
 GPS week: 1187   Day: 5   MJD: 52558                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2562     81    -0.50     0.42     4.61     0.00
 cod |   288     0  16397      4    -2.73     0.70     0.08    26.97
 emr |   288     0  10811      0   803.51     9.24     0.08    26.70
 esa |   288     0  15449    307    -7.92     5.30     0.09    23.53
 gfz |   288     0  14340      0     0.31    -0.82     0.09    22.80
 igu |    96     0   2382      0    -6.84     5.00     5.23     0.00
 ngs |    96     0   2562     77    -1.17     0.58     4.43     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio |
 -----+-------------------------------------------------+
    1 |-11217    55  -123  -102   184-11020-11073     - |
    2 |-14684   -84  -134   -71   345     --10873     - |
    3 | -2667  -132   -27   -29   218  2557 -2666     - |
    4 |  3299   156   -69   -40   -62   -95  3216     - |
    5 |  1729   -76   -23   156   -34 12396  1722     - |
    6 | -1415    26  -128    35    83 -4874  -373     - |
    7 | -2589    67  -181    77    53 -4654 -2643     - |
    8 |  2899   -54  -116   121    75 -2726  1873     - |
    9 | 12951    87     3    -5  -101 11690 11654     - |
   10 | -6103   -16    27    91  -101 -2508 -5451     - |
   11 |  2281  -147   110   246  -209    76  2397     - |
   13 |  5801    57   -76    48   -27  1719  5654     - |
   14 |  3625  -147   205   -75    12  -142  3496     - |
   15 | -6765     -    69     -   -81 -2954 -6665     - |
   17 |-40242   154   -60  -133    42     --34035     - |
   18 |  4162  -152   184   -24   -12  1189  3895     - |
   20 |  4784   -98    61   -15    62   452  4875     - |
   22 |  5822   -68  -260   109   278  1842  5305     - |
   23 | -2923    85   -66   201  -223  5084 -2684     - |
   24 |  1493    45   -68   105   -82 13931   483     - |
   25 |  1653   -57  -151     8   236  9568  1496     - |
   26 | -1564   139   -41   109  -229 -1663 -1582     - |
   27 | -4699    34  -228    58   168-26685 -4248     - |
   28 | 11174    62   114   -54  -157  1335  9973     - |
   29 |    -6   193   -30     X  -191 -2225  -109     - |
   30 | -1611  -129   -63   108   123  1918 -1818     - |
   31 | -1943   -50   -93    19   148 -4274 -1382     - |
 -----+-------------------------------------------------+
 AUCK |     -     9     -   -11     -     -     -     - |
 BAHR |     -   -35   172   -82   -76     -     -     - |
 BRMU |     -     -     -   -42    43     -     -     - |
 CAS1 |     -     2     -    13   -15     -     -     - |
 CEDU |     -    88     -  -101     -     -     -     - |
 CHAT |     -    55     -   -63     -     -     -     - |
 COCO |     -    67     -  -150    76     -     -     - |
 DAVR |     -   -67     -     -    79     -     -     - |
 DRAO |     -   -58    58     -     -     -     -     - |
 FAIR |     -   -16    92    -2   -88     -     -     - |
 FORT |     -     -     -    69   -71     -     -     - |
 GODE |     -   -11     -    12     -     -     -     - |
 GRAZ |     -    14     -   -16     -     -     -     - |
 HOB2 |     -   -35   195   -27  -159     -     -     - |
 IISC |     -  -130     -    82    67     -     -     - |
 KERG |     -     -    79     -   -93     -     -     - |
 KOUR |     -   -18    92   -83     -     -     -     - |
 KSTU |     -   -23     -     -    27     -     -     - |
 MAC1 |     -     8     -    53   -64     -     -     - |
 MAS1 |     -     -     -    18   -19     -     -     - |
 MATE |     -     -    26   -30     -     -     -     - |
 MKEA |     -    24     -    33   -62     -     -     - |
 NKLG |     -   106     -     -  -125     -     -     - |
 NRC2 |     -    53   259  -425    73     -     -     - |
 NRIL |     -    -3     -     -     3     -     -     - |
 NTUS |     -   -22     -     -    26     -     -     - |
 NYAL |     -     -    55   -63     -     -     -     - |
 OHI2 |     -    55     -     -   -65     -     -     - |
 PIE1 |     -     -    26   -30     -     -     -     - |
 POTS |     -    41     -   -90    44     -     -     - |
 RIOG |     -   105     -     -  -124     -     -     - |
 SANT |     -   149     -  -170     -     -     -     - |
 SUTH |     -   -28     -    32     -     -     -     - |
 THTI |     -     -     -    -3     3     -     -     - |
 TIDB |     -     1     -    74   -78     -     -     - |
 USNO |     -   -73    74     -     -     -     -     - |
 VILL |     -   -94     -   107     -     -     -     - |
 WTZR |     -   -14     -    16     -     -     -     - |
 YELL |     -    23     -   -26     -     -     -     - |
 ZWEN |     -  -110     -     -   130     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  3342   114    42    45    90  3517  3325     - |  288   2.96
    2 |  6784   169   122   136   163     -  3858     - |  250   2.57
    3 |  1626    90    38    36    72  2645  1685     - |  288   1.46
    4 |  1273    64    33   137   195  1556  1161     - |  288   0.79
    5 |  6429   126   116    55    64  7731  6687     - |  283   3.80
    6 | 11413    57    76    86    53  5551 11783     - |  288  10.40
    7 |  2510    54    42    26    78  3608  2332     - |  288   1.06
    8 |  5454    41    36    34    81  2233  5288     - |  288   2.57
    9 |  5062    55    32    90    79  6926  3452     - |  288   3.04
   10 |  3763   163    58   190    57  2052  3608     - |  283   2.38
   11 |  2420    71    93    95   122   844  2289     - |  288   0.44
   13 |  1356   136    70   115   120   710  1050     - |  288   0.29
   14 |  2145    42    48    55    62  1079  1866     - |  288   0.21
   15 |  4344     -   210     -   246  4221  4451     - |  262   3.15
   17 |  5379   104   119   121    75     -  7576     - |  288   1.87
   18 |  3388    76    41   175   106   452  2879     - |  288   0.46
   20 |  1628    68    50   120   125   470  1445     - |  288   0.37
   22 |  3563   187   170    68    51  1699  4105     - |  281   2.90
   23 |  8349   144   170   153   212  3172  8185     - |  284   8.10
   24 |  7693    47    41    63    80 11520  7039     - |  288   2.69
   25 |  3594    66    32    59    35  3054  3354     - |  288   2.60
   26 |  1117    37    48    55    42  1259   976     - |  288   0.54
   27 |  1987    37    37    64    77 16990  1913     - |  288   1.32
   28 |  5291    57    34    54    54  1370  5649     - |  288   0.48
   29 |  1525   117   117     X    85  2206  1326     - |  288   0.68
   30 |  1972   106    81   140    92  1111  1609     - |  282   0.98
   31 |  3528   102   119    90   175  5718  3460     - |  288   1.52
 -----+-------------------------------------------------+--------------
 AUCK |     -   174     -   200     -     -     -     - |  209  16.91
 BAHR |     -    50    37    43    25     -     -     - |  288   0.42
 BRMU |     -     -     -    26    27     -     -     - |  288  28.33
 CAS1 |     -    67     -    92    25     -     -     - |  288   9.07
 CEDU |     -    37     -    42     -     -     -     - |  285  15.89
 CHAT |     -    51     -    58     -     -     -     - |  286  19.76
 COCO |     -    38     -    61    28     -     -     - |  288  13.81
 DAVR |     -    34     -     -    41     -     -     - |  288  18.49
 DRAO |     -    55    55     -     -     -     -     - |  287   0.09
 FAIR |     -    76    59    25    24     -     -     - |  288   0.03
 FORT |     -     -     -    36    38     -     -     - |  288   0.14
 GODE |     -    17     -    19     -     -     -     - |  288   0.06
 GRAZ |     -   125     -   143     -     -     -     - |  286  19.10
 HOB2 |     -    55    38    64    40     -     -     - |  288   0.12
 IISC |     -    28     -    26    17     -     -     - |  288  39.60
 KERG |     -     -    23     -    26     -     -     - |  287   1.85
 KOUR |     -    46    35    36     -     -     -     - |  288  40.49
 KSTU |     -    80     -     -    95     -     -     - |  271  14.76
 MAC1 |     -    57     -    56    29     -     -     - |  288  11.99
 MAS1 |     -     -     -   264   272     -     -     - |  209   2.22
 MATE |     -     -    76    86     -     -     -     - |  288   0.10
 MKEA |     -    69     -    74    47     -     -     - |  288  46.57
 NKLG |     -    34     -     -    40     -     -     - |  254 399.35
 NRC2 |     -    26    30    36    28     -     -     - |  288   0.05
 NRIL |     -    24     -     -    28     -     -     - |  286  16.72
 NTUS |     -    19     -     -    22     -     -     - |  288  15.13
 NYAL |     -     -    23    27     -     -     -     - |  288   0.12
 OHI2 |     -    30     -     -    36     -     -     - |  288   8.61
 PIE1 |     -     -    38    43     -     -     -     - |  288   0.03
 POTS |     -    40     -   101    78     -     -     - |  278  22.18
 RIOG |     -    18     -     -    21     -     -     - |  288  16.87
 SANT |     -    91     -   104     -     -     -     - |  265  36.47
 SUTH |     -    41     -    47     -     -     -     - |  286  34.32
 THTI |     -     -     -    34    35     -     -     - |  287   7.63
 TIDB |     -    21     -    30    20     -     -     - |  288   0.16
 USNO |     -    34    34     -     -     -     -     - |  288   0.05
 VILL |     -    39     -    45     -     -     -     - |  288  30.79
 WTZR |     -    32     -    37     -     -     -     - |  288   0.08
 YELL |     -    16     -    18     -     -     -     - |  287   0.05
 ZWEN |     -    24     -     -    29     -     -     - |  277  27.58
 -----+-------------------------------------------------+--------------
 TOT  |  4608    78    79    89    91  5232  4433     - |


 BEST CLOCK FIT: FAIR   288   0.03 (ns) 

