
 GPS week: 1175   Day: 0   MJD: 52469                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2673      0     0.03    -0.48     5.60     0.00
 cod |   288     0  27111    539    -0.08    -0.35     0.06    21.72
 esa |   288     0  18443    785     0.51    -0.31     0.08    14.27
 gfz |   288     0  16558    336    -0.48     0.69     0.08    15.28
 igu |    96     0   2391     66    -0.94     5.09     4.32     0.00
 jpl |   288     0  13868    868     1.62    -3.08     0.05    29.06
 ngs |    96     0   2673      0     0.04    -0.49     5.07     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  30000    853 -1204.34   -31.41     0.06    19.67

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  7267  -106   287    12 10889   -95  6343     -   -79 |
    2 | -6435    50   303    90 -2062  -199 -5712     -   -85 |
    3 | -3167    70    84   126  -753   -62 -3177     -  -154 |
    4 |  -461    75    70   -12  2017    78  -362     -  -134 |
    5 |  5402   -43   168  -110 11797   228  4218     -  -288 |
    6 | -4306   207  -179    65   -60    31 -3845     -  -190 |
    7 | -2888   114   137   -67 -6967   -18 -3292     -  -170 |
    8 | -3703   -50   201   -69 -1760    16 -3464     -   -58 |
    9 | -4298   -34   135    93 -6147   133 -4308     -  -307 |
   10 | -2399    33   111    13  4088   165 -2433     -  -155 |
   11 |  7608   -71     9    82  5304   -12  7409     -    26 |
   13 |  4797    11   221  -189   220   -56  4761     -    32 |
   14 |  3589    14    60   -43  1285    34  3792     -   -33 |
   15 |-10724   168     -   179 -6521    44 -8955     -  -333 |
   17 | -3585     X    37   302     -    24 -3329     -  -290 |
   18 |  6084    -1    81   -93  3521    86  5962     -     X |
   20 |  4415   -33   148     4  1796    23  4452     -   -78 |
   21 | -1751   165   -75   138     -  -175 -1394     -  -210 |
   22 | -5105    24   143    72 -6751   -53 -5089     -  -178 |
   23 |   -84    87   -71   -51  1490   261   420     -  -348 |
   24 |  2920   108   126   -28     -    59  1978     -  -197 |
   25 |  2610    38   103   135  6907     3  1839     -  -225 |
   26 |  -295    21   -98    37  1160   155  -409     -  -199 |
   27 |  4267   -35   123   165-22450   -80  3851     -   -74 |
   28 | 10156    21    23  -163  3316    94  9684     -   -37 |
   29 | -2352    63    -7   162   527   155 -2304     -  -212 |
   30 | -1880    86   162   131 -6599     4 -1612     -  -315 |
   31 | -5976     3    84    79 -5535    -6 -5306     -  -125 |
 -----+-------------------------------------------------------+
 ALBH |     -  -163     -     -     -   103     -     -    29 |
 ALGO |     -     -     -     -     -   -31     -     -    46 |
 ANKR |     -    41   -62     -     -     -     -     -     - |
 ASC1 |     -     -     -   239     -     -     -     -  -186 |
 BAHR |     -    -2    80     -     -     -     -     -   -56 |
 BJFS |     -     -     -  -214     -     -     -     -   166 |
 BOR1 |     -     4     -     -     -     -     -     -    -4 |
 BRUS |     -   -20     -     -     -    13     -     -     3 |
 CAS1 |     -    43    -1  -109     -    14     -     -    17 |
 CEDU |     -   212  -433     -     -     -     -     -    81 |
 CHAT |     -   -94    10     -     -   -21     -     -   128 |
 CHUR |     -   128     -     -     -     -     -     -  -142 |
 COCO |     -    79     -    17     -   -42     -     -   -38 |
 CRO1 |     -     -     -     -     -   -49     -     -    72 |
 DAVR |     -   -18     -  -103     -     -     -     -   100 |
 DRAO |     -     0     -     -     -     -     -     -     0 |
 EISL |     -   -12   -95     -     -    59     -     -    -5 |
 FAIR |     -  -121    18  -121     -   123     -     -    32 |
 GALA |     -   -25   -51    16     -    -9     -     -    65 |
 GODE |     -    33   -31     -     -     -     -     -   -14 |
 GOLD |     -     1     -     -     -   -79     -     -   117 |
 GRAZ |     -   -12   -77     -     -     -     -     -    69 |
 GUAT |     -     -     -    39     -     -     -     -   -31 |
 HERS |     -  -294     -     -     -     -     -     -   325 |
 HOB2 |     -    83  -131     -     -     -     -     -     3 |
 HRAO |     -   -78     -     -     -   -99     -     -   232 |
 IISC |     -  -149   -25     -     -     -     -     -   183 |
 JAB1 |     -    36     -     -     -   -27     -     -     - |
 JPLM |     -     -     -     3     -     -     -     -    -2 |
 KARR |     -   144     -  -205     -     -     -     -     - |
 KERG |     -     -     -   -28     -     X     -     -    22 |
 KIRU |     -   -74     -     -     -     -     -     -    81 |
 KOKB |     -    17     -   -24     -     -     -     -     - |
 KOSG |     -   -53     -     -     -     -     -     -    58 |
 KOUR |     -   -98    -9    99     -     -     -     -    39 |
 KUNM |     -     -     -     -     -  -149     -     -   219 |
 KWJ1 |     -     -     -    26     -   -14     -     -     X |
 LAE1 |     -   -54     -  -163     -     -     -     -   188 |
 LHAS |     -    97   -87   -57     -     -     -     -     - |
 MAC1 |     -   -52    76  -100     -    62     -     -   -11 |
 MALI |     -     -   -91     -     -     -     -     -    66 |
 MAS1 |     -     -     X  -162     -     -     -     -   126 |
 MATE |     -   155  -352     -     -     X     -     -    85 |
 MAW1 |     -    -8     -     1     -   -13     -     -    27 |
 MBAR |     -    17     -   -24     -     -     -     -     - |
 MDO1 |     -     -  -119     -     -     -     -     -    86 |
 METS |     -   -15     -     -     -     -     -     -    17 |
 MKEA |     -   -32   -44     6     -   -77     -     -   177 |
 NLIB |     -     -  -159     -     -   -56     -     -   258 |
 NPLD |     -   -57     -     -     -     -     -     -    63 |
 NRC2 |     -   -65  -130    59     -     X     -     -   120 |
 NRIL |     -    26     -   -16     -   -11     -     -     - |
 NYA1 |     -    70     -     -     -   -78     -     -    38 |
 NYAL |     -     -    87     -     -     -     -     -   -63 |
 OS0G |     -    17     -   -82     -     -     -     -    42 |
 PERT |     -     -     2     -     -     -     -     -    -2 |
 PIE1 |     -     -     X     -     -    70     -     -  -103 |
 POL2 |     -   -31     -     -     -  -106     -     -   192 |
 POTS |     -    65  -132     -     -     -     -     -    24 |
 PRDS |     -    11     -     -     -     -     -     -   -12 |
 PTBB |     -    57     -     -     -     -     -     -   -63 |
 REYK |     -    84     -     X     -     -     -     -   -93 |
 RIOG |     -   -29    14  -103     -    65     -     -     5 |
 SANT |     -  -181   170  -100     -    73     -     -    46 |
 SCH2 |     -   -74     -     -     -     -     -     -    81 |
 SELE |     -    59  -173     -     -     -     -     -    61 |
 SEY1 |     -     -     -     -     -    -9     -     -    13 |
 SFER |     -  -153     -     -     -     -     -     -   169 |
 STJO |     -    45     -     -     -     -     -     -   -50 |
 SUTH |     -  -112   -78     -     -     -     -     -   181 |
 THTI |     -     -   135     -     -     -     -     -   -98 |
 TIDB |     -     X     X     -     -   -60     -     -    88 |
 TIXI |     -    -4     -     6     -     -     -     -     - |
 TRO1 |     -  -195     -    16     -     -     -     -   204 |
 TROM |     -     -     5     -     -     -     -     -    -4 |
 URUM |     -  -168     -     -     -     -     -     -   185 |
 USN1 |     -     -     -     -     -  -235     -     -   347 |
 USNO |     -   -25     -     -     -     1     -     -    26 |
 USUD |     -   -93  -119     -     -   128     -     -     X |
 VILL |     -    53   -57     -     -     -     -     -   -17 |
 WILL |     -   -33     -     -     -     -     -     -    36 |
 WSRT |     -   -42     -     -     -     -     -     -    46 |
 WTZR |     -     0   -64     -     -   -12     -     -    64 |
 WUHN |     -   152  -275    40     -     -     -     -     - |
 YAR2 |     -   -36     -     -     -   -74     -     -   150 |
 YELL |     -    21  -169     -     -     -     -     -   101 |
 ZWEN |     -   -65     -   -12     -     -     -     -    81 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8372    52   121    79  6913   176  6724     -    98 |  282   3.70
    2 |  5437   102    76    89  1607    77  4968     -    34 |  288   2.09
    3 |  4589    52    68    95  4359    26  4491     -    59 |  288   2.11
    4 |  2160   126   202    54  1590    73  2266     -    76 |  280   0.75
    5 |  6218    45    23    24  5439    25  5064     -    43 |  288   3.24
    6 |  8671    47   175    69  6270    34  8435     -   105 |  288   9.06
    7 |  3901    36    44   114  5041    44  3503     -   114 |  288   0.68
    8 |  3714    46    28    69  1664    26  4038     -    31 |  288   2.73
    9 |  4754    37    86    28  2398    42  4956     -    31 |  288   2.06
   10 |  2745    54    49    72  3473    61  2654     -    68 |  288   2.80
   11 |  1276    73    72    70  2519    40  1074     -    54 |  288   0.29
   13 |  1140    85   123   142  1136    65  1052     -    49 |  288   0.40
   14 |  1006    62    49    64  1081    42   917     -    53 |  288   0.20
   15 |  5782    89     -   122  5087    93  5279     -    54 |  277   3.62
   17 |  1498     X    59    50     -    37  1858     -    74 |  276   3.06
   18 |  1302    46    54    85  1847    47  1241     -     X |  288   0.43
   20 |  1295   138    93    76  1295    80  1307     -   159 |  288   0.15
   21 |  5439    64    86   118     -   183  5336     -    70 |  288   2.68
   22 | 19284    34    34    53 12103    35 16275     -    29 |  288   5.93
   23 |  7210    82    75    56  2860    29  7293     -    71 |  288   5.95
   24 |  4572    84    84   194     -   104  4886     -    94 |  282   1.51
   25 |  5473    72    22    81  3976    27  5399     -    31 |  288   1.98
   26 |  1355   183   225   150  1585    64  1252     -   180 |  288   0.83
   27 |  4308    66    83   105  9879    58  4158     -    44 |  288   3.09
   28 |  1398    47    50    53  1659    44  1408     -    89 |  288   0.65
   29 |  1272    71    59    90  1102    41  1262     -    61 |  288   0.43
   30 |  1967    32    39    21  4852    20  1742     -    19 |  288   0.97
   31 |  3692    66   180    32  4016    69  3247     -    84 |  288   1.12
 -----+-------------------------------------------------------+--------------
 ALBH |     -    69     -     -     -    54     -     -    29 |  288   0.07
 ALGO |     -     -     -     -     -    89     -     -   131 |  214    >>>
 ANKR |     -    27    41     -     -     -     -     -     - |  287  25.17
 ASC1 |     -     -     -    25     -     -     -     -    19 |  200    >>>
 BAHR |     -    23    33     -     -     -     -     -    16 |  288   0.49
 BJFS |     -     -     -   216     -     -     -     -   168 |  286    >>>
 BOR1 |     -    18     -     -     -     -     -     -    20 |  286   5.96
 BRUS |     -    23     -     -     -    22     -     -    16 |  288   0.02
 CAS1 |     -    51    39    40     -    24     -     -    26 |  288   8.50
 CEDU |     -    45    29     -     -     -     -     -    42 |  288  22.75
 CHAT |     -    30    31     -     -    14     -     -    15 |  287  14.22
 CHUR |     -    30     -     -     -     -     -     -    33 |  286   0.80
 COCO |     -    31     -    55     -    30     -     -    39 |  288  11.88
 CRO1 |     -     -     -     -     -    30     -     -    45 |  286   0.09
 DAVR |     -    28     -    53     -     -     -     -    24 |  288  25.24
 DRAO |     -    38     -     -     -     -     -     -    42 |  288   0.08
 EISL |     -    42    50     -     -    33     -     -    26 |  288  31.43
 FAIR |     -    40    21    36     -    45     -     -    27 |  288   0.06
 GALA |     -    44    86    43     -    27     -     -    24 |  288  15.99
 GODE |     -    39    63     -     -     -     -     -    21 |  288   0.06
 GOLD |     -    80     -     -     -    71     -     -    30 |  288  16.14
 GRAZ |     -    74   214     -     -     -     -     -    80 |  284  29.37
 GUAT |     -     -     -    23     -     -     -     -    18 |  286    >>>
 HERS |     -    22     -     -     -     -     -     -    25 |  262  71.48
 HOB2 |     -    29    25     -     -     -     -     -    25 |  288   0.06
 HRAO |     -    22     -     -     -    21     -     -    37 |  288  17.31
 IISC |     -   119   114     -     -     -     -     -   210 |  288  17.48
 JAB1 |     -    51     -     -     -    38     -     -     - |  288  72.89
 JPLM |     -     -     -    49     -     -     -     -    38 |  286   4.42
 KARR |     -    21     -    29     -     -     -     -     - |  232  14.21
 KERG |     -     -     -    32     -     X     -     -    25 |  287   2.36
 KIRU |     -    26     -     -     -     -     -     -    28 |  286   0.96
 KOKB |     -    16     -    23     -     -     -     -     - |  287   0.08
 KOSG |     -    16     -     -     -     -     -     -    18 |  285    >>>
 KOUR |     -    38    43    60     -     -     -     -    28 |  288  16.85
 KUNM |     -     -     -     -     -    29     -     -    43 |  286  42.72
 KWJ1 |     -     -     -   148     -    78     -     -     X |  196  98.24
 LAE1 |     -    38     -    24     -     -     -     -    38 |  287  14.35
 LHAS |     -    28    60    76     -     -     -     -     - |  288  14.96
 MAC1 |     -    86    20    57     -    28     -     -    19 |  288  15.19
 MALI |     -     -    36     -     -     -     -     -    26 |  288  18.33
 MAS1 |     -     -     X    45     -     -     -     -    35 |  262   3.06
 MATE |     -    74    77     -     -     X     -     -   131 |  288   0.07
 MAW1 |     -    84     -    54     -    44     -     -    20 |  288  20.29
 MBAR |     -     9     -    13     -     -     -     -     - |  275  26.36
 MDO1 |     -     -    44     -     -     -     -     -    32 |  286  14.09
 METS |     -    26     -     -     -     -     -     -    29 |  285   1.45
 MKEA |     -    29    36    55     -    35     -     -    25 |  288  29.84
 NLIB |     -     -   181     -     -    84     -     -   213 |  286 367.25
 NPLD |     -    22     -     -     -     -     -     -    24 |  285   0.03
 NRC2 |     -    26    58    22     -     X     -     -    48 |  288   0.06
 NRIL |     -    32     -    20     -    26     -     -     - |  288  11.46
 NYA1 |     -    46     -     -     -    29     -     -    37 |  288   0.07
 NYAL |     -     -    88     -     -     -     -     -    64 |  284   0.08
 OS0G |     -    13     -    28     -     -     -     -    17 |  285   0.09
 PERT |     -     -    19     -     -     -     -     -    14 |  288  10.01
 PIE1 |     -     -     X     -     -    27     -     -    40 |  288   0.07
 POL2 |     -    25     -     -     -    64     -     -    75 |  288   9.65
 POTS |     -    23    29     -     -     -     -     -    27 |  288  11.82
 PRDS |     -    35     -     -     -     -     -     -    39 |  286   1.89
 PTBB |     -    38     -     -     -     -     -     -    42 |  286   0.05
 REYK |     -   126     -     X     -     -     -     -   139 |  280  10.59
 RIOG |     -    49    55    81     -    24     -     -    53 |  288  11.52
 SANT |     -   122    69   139     -    59     -     -    94 |  288  11.20
 SCH2 |     -    29     -     -     -     -     -     -    32 |  286  25.31
 SELE |     -    44    35     -     -     -     -     -    35 |  288  28.70
 SEY1 |     -     -     -     -     -    20     -     -    30 |  284  45.33
 SFER |     -    24     -     -     -     -     -     -    26 |  287   1.29
 STJO |     -    34     -     -     -     -     -     -    37 |  286   7.30
 SUTH |     -    33    56     -     -     -     -     -    31 |  288  13.80
 THTI |     -     -    26     -     -     -     -     -    19 |  287   2.35
 TIDB |     -     X     X     -     -    13     -     -    19 |  264   0.17
 TIXI |     -    16     -    23     -     -     -     -     - |  287  10.06
 TRO1 |     -    76     -    33     -     -     -     -    70 |  288   9.75
 TROM |     -     -    18     -     -     -     -     -    13 |  286  10.17
 URUM |     -    22     -     -     -     -     -     -    25 |  288  20.67
 USN1 |     -     -     -     -     -    18     -     -    27 |  286   0.04
 USNO |     -   117     -     -     -    58     -     -    52 |  283   0.04
 USUD |     -    49    61     -     -    26     -     -     X |  288   0.62
 VILL |     -    21    39     -     -     -     -     -    23 |  288   4.06
 WILL |     -    37     -     -     -     -     -     -    41 |  286   4.97
 WSRT |     -    16     -     -     -     -     -     -    18 |  288   0.03
 WTZR |     -    85    57     -     -    88     -     -    25 |  288   0.12
 WUHN |     -    60    40    94     -     -     -     -     - |  287  12.52
 YAR2 |     -    21     -     -     -    27     -     -    39 |  288   3.24
 YELL |     -    51    56     -     -     -     -     -    25 |  288   0.05
 ZWEN |     -    39     -    69     -     -     -     -    36 |  279  24.29
 -----+-------------------------------------------------------+--------------
 TOT  |  5605    60    82    79  4322    47  5068     -    64 |


 BEST CLOCK FIT: BRUS   288   0.02 (ns) 

