
 GPS week: 1179   Day: 2   MJD: 52499                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2562      0     0.01     0.01     4.24     0.00
 cod |   288     0  25777    369    -0.19     0.21     0.06    24.84
 emr |   288     0  11706     13   168.61    10.44     0.06    25.41
 gfz |   288     0  16480     40     0.07    -0.31     0.08    20.03
 igu |    96     0   2562      0     0.04    -0.04     5.14     0.00
 ngs |    96     0   2562      0     0.01     0.01     4.06     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26384    643 -1559.00   -32.91     0.05    29.72

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 | -9446    72   -34   175-17836 -8537     -  -150 |
    2 |  2494   708  -207     0  7053  2065     -  -291 |
    3 | -2278    92   -14   163  1277 -1871     -  -175 |
    4 | -3867   201  -180   174  3633 -3003     -  -131 |
    5 | -1384    59    29    21  4876  -507     -   -89 |
    6 |   234  -381    12   312  9764  -447     -    85 |
    7 |   -68   116  -125   -17  -997   -84     -    21 |
    8 | -3703   -60  -156   267  1436 -3425     -     3 |
    9 | -1721   114   -84    92  3242 -1630     -   -79 |
   10 |  1963    81   -90    13  2060  1109     -     X |
   11 |  7188     9    89    -7  5600  6510     -   -79 |
   13 |  4734    30   112    28  2613  4433     -  -140 |
   14 |  1080    67   134   -83   374  1142     -  -115 |
   17 |   827   219  -137    40-22377   213     -   -93 |
   18 |  6610   109    13   -95  5358  6427     -   -38 |
   20 |  3654   -42    75   184  3161  3520     -  -153 |
   21 | -3207   183   -52    23   492 -2944     -  -121 |
   22 |   420   -22    25    31  5152  1158     -   -25 |
   23 |  7105   282  -113   -83  7107  6142     -   -82 |
   24 | -8984   155  -157   130  1888 -7839     -   -83 |
   25 | -7766   128     8   262 -5900 -8130     -  -290 |
   26 |  1450   194   -81     6   662  1075     -   -95 |
   27 |  4244    -7   -47   227-17256  3927     -  -100 |
   28 | -3462   -14   118   -34  1751 -2512     -   -67 |
   29 |  1354   177   -89    12  2324  1419     -   -79 |
   30 |  1177    83   -70   157 -4336   989     -  -115 |
   31 |   427    52    24    44 -2596   -60     -   -94 |
 -----+-------------------------------------------------+
 ALBH |     -  -160     -     -     -     -     -   134 |
 ALGO |     -  -126    64     -     -     -     -    50 |
 AMC2 |     -  -131     -     -     -     -     -   109 |
 ARTU |     -    41     -   -51     -     -     -     - |
 ASC1 |     -     5     -    -4     -     -     -    -2 |
 AUCK |     -    25     -     -     -     -     -   -21 |
 BAHR |     -    34    79     -     -     -     -   -96 |
 BILI |     -    45     -   -56     -     -     -     - |
 BOR1 |     -    23     -     -     -     -     -   -20 |
 BRUS |     -   -70     -     -     -     -     -    59 |
 CAS1 |     -    73     -   -59     -     -     -   -21 |
 CEDU |     -   -52     -     -     -     -     -    43 |
 CHAT |     -  -113     -     -     -     -     -    95 |
 CHUR |     -   149     -     -     -     -     -  -124 |
 COCO |     -   120     -    -9     -     -     -   -94 |
 DAVR |     -    75     -  -150     -     -     -    39 |
 DRAO |     -   -39    16     -     -     -     -    19 |
 FAIR |     -     X    52  -162     -     -     -    65 |
 FORT |     -     -   -30     4     -     -     -    23 |
 GALA |     -     -     -  -234     -     -     -   158 |
 GODE |     -   -64     -     -     -     -     -    53 |
 GOLD |     -   -26     -     -     -     -     -    22 |
 GRAZ |     -  -131     -     -     -     -     -   109 |
 GUAT |     -     -     -  -105     -     -     -    71 |
 HERS |     -  -376     -     -     -     -     -   314 |
 HOB2 |     -    -3    43     -     -     -     -   -34 |
 IISC |     -  -163     -     -     -     -     -   137 |
 JPLM |     -     -     -  -101     -     -     -    68 |
 KARR |     -   -26     -    32     -     -     -     - |
 KERG |     -     -   127  -161     -     -     -     X |
 KIRU |     -   -45     -     -     -     -     -    38 |
 KOSG |     -  -133     -     -     -     -     -   111 |
 KOUR |     -   -83     -     -     -     -     -    70 |
 KSTU |     -     -     -   -35     -     -     -    23 |
 LPGS |     -   -67     -     -     -     -     -    56 |
 MAC1 |     -   -83     -  -104     -     -     -   141 |
 MAS1 |     -     -     -  -176     -     -     -   119 |
 MAW1 |     -    18     -     -     -     -     -   -15 |
 MEDI |     -   -51     -     -     -     -     -    42 |
 MKEA |     -    43     -  -190     -     -     -    92 |
 MSKU |     -   101     -  -125     -     -     -     - |
 NPLD |     -   -87     -     -     -     -     -    73 |
 NRC2 |     -   -99    99  -145     -     -     -    96 |
 NRIL |     -    54     -   -67     -     -     -     - |
 NYA1 |     -    19     -     -     -     -     -   -16 |
 OHI2 |     -    83     -  -102     -     -     -     - |
 OS0G |     -   -62     -     -     -     -     -    52 |
 PENC |     -   263     -     -     -     -     -  -220 |
 PIE1 |     -     -    67     -     -     -     -   -58 |
 POTS |     -   -97     -     -     -     -     -    81 |
 PRDS |     -   -77     -     -     -     -     -    65 |
 PTBB |     -   -36     -     -     -     -     -    30 |
 REYK |     -   -44     -     6     -     -     -    33 |
 RIOG |     -     4     -  -151     -     -     -    98 |
 SANT |     -   -41     -  -137     -     -     -   126 |
 SCH2 |     -   -95     -     -     -     -     -    79 |
 STJO |     -   -34   146  -149     -     -     -     5 |
 SUTH |     -   -95     -     -     -     -     -    80 |
 THTI |     -     -     -   149     -     -     -  -100 |
 TLSE |     -    23     -     -     -     -     -   -19 |
 TRO1 |     -  -137     -   137     -     -     -    28 |
 TROM |     -     -    91     -     -     -     -   -77 |
 TSKB |     -   -20    63     -     -     -     -   -37 |
 TWTF |     -   -84     -     -     -     -     -    70 |
 USNO |     -   -90    90     -     -     -     -    -2 |
 VILL |     -    -8    56     -     -     -     -   -41 |
 WILL |     -   -78     -     -     -     -     -    65 |
 WTZR |     -   -23     -     -     -     -     -    19 |
 WUHN |     -   -79     -    99     -     -     -     - |
 YAKT |     -  -126     -     -     -     -     -   106 |
 YAR2 |     -  -228     -     -     -     -     -   191 |
 YELL |     -    14     -   -56     -     -     -    26 |
 YSSK |     -   -44     -    55     -     -     -     - |
 ZWEN |     -   -83     -   -24     -     -     -    85 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  7289    50    37    48  9742  7187     -    46 |  288   3.51
    2 |  3773    85    35    76  3105  3494     -    50 |  288   2.61
    3 |  3875    43    84    46  3453  3840     -    65 |  288   2.64
    4 |  3614    87    43    42  2340  2724     -   105 |  277   0.61
    5 |  7498    64    48    50  6625  6564     -    45 |  288   4.03
    6 |  6489   107    42    42  5939  6077     -    45 |  288   4.56
    7 |  1158    65    38    44  1315  1254     -    69 |  288   0.92
    8 |  2732   130    82    96  2608  3201     -   157 |  276   2.50
    9 |  2055   142    66    47  3031  2097     -    53 |  277   2.15
   10 |  6009    70    39    45  2943  5902     -     X |  288   2.99
   11 |  2393    65    52    37  2568  2766     -    27 |  288   0.24
   13 |  1876    72    54    62  1675  1992     -    70 |  288   0.30
   14 |  1852    70    31   152   687  1639     -    95 |  288   0.24
   17 |  2458   160   109   117 15119  2517     -   124 |  278   2.48
   18 |   769   101    59    65  2855   828     -    73 |  288   0.32
   20 |   984    71    73    51  1960   922     -    84 |  288   0.32
   21 |  6273    79   109   187  6284  5817     -    97 |  284   3.95
   22 |  7754    62    68    60  4601  7381     -    46 |  288   1.62
   23 |  4775    69    38    49  5116  5500     -    37 |  288   4.98
   24 |  5146    83    51    96  3796  5085     -    59 |  276   2.11
   25 |  3796    99    79   102  1911  3318     -    44 |  278   1.50
   26 |  2741    53    32    89   845  2571     -    41 |  288   0.46
   27 |  2620   128   164   181 10988  2497     -    81 |  278   1.91
   28 |  2823    98    52    76  2517  2951     -    58 |  288   1.39
   29 |  1548    61    37   101  1502  1637     -    46 |  288   0.63
   30 |  1305    41    29   111  3459  1286     -    72 |  288   0.83
   31 |  6014    41    48   108  2185  5262     -    50 |  288   2.22
 -----+-------------------------------------------------+--------------
 ALBH |     -    29     -     -     -     -     -    24 |  285   0.07
 ALGO |     -    55    31     -     -     -     -    27 |  288   0.04
 AMC2 |     -    23     -     -     -     -     -    19 |  285   0.09
 ARTU |     -    15     -    19     -     -     -     - |  288  11.65
 ASC1 |     -    43     -    36     -     -     -    31 |  286    >>>
 AUCK |     -    30     -     -     -     -     -    25 |  264  16.38
 BAHR |     -    73    61     -     -     -     -    67 |  288   0.64
 BILI |     -    67     -    84     -     -     -     - |  287  10.07
 BOR1 |     -    33     -     -     -     -     -    28 |  281   0.56
 BRUS |     -    21     -     -     -     -     -    18 |  286   0.07
 CAS1 |     -   114     -    50     -     -     -   123 |  288   8.06
 CEDU |     -    47     -     -     -     -     -    39 |  286  14.46
 CHAT |     -    34     -     -     -     -     -    29 |  285  15.95
 CHUR |     -    16     -     -     -     -     -    14 |  286   0.64
 COCO |     -    52     -    50     -     -     -    34 |  288  13.00
 DAVR |     -    43     -    56     -     -     -    36 |  288  22.48
 DRAO |     -    40    27     -     -     -     -    15 |  288   0.07
 FAIR |     -     X    37    36     -     -     -    26 |  288   0.09
 FORT |     -     -    37    68     -     -     -    25 |  288   0.30
 GALA |     -     -     -    65     -     -     -    44 |  276  16.12
 GODE |     -    42     -     -     -     -     -    35 |  286   0.11
 GOLD |     -    73     -     -     -     -     -    61 |  274  13.13
 GRAZ |     -    30     -     -     -     -     -    25 |  285  54.72
 GUAT |     -     -     -    66     -     -     -    44 |  286    >>>
 HERS |     -    25     -     -     -     -     -    21 |  262 118.02
 HOB2 |     -    27    41     -     -     -     -    37 |  288   0.11
 IISC |     -    34     -     -     -     -     -    28 |  266  36.54
 JPLM |     -     -     -    35     -     -     -    23 |  286   5.11
 KARR |     -    39     -    49     -     -     -     - |  288  14.47
 KERG |     -     -    66    83     -     -     -     X |  276 116.26
 KIRU |     -    26     -     -     -     -     -    22 |  286   5.41
 KOSG |     -    37     -     -     -     -     -    31 |  288  14.02
 KOUR |     -    34     -     -     -     -     -    28 |  284  11.85
 KSTU |     -     -     -    42     -     -     -    29 |  277  17.14
 LPGS |     -   137     -     -     -     -     -   114 |  246  44.09
 MAC1 |     -    48     -    48     -     -     -    25 |  288  13.50
 MAS1 |     -     -     -    63     -     -     -    42 |  262   2.26
 MAW1 |     -    59     -     -     -     -     -    50 |  285  25.45
 MEDI |     -    22     -     -     -     -     -    19 |  286   0.09
 MKEA |     -    28     -    51     -     -     -    25 |  288  30.57
 MSKU |     -    48     -    60     -     -     -     - |  251  30.69
 NPLD |     -    34     -     -     -     -     -    29 |  285   0.09
 NRC2 |     -    97    28    45     -     -     -    47 |  288   0.09
 NRIL |     -    19     -    24     -     -     -     - |  288  16.12
 NYA1 |     -    30     -     -     -     -     -    25 |  286   0.07
 OHI2 |     -    77     -    96     -     -     -     - |  286   8.54
 OS0G |     -    23     -     -     -     -     -    19 |  288   8.21
 PENC |     -    29     -     -     -     -     -    24 |  285   7.82
 PIE1 |     -     -    17     -     -     -     -    14 |  288   0.11
 POTS |     -    23     -     -     -     -     -    20 |  286  11.80
 PRDS |     -    33     -     -     -     -     -    28 |  286   1.71
 PTBB |     -    38     -     -     -     -     -    32 |  286   0.09
 REYK |     -    21     -    34     -     -     -    25 |  288  15.77
 RIOG |     -   128     -    90     -     -     -    87 |  288   9.78
 SANT |     -    96     -    71     -     -     -    38 |  284  15.04
 SCH2 |     -    21     -     -     -     -     -    17 |  286  14.02
 STJO |     -    59    29    67     -     -     -    20 |  288  45.36
 SUTH |     -    47     -     -     -     -     -    39 |  285  24.18
 THTI |     -     -     -    77     -     -     -    52 |  287   3.34
 TLSE |     -    39     -     -     -     -     -    33 |  278   0.47
 TRO1 |     -    51     -    63     -     -     -    35 |  288   9.30
 TROM |     -     -   117     -     -     -     -   100 |  286  12.35
 TSKB |     -    47    65     -     -     -     -    29 |  288   1.00
 TWTF |     -    70     -     -     -     -     -    58 |  286   0.54
 USNO |     -    57    23     -     -     -     -    36 |  288   0.08
 VILL |     -    43    38     -     -     -     -    13 |  288   3.46
 WILL |     -    34     -     -     -     -     -    28 |  286   3.83
 WTZR |     -    69     -     -     -     -     -    58 |  287  57.50
 WUHN |     -    57     -    71     -     -     -     - |  287  26.40
 YAKT |     -    34     -     -     -     -     -    28 |  286   1.48
 YAR2 |     -    46     -     -     -     -     -    39 |  286   4.67
 YELL |     -    35     -    51     -     -     -    31 |  288   0.08
 YSSK |     -    20     -    25     -     -     -     - |  287  12.58
 ZWEN |     -    71     -   115     -     -     -    97 |  266  11.49
 -----+-------------------------------------------------+--------------
 TOT  |  4240    64    61    76  5140  4060     -    53 |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

