
 GPS week: 1187   Day: 0   MJD: 52553                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2480      0    -0.02     0.03     4.33     0.00
 cod |   288     0  24295    693    -0.12     0.21     0.07    20.69
 emr |   288     0  11157      3   728.25    12.13     0.06    23.75
 esa |   288     0  17275    642    -0.30    -0.60     0.11    11.75
 gfz |   288     0  14559      1    -0.94     0.74     0.08    16.41
 igu |    96     0   2195      0    -0.12     0.18     5.12     0.00
 jpl |   288     0   8562    224    -3.17     2.09     0.09     0.00
 ngs |    96     0   2480      0    -0.02     0.03     4.29     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26664    308 -3527.87   -42.88     0.05    27.40

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |-16632    17   -17    61   166-14019  -101-15468     -  -124 |
    2 | 10230     2   -67   250   249     -  -210  8622     -  -183 |
    3 |-11113    25   -10   -18   274  -124   123-10892     -  -167 |
    4 | -1428   247   -58  -130   102 -1372   340 -1293     -  -141 |
    5 | -2351   162   -75   316    12  7300   -32 -3057     -  -155 |
    6 | 10728   238  -231    44   168 12399   218  9748     -   -98 |
    7 | -1838   169    14    98   -13 -2464  -156 -1723     -  -174 |
    8 |  6784   -22    87   125   129 14405  -155  7422     -  -189 |
    9 | -3363   217  -121    91    11 -4578   253 -3109     -  -104 |
   10 | -2831   112   -69    98   175  6470  -150 -1984     -  -172 |
   11 |  3293   -86   146   127  -150  -168  -200  2661     -   -27 |
   13 |  2741   -12    86    -6   -33 -2178   535  2820     -   -43 |
   14 |  5264   -15    22   -38   -23  -332  -135  5016     -    22 |
   15 | -4852   189  -156     -   142     -  -340 -4307     -   -93 |
   18 |  5697   -30  -181   539  -138  3195    11  5502     -    60 |
   20 |  3468  -113    79   211    82 -1329  -189  3599     -  -100 |
   22 |  4389    14   -82   286   255  9298  -248  3782     -  -207 |
   23 | -5801   236  -104   354    -6 -2291   296 -5423     -  -198 |
   24 | -3122   224    -4   -70   -74 -2043    68 -2982     -   -92 |
   25 | -6726    83   -42   132   260  5228   257 -6626     -  -237 |
   26 |  1678   201   -74   113   -12 -2389   343  1729     -  -129 |
   27 | -3986   -25   -48   159   209-24255   187 -3788     -  -133 |
   28 |    39    -6   153  -148   -32   181    37   233     -   -45 |
   29 |  3826   133   -78    50    41     -   406  3898     -   -78 |
   30 |  3102     X  -155   329   221  -849   398  2910     -  -118 |
   31 |  3131   -16    69   110    73   321   -34  2918     -  -138 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -194     -     -     -     -   -43     -     -   146 |
 ALGO |     -  -115    66   -59     -     -     -     -     -    55 |
 AMC2 |     -  -122     -     -     -     -     -     -     -    92 |
 ARTU |     -    85     -     -  -107     -    17     -     -     - |
 ASC1 |     -  -116     -  -226     -     -     -     -     -   175 |
 BAHR |     -   -34    92     8   -62     -     -     -     -   -21 |
 BJFS |     -     -     -     -  -857     -     -     -     -   513 |
 BOR1 |     -    19     -     -     -     -     -     -     -   -14 |
 BRMU |     -     X     -   174  -125     -     -     -     -     X |
 BRUS |     -    33     -     -     -     -     -     -     -   -25 |
 CAS1 |     -    27     -    30  -100     -     2     -     -    30 |
 CEDU |     -   -33     -  -380     -     -     4     -     -   189 |
 CHAT |     -   -23     -     5     -     -     -     -     -    15 |
 CHUR |     -    45     -     -     -     -     -     -     -   -34 |
 COCO |     -    69     -    89   -41     -  -264     -     -   -65 |
 CRO1 |     -     -     -     -   -10     -     -     -     -     6 |
 DAVR |     -   -94     -     -   -70     -   -68     -     -   113 |
 DRAO |     -   -51   -17     -     -     -     -     -     -    53 |
 FAIR |     -     -    -1   133  -120     -     -     -     -    15 |
 FORT |     -     -     -  -125    -3     -     -     -     -    55 |
 GODE |     -   -49     -  -135     -     -     -     -     -    96 |
 GOLD |     -  -111     -     -     -     -     -     -     -    84 |
 GRAZ |     -   -32     -   -40     -     -     -     -     -    38 |
 HERS |     -  -353     -     -     -     -     -     -     -   266 |
 HOB2 |     -   -47   128   -28     -     -  -145     -     -   -64 |
 IISC |     -  -100     -   184   -70     -     -     -     -    44 |
 JPLM |     -     -     -     -  -164     -     -     -     -    98 |
 KARR |     -   -12     -     -    16     -   245     -     -     - |
 KERG |     -    -8    94     -   -19     -     -     -     -   -64 |
 KOSG |     -  -143     -     -     -     -     -     -     -   108 |
 KOUR |     -   -30    46   -82     -     -     -     -     -    18 |
 KSTU |     -   -79     -     -     -     -     -     -     -    59 |
 MAC1 |     -    39     -  -119  -180     -    24     -     -   127 |
 MALI |     -     -     -  -202     -     -     -     -     -    87 |
 MAS1 |     -     -     -     X  -162     -     -     -     -    97 |
 MATE |     -    -1   147  -333     -     -     -     -     -    15 |
 MCM4 |     -   338     -     -     -     -     -     -     -  -255 |
 MDO1 |     -     -     -  -364     -     -     -     -     -   156 |
 MEDI |     -   -39     -     -     -     -     -     -     -    29 |
 MKEA |     -    39     -  -101   -96     -     -     -     -    71 |
 NKLG |     -    27     -     -  -105     -     -     -     -    44 |
 NPLD |     -   -68     -     -     -     -  -134     -     -    51 |
 NRC2 |     -    17   170  -574   -23     -     -     -     -   100 |
 NTUS |     -  -131     -     -    -5     -     -     -     -   102 |
 NYAL |     -     -     -    89     -     -     -     -     -   -38 |
 OHI2 |     -    19     -     -   -24     -   116     -     -     - |
 OS0G |     -   -36     -  -178     -     -     -     -     -   103 |
 PENC |     -   294     -     -     -     -  -105     -     -  -222 |
 PERT |     -   -67    -9   137     -     -     -     -     -     - |
 POTS |     -    21     -  -183     -     -     -     -     -    63 |
 PRDS |     -  -104     -     -     -     -     -     -     -    79 |
 RIOG |     -   -21     -   349  -135     -   -36     -     -   -53 |
 SANT |     -   -78     -   -24     -     -     -     -     -    68 |
 SCH2 |     -  -107     -     -     -     -     -     -     -    81 |
 SELE |     -    58     -  -110     -     -  -166     -     -     4 |
 STJO |     -     -     0     -     -     -     -     -     -     0 |
 SUTH |     -     -     -   -68     -     -     -     -     -    29 |
 THTI |     -     -     -  -166  -119     -     -     -     -   142 |
 TLSE |     -   -82     -     -     -     -     -     -     -    62 |
 TRO1 |     -     6     -     -    38     -     -     -     -   -26 |
 TROM |     -     -    90   -90     -     -     -     -     -   -40 |
 TWTF |     -   -51     -     -     -     -     -     -     -    39 |
 URUM |     -   -52     -     -     -     -     -     -     -    39 |
 USNO |     -  -122    82     -     -     -     -     -     -    22 |
 USUD |     -     -     -     1     -     -     -     -     -     0 |
 VILL |     -   -24     -    34     -     -    -6     -     -     5 |
 WILL |     -    36     -     -     -     -     -     -     -   -27 |
 WSRT |     -   -42     -     -     -     -     -     -     -    31 |
 WTZR |     -   -27     -   -66     -     -     -     -     -    49 |
 YAKT |     -   -65     -     -     -     -    20     -     -    49 |
 YAR2 |     -  -152     -     -     -     -  -242     -     -   115 |
 YELL |     -  -120     -  -159     -     -     -     -     -   138 |
 ZAMB |     -   192     -     -  -242     -     -     -     -     - |
 ZWEN |     -  -120     -     -   126     -     -     -     -    16 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4641    76    84   119   150  7981    67  5249     -    34 |  288   3.24
    2 |  8184   210   195   314   131     -   147  7096     -   108 |  281   4.96
    3 |  3012    85    35   101    62  2646    75  3193     -    54 |  288   2.76
    4 |  1650    67    33   116    85  1911    50  1842     -    61 |  288   0.84
    5 |  6985   229    99    97   116  7400    95  6303     -    89 |  281   4.91
    6 | 10370    47    35   244    91  7658    75 10935     -    62 |  288   8.64
    7 |  1495    51    23   104    62  1561    66  1557     -    40 |  288   1.04
    8 |  6993    49    40    79    69  5984    64  6871     -    48 |  288   2.37
    9 |  3988    48    43   104    49  3886   111  3836     -    44 |  288   2.26
   10 |  7311   136    41    93    76  4672    48  7405     -    68 |  283   2.43
   11 |  2573   143    42    84    66   815   100  1721     -   100 |  288   0.60
   13 |   815    68    50   145    48   641    79   960     -    48 |  288   0.36
   14 |  1726    61    43    67   132   465    62  1747     -    76 |  288   0.28
   15 |  3979    77    83     -   114     -    64  3808     -    72 |  288   2.78
   18 |  2607    92    45   163    45  1587    62  2818     -    50 |  288   0.40
   20 |   896    81    55   140   144   422   109  1018     -    45 |  288   0.31
   22 |  3027   196    37   121   191  5228    45  2933     -    45 |  281   2.67
   23 |  5519    86   147   165   185  3063   114  5406     -   101 |  279   6.16
   24 |  4358    70    39    70    39  3442   103  4334     -    36 |  288   3.15
   25 |  3096    49    74    68   119  5565    92  2923     -    50 |  288   2.41
   26 |   564    73    41    55    40  1567    83   628     -    53 |  288   0.39
   27 |  1537    78    19    81    53 15786   118  1668     -    40 |  288   1.78
   28 |  1749    65   113   105   117  2324    73  1895     -    27 |  288   0.50
   29 |  1001    81    50    85    84     -   120   956     -   115 |  288   0.85
   30 |  1785     X    44   167   166   753    86  1766     -    53 |  277   1.14
   31 |  2520   134    37    86    68  2147   143  2812     -    97 |  288   2.33
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    15     -     -     -     -    50     -     -    12 |  285   0.08
 ALGO |     -    42    22    70     -     -     -     -     -    18 |  288   0.05
 AMC2 |     -    26     -     -     -     -     -     -     -    19 |  286   0.03
 ARTU |     -    19     -     -    24     -    50     -     -     - |  269  14.34
 ASC1 |     -    75     -    66     -     -     -     -     -    60 |  272    >>>
 BAHR |     -    23    25    76    31     -     -     -     -    23 |  288   0.49
 BJFS |     -     -     -     -    29     -     -     -     -    18 |   89    >>>
 BOR1 |     -   120     -     -     -     -     -     -     -    91 |  286   0.49
 BRMU |     -     X     -    48    34     -     -     -     -     X |  274  24.61
 BRUS |     -    27     -     -     -     -     -     -     -    20 |  286   0.05
 CAS1 |     -    68     -    85    32     -   300     -     -    32 |  288  10.06
 CEDU |     -    35     -    51     -     -    66     -     -    33 |  288  28.07
 CHAT |     -    46     -    45     -     -     -     -     -    40 |  276  17.52
 CHUR |     -    52     -     -     -     -     -     -     -    39 |  221   0.52
 COCO |     -    35     -   114    35     -    55     -     -    39 |  288  13.96
 CRO1 |     -     -     -     -   121     -     -     -     -    72 |  286  32.37
 DAVR |     -    56     -     -    76     -    52     -     -    65 |  288  23.46
 DRAO |     -    31    18     -     -     -     -     -     -    14 |  288   0.03
 FAIR |     -     -    25   113    98     -     -     -     -    31 |  288   0.12
 FORT |     -     -     -    77    50     -     -     -     -    28 |  288   0.08
 GODE |     -    30     -    44     -     -     -     -     -    20 |  288   0.13
 GOLD |     -   113     -     -     -     -     -     -     -    85 |  280  22.36
 GRAZ |     -    30     -    79     -     -     -     -     -    16 |  287  23.83
 HERS |     -    37     -     -     -     -     -     -     -    28 |  262  43.00
 HOB2 |     -    46    46    59     -     -    75     -     -    35 |  288   0.05
 IISC |     -    38     -   162    44     -     -     -     -    64 |  288  46.84
 JPLM |     -     -     -     -    25     -     -     -     -    15 |  286   6.05
 KARR |     -    18     -     -    22     -    42     -     -     - |  288  12.74
 KERG |     -    60    48     -    40     -     -     -     -    34 |  287   1.14
 KOSG |     -    30     -     -     -     -     -     -     -    23 |  286  51.85
 KOUR |     -    34    47    54     -     -     -     -     -    35 |  288  47.22
 KSTU |     -    41     -     -     -     -     -     -     -    31 |  282  17.55
 MAC1 |     -    63     -   136    44     -   238     -     -    45 |  288  12.55
 MALI |     -     -     -   129     -     -     -     -     -    55 |  288  25.27
 MAS1 |     -     -     -     X    25     -     -     -     -    15 |  251   2.30
 MATE |     -    35    17   119     -     -     -     -     -    34 |  288   0.08
 MCM4 |     -    55     -     -     -     -     -     -     -    42 |  206   1.91
 MDO1 |     -     -     -    57     -     -     -     -     -    25 |  286   9.56
 MEDI |     -    34     -     -     -     -     -     -     -    26 |  286   0.11
 MKEA |     -    31     -    56    36     -     -     -     -    27 |  288  46.49
 NKLG |     -    39     -     -    37     -     -     -     -    33 |  287    >>>
 NPLD |     -    20     -     -     -     -    63     -     -    15 |  285   0.04
 NRC2 |     -    32    24    65    33     -     -     -     -    17 |  288   0.04
 NTUS |     -    23     -     -    37     -     -     -     -    26 |  288  14.21
 NYAL |     -     -     -    83     -     -     -     -     -    36 |  275   0.04
 OHI2 |     -    39     -     -    49     -    68     -     -     - |  286  10.30
 OS0G |     -    21     -    40     -     -     -     -     -    25 |  276   0.30
 PENC |     -    27     -     -     -     -    39     -     -    21 |  285   5.93
 PERT |     -    57    59    50     -     -     -     -     -     - |  288  16.67
 POTS |     -    33     -    73     -     -     -     -     -    19 |  280  15.72
 PRDS |     -   187     -     -     -     -     -     -     -   141 |  243   1.92
 RIOG |     -    66     -   112    49     -   104     -     -    87 |  288  16.09
 SANT |     -    52     -   154     -     -     -     -     -    87 |  288  31.17
 SCH2 |     -   144     -     -     -     -     -     -     -   109 |  284  29.80
 SELE |     -    41     -   150     -     -    46     -     -    46 |  288  31.16
 STJO |     -     -    14     -     -     -     -     -     -    12 |  286  18.83
 SUTH |     -     -     -    73     -     -     -     -     -    31 |  286  32.54
 THTI |     -     -     -    71    43     -     -     -     -    39 |  287   5.66
 TLSE |     -    24     -     -     -     -     -     -     -    18 |  286   0.53
 TRO1 |     -    48     -     -    95     -     -     -     -    64 |  284  11.83
 TROM |     -     -    14    75     -     -     -     -     -    31 |  288  15.93
 TWTF |     -   103     -     -     -     -     -     -     -    78 |  286   0.56
 URUM |     -    31     -     -     -     -     -     -     -    24 |  288  20.96
 USNO |     -    26    21     -     -     -     -     -     -    12 |  288   0.04
 USUD |     -     -     -   112     -     -     -     -     -    48 |  286    >>>
 VILL |     -    58     -   110     -     -    44     -     -    24 |  288  24.53
 WILL |     -    44     -     -     -     -     -     -     -    33 |  286   0.52
 WSRT |     -    26     -     -     -     -     -     -     -    20 |  288   0.06
 WTZR |     -    54     -   117     -     -     -     -     -    22 |  288   0.08
 YAKT |     -    25     -     -     -     -    70     -     -    19 |  286   0.32
 YAR2 |     -    29     -     -     -     -    61     -     -    22 |  286   3.35
 YELL |     -    33     -    70     -     -     -     -     -    32 |  288   0.05
 ZAMB |     -    31     -     -    39     -     -     -     -     - |  283  20.66
 ZWEN |     -    48     -     -    36     -     -     -     -    20 |  288  24.68
 -----+-------------------------------------------------------------+--------------
 TOT  |  4333    74    61   109    83  5122    91  4288     -    52 |


 BEST CLOCK FIT: AMC2   286   0.03 (ns) 

