
 GPS week: 1195   Day: 0   MJD: 52609                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2584      0     0.21    -0.18     5.04     0.00
 cod |   288     0  23875    286     0.10     0.17     0.07    19.32
 emr |   288     0  17305    316  1513.54    11.15     0.09    13.90
 esa |   288     0  17632    580    -0.18    -0.02     0.08    17.00
 gfz |   288     0  15097     33     0.00    -0.37     0.07    20.51
 igu |    96     0   2488      0     0.22    -0.21     3.87     0.00
 jpl |   288     0  13139    572     1.41    -1.70     0.05    29.28
 ngs |    96     0   2584      0     0.21    -0.18     4.99     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs |
 -----+-------------------------------------------------+
    1 |  1640    34  -127    45     1 15627    23  1753 |
    2 |   994  -133  -234   -21   312  6346   -14   321 |
    3 | -3831  -100  -388   -10   274 -2543   137 -2907 |
    4 | -2785   159  -227   -47  -197 -7552   310 -2940 |
    5 | -1523    88  -169   198   -34   133  -150 -1700 |
    6 |  9134    -7  -244     9    91 20638   102  7853 |
    7 |  -164   131   -99   153     2 -2987  -227  -165 |
    8 |  2162    98   -77    37    54  4188  -191  1895 |
    9 | -7892    43   -34   -64   -13 -3833    64 -6953 |
   10 | -7215   158   121    55    56 -8735  -429 -6686 |
   11 |  3939   -87  -113   102    48 -2059    38  4209 |
   13 |  3529   -15   -96  -122   -85  -561   405  3726 |
   14 |  2161    42   -31   140  -137 -1295     4  2368 |
   15 |  2031    42   -50     -   103  1090  -166  1875 |
   17 |   757    76   -57    46    28 -5169  -151   618 |
   18 |  3831   -21  -107   332  -168  -533   -21  3885 |
   20 |  3395    23  -189   159   -93 -2523    87  3491 |
   22 |  -206  -130  -142     1   313  -208  -124  -691 |
   23 |  -163    71     X   -34    -7  4357   -42  -342 |
   24 |  1081   152   -46   -50  -106  1048    43   992 |
   25 |   -23   -90  -384    53    67  2402   358  -425 |
   26 |   135   -17   -49   -60   -20  4916   198   130 |
   27 |  -422   -29  -152    45   -10-10956   123  -167 |
   28 |  -507    73    90   -93    82 -1697  -174  -431 |
   29 | -4409    85    64  -241     2     -   128 -4385 |
   30 | -3589   -41  -192   -68   -34 -1373   334 -3389 |
   31 | -1994   -77  -232    75   197 -8499   -33 -1872 |
 -----+-------------------------------------------------+
 ALBH |     -  -115    15     -     -     -    69     - |
 ALGO |     -   -99   137     X     -     -     -     - |
 AMC2 |     -  -112   156     -     -     -     X     - |
 BAHR |     -    -1    24    20   -32     -     -     - |
 BILI |     -     -     -     -    49     -   -35     - |
 BJFS |     -     -   132     -   -90     -     -     - |
 BOGT |     -     X     -   186     -     -  -108     - |
 BRMU |     -    69     -  -144    57     -     -     - |
 BRUS |     -   -68    95     -     -     -     -     - |
 CAS1 |     -   -29     -    77   -67     -    22     - |
 CEDU |     -   -52     -    59     -     -     -     - |
 CHUR |     -   -87   120     -     -     -     -     - |
 COCO |     -   -36     -  -159   105     -    42     - |
 CRO1 |     -  -148   237     -     -     -   -10     - |
 DAVR |     -   -66     -     -    63     -     -     - |
 DRAO |     -   -60    83     -     -     -     -     - |
 EISL |     -   -47     -  -440    77     -   226     - |
 FAIR |     -     -    48    19   -99     -    30     - |
 FLIN |     -    -7     -     -     -     -     5     - |
 GODE |     -   -96   247   -91     -     -     -     - |
 GOLD |     -     3     -     -     -     -    -2     - |
 GUAM |     -    13     -     X   -12     -     X     - |
 GUAT |     -   145     -     -  -136     -     -     - |
 HOB2 |     -   -75   166    29     -     -   -45     - |
 HOFN |     -     -     -     -    -4     -     3     - |
 HRAO |     -    -6     -     -     -     -     4     - |
 IISC |     -   -37     -     -     -     -    24     - |
 IRKT |     -     -  -189   155     -     -     -     - |
 JAB1 |     -     5     -     -     -     -    -3     - |
 JPLM |     -     -    98     -   -66     -     -     - |
 KARR |     -   -70     -     -    66     -     -     - |
 KIRU |     -  -167    90   157     -     -   -22     - |
 KOKB |     -    11   112     -   -85     -     -     - |
 KOUR |     -    19     -   -21     -     -     -     - |
 MAC1 |     -   -52     -     4    46     -     -     - |
 MADR |     -    84  -117     -     -     -     -     - |
 MALI |     -   279     -  -273   -24     -     -     - |
 MAS1 |     -    18   127  -125     0     -     -     - |
 MATE |     -    27     -   -31     -     -     -     - |
 MAW1 |     -   125     -     -  -105     -    -9     - |
 MDO1 |     -   381   560  -878     -     -     -     - |
 METS |     -  -116   161     -     -     -     -     - |
 MKEA |     -   -71     -   -13   -69     -   107     - |
 NLIB |     -     -    38   -95     -     -    38     - |
 NRC2 |     -  -312    40   595  -226     -     -     - |
 NRIL |     -     -     -     -   -96     -    68     - |
 NYAL |     -     -  -174   142     -     -     -     - |
 OHI2 |     -    60     -     -   -64     -     5     - |
 PERT |     -   -41   -41   179     -     -   -57     - |
 PIE1 |     -  -107   166   -30     -     -    10     - |
 POTS |     -   -47     -    63     -     -    -6     - |
 RABT |     -    69     -     -     -     -   -46     - |
 RBAY |     -    58     -     -   -55     -     -     - |
 RIOG |     -   113     -     -  -106     -     -     - |
 SANT |     -  -316     -   447     -     -   -54     - |
 SCH2 |     -  -158   220     -     -     -     -     - |
 SELE |     -   431     -  -490     -     -     -     - |
 SUTH |     -   -75     -    85     -     -     -     - |
 TOW2 |     -    89     -     -     -     -   -59     - |
 TSKB |     -     1  -106    86     -     -     -     - |
 TWTF |     -    68   -95     -     -     -     -     - |
 USN1 |     -     -   569     -     -     -  -270     - |
 USUD |     -   121  -246   122     -     -   -37     - |
 VILL |     -   153     -  -173     -     -     -     - |
 WES2 |     -  -100   139     -     -     -     -     - |
 WILL |     -   -57    79     -     -     -     -     - |
 WSRT |     -   -66     -    75     -     -     -     - |
 WTZR |     -    13   299  -256     -     -     -     - |
 WUHN |     -     -     -   116   159     -  -178     - |
 YAKT |     -     -   -51     -     -     -    24     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  7014    72    56    73    74  5987    30  7157 |  288   3.86
    2 |  3010    38    68   122    38  3656    95  3012 |  288   2.76
    3 |  8874    75   126    64    62  6111    84  8410 |  286   4.19
    4 |  3402   115    77    71    73  3805    56  3532 |  288   0.97
    5 | 12407    69    56    45    98  7487    90 10329 |  288   4.71
    6 | 12725   192    65   138   211  9486    58 13681 |  280  12.06
    7 |  2014   166   133    87    54  2251   132  2112 |  282   1.25
    8 |  4706    56    64    63    64  2522    50  4927 |  288   4.31
    9 |  4862    60    84    43    70  1736    56  5043 |  288   2.32
   10 |  2054    77    97    93    60  2451    68  2765 |  288   2.15
   11 |   936   130   183    59    51  1262    53  1420 |  288   0.25
   13 |  1116    54   119    52    32   523    72  1029 |  288   0.25
   14 |  1225    96   102    95    54   601    57  1446 |  288   0.24
   15 |  2914    66    50     -    44  1401    42  2388 |  288   2.60
   17 |  2164    67    69   253    91  3647    87  2228 |  288   1.54
   18 |  1052    64    77    45    29   512    28  1065 |  288   0.39
   20 |  1114   116    86    51    68  1193    39  1156 |  288   0.20
   22 |  4326    40    49    52    35  3631    31  4198 |  288   2.90
   23 |  8608    84     X    68    83  4736    41  8675 |  288   7.26
   24 |  3531   105    42    87    75  2552    67  3589 |  288   2.77
   25 |  5511    89    56    81   167  3231   100  6116 |  288   3.44
   26 |   926    85   221   118    38  2381    68   979 |  288   0.68
   27 |  2139    39    98   114    36  6367    44  2150 |  288   1.52
   28 |  2140    75    44    46    85  1188    55  2202 |  288   0.59
   29 |  1287   102   176   161    72     -    74  1363 |  288   0.76
   30 |   950    76   105    40    90  1183    73   908 |  288   0.77
   31 |  3018   107   108   109   168  2781    45  2942 |  284   1.55
 -----+-------------------------------------------------+--------------
 ALBH |     -    38    77     -     -     -    22     - |  286   0.21
 ALGO |     -    30    42     X     -     -     -     - |  288   0.04
 AMC2 |     -    43    60     -     -     -     X     - |  287   0.05
 BAHR |     -    27    53    31    27     -     -     - |  288   0.39
 BILI |     -     -     -     -    18     -    12     - |  287  12.22
 BJFS |     -     -    44     -    30     -     -     - |  287    >>>
 BOGT |     -     X     -    78     -     -    45     - |  288  32.84
 BRMU |     -    48     -    67    29     -     -     - |  287  22.25
 BRUS |     -    78   109     -     -     -     -     - |  288   0.08
 CAS1 |     -    49     -    88    47     -    49     - |  287   8.45
 CEDU |     -    38     -    44     -     -     -     - |  279  27.38
 CHUR |     -    68    94     -     -     -     -     - |  255   0.64
 COCO |     -    22     -    80    36     -    34     - |  288  16.28
 CRO1 |     -    38   131     -     -     -    51     - |  287  30.23
 DAVR |     -    39     -     -    37     -     -     - |  277  21.94
 DRAO |     -    25    34     -     -     -     -     - |  288   0.05
 EISL |     -    71     -    91    45     -    42     - |  288  49.08
 FAIR |     -     -    55    82    33     -    37     - |  287   0.07
 FLIN |     -    21     -     -     -     -    14     - |  288   7.30
 GODE |     -    49    90    32     -     -     -     - |  288   0.17
 GOLD |     -    88     -     -     -     -    58     - |  288  19.04
 GUAM |     -    60     -     X    57     -     X     - |  285  24.17
 GUAT |     -    26     -     -    25     -     -     - |  279    >>>
 HOB2 |     -   105   144    48     -     -    47     - |  288   0.09
 HOFN |     -     -     -     -    28     -    20     - |  288    >>>
 HRAO |     -    69     -     -     -     -    45     - |  288   3.59
 IISC |     -    22     -     -     -     -    15     - |  189  14.31
 IRKT |     -     -    41    33     -     -     -     - |  284   0.21
 JAB1 |     -    61     -     -     -     -    40     - |  286  19.13
 JPLM |     -     -    49     -    33     -     -     - |  273  42.22
 KARR |     -    22     -     -    21     -     -     - |  288  12.85
 KIRU |     -    45   104    31     -     -    37     - |  288   1.58
 KOKB |     -    39    93     -    51     -     -     - |  288   0.05
 KOUR |     -    83     -    94     -     -     -     - |  271   1.54
 MAC1 |     -    62     -    30    50     -     -     - |  288  17.62
 MADR |     -   106   148     -     -     -     -     - |  285  21.92
 MALI |     -    60     -   154    83     -     -     - |  288  31.89
 MAS1 |     -    27    27    37    26     -     -     - |  288   1.91
 MATE |     -    22     -    25     -     -     -     - |  288   0.06
 MAW1 |     -    44     -     -    41     -    30     - |  288  28.89
 MDO1 |     -    22    28    38     -     -     -     - |  288  29.84
 METS |     -    24    34     -     -     -     -     - |  282   1.08
 MKEA |     -    70     -    91    71     -    66     - |  272    >>>
 NLIB |     -     -    91    30     -     -    37     - |  288   0.04
 NRC2 |     -    35    39    20    19     -     -     - |  288   0.03
 NRIL |     -     -     -     -    13     -     9     - |  287  13.92
 NYAL |     -     -    95    77     -     -     -     - |  235   0.08
 OHI2 |     -    40     -     -    31     -    30     - |  288  13.42
 PERT |     -    82    86    51     -     -    41     - |  288  15.15
 PIE1 |     -    26   100    46     -     -    27     - |  288   0.05
 POTS |     -    32     -    32     -     -    35     - |  277  16.32
 RABT |     -    27     -     -     -     -    18     - |  258  18.66
 RBAY |     -    38     -     -    36     -     -     - |  262 228.32
 RIOG |     -    35     -     -    33     -     -     - |  278  16.80
 SANT |     -   105     -    51     -     -    88     - |  288   6.24
 SCH2 |     -    39    54     -     -     -     -     - |  280  43.83
 SELE |     -    24     -    28     -     -     -     - |  283  29.90
 SUTH |     -    59     -    67     -     -     -     - |  287  20.59
 TOW2 |     -    68     -     -     -     -    45     - |  288  18.45
 TSKB |     -    50    42    55     -     -     -     - |  288   0.98
 TWTF |     -    46    64     -     -     -     -     - |  287   0.44
 USN1 |     -     -    83     -     -     -    40     - |  285   0.04
 USUD |     -    47    59    40     -     -    21     - |  288  13.80
 VILL |     -    48     -    55     -     -     -     - |  288   3.54
 WES2 |     -    77   107     -     -     -     -     - |  284   0.05
 WILL |     -    52    72     -     -     -     -     - |  280   0.88
 WSRT |     -    25     -    29     -     -     -     - |  288   0.05
 WTZR |     -    35    53    27     -     -     -     - |  288   0.09
 WUHN |     -     -     -    35    41     -    29     - |  287  17.91
 YAKT |     -     -   104     -     -     -    50     - |  286   0.42
 -----+-------------------------------------------------+--------------
 TOT  |  5035    68    91    78    67  3874    50  4988 |


 BEST CLOCK FIT: NRC2   288   0.03 (ns) 

