
 GPS week: 1193   Day: 2   MJD: 52597                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2583      0    -0.03     0.27     4.89     0.00
 cod |   288     0  23086     45     0.02     0.18     0.08    15.82
 emr |   288     0  18106      1  1334.83    11.69     0.05    23.85
 esa |   288     0  17663    343     0.96    -0.86     0.10    11.86
 gfz |   288     0  13838      0     0.22    -0.50     0.07    16.46
 igu |    96     0   2295      0    -0.03     0.27     4.61     0.00
 ngs |    96     0   2583      0    -0.03     0.27     4.71     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |    46     0   3646     44 -5394.48   -49.03     0.06    32.01

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |   923   -89   -14  -152   274 13914   143     -  -190 |
    2 |  7462  -171   -69    22   248 14769  6344     -     5 |
    3 | -4139    -7  -236    66   356 -1301 -2917     -  -167 |
    4 |   -93   121  -100    12    52  4608  -409     -  -105 |
    5 |  1099    84  -164   106   113 13979   689     -  -106 |
    6 |    22   131  -170   -25   189 -2896  1020     -  -167 |
    7 |  2734    13  -124   176    96  1689  2667     -  -164 |
    8 | -1182   -51   -85    28   207 -1973 -1712     -  -173 |
    9 | -5609   123   -91    92   -33  -638 -4552     -   -64 |
   10 | -3377   199   -43    41  -131 -4795 -3396     -   -87 |
   11 |  5899   -57   117   113  -208  2645  5571     -    40 |
   13 |  4205   -71   115    39  -101  1669  4001     -   -80 |
   14 |  4252    64    39    -5  -109  1714  4258     -   -20 |
   15 |  1315   183  -162     -    54     -  1424     -    17 |
   17 |  1812   304  -116    58  -102     -  1164     -  -202 |
   18 |  3744    91   -11   209  -225   703  3737     -     9 |
   20 |  2595   -57    59   -10     4  2427  2624     -   -89 |
   22 |-12760  -191  -106  -175   506-19731-10400     -  -144 |
   23 |  1050   258   -97    18   -95  7712    88     -   -85 |
   24 | -5615   318   -63    22  -209 -3045 -5558     -   -70 |
   25 | -2043   -58  -166    54   268 -7731 -1914     -   -34 |
   26 |  -802   174   -80    78   -57   546  -829     -  -161 |
   27 | -1991  -110   -96   -12   305-13673 -2352     -  -165 |
   28 |  3952    95   107   -24  -240  2503  3653     -    38 |
   29 | -2814   279  -126    38   -16     - -2438     -  -309 |
   30 | -2448    -5  -148   128   169 -8049 -2624     -  -133 |
   31 |  1858  -111   -22   -40   173 -5182  1815     -   -21 |
 -----+-------------------------------------------------------+
 ALBH |     -    21   -50     -     -     -     -     -   165 |
 ALGO |     -   -98    61     X     -     -     -     -    18 |
 AMC2 |     -  -104    36     -     -     -     -     -   152 |
 ASC1 |     -   107     -  -154     -     -     -     -    27 |
 AUCK |     -    18     -   -54     -     -     -     -    41 |
 BAHR |     -   296   223  -786    16     -     -     -  -182 |
 BILI |     -     2     -     -    -2     -     -     -     - |
 BRMU |     -    92     -  -160    38     -     -     -   -33 |
 CAS1 |     -   -79     -   100     -     -     -     -    13 |
 CEDU |     -   -83     -   -15     -     -     -     -   291 |
 CHAT |     -   -32     -    95   -67     -     -     -    80 |
 CHUR |     -   154   -58     -     -     -     -     -  -210 |
 COCO |     -   -30     -    11     -     -     -     -    69 |
 CRO1 |     -   -35    30     -     -     -     -     -   -33 |
 DAEJ |     -   -71    47     -     -     -     -     -     X |
 DRAO |     -   -18    21     -     -     -     -     -   -43 |
 EISL |     -     -     -   218  -177     -     -     -    62 |
 FAIR |     -     2    35   132  -186     -     -     -   122 |
 GODE |     -  -257   165     -     -     -     -     -    26 |
 GUAM |     -  -300     -   807  -267     -     -     -  -116 |
 GUAT |     -   -19     -     -   -49     -     -     -   216 |
 HERS |     -   -63   -55     -     -     -     -     -   413 |
 HOB2 |     -    90   148  -421     -     -     -     -    16 |
 IRKT |     -     -     7   -15     -     -     -     -     - |
 JPLM |     -     -   -69     -    51     -     -     -   152 |
 KERG |     -  -118   122     -   -47     -     -     -   -52 |
 KOUR |     -     0     -   -94    64     -     -     -   -19 |
 LHAS |     -    39     -   -53     -     -     -     -     - |
 MAC1 |     -   -42     -   -20     -     -     -     -   176 |
 MALI |     -     -     -   643  -463     -     -     -     - |
 MAS1 |     -   -75   110   -65   -26     -     -     -   -61 |
 MCM4 |     -   -55     -     -   113     -     -     -  -193 |
 MDO1 |     -    17   124  -315     -     -     -     -   121 |
 MEDI |     -    41  -115     -     -     -     -     -   393 |
 MKEA |     -    81     -    -7   -81     -     -     -    37 |
 NRC2 |     -     6    76  -132   -69     -     -     -   155 |
 NYAL |     -     -    35   -21     -     -     -     -  -115 |
 OS0G |     -     -    54    16   -61     -     -     -   -91 |
 PERT |     -   -11    65   -21   -69     -     -     -     - |
 PIE1 |     -    63   112  -190     -     -     -     -  -278 |
 POTS |     -   -10     -   -36     -     -     -     -   149 |
 RESO |     -    55     -     -   -53     -     -     -     - |
 RIOG |     -    63     -    72  -138     -     -     -    82 |
 SANT |     -   -29     -    51     -     -     -     -   -29 |
 SCH2 |     -  -245   168     -     -     -     -     -    36 |
 SELE |     -  -244     -   300     -     -     -     -    48 |
 SFER |     -   -74    27     -     -     -     -     -   102 |
 STJO |     -  -204    98     -     -     -     -     -   178 |
 SUTH |     -  -101     -   110     -     -     -     -    58 |
 THTI |     -     -     -   100   -40     -     -     -  -107 |
 TIDB |     -    15    47    53  -121     -     -     -     - |
 TLSE |     -   -34   -26     -     -     -     -     -   232 |
 TSKB |     -    33    68  -154     -     -     -     -   -64 |
 TWTF |     -   -28   -39     -     -     -     -     -   275 |
 USNO |     -   -43    43     -     -     -     -     -   -70 |
 USUD |     -    94  -104    52     -     -     -     -    58 |
 VILL |     -   142     -  -272     -     -     -     -   196 |
 WES2 |     -  -174   115     -     -     -     -     -     - |
 WILL |     -    24   -53     -     -     -     -     -   174 |
 WSRT |     -  -144   126     -     -     -     -     -  -146 |
 WTZR |     -   -59   245  -392     -     -     -     -   -46 |
 YAKT |     -   -52    -6     -     -     -     -     -   188 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  9244    68    53   146    52  6580  9430     -    58 |  288   4.92
    2 |  4301   140    45   173    66  8896  3632     -    15 |  288   1.50
    3 |  6888   120    78   199   128  3354  6523     -    52 |  280   2.64
    4 |  1814   130    49   146    59  2654  1585     -    34 |  288   0.60
    5 |  4799    57    76   139    51  4796  4827     -    36 |  288   2.15
    6 | 11727   233    65    90   105  7039 10813     -    51 |  281  11.24
    7 |  1616   129   135    56   144  1864  1601     -    50 |  281   0.81
    8 |  7223    66    33    57    37  4083  7147     -    50 |  288   5.46
    9 |  6925    57    58    59    84  2919  6554     -    45 |  288   2.88
   10 |  2503   103    42   161    51  2422  2593     -    33 |  288   2.67
   11 |  1527    81    62    62   132  1891  1050     -    13 |  288   0.45
   13 |  1433    72    41   165    40  1485  1227     -    26 |  288   0.50
   14 |  1025    56    35    42   100  1232   965     -    14 |  288   0.22
   15 |  6412    61    26     -    37     -  6367     -    26 |  288   1.72
   17 |  4627    71    25    41    43     -  4207     -    58 |  288   1.68
   18 |  1843    95    59   128    51   819  1751     -    12 |  288   0.30
   20 |  1468   139    48   132    55  1466  1416     -    33 |  288   0.45
   22 |  7407    79    89    73    64 11400  6659     -    49 |  288   4.34
   23 |  7913    69    27    69    76  3820  8359     -    29 |  288   7.05
   24 |  2200    99    49    62   168  1824  2137     -    28 |  288   2.38
   25 |  3692   125    50   159    75  3277  3515     -    14 |  288   2.41
   26 |   645    62    41    88    70   489   461     -    48 |  288   0.55
   27 |  2627    57    38   114    57  7384  2376     -    48 |  288   1.42
   28 |  1379    66    44    58    65  2378  1367     -    12 |  288   0.41
   29 |  1639    61    40    65    82     -  1444     -   128 |  288   0.54
   30 |  2793    54    29    32    36  4561  2658     -    41 |  288   0.50
   31 |  1429    86    71   108    45  4207  1306     -    12 |  281   1.24
 -----+-------------------------------------------------------+--------------
 ALBH |     -    50    35     -     -     -     -     -    63 |  281   0.07
 ALGO |     -    22    15     X     -     -     -     -     9 |  288   0.04
 AMC2 |     -    51    34     -     -     -     -     -    56 |  288   0.13
 ASC1 |     -    27     -    36     -     -     -     -     6 |  285    >>>
 AUCK |     -   156     -   224     -     -     -     -    29 |  176  23.42
 BAHR |     -    60    38    32    54     -     -     -    53 |  288   1.28
 BILI |     -    21     -     -    20     -     -     -     - |  287  13.46
 BRMU |     -    32     -    62    38     -     -     -    28 |  288  20.33
 CAS1 |     -    70     -    98     -     -     -     -    10 |  288   8.27
 CEDU |     -    95     -    78     -     -     -     -   120 |  288  19.98
 CHAT |     -    63     -    46    29     -     -     -    17 |  239   9.68
 CHUR |     -   163    91     -     -     -     -     -   109 |  261   0.97
 COCO |     -    43     -    46     -     -     -     -    22 |  288  11.30
 CRO1 |     -    54    34     -     -     -     -     -    18 |  282  25.52
 DAEJ |     -    78    52     -     -     -     -     -     X |  286   2.26
 DRAO |     -    22    15     -     -     -     -     -    23 |  288   0.09
 EISL |     -     -     -    35    23     -     -     -    30 |  288  28.95
 FAIR |     -    44    38    26    30     -     -     -    32 |  288   0.09
 GODE |     -    75    55     -     -     -     -     -    36 |  285   0.33
 GUAM |     -    39     -    77    48     -     -     -    70 |  266  23.18
 GUAT |     -    61     -     -    40     -     -     -    77 |  287    >>>
 HERS |     -    63    61     -     -     -     -     -   159 |  242  22.65
 HOB2 |     -    95   112   128     -     -     -     -    27 |  288   0.12
 IRKT |     -     -    47    95     -     -     -     -     - |  281   0.30
 JPLM |     -     -    55     -    55     -     -     -    69 |  276  14.49
 KERG |     -    88    36     -    55     -     -     -    28 |  287   2.36
 KOUR |     -    39     -    99    34     -     -     -    24 |  288   1.65
 LHAS |     -    30     -    40     -     -     -     -     - |  287  10.30
 MAC1 |     -    65     -    45     -     -     -     -    67 |  286  15.37
 MALI |     -     -     -   309   223     -     -     -     - |  215  27.59
 MAS1 |     -    29    15    27    24     -     -     -    20 |  288   2.38
 MCM4 |     -    48     -     -    78     -     -     -    99 |  288  11.84
 MDO1 |     -    32    59    78     -     -     -     -    43 |  288  51.64
 MEDI |     -   105    84     -     -     -     -     -   167 |  280   0.42
 MKEA |     -    98     -    90    54     -     -     -    15 |  288  45.08
 NRC2 |     -    17    36    30    39     -     -     -    42 |  288   0.04
 NYAL |     -     -    16    28     -     -     -     -    35 |  288   0.04
 OS0G |     -     -    10    56    40     -     -     -    24 |  288   0.27
 PERT |     -    93    25    62    51     -     -     -     - |  288  13.30
 PIE1 |     -    42    26    61     -     -     -     -    92 |  288   0.09
 POTS |     -    41     -    50     -     -     -     -    64 |  276  14.29
 RESO |     -    23     -     -    22     -     -     -     - |  277  11.74
 RIOG |     -   107     -   119    45     -     -     -    23 |  275  14.34
 SANT |     -    69     -    89     -     -     -     -    31 |  269   9.93
 SCH2 |     -    46    31     -     -     -     -     -    35 |  274  18.42
 SELE |     -    37     -    45     -     -     -     -    20 |  288  35.86
 SFER |     -    89    70     -     -     -     -     -    56 |  277   0.33
 STJO |     -    25    33     -     -     -     -     -    74 |  288  13.88
 SUTH |     -    21     -    33     -     -     -     -    16 |  288  14.40
 THTI |     -     -     -    64    27     -     -     -    48 |  287   1.28
 TIDB |     -    50    18    38    19     -     -     -     - |  243   0.11
 TLSE |     -    48    49     -     -     -     -     -   100 |  288   0.76
 TSKB |     -    36    20    53     -     -     -     -    28 |  288   0.89
 TWTF |     -    73    76     -     -     -     -     -   116 |  288   0.38
 USNO |     -    39    21     -     -     -     -     -    30 |  288   0.04
 USUD |     -    51    73    79     -     -     -     -    42 |  288  29.84
 VILL |     -    49     -    60     -     -     -     -    77 |  287  25.48
 WES2 |     -    76    51     -     -     -     -     -     - |  285   0.15
 WILL |     -    61    58     -     -     -     -     -    70 |  280   1.54
 WSRT |     -    42    47     -     -     -     -     -    64 |  288   0.05
 WTZR |     -    39    59    76     -     -     -     -    24 |  288   0.05
 YAKT |     -    30    34     -     -     -     -     -    70 |  287   0.52
 -----+-------------------------------------------------------+--------------
 TOT  |  4895    77    53    97    72  4611  4713     -    56 |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

