
 GPS week: 1169   Day: 6   MJD: 52433                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2674      0     0.08    -0.18     4.72     0.00
 cod |   288     0  24607      0     0.10    -0.26     0.06    22.15
 emr |   288     0  18555     52    37.45     3.71     0.08    18.67
 gfz |   288     0  15637     82    -0.01    -0.14     0.09    14.96
 igu |    96     0   2186      0     0.02    -0.09     3.96     0.00
 jpl |   282     0  12860    561     0.56     2.05     0.06    23.89
 ngs |    96     0   2674      0     0.09    -0.19     4.59     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0   8349      2  -186.83   -26.08     0.07    20.33

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -7271   -92  -149    -7-15469    71 -4712     -   192 |
    2 | -5812    55  -133  -114     -   -75 -5069     -   178 |
    3 |  1446   103  -165    76 13516   -45  1494     -    20 |
    4 | -5658    -3   -89     0 -4255   263 -5265     -   -27 |
    5 | -2060   134  -110    46   864    16 -2779     -   -86 |
    6 |  3669   228  -189    86   278  -143  3810     -   -72 |
    7 | -1602    45    54  -120 -4286    85 -1645     -   -70 |
    8 |  6849    -5   -93    18 -2497   154  5584     -    12 |
    9 |   884   138   -77    82  4105   128  1650     -  -196 |
   10 | -2613   -15  -156   143   396    96 -2338     -   -13 |
   11 |    81   -67    75  -110  -567    24   382     -    67 |
   13 |  3318   -82   -71    86  -572    45  3332     -    60 |
   14 |  5204     2   -48    78  -366   -49  5272     -    19 |
   15 | -3113   180  -269   216 15209    48 -2786     -  -130 |
   17 | -3060   220  -213   212     -    27 -3199     -  -212 |
   18 |  1337   114   -16    13  1843   -31  1428     -  -106 |
   20 |  1264   -68    -2  -158   338   153  1174     -   126 |
   21 |  5712   242  -268   112     -     6  4040     -  -103 |
   22 |  4399   -58  -116    46  1683  -121  3824     -   219 |
   23 |  2840    97  -212   170  7302    11  2092     -   -44 |
   24 |  1916    36  -178   129     -   106  1522     -   -16 |
   25 | -3491    16   -84    -2  3049   -79 -3248     -    95 |
   26 |   841    25  -165   111 -2650   116   548     -    -8 |
   27 | -5314   -34  -127    87 -4653   131 -4347     -    -3 |
   28 | -1125  -110   234  -210 -3963    59 -1284     -    18 |
   29 |   634    84   -53    73     -    83   343     -  -155 |
   30 |  3771   113  -157   109-13037   -67  3079     -   -30 |
   31 | -3049   -35  -100    -2  4971   -36 -2924     -   147 |
 -----+-------------------------------------------------------+
 ALBH |     -   -80     3     -     -    75     -     -     - |
 ALGO |     -  -132   177   -25     -     X     -     -     - |
 AMC2 |     -  -131   154     -     -     -     -     -     - |
 ASC1 |     -    94     -  -140     -     -     -     -     - |
 BAHR |     -   -19    23     -     -     -     -     -     - |
 BOR1 |     -   -67    80     -     -     -     -     -     - |
 BRMU |     -    15     -   -21     -     -     -     -     - |
 BRUS |     -   -55    65     -     -     -     -     -     - |
 CAS1 |     -    69     -  -102     -     -     -     -     - |
 CHAT |     -    86     -     -     -   -80     -     -     - |
 CHUR |     -   -57    68     -     -     -     -     -     - |
 COCO |     -   -55     -    19     -    40     -     -     - |
 CRO1 |     -     -    86  -163     -    43     -     -     - |
 DARW |     -    40     -     -     -   -37     -     -     - |
 DAV1 |     -    64     -  -138     -    28     -     -     - |
 DRAO |     -   -93   -14     -     -     -     -     -   114 |
 FAIR |     -     -   100   -31     -   -63     -     -     - |
 GALA |     -    14     -     7     -   -18     -     -     - |
 GODE |     -   -45    53     -     -     -     -     -     - |
 GOLD |     -    37     -     -     -   -34     -     -     - |
 GRAZ |     -   -25    29     -     -     -     -     -     - |
 GUAM |     -   102     -     -     -   -96     -     -     - |
 HOB2 |     -    20    33   -71     -     -     -     -     - |
 HOFN |     -     -     -   367     -  -230     -     -     - |
 HRAO |     -    29     -     -     -   -28     -     -     - |
 IISC |     -    30     -   -46     -     -     -     -     - |
 JPLM |     -     -   139  -173     -     -     -     -     - |
 KERG |     -    55     6   -89     -     -     -     -     - |
 KIRU |     -   -70   153     -     -   -51     -     -     - |
 KOKB |     -   -99   118     -     -     -     -     -     - |
 KOUR |     -   -26     -     -     -    23     -     -     - |
 KSTU |     -   -63     -     -     -    59     -     -     - |
 KWJ1 |     -     -     -  -118     -    74     -     -     - |
 MAC1 |     -   -19     -  -185     -   137     -     -     - |
 MADR |     -   -15    17     -     -     -     -     -     X |
 MAW1 |     -   125     -  -186     -     -     -     -     - |
 MEDI |     -    56   -66     -     -     -     -     -     - |
 METS |     -   -72    85     -     -     -     -     -     - |
 MKEA |     -   -34     -    -7     -    37     -     -     - |
 NLIB |     -     -   110     -     -   -86     -     -     - |
 NPLD |     -  -130   154     -     -     -     -     -     - |
 NRC2 |     -   -37   259     -     -  -172     -     -     - |
 ONSA |     -   -64   149   -92     -     -     -     -     - |
 PERT |     -    97  -116     -     -     -     -     -     - |
 PIMO |     -     -     -   117     -   -73     -     -     - |
 POL2 |     -     0     -     -     -     0     -     -     - |
 PRDS |     -   -92   109     -     -     -     -     -     - |
 RAMO |     -     7     -     -     -    -7     -     -     - |
 RIOG |     -    21     -  -165     -    85     -     -     - |
 SANT |     -    72     -  -180     -    50     -     -     - |
 SCH2 |     -  -124   147     -     -     -     -     -     - |
 SFER |     -   -59   117     -     -   -23     -     -     - |
 STJO |     -   -12   213     -     -  -159     -     -     - |
 TIDB |     -    -5    20   -17     -     X     -     -     X |
 TOW2 |     -   -30     -     -     -    28     -     -     - |
 TRO1 |     -  -118     -   174     -     -     -     -     - |
 TSKB |     -   -41   106   -72     -     -     -     -     - |
 USNO |     -   -85   114     -     -   -10     -     -     - |
 USUD |     -    42  -181   -27     -   125     -     -     - |
 WES2 |     -   -24    28     -     -     -     -     -     - |
 WILL |     -   -85   101     -     -     -     -     -     - |
 WSRT |     -  -144   170     -     -     -     -     -     - |
 WTZR |     -   -85   101     -     -     -     -     -     - |
 YAR2 |     -     4     -     -     -    -5     -     -     - |
 YELL |     -    28     -   130     -  -112     -     -     - |
 ZWEN |     -   -43     -    63     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 | 12454    48    39    51  6872    46 11356     -    35 |  288   5.19
    2 |  5656    81    69   104     -    52  5709     -    69 |  288   3.15
    3 |  2693    75    82   155  7636    73  2679     -    94 |  277   1.67
    4 |  1932    69    71    98  1509    60  1950     -    93 |  288   0.46
    5 |  3863    45   109   111  3296    57  4572     -    28 |  288   2.91
    6 |  7734    99    66   155  3391    61  7805     -    74 |  277   7.99
    7 |  1828    81    69    86  1421    41  1973     -    54 |  277   0.88
    8 |  6358    34    26    52  2859    31  5593     -    43 |  288   5.21
    9 |  3938    32    33    59  1987    29  3479     -    54 |  288   1.77
   10 |  2886    68    53    50  3297    46  3003     -    62 |  288   2.88
   11 |  2134   110    62   134   860    94  2011     -    75 |  288   0.35
   13 |   994    65    64   145  1071    62  1031     -   115 |  288   0.38
   14 |   858    62    77   104   546    35   601     -   109 |  288   0.19
   15 |  2947    65    49   172  4631    41  2737     -    62 |  288   2.11
   17 |  4012    52    60    60     -    24  4354     -    50 |  288   3.48
   18 |  1078    56    37    48  2083    31   950     -    49 |  288   0.46
   20 |   832    62    34    42  1041    39   766     -    79 |  288   0.27
   21 |  4407    68   109   193     -    49  3947     -    64 |  288   2.71
   22 |  2104    59    42    54  1277    40  1763     -    79 |  288   1.43
   23 |  8217    67    33    96  5868    51  8463     -    55 |  288   6.06
   24 |  5149    69    37   123     -    58  5950     -    38 |  288   3.80
   25 |  1300    85    84   119  1330    70  1130     -    57 |  288   1.01
   26 |   804    45    32    64  1283    28   886     -    31 |  288   0.64
   27 | 10313    52    30    45  7779    47  9621     -    48 |  288   5.03
   28 |  2994    62    36    67  1442    63  2933     -    72 |  288   0.67
   29 |  2852    54    65    87     -    43  2737     -   155 |  288   0.60
   30 |  3234    59   110   143  8703    50  3448     -    44 |  288   1.20
   31 |  1528    63    37    58  1625    68  1421     -    31 |  277   1.66
 -----+-------------------------------------------------------+--------------
 ALBH |     -    26    54     -     -    36     -     -     - |  288   0.08
 ALGO |     -    29    46    41     -     X     -     -     - |  288   0.03
 AMC2 |     -    48    58     -     -     -     -     -     - |  288   0.05
 ASC1 |     -    15     -    23     -     -     -     -     - |  270    >>>
 BAHR |     -    26    31     -     -     -     -     -     - |  288   0.48
 BOR1 |     -    61    72     -     -     -     -     -     - |  281   0.57
 BRMU |     -    52     -    78     -     -     -     -     - |  288  26.74
 BRUS |     -    43    50     -     -     -     -     -     - |  288   0.11
 CAS1 |     -    25     -    37     -     -     -     -     - |  276   9.16
 CHAT |     -    28     -     -     -    26     -     -     - |  279  17.39
 CHUR |     -   238   282     -     -     -     -     -     - |  263   0.85
 COCO |     -    32     -    94     -    48     -     -     - |  287  15.73
 CRO1 |     -     -    88    53     -    41     -     -     - |  286   0.10
 DARW |     -   134     -     -     -   124     -     -     - |  227  16.09
 DAV1 |     -    52     -    68     -    30     -     -     - |  276  28.37
 DRAO |     -    28    31     -     -     -     -     -    28 |  288   0.07
 FAIR |     -     -    22    96     -    57     -     -     - |  276   0.27
 GALA |     -    28     -    83     -    40     -     -     - |  288  22.40
 GODE |     -    39    46     -     -     -     -     -     - |  288  25.75
 GOLD |     -    23     -     -     -    22     -     -     - |  280  23.13
 GRAZ |     -    45    54     -     -     -     -     -     - |  288  49.99
 GUAM |     -   208     -     -     -   193     -     -     - |  233  14.48
 HOB2 |     -    21    32    23     -     -     -     -     - |  288   0.09
 HOFN |     -     -     -    47     -    29     -     -     - |  260    >>>
 HRAO |     -    38     -     -     -    34     -     -     - |  279  17.32
 IISC |     -    33     -    49     -     -     -     -     - |  288  25.10
 JPLM |     -     -    85   106     -     -     -     -     - |  285   9.37
 KERG |     -    43    42    40     -     -     -     -     - |  287    >>>
 KIRU |     -    83   150     -     -    62     -     -     - |  288   2.18
 KOKB |     -    22    26     -     -     -     -     -     - |  288   0.05
 KOUR |     -    40     -     -     -    37     -     -     - |  275  25.15
 KSTU |     -    44     -     -     -    41     -     -     - |  278  16.95
 KWJ1 |     -     -     -   195     -   122     -     -     - |  160 122.67
 MAC1 |     -    45     -    55     -    42     -     -     - |  288  14.74
 MADR |     -    69    82     -     -     -     -     -     X |  288  16.18
 MAW1 |     -    35     -    51     -     -     -     -     - |  288  22.35
 MEDI |     -    66    78     -     -     -     -     -     - |  288   0.76
 METS |     -    55    65     -     -     -     -     -     - |  285   0.17
 MKEA |     -    79     -   181     -    54     -     -     - |  219  28.51
 NLIB |     -     -    91     -     -    71     -     -     - |  277   0.08
 NPLD |     -    43    51     -     -     -     -     -     - |  285   0.07
 NRC2 |     -    25    29     -     -    22     -     -     - |  288   0.07
 ONSA |     -    47    65    41     -     -     -     -     - |  288   0.36
 PERT |     -    21    25     -     -     -     -     -     - |  288  15.50
 PIMO |     -     -     -   161     -   101     -     -     - |  161  20.25
 POL2 |     -    40     -     -     -    37     -     -     - |  281  12.00
 PRDS |     -    38    45     -     -     -     -     -     - |  288   1.67
 RAMO |     -    25     -     -     -    23     -     -     - |  281  21.72
 RIOG |     -    75     -    67     -    37     -     -     - |  288  13.79
 SANT |     -    79     -    49     -    45     -     -     - |  273  19.58
 SCH2 |     -    61    72     -     -     -     -     -     - |  286   4.18
 SFER |     -    90   207     -     -    81     -     -     - |  287   1.29
 STJO |     -    54    19     -     -    45     -     -     - |  288   1.47
 TIDB |     -    62   105    57     -     X     -     -     X |  288   0.06
 TOW2 |     -    24     -     -     -    23     -     -     - |  279  14.82
 TRO1 |     -    52     -    79     -     -     -     -     - |  288  10.28
 TSKB |     -    33    53    46     -     -     -     -     - |  288   1.11
 USNO |     -    20    28     -     -    23     -     -     - |  288   0.03
 USUD |     -    63   165    66     -    60     -     -     - |  288   0.32
 WES2 |     -    46    54     -     -     -     -     -     - |  288   0.07
 WILL |     -    57    68     -     -     -     -     -     - |  286   1.18
 WSRT |     -    73    87     -     -     -     -     -     - |  286   0.07
 WTZR |     -    79    94     -     -     -     -     -     - |  288   0.07
 YAR2 |     -    36     -     -     -    32     -     -     - |  273   3.50
 YELL |     -    38     -    75     -    61     -     -     - |  288   0.16
 ZWEN |     -    22     -    33     -     -     -     -     - |  288  16.67
 -----+-------------------------------------------------------+--------------
 TOT  |  4721    64    77    91  3958    58  4586     -    70 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

