
 GPS week: 1176   Day: 5   MJD: 52481                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2656      0    -0.01     0.05     4.03     0.00
 cod |   288     0  23885     68    -0.22     0.20     0.08    19.81
 emr |   288     0  11528      5   998.86    11.06     0.10    14.16
 esa |   288     0  17063   1075    -0.48     0.34     0.10    14.32
 gfz |   288     0  15453     46     0.00    -0.33     0.09    16.91
 igu |    96     0   2560     15    -0.05     0.82     4.02     0.00
 ngs |    96     0   2656      0    -0.01     0.05     4.00     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24079    288 -1568.03   -31.37     0.04    34.80

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  -864    60  -262   271   224 -7953    87     -  -148 |
    2 |  5117    65   -72   178   225  4053  4497     -  -190 |
    3 |  4662   208    -4    49    70 -1357  4637     -  -171 |
    4 | -3911   322    16   -98    30  -812 -3939     -  -133 |
    5 | -7321   -39  -218   376   145 -2891 -5841     -  -114 |
    6 | -9100   156   298    67  -114 -1644 -9245     -  -181 |
    7 | -5956   163   -36   196  -149 -9813 -5386     -   -86 |
    8 |  6766   -55   -26   319   -11  3610  5906     -   -84 |
    9 |   265   -37   100   134   108  4340   337     -  -127 |
   10 | -4314    87   -79    -1   123  3538 -3924     -   -77 |
   11 |  4892    47    78   -82   -66   285  4957     -     4 |
   13 |  2607    27  -152   175    28  -461  2633     -   -40 |
   14 |   880   -31    88   -32   154 16261   932     -   -79 |
   15 |   733   164   174     -   -96  6752  1183     -  -115 |
   17 | -5179   155   145     X  -182     - -4787     -   -58 |
   18 |  3885     5   -75   139  -176  2205  3756     -    56 |
   20 |  3485  -109  -157   169   116   833  3462     -     X |
   21 | -1760    91  -184     X   187  3708 -2383     -   -68 |
   22 | -1084    31   -11   183   238  1286 -1105     -  -205 |
   23 |  4802   109    90    27    -5  9952  3717     -  -107 |
   24 |  3902     -   -45     X   -91  2322  3754     -    55 |
   25 |   -47    63    34   256   178   347  -303     -  -242 |
   26 | -1702    84  -176   205    32  -125 -1646     -   -76 |
   27 |  5210   -31   -50   170   169-21214  5206     -  -114 |
   28 |   487    30   -17   104   -94   746   674     -    -7 |
   29 | -4463   -28    -8   242   126 -2560 -4439     -  -142 |
   30 |  2112    23    26   114   245 -6587  1353     -  -190 |
   31 | -3534   117    18    80    71 -7164 -3515     -  -141 |
 -----+-------------------------------------------------------+
 ALBH |     -  -253     -     -     -     -     -     -   144 |
 AMC2 |     -  -245     -     -     -     -     -     -   140 |
 ANKR |     -    -4     -     6     -     -     -     -     - |
 AOML |     -  -153     -     -     -     -     -     -    87 |
 AUCK |     -   104     -   -32     -     -     -     -   -49 |
 BAHR |     -    73   116   -66  -112     -     -     -    -7 |
 BILI |     -  -118     -     -   138     -     -     -     - |
 BJFS |     -     -     -     -   180     -     -     -   -88 |
 CAS1 |     -   147     -     3   -89     -     -     -   -42 |
 CEDU |     -   263     -  -511     -     -     -     -    61 |
 CHAT |     -     9     -     -   -92     -     -     -    40 |
 CHUR |     -    82     -     -     -     -     -     -   -46 |
 COCO |     -    28     -     -    37     -     -     -   -34 |
 DAVR |     -    66     -     -   -91     -     -     -     7 |
 DRAO |     -  -100     9     -     -     -     -     -    53 |
 EISL |     -     -     -  -226     -     -     -     -    93 |
 FAIR |     -   -59   133    86  -148     -     -     -    15 |
 GALA |     -   -70     -   -45    -7     -     -     -    61 |
 GODE |     -   -51     -   -58     -     -     -     -    53 |
 GOLD |     -  -152     -     -     -     -     -     -    86 |
 GRAZ |     -   -32     -    44     -     -     -     -     - |
 GUAT |     -     -     -     -   -14     -     -     -     7 |
 HOB2 |     -   153    50  -239   -26     -     -     -     3 |
 HRAO |     -   -78     -     -     -     -     -     -    44 |
 IISC |     -  -190     -     -  -109     -     -     -   161 |
 JPLM |     -     -     -     -   -52     -     -     -    25 |
 KIRU |     -  -111     -     -     -     -     -     -    63 |
 KOKB |     -   636  -530     -  -205     -     -     -     - |
 KOSG |     -  -138     -     -     -     -     -     -    78 |
 KOUR |     -  -144   108    87     -     -     -     -     2 |
 MALI |     -     -     -   -84     -     -     -     -    35 |
 MAS1 |     -     -     -     X   -91     -     -     -    44 |
 MATE |     -     -     -  -265     -     -     -     -   109 |
 MAW1 |     -    40     -     -  -173     -     -     -    62 |
 MCM4 |     -     -     -     -  -527     -     -     -   256 |
 MDO1 |     -     -   -36  -103     -     -     -     -    57 |
 MEDI |     -   -24     -     -     -     -     -     -    14 |
 MKEA |     -  -217     -  -109  -183     -     -     -   258 |
 MSKU |     -   -26     -     -    30     -     -     -     - |
 NLIB |     -     -     -   -93     -     -     -     -    38 |
 NPLD |     -   -93     -     -     -     -     -     -    53 |
 NRC2 |     -   -24   247  -593   140     -     -     -    90 |
 NRIL |     -     7     -     -    -8     -     -     -     - |
 OS0G |     -   -11   125   -41     -     -     -     -     - |
 PENC |     -   324     -     -     -     -     -     -  -185 |
 PERT |     -   172   -22    19     -     -     -     -   -97 |
 PIE1 |     -   -52     -    16     -     -     -     -    23 |
 POTS |     -    14     -   -78     -     -     -     -    24 |
 PRDS |     -   -85     -     -     -     -     -     -    48 |
 REYK |     -    64     -     -   -75     -     -     -     - |
 RIOG |     -    47     -     -   -55     -     -     -     - |
 SANT |     -   -95     -    51  -101     -     -     -    82 |
 SCH2 |     -  -135     -     -     -     -     -     -    77 |
 SELE |     -    22     -  -245     -     -     -     -    89 |
 SEY1 |     -     -     -  -498     -     -     -     -   205 |
 SFER |     -  -242     -     -     -     -     -     -   138 |
 STJO |     -  -108   144     -   -57     -     -     -    31 |
 SUTH |     -  -168     -    18     -     -     -     -    88 |
 TRO1 |     -   -46     -     -    54     -     -     -     - |
 TROM |     -     -     -    26     -     -     -     -   -11 |
 URUM |     -  -149     -     -     -     -     -     -    85 |
 USNO |     -   -98    76     -     -     -     -     -    25 |
 USUD |     -   -60     -    -3     -     -     -     -    35 |
 VILL |     -     1   166  -109     -     -     -     -   -24 |
 WILL |     -   -72     -     -     -     -     -     -    41 |
 WTZR |     -    15     -   -21     -     -     -     -     - |
 WUHN |     -   -42     -   -58    98     -     -     -     - |
 YAR2 |     -    -4     -     -     -     -     -     -     2 |
 YELL |     -  -107     -  -149     -     -     -     -   122 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8724   110    59    31    46  3826  8156     -    32 |  288   4.56
    2 |  3902    51   102   245    34  2510  3232     -    35 |  288   2.39
    3 |  1844    71    56    62    59  2544  1822     -    27 |  288   1.56
    4 |   872   275   166   181   170  1197   843     -    51 |  281   0.70
    5 |  7529   131    66   109    53  4035  7830     -    38 |  288   4.66
    6 |  9658   144    78    71   238  3161  9551     -    29 |  288   5.57
    7 |  2902    48    86    62    91  4237  2686     -    31 |  288   0.67
    8 |  4727    59   135    62    34  2096  3862     -    40 |  288   2.19
    9 |  1811    54    80    58    87  2518  1706     -    29 |  288   1.64
   10 |  3742    97   108   176   107  3264  3583     -    30 |  288   3.07
   11 |   867    69    80   243    42  1203   884     -   124 |  288   0.34
   13 |  1035   108    75    99    86   918  1024     -    53 |  288   0.30
   14 |   730    49   151    70    51  8609   738     -    39 |  288   0.19
   15 |  4056   270   181     -    94  2595  4245     -   121 |  277   1.74
   17 |  3713   146    91     X   139     -  3567     -    99 |  276   3.01
   18 |   788   103    84   144   109  1886   770     -    74 |  288   0.33
   20 |   625    85    72    52    66  1261   690     -     X |  288   0.24
   21 |  4377   173   141     X   176  5051  3898     -    67 |  288   2.87
   22 |  3099    45    79   108    62  2542  3230     -    35 |  288   1.98
   23 |  6461    90    71   140    59  5880  7438     -    25 |  288   6.73
   24 |  1751     -   206     X   190  1284  1684     -    97 |  222   1.88
   25 |  2024    46   176   105    85  2694  2110     -    31 |  288   1.29
   26 |   678    80    75    51    33   959   774     -    27 |  288   0.21
   27 |  3297   247    91   154    61 11667  3321     -    34 |  288   2.30
   28 |  2978    57   144   155    86  2951  3243     -    73 |  288   0.92
   29 |  1692   100    59   105    58  1672  1597     -    34 |  288   0.84
   30 |  5283   140    63    80    41  5251  5366     -    51 |  288   1.72
   31 |  1103    45    57   245   102  4769  1127     -    52 |  288   0.74
 -----+-------------------------------------------------------+--------------
 ALBH |     -    40     -     -     -     -     -     -    23 |  284   0.07
 AMC2 |     -    31     -     -     -     -     -     -    18 |  286   0.04
 ANKR |     -    24     -    34     -     -     -     -     - |  288  37.76
 AOML |     -    35     -     -     -     -     -     -    20 |  286  23.73
 AUCK |     -    59     -   190     -     -     -     -    45 |  264  13.25
 BAHR |     -    55    51    59    43     -     -     -    20 |  288   0.65
 BILI |     -    38     -     -    44     -     -     -     - |  287  11.28
 BJFS |     -     -     -     -    57     -     -     -    27 |  198    >>>
 CAS1 |     -    82     -    64    41     -     -     -    43 |  288   8.77
 CEDU |     -    44     -    50     -     -     -     -    26 |  288  14.24
 CHAT |     -    32     -     -    27     -     -     -    18 |  287  14.25
 CHUR |     -    35     -     -     -     -     -     -    20 |  286   0.82
 COCO |     -    46     -     -    31     -     -     -    38 |  244  13.28
 DAVR |     -    43     -     -    93     -     -     -    57 |  288  23.19
 DRAO |     -    50    76     -     -     -     -     -    28 |  288   0.04
 EISL |     -     -     -    77     -     -     -     -    32 |  288  25.29
 FAIR |     -    64    47    26    35     -     -     -    52 |  283   0.12
 GALA |     -    32     -    47    31     -     -     -    24 |  288  18.45
 GODE |     -    42     -    44     -     -     -     -    27 |  283    >>>
 GOLD |     -    39     -     -     -     -     -     -    22 |  286  16.19
 GRAZ |     -    61     -    84     -     -     -     -     - |  288  37.21
 GUAT |     -     -     -     -    35     -     -     -    17 |  286    >>>
 HOB2 |     -    42    51    46    26     -     -     -    22 |  288   0.08
 HRAO |     -    28     -     -     -     -     -     -    16 |  284  22.20
 IISC |     -    97     -     -   163     -     -     -   124 |  284  25.80
 JPLM |     -     -     -     -    41     -     -     -    20 |  286   7.74
 KIRU |     -    25     -     -     -     -     -     -    14 |  286   1.55
 KOKB |     -    63    61     -    47     -     -     -     - |  288   0.07
 KOSG |     -    43     -     -     -     -     -     -    24 |  288  14.83
 KOUR |     -    44    68    56     -     -     -     -    20 |  288  18.71
 MALI |     -     -     -    99     -     -     -     -    41 |  287  63.14
 MAS1 |     -     -     -     X    27     -     -     -    13 |  262   2.80
 MATE |     -     -     -    71     -     -     -     -    29 |  287   0.11
 MAW1 |     -    53     -     -    55     -     -     -    22 |  288  26.20
 MCM4 |     -     -     -     -   285     -     -     -   139 |  264  10.54
 MDO1 |     -     -    63    51     -     -     -     -    36 |  288   4.52
 MEDI |     -    23     -     -     -     -     -     -    13 |  286   0.06
 MKEA |     -    47     -    56    32     -     -     -    19 |  288  28.54
 MSKU |     -    42     -     -    49     -     -     -     - |  246  27.18
 NLIB |     -     -     -    66     -     -     -     -    27 |  287   0.06
 NPLD |     -    26     -     -     -     -     -     -    15 |  285   0.06
 NRC2 |     -    25    86    50    33     -     -     -    35 |  288   0.08
 NRIL |     -    52     -     -    61     -     -     -     - |  285  12.90
 OS0G |     -    32    39    38     -     -     -     -     - |  288   0.12
 PENC |     -    25     -     -     -     -     -     -    15 |  285   5.21
 PERT |     -    26    66    62     -     -     -     -    29 |  288  13.30
 PIE1 |     -    31     -    39     -     -     -     -    23 |  288   0.06
 POTS |     -    39     -    42     -     -     -     -    21 |  288  12.60
 PRDS |     -    30     -     -     -     -     -     -    17 |  286   1.64
 REYK |     -    12     -     -    14     -     -     -     - |  285  13.30
 RIOG |     -    30     -     -    35     -     -     -     - |  261  13.71
 SANT |     -    29     -    67    25     -     -     -    23 |  288  17.81
 SCH2 |     -    28     -     -     -     -     -     -    16 |  286   7.05
 SELE |     -    36     -    40     -     -     -     -    27 |  288  29.82
 SEY1 |     -     -     -    88     -     -     -     -    36 |  286  33.84
 SFER |     -    24     -     -     -     -     -     -    14 |  287   1.10
 STJO |     -    49    78     -    20     -     -     -    19 |  288  13.92
 SUTH |     -    34     -    69     -     -     -     -    22 |  288  19.07
 TRO1 |     -    71     -     -    83     -     -     -     - |  288  13.62
 TROM |     -     -     -    40     -     -     -     -    16 |  288  21.52
 URUM |     -    25     -     -     -     -     -     -    14 |  288  14.61
 USNO |     -    46    54     -     -     -     -     -    33 |  283   0.06
 USUD |     -    41     -    95     -     -     -     -    40 |  288   0.48
 VILL |     -    33    74    35     -     -     -     -    30 |  288   9.10
 WILL |     -    38     -     -     -     -     -     -    22 |  286   3.55
 WTZR |     -    16     -    22     -     -     -     -     - |  288   0.15
 WUHN |     -    34     -    54    22     -     -     -     - |  287  21.46
 YAR2 |     -    31     -     -     -     -     -     -    18 |  286   4.00
 YELL |     -    36     -    45     -     -     -     -    31 |  288   0.12
 -----+-------------------------------------------------------+--------------
 TOT  |  4034    78    97    99    89  4022  3997     -    44 |


 BEST CLOCK FIT: DRAO   288   0.04 (ns) 

