
 GPS week: 1194   Day: 0   MJD: 52602                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2582      0     0.03    -0.08     5.07     0.00
 cod |   288     0  20946     58     0.41    -0.27     0.09    15.41
 emr |   288     0  16138      6  -138.40    -6.03     0.08    18.78
 esa |   288     0  14314    327    -0.11    -0.27     0.11    12.44
 gfz |   288     0  14729    150     0.54    -1.06     0.07    23.77
 igu |    96     0   2486      0     0.04    -0.12     4.54     0.00
 ngs |    96     0   2582      0     0.03    -0.07     4.82     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   188     0  14556      2 -5614.76   -47.38     0.05    29.60

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  3354   -38   120  -288   100  7955  1966     -   -37 |
    2 | -2090  -198    12    36   176 -6972 -2108     -  -108 |
    3 | -6405    63    -8   -84   116 -5226 -5217     -  -120 |
    4 |   579   150  -112   109    91  2538   531     -  -176 |
    5 |  4077    -4  -198   360    91  6101  3165     -  -149 |
    6 | -5182   277  -225   198   104  2704 -3890     -  -221 |
    7 |   427  -110    77   140    49  2198   390     -  -149 |
    8 |  1423   341   353  -534  -387 -7803   723     -   214 |
    9 | -1703    36  -156   270    99 -4514 -1051     -  -169 |
   10 |   623   166   -93   -31    43  7768    -3     -   -60 |
   11 |  4459   -76   -90   119  -133  2977  4614     -   225 |
   13 |  6246   142     6  -138   -99  3279  6182     -    94 |
   14 |  5801    36   -52    79     8  3368  5603     -   -32 |
   15 |  2782   102   -72     -    57 17056  1981     -   -81 |
   17 | -9510   225  -194   185   -33-19254 -8870     -   -57 |
   18 |  4818   113  -206   270    -9  2067  4742     -   -36 |
   20 |  6651   132   136  -227   -82  1806  6616     -    22 |
   22 | -1432  -316   107    71   212  -668 -1405     -  -198 |
   23 | -8423   198  -275    62    36 -6683 -7599     -    46 |
   24 | -6626   132   -59   -41    63  2501 -6615     -   -83 |
   25 |  4125    51   -38    35   112  4665  3564     -  -160 |
   26 | -2182    90  -153   387    25   -73 -2273     -  -192 |
   27 |   -33    21   130   -58   -85-13475   243     -     3 |
   28 | 10649     7    55  -148    25 10401 10852     -     6 |
   29 | -3503     9  -166   155   110     - -3495     -   -81 |
   30 | -2962    62  -193   161   121 -2284 -3122     -  -108 |
   31 | -6376   145   -50    40   -47-10626 -5874     -   -14 |
 -----+-------------------------------------------------------+
 ALBH |     -  -137   -30     -     -     -     -     -   139 |
 ALGO |     -  -130    35   136     -     -     -     -   -18 |
 AOML |     -    -7     -     -     -     -     -     -     4 |
 ARTU |     -    32     -     -   -21     -     -     -     - |
 BAHR |     -    41   113   -61   -71     -     -     -   -16 |
 BJFS |     -     -   -66     -  -244     -     -     -   366 |
 BOR1 |     -   -16   119     -     -     -     -     -  -102 |
 BRMU |     -    28     -   115   -19     -     -     -   -71 |
 BRUS |     -  -101   130     -     -     -     -     -   -46 |
 CAS1 |     -     -     -   180   -94     -     -     -     - |
 CHUR |     -    36   164     -     -     -     -     -  -167 |
 COCO |     -     -     -  -175    92     -     -     -     - |
 DAEJ |     -   151    -2     -     -     -     -     -  -119 |
 DRAO |     -    23    58     -   -28     -     -     -   -40 |
 FORT |     -   577    87  -542  -105     -     -     -    -1 |
 GRAZ |     -  -142     -   195     -     -     -     -   -12 |
 GUAT |     -    93     -     -  -119     -     -     -    75 |
 HERS |     -  -177     2     -     -     -     -     -   136 |
 HOB2 |     -   140     -  -173     -     -     -     -     - |
 KERG |     -    35   -33     -    51     -     -     -   -56 |
 KGN0 |     -     -   197     -     -     -     -     -  -125 |
 KIRU |     -  -198   153     -     -     -     -     -     9 |
 KOSG |     -  -107     -     -     -     -     -     -    56 |
 KOUR |     -   -55     -    62     -     -     -     -     1 |
 KUNM |     -  -221     -     -     -     -     -     -   115 |
 LPGS |     -   153     -     -     X     -     -     -   -80 |
 MAC1 |     -     -     -    11    -6     -     -     -     - |
 MALI |     -   378     -  -433  -308     -     -     -   426 |
 MAS1 |     -   -57    53   128   -19     -     -     -   -67 |
 MATE |     -    35     -    14     -     -     -     -   -37 |
 MEDI |     -  -136    21     -     -     -     -     -    87 |
 METS |     -  -188     9     -     -     -     -     -   141 |
 MIZU |     -     -   -41     -     -     -     -     -    26 |
 NOT1 |     -     -  -159     -     -     -     -     -   101 |
 NRC2 |     -   -94    52     X   -47     -     -     -    83 |
 OS0G |     -   -72   103    46   -46     -     -     -   -15 |
 POTS |     -    29     -   -32     -     -     -     -    -3 |
 RESO |     -    54     -     -   -35     -     -     -     - |
 REYK |     -  -193     -     -     -     -     -     -   101 |
 RIOG |     -  -151     -  -133   279     -     -     -  -151 |
 SCH2 |     -  -327    21     -     -     -     -     -   243 |
 SELE |     -   122     -  -379     -     -     -     -   149 |
 SFER |     -  -268     -     -     -     -     -     -   140 |
 STJO |     -  -184   -12     -     -     -     -     -   156 |
 THTI |     -     -     -    74    14     -     -     -   -65 |
 TIXI |     -    61     -     -   -39     -     -     -     - |
 TLSE |     -  -137    -2     -     -     -     -     -   112 |
 TOW2 |     -   133     -     -   -86     -     -     -     - |
 TRO1 |     -  -223     -     -   -56     -     -     -   231 |
 TROM |     -     -     -   -53     -     -     -     -    22 |
 TSKB |     -    -4    60  -102     -     -     -     -    11 |
 TWTF |     -     1  -213     -     -     -     -     -   208 |
 URUM |     -   -48     -     -    -9     -     -     -    50 |
 USNO |     -   -34   101     -     -     -     -     -   -72 |
 VILL |     -   104     -  -116     -     -     -     -    -8 |
 WES2 |     -  -130   107     -     -     -     -     -     - |
 WHIT |     -    15     -     -   -10     -     -     -     - |
 WILL |     -  -119   -17     -     -     -     -     -   111 |
 WSRT |     -  -132   187     -     -     -     -     -   -76 |
 WTZR |     -   -59   174  -134     -     -     -     -   -34 |
 WUHN |     -  -153     -   -38   163     -     -     -   -55 |
 YELL |     -    70     -   249     -     -     -     -  -204 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8188    43    68    62    29  5216  8026     -    34 |  288   5.87
    2 |  5330    79    38    62    50  4801  5207     -    36 |  288   1.85
    3 |  5337   303    89   207   145  3047  4079     -   107 |  284   2.84
    4 |  1175    74    59    83    58  1158  1158     -    70 |  288   0.70
    5 |  9143   157    77    95    67  9329  7843     -    65 |  288   3.63
    6 | 14298   245    84   124    65  6218 14144     -   117 |  281  10.90
    7 |  1069   241   145   208   141  1245   856     -   111 |  281   1.02
    8 |  5472   158    56   112   104  3091  5588     -    38 |  288   4.97
    9 |  5410    41    38    41    64  3711  5266     -    36 |  288   3.26
   10 |  4060    85    45    78    41  4562  4062     -    21 |  288   3.24
   11 |  1035   102    61    92    67   921  1090     -    60 |  288   0.27
   13 |   859    60   112    63    57  1340   653     -    51 |  288   0.31
   14 |  1926   131   139   100   119  1198  1744     -    55 |  288   0.19
   15 |  5074    76    42     -    25  6781  4318     -    22 |  288   3.89
   17 |  3872    71    53    86    41  7813  3644     -    40 |  288   2.23
   18 |  1167   116    43    77    33   970  1009     -    39 |  288   0.31
   20 |  1222   113    54   175   143   686   906     -    74 |  288   0.32
   22 |  4837   104   199   108    58  1888  4510     -    39 |  288   2.54
   23 |  7610    71    83    65    73  5564  6607     -    34 |  288   7.48
   24 |  1757    73   119    48   164  2806  1890     -    94 |  288   2.15
   25 |  6070    76    86    88    33  2244  6401     -    41 |  288   2.20
   26 |  1757   109   104   187    54   982  1592     -    52 |  288   0.54
   27 |  1971   123    51   158   106  8471  2036     -    96 |  288   1.47
   28 |  4487    98    40   184    75  6012  4617     -    53 |  288   0.49
   29 |  1132    75   118    96   101     -   979     -    60 |  288   0.65
   30 |  3466    76    29   195    35  3158  3205     -    66 |  288   1.03
   31 |  2278   184    66   138    90  5443  1900     -    43 |  281   1.22
 -----+-------------------------------------------------------+--------------
 ALBH |     -    71    53     -     -     -     -     -    39 |  288   0.22
 ALGO |     -   117   187   191     -     -     -     -   145 |  285   0.06
 AOML |     -    14     -     -     -     -     -     -     7 |  186  32.30
 ARTU |     -    21     -     -    14     -     -     -     - |  288  13.66
 BAHR |     -    66    34    72    22     -     -     -    25 |  288   0.30
 BJFS |     -     -    89     -    60     -     -     -    61 |  288    >>>
 BOR1 |     -    39    61     -     -     -     -     -    35 |  284   0.48
 BRMU |     -    82     -    87    47     -     -     -    16 |  286  20.11
 BRUS |     -    28    51     -     -     -     -     -    36 |  288   0.06
 CAS1 |     -     -     -    22    12     -     -     -     - |  288   7.67
 CHUR |     -   177   135     -     -     -     -     -    69 |  280   1.20
 COCO |     -     -     -    31    16     -     -     -     - |  288  15.36
 DAEJ |     -    92   125     -     -     -     -     -    59 |  287   1.53
 DRAO |     -    49    19     -    29     -     -     -    13 |  288   0.12
 FORT |     -    67    29    58    34     -     -     -    43 |  288   0.09
 GRAZ |     -    92     -   149     -     -     -     -    39 |  288  16.02
 GUAT |     -    73     -     -    37     -     -     -    23 |  287    >>>
 HERS |     -    33    44     -     -     -     -     -    31 |  256  18.04
 HOB2 |     -    63     -    78     -     -     -     -     - |  283   0.10
 KERG |     -    99    52     -    33     -     -     -    34 |  287   1.38
 KGN0 |     -     -    45     -     -     -     -     -    29 |  183   0.26
 KIRU |     -    66    62     -     -     -     -     -    32 |  249   1.96
 KOSG |     -    40     -     -     -     -     -     -    21 |  187  12.36
 KOUR |     -    83     -   105     -     -     -     -    31 |  264   2.99
 KUNM |     -    39     -     -     -     -     -     -    20 |  173  52.19
 LPGS |     -    62     -     -     X     -     -     -    32 |  143  22.66
 MAC1 |     -     -     -    39    20     -     -     -     - |  288  20.54
 MALI |     -    78     -    59    51     -     -     -    61 |  288  37.57
 MAS1 |     -    26    19    30    25     -     -     -    17 |  288   2.25
 MATE |     -    30     -    42     -     -     -     -    11 |  288   0.07
 MEDI |     -    62    93     -     -     -     -     -    51 |  284   0.09
 METS |     -    49    51     -     -     -     -     -    43 |  284   0.13
 MIZU |     -     -   100     -     -     -     -     -    63 |  169   0.37
 NOT1 |     -     -    58     -     -     -     -     -    37 |  187    >>>
 NRC2 |     -    25    14     X    12     -     -     -    25 |  288   0.04
 OS0G |     -    19    24   106    48     -     -     -    17 |  288   0.14
 POTS |     -    71     -    98     -     -     -     -    14 |  277  16.23
 RESO |     -    43     -     -    28     -     -     -     - |  285   9.91
 REYK |     -    17     -     -     -     -     -     -     9 |  187   9.19
 RIOG |     -    76     -    25    40     -     -     -    53 |  276  16.63
 SCH2 |     -    83   130     -     -     -     -     -    61 |  285  18.52
 SELE |     -    38     -    62     -     -     -     -    34 |  287  26.68
 SFER |     -    59     -     -     -     -     -     -    31 |  127    >>>
 STJO |     -    61    28     -     -     -     -     -    36 |  288  14.20
 THTI |     -     -     -    68    37     -     -     -    45 |  287   0.98
 TIXI |     -    56     -     -    36     -     -     -     - |  287   8.89
 TLSE |     -    44    49     -     -     -     -     -    31 |  288   0.51
 TOW2 |     -    26     -     -    17     -     -     -     - |  284  18.64
 TRO1 |     -    59     -     -    46     -     -     -    34 |  266  12.42
 TROM |     -     -     -    27     -     -     -     -    12 |  187  14.12
 TSKB |     -    40    14    57     -     -     -     -    16 |  288   0.84
 TWTF |     -    75    70     -     -     -     -     -    58 |  288   0.55
 URUM |     -    47     -     -    34     -     -     -    37 |  288  35.87
 USNO |     -    56    40     -     -     -     -     -    24 |  288   0.03
 VILL |     -    39     -    71     -     -     -     -    41 |  288   5.15
 WES2 |     -    72    59     -     -     -     -     -     - |  286   0.09
 WHIT |     -    49     -     -    31     -     -     -     - |  284   1.65
 WILL |     -    42    46     -     -     -     -     -    32 |  288   0.62
 WSRT |     -    27    50     -     -     -     -     -    34 |  285   0.06
 WTZR |     -    37    53    40     -     -     -     -    15 |  288   0.07
 WUHN |     -    54     -    51    41     -     -     -    56 |  287  25.71
 YELL |     -   164     -   146     -     -     -     -   176 |  252   0.16
 -----+-------------------------------------------------------+--------------
 TOT  |  5071    91    79   106    66  4537  4816     -    53 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

