
 GPS week: 1172   Day: 1   MJD: 52449                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2632      6     0.33    -0.31     3.60     0.00
 cod |    96     0   2536      0     4.21    -5.12     3.72     0.00
 emr |   288     0  17312      0   -10.25    -4.06     0.07    27.16
 esa |   288     0  16178   1289     0.41    -0.95     0.10    17.84
 gfz |   288     0  13899     40     0.03    -0.33     0.09    19.41
 igu |    96     0   1912      0    -0.16     0.12     4.09     0.00
 ngs |    96     0   2632      5     0.26    -0.31     3.42     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23098    735  -636.67   -32.42     0.05    35.58

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  4434  4113     7    79   -95  7844  4525     -     7 |
    2 |  4781  4522    12   144   -10     -  3842     -   -75 |
    3 |  -823 -1109   -77   100    69 -4533  -994     -   -29 |
    4 |    88  -219   -82    73     1 -1617   -72     -    26 |
    5 |  3924  3621  -155    10   365  3843  3784     -   -85 |
    6 | -9419 -9718  -171   200   218 -4756 -7328     -   -89 |
    7 | -5297 -5598    49    87  -148 -9063 -5423     -     X |
    8 |   186  -114    24   208  -114 -6347  -196     -   -60 |
    9 | 10621 10300  -135   188   363  5110  9863     -  -189 |
   10 |  3271  2956    59   -32  -126 11386  2374     -    40 |
   11 |  5539  5266   107    29  -298  6376  5595     -    66 |
   13 |  3633  3327     8   -17  -234     -  3393     -   125 |
   14 |  3795  3483    11   114    66   798  3829     -  -101 |
   15 | -5429 -5717   -71     -   293  6163 -4479     -  -106 |
   17 | -2491 -2804  -131   -20   307     - -2337     -   -58 |
   18 |  4587  4272   -24    31   220  1429  4858     -  -116 |
   20 |  5151  4879    53   199  -178  1820  5192     -   -43 |
   21 | -6908     -   -86     X   462     - -6301     -  -179 |
   22 | -2711 -3001   -42   113   133 -8552 -3703     -   -97 |
   23 |  -379  -717     1    89   186     -  -203     -  -147 |
   24 |  4565  4272   -50   214   -41     -  3549     -   -47 |
   25 | -1403 -1689  -117   220   201  6701 -1131     -  -131 |
   26 |   288   -42   -64   253   202     -     4     -  -179 |
   27 | -4481 -2624   -38     X    53     - -4188     -     X |
   28 | -1237 -1533   141   -88  -245 -1956 -1035     -    70 |
   29 | -2552 -2879    16     X   194  1954 -2152     -  -117 |
   30 | -5698 -5988  -264   238   449-10987 -5438     -  -163 |
   31 | -8264 -8574    65     9  -126 -5174 -7885     -    15 |
 -----+-------------------------------------------------------+
 ALBH |     -     -  -110     -     -     -     -     -    84 |
 ALGO |     -     -  -112   374     -     -     -     -     7 |
 AUCK |     -     -     -  -268     -     -     -     -   134 |
 BAHR |     -     -   113   -64   -48     -     -     -   -28 |
 BJFS |     -     -   118     -  -166     -     -     -     X |
 BOR1 |     -     -   106     -     -     -     -     -   -81 |
 BRUS |     -     -    31     -     -     -     -     -   -24 |
 CAS1 |     -     -     -    30  -120     -     -     -    50 |
 CEDU |     -     -     -  -215     -     -     -     -   108 |
 CHAT |     -     -     -   -95     -     -     -     -    48 |
 CHUR |     -     -   101     -     -     -     -     -   -77 |
 COCO |     -     -     -  -122   -43     -     -     -    84 |
 DAV1 |     -     -     -     -  -124     -     -     -    68 |
 DRAO |     -     -   -18     -     -     -     -     -    13 |
 GALA |     -     -     -    59  -255     -     -     -   111 |
 GODE |     -     -    28   -98     -     -     -     -    28 |
 GRAZ |     -     -    19  -193     -     -     -     -    78 |
 GUAT |     -     -     -     -   113     -     -     -   -62 |
 HOB2 |     -     -    70  -416     -     -     -     -    34 |
 IISC |     -     -     -  -302     -     -     -     -   151 |
 JPLM |     -     -   122     -  -271     -     -     -    55 |
 KERG |     -     -   -19     -    -6     -     -     -    18 |
 KGN0 |     -     -    -4     -     -     -     -     -     3 |
 KIRU |     -     -    84     -     -     -     -     -   -64 |
 KWJ1 |     -     -     -     -    54     -     -     -   -30 |
 MAC1 |     -     -     -   -15  -105     -     -     -    63 |
 MALI |     -     -     -    61  -385     -     -     -   180 |
 MAS1 |     -     -     -    57   -53     -     -     -     - |
 MATE |     -     -     -  -244     -     -     -     -   122 |
 MEDI |     -     -    -7     -     -     -     -     -     6 |
 METS |     -     -   -62     -     -     -     -     -    48 |
 NPLD |     -     -   105     -     -     -     -     -   -80 |
 NRC2 |     -     -    98  -211   -47     -     -     -    57 |
 NYAL |     -     -   -13     X     -     -     -     -    10 |
 OS0G |     -     -    64   -32     -     -     -     -   -33 |
 PERT |     -     -    63  -222     -     -     -     -    63 |
 PIE1 |     -     -    37     X     -     -     -     -   -28 |
 POTS |     -     -     -  -223     -     -     -     -   112 |
 PRDS |     -     -   -19     -     -     -     -     -    14 |
 RIOG |     -     -     -   247  -265     -     -     -    21 |
 SANT |     -     -     -   358  -158     -     -     -   -94 |
 SCH2 |     -     -   -20     -     -     -     -     -    15 |
 SELE |     -     -     -  -209     -     -     -     -   105 |
 SFER |     -     -     3     -     -     -     -     -    -2 |
 STJO |     -     -   103     -  -181     -     -     -    20 |
 THTI |     -     -     -  -247    41     -     -     -   101 |
 TRO1 |     -     -     -     -  -258     -     -     -   141 |
 TROM |     -     -     -    23     -     -     -     -   -11 |
 TSKB |     -     -    40  -284     -     -     -     -   112 |
 TWTF |     -     -    14     -     -     -     -     -   -11 |
 USNO |     -     -    20     -     -     -     -     -   -15 |
 VILL |     -     -     -    -8     -     -     -     -     4 |
 WES2 |     -     -  -111   169     -     -     -     -     - |
 WILL |     -     -   -48     -     -     -     -     -    36 |
 WSRT |     -     -   142   -51     -     -     -     -   -83 |
 WUHN |     -     -     -  -237   218     -     -     -     - |
 YELL |     -     -     -  -230   -11     -     -     -   121 |
 ZWEN |     -     -     -     -  -100     -     -     -    55 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5934  5785    88    79   211  5612  5511     -    75 |  277   3.53
    2 |  4013  3987    57    51    37     -  3459     -    35 |  288   2.18
    3 |  3533  3606    34   102    90  3671  3521     -    86 |  288   1.96
    4 |   836   795    84   108   131  1057   958     -    59 |  288   0.79
    5 |  3153  3043    28   136    63  3855  2970     -    47 |  288   2.60
    6 |  6590  6715    42    62    69  6177  6032     -    25 |  288   5.55
    7 |  1857  1906    56    82    42  4471  1862     -     X |  288   0.69
    8 |  3229  3140    53    35   126  3819  3017     -   101 |  288   3.58
    9 |  3773  3703    43   135    31  3632  4137     -    91 |  288   0.89
   10 |  2755  2817    46    88   100  5897  3362     -    18 |  288   2.10
   11 |  1636  1555    31   130    89  3219  1620     -    45 |  288   0.30
   13 |  1125  1171    59    66    49     -  1207     -    70 |  288   0.32
   14 |   784   643    61    63    68  1023   766     -    66 |  288   0.31
   15 |  5607  5541    94     -   146  5994  5076     -    30 |  288   2.44
   17 |  1188  1221    39    38    48     -  1423     -    29 |  288   3.19
   18 |  1588  1469    85   197    31  1438  1321     -    51 |  288   0.40
   20 |   825   852    37   142    57  1041   855     -    78 |  288   0.24
   21 |  3353     -   184     X   173     -  3055     -   114 |  287   3.02
   22 |  7828  7886    83    29    92  5742  7165     -    25 |  288   1.20
   23 |  4286  4318    68    83    80     -  4447     -    88 |  288   4.57
   24 |  5455  5508    58   112   127     -  4366     -    35 |  288   2.14
   25 |  2475  2417    66    56    77  3268  2605     -    42 |  288   2.04
   26 |   786   679    81   317   110     -   842     -    46 |  278   0.64
   27 |  7648  9780    74     X   103     -  8014     -     X |  156   7.85
   28 |  1287  1247    23    44    86   512  1408     -    49 |  288   0.42
   29 |  2074  1980    83     X   190  1520  1858     -    58 |  276   1.10
   30 |  1328  1312    29    61    50  6644  1370     -    39 |  288   0.98
   31 |  1817  1811    41   126    49  3858  1477     -    22 |  288   1.50
 -----+-------------------------------------------------------+--------------
 ALBH |     -     -    55     -     -     -     -     -    42 |  284   0.05
 ALGO |     -     -    21    76     -     -     -     -    30 |  288   0.03
 AUCK |     -     -     -   186     -     -     -     -    93 |  110   7.03
 BAHR |     -     -    48    66    31     -     -     -    27 |  288   0.56
 BJFS |     -     -    88     -   124     -     -     -     X |  288    >>>
 BOR1 |     -     -    94     -     -     -     -     -    72 |  281   0.52
 BRUS |     -     -    51     -     -     -     -     -    39 |  286   0.11
 CAS1 |     -     -     -    53    51     -     -     -    27 |  288   8.46
 CEDU |     -     -     -    37     -     -     -     -    19 |  286  13.54
 CHAT |     -     -     -    36     -     -     -     -    18 |  119   8.93
 CHUR |     -     -   144     -     -     -     -     -   110 |  283   1.33
 COCO |     -     -     -    56    45     -     -     -    26 |  288   9.30
 DAV1 |     -     -     -     -    83     -     -     -    45 |  286  18.66
 DRAO |     -     -    15     -     -     -     -     -    11 |  288   0.04
 GALA |     -     -     -    94    56     -     -     -    26 |  288  18.16
 GODE |     -     -    69    57     -     -     -     -    57 |  288  24.71
 GRAZ |     -     -    97   184     -     -     -     -    57 |  285  53.50
 GUAT |     -     -     -     -    38     -     -     -    21 |  286    >>>
 HOB2 |     -     -    33    83     -     -     -     -    31 |  288   0.06
 IISC |     -     -     -    46     -     -     -     -    23 |  288  20.44
 JPLM |     -     -    60     -    41     -     -     -    36 |  288  13.92
 KERG |     -     -    30     -    98     -     -     -    41 |  287   2.23
 KGN0 |     -     -   192     -     -     -     -     -   147 |  281   0.63
 KIRU |     -     -    58     -     -     -     -     -    45 |  286   2.39
 KWJ1 |     -     -     -     -   164     -     -     -    89 |  178 138.63
 MAC1 |     -     -     -   258   237     -     -     -    43 |  288  13.46
 MALI |     -     -     -    99    46     -     -     -    32 |  288 112.61
 MAS1 |     -     -     -   118   108     -     -     -     - |  154   1.40
 MATE |     -     -     -    55     -     -     -     -    28 |  262   0.12
 MEDI |     -     -   107     -     -     -     -     -    82 |  286   0.44
 METS |     -     -    77     -     -     -     -     -    59 |  285   0.33
 NPLD |     -     -    78     -     -     -     -     -    59 |  285   0.04
 NRC2 |     -     -    25    52    54     -     -     -    49 |  288   0.12
 NYAL |     -     -    22     X     -     -     -     -    17 |  288   0.31
 OS0G |     -     -    39    43     -     -     -     -    22 |  288   0.17
 PERT |     -     -    43    80     -     -     -     -    18 |  288  12.97
 PIE1 |     -     -    19     X     -     -     -     -    14 |  288   0.05
 POTS |     -     -     -    42     -     -     -     -    21 |  285  13.04
 PRDS |     -     -    63     -     -     -     -     -    48 |  286   1.47
 RIOG |     -     -     -    57    46     -     -     -    27 |  288  13.13
 SANT |     -     -     -    74    47     -     -     -    20 |  288  18.07
 SCH2 |     -     -    61     -     -     -     -     -    46 |  284   8.64
 SELE |     -     -     -    48     -     -     -     -    24 |  285  38.12
 SFER |     -     -   209     -     -     -     -     -   159 |  267   1.20
 STJO |     -     -    19     -    26     -     -     -    21 |  288  12.66
 THTI |     -     -     -   104    64     -     -     -    26 |  287   1.48
 TRO1 |     -     -     -     -    23     -     -     -    12 |  286  11.78
 TROM |     -     -     -    33     -     -     -     -    17 |  286  11.71
 TSKB |     -     -    62    46     -     -     -     -    62 |  288   0.78
 TWTF |     -     -    67     -     -     -     -     -    51 |  286   0.52
 USNO |     -     -    25     -     -     -     -     -    19 |  288   0.05
 VILL |     -     -     -    36     -     -     -     -    18 |  288  13.81
 WES2 |     -     -    93   142     -     -     -     -     - |  277   0.16
 WILL |     -     -    55     -     -     -     -     -    42 |  284   4.25
 WSRT |     -     -    62    37     -     -     -     -    39 |  288   0.06
 WUHN |     -     -     -    48    44     -     -     -     - |  286  14.33
 YELL |     -     -     -    51    57     -     -     -    18 |  288   0.10
 ZWEN |     -     -     -     -    36     -     -     -    20 |  238  67.32
 -----+-------------------------------------------------------+--------------
 TOT  |  3602  3720    75   101    93  4086  3417     -    54 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

