
 GPS week: 1167   Day: 6   MJD: 52419                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2676      0    -0.03     0.06     4.17     0.00
 cod |   288     0  26908    607    -0.25     0.31     0.08    13.01
 emr |   288     0  18806    302   576.70    18.91     0.07    15.75
 esa |   288     0  18514   2255    -0.19    -0.12     0.11     7.71
 gfz |   288     0  15916    289    -0.17     0.28     0.07    13.64
 igu |    96     0   2198      0     0.01    -0.06     3.64     0.00
 jpl |   284     0  13468    793     1.33     4.51     0.04    29.63
 ngs |    96     0   2676      0    -0.03     0.06     3.91     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  29754   1140   133.28   -21.07     0.05    20.27

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4709   -39   -46   403  -268 -5932    51 -4191     -    48 |
    2 |   593   114   -34   250  -133     -  -123   606     -    46 |
    3 |  1483   -22   -57   -38    97  4503    -9  1324     -     7 |
    4 |  -573   201  -256  -214    71  3071   371  -583     -  -139 |
    5 | -3205   137   -53   143   122 -2500   -11 -2289     -  -176 |
    6 | -6981   231  -184   -92   284    92    14 -7332     -  -168 |
    7 | -5429     X  -141    33   -32 -8994   266 -5755     -   -93 |
    8 |  4325     1  -229   339    -1  5759   189  3573     -   -66 |
    9 | -2735    98  -125   267   130  1533   148 -2589     -  -243 |
   10 | -3319    56  -167   -45   192 -1161   147 -2995     -  -135 |
   11 |  6709    33   -36   -11  -173  1716    79  6737     -    79 |
   13 | 11294    22   -75    29  -126  3507   142 10504     -    32 |
   14 |  3586   -95   217   -15    15  2646  -188  3584     -    40 |
   15 | -1716   259   -94     -   209     -   -48 -1598     -  -196 |
   17 |  1047     X  -239     X   396     -    39   950     -  -111 |
   18 |  3999   104   134     X    45  2266   -78  4037     -  -139 |
   20 |  3497   -20    18    92  -257  2434   129  3661     -    33 |
   21 | -3131   248    -8     X   172     -  -130 -2893     -  -165 |
   22 | -4159    10    47   227  -152 -8027  -192 -3789     -    89 |
   23 |   696   257  -169   -25   228 -2954   111   491     -  -246 |
   24 | -7454   193  -230   180   152 -4843   205 -7036     -  -243 |
   25 | -2044   -41    39   284   -47  8482   -94 -1468     -     8 |
   26 | -1311    46  -206    16   241  -981   285 -1350     -  -264 |
   27 | -4135    11  -175   172   -37   378   173 -3685     -   -17 |
   28 | 12655   -39   -82    75  -126 11484   203 11348     -   -17 |
   29 | -2330    17  -202   253   343     -   158 -1756     -  -277 |
   30 |  -170    68     0    82   218 -9886   -53  -316     -  -189 |
   31 |  3267    42   -50    18  -158 -2942     8  2522     -   105 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -393  -111  -123     -     -   199     -     -   108 |
 AMC2 |     -  -180    69     -     -     -     -     -     -    63 |
 ANKR |     -   -29     -    49     -     -     -     -     -     - |
 AOML |     -   -62     -     -     -     -     -     -     -    40 |
 AUCK |     -   128     -     X     -     -  -102     -     -    66 |
 BAHR |     -    20   108    62  -122     -   -86     -     -    85 |
 BOR1 |     -  -139   138     -     -     -     -     -     -   -17 |
 BRMU |     -    57     -     X   -31     -     -     -     -   -15 |
 BRUS |     -  -102   122     -     -     -     1     -     -   -31 |
 CAS1 |     -    26     -   148   -53     -   -33     -     -     9 |
 CEDU |     -   -92     -   133     -     -     -     -     -     8 |
 COCO |     -    90     -     4    57     -   -65     -     -    -6 |
 CRO1 |     -   -28   105     -     -     -   -82     -     -    60 |
 DAEJ |     -  -105     -     -     -     -     -     -     -    68 |
 DARW |     -    83     -     -     -     -   -36     -     -     - |
 DAV1 |     -    50     -     -  -141     -     -     -     -    63 |
 DRAO |     -   -22    -3     -     -     -     -     -     -    17 |
 EISL |     -    -2     -   -64     -     -   115     -     -  -139 |
 FAIR |     -     -    56     X     X     -   -30     -     -     X |
 GALA |     -   137     -   -30   -25     -   -85     -     -    62 |
 GODE |     -  -136    78     -     -     -     -     -     -    28 |
 GOLD |     -    32     -     -     -     -   -61     -     -    68 |
 GRAZ |     -   -84   110  -179     -     -     -     -     -    37 |
 GUAT |     -     -     -     -   206     -     -     -     -  -139 |
 HOB2 |     -    12   -42  -108     -     -     -     -     -    66 |
 HRAO |     -  -189     -     -     -     -     9     -     -   109 |
 IISC |     -   -95     -    73  -328     -     -     -     -   253 |
 JPLM |     -     -   138     -  -149     -     -     -     -    -6 |
 KARR |     -   -46     -     -    43     -     -     -     -     - |
 KERG |     -   -92   -18     -   -69     -    42     -     -    60 |
 KIRU |     -  -130     -     -     -     -     -     -     -    84 |
 KOSG |     -  -183     -     -     -     -     -     -     -   117 |
 KOUR |     -    60     -  -260   -39     -    35     -     -    27 |
 KUNM |     -     -     -     -     -     -    39     -     -   -56 |
 KWJ1 |     -     -     -     -  -192     -    36     -     -    76 |
 LPGS |     -   -26     -     -     -     -     -     -     -    17 |
 MAC1 |     -   -23     -    70  -152     -     7     -     -    81 |
 MALI |     -     -     -  -233   515     -     -     -     -  -258 |
 MAS1 |     -     4    83    34  -145     -     -     -     -    17 |
 MATE |     -     9  -122   155     -     -     X     -     -    30 |
 MAW1 |     -    83     -     -   -80     -     4     -     -    -5 |
 MDO1 |     -     -    99  -148     -     -     -     -     -   -21 |
 MEDI |     -   -70   -12     -     -     -     -     -     -    55 |
 METS |     -  -157   164     -     -     -     -     -     -   -26 |
 MKEA |     -   233     -    94  -108     -   -85     -     -    12 |
 NOT1 |     -     -  -122     -     -     -     -     -     -    95 |
 NPLD |     -  -129   228     -     -     -     -     -     -   -94 |
 NRC2 |     -    84   166  -714    31     -     X     -     -    69 |
 NYA1 |     -   245     -     -     -     -  -108     -     -     X |
 NYAL |     -     -   -55   312     -     -     -     -     -   -76 |
 ONSA |     -  -107   191    -4  -168     -     -     -     -    35 |
 PENC |     -   318     -     -     -     -     -     -     -  -204 |
 PERT |     -   144   -78    53     -     -     -     -     -   -51 |
 PIE1 |     -  -102    75     X     -     -     -     -     -     9 |
 POL2 |     -   -56     -     -     -     -   -83     -     -   164 |
 POTS |     -   -18     -   -46     -     -     -     -     -    29 |
 PRDS |     -  -105    76     -     -     -     -     -     -     9 |
 PTBB |     -    57     -     -     -     -     -     -     -   -36 |
 REYK |     -   -14     -     -     -     -     -     -     -     9 |
 SANT |     -    87     -  -268   -48     -   -25     -     -   104 |
 SCH2 |     -  -131    80     -     -     -     -     -     -    22 |
 SEY1 |     -     -     -  -386     -     -    37     -     -    66 |
 SFER |     -  -164     X     -     -     -   -42     -     -   166 |
 STJO |     -     5    55     -     -     -   -43     -     -    15 |
 SUTH |     -  -259     -    51     -     -     -     -     -   147 |
 THTI |     -     -     -    80     -     -     -     -     -   -31 |
 TIDB |     -    -9    33     X   -29     -     X     -     -     X |
 TOW2 |     -    95     -     -     -     -   -42     -     -     - |
 TRO1 |     -  -176     -     -  -130     -     -     -     -   202 |
 TROM |     -     -     -   -16     -     -     -     -     -     6 |
 TSKB |     -     -   127  -531   -86     -     -     -     -   161 |
 TWTF |     -     -  -117     -     -     -     -     -     -    91 |
 USNO |     -    97   147  -477     -     -     8     -     -    -7 |
 USUD |     -   -57    -9    42  -155     -     4     -     -   127 |
 VILL |     -    56     -  -309     -     -     -     -     -    82 |
 WILL |     -  -197    76     -     -     -     -     -     -    68 |
 WSRT |     -  -159   169     -     -     -     -     -     -   -29 |
 WTZR |     -  -176   242     1     -     -   -39     -     -   -19 |
 YAR2 |     -    12     -     -     -     -  -116     -     -   157 |
 YELL |     -    95   167  -105   -10     -  -160     -     -    86 |
 ZWEN |     -    31     -     -   -30     -     -     -     -     X |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5394    43    33    61    54  2571    34  4812     -    47 |  288   4.02
    2 |  3158    90    91   114    63     -    29  3215     -    54 |  288   2.18
    3 |  3387   201   100   108   100  2266    56  2930     -    71 |  282   2.05
    4 |  1193    82    54   169    54  1306    77  1279     -    39 |  288   0.86
    5 |  4695    91    34    81    50  2153    24  3833     -    66 |  288   1.96
    6 | 10492   172    50   133    74  6739    42 10226     -    92 |  283   9.79
    7 |  3210     X    65    79    41  3943    48  3056     -    87 |  276   0.70
    8 |  5970    64    75   151    64  6116    42  5768     -    32 |  288   5.01
    9 |  2409    80    73   118    44  1977    31  2492     -    50 |  288   1.67
   10 |  3530    90   123   131    89  2421    53  3029     -    67 |  288   2.12
   11 |   944    77    56    99    46  1791    43   830     -    45 |  288   0.36
   13 |  3771    49    42   104    51  2319    45  3514     -    28 |  288   0.24
   14 |   506    50    77   151    56  1354    42   566     -    88 |  288   0.17
   15 |  5344   135    74     -   191     -    27  5816     -    27 |  288   2.35
   17 |  1659     X   135     X   157     -    94  1421     -   131 |  282   2.14
   18 |  1113    80    86     X   139  1822    29  1101     -    64 |  288   0.33
   20 |   633    97    67   100    20  1564    36   706     -    43 |  288   0.21
   21 |  3232   124    77     X   217     -    27  3129     -    67 |  288   2.85
   22 |  2526    95    52    98    39  3628    51  1994     -    74 |  288   1.42
   23 |  5263   107    46   203    60  3381    39  5094     -    57 |  288   5.06
   24 |  2815   130    33    91    75  3867    46  2473     -    85 |  288   1.86
   25 |  4878    54    29   125    19  5167    39  4758     -    76 |  288   2.23
   26 |   600   115    26   233   105   850    45   633     -    90 |  288   0.56
   27 |  8611    63    24   132    36  4225    28  7318     -    24 |  288   2.22
   28 |  4625    54    48    39    36  6149    43  4247     -    33 |  288   0.25
   29 |  4285    94    35    45   105     -    38  3668     -    67 |  288   0.37
   30 |   701    79    45   154   159  6340    56   776     -    72 |  288   1.00
   31 |  2549   114    96   206    49  1824    41  2537     -    45 |  281   1.75
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    53    92   100     -     -    23     -     -    35 |  288   0.08
 AMC2 |     -    41    43     -     -     -     -     -     -    25 |  288   0.04
 ANKR |     -    31     -    52     -     -     -     -     -     - |  287  38.86
 AOML |     -    50     -     -     -     -     -     -     -    32 |  286  20.47
 AUCK |     -    35     -     X     -     -    21     -     -    26 |  264  14.66
 BAHR |     -    40    38   118    32     -    23     -     -    28 |  288   0.33
 BOR1 |     -    57    59     -     -     -     -     -     -    55 |  288   0.52
 BRMU |     -    50     -     X    26     -     -     -     -    28 |  287  28.06
 BRUS |     -    93    91     -     -     -    32     -     -    33 |  288   0.11
 CAS1 |     -    68     -   115    37     -    46     -     -    33 |  288   8.45
 CEDU |     -    71     -   103     -     -     -     -     -    23 |  288  18.92
 COCO |     -    75     -    99    58     -    44     -     -    33 |  288  10.08
 CRO1 |     -    50    86     -     -     -    34     -     -    26 |  288   0.13
 DAEJ |     -    75     -     -     -     -     -     -     -    48 |  274   3.61
 DARW |     -    56     -     -     -     -    25     -     -     - |  272  20.57
 DAV1 |     -    69     -     -    49     -     -     -     -    24 |  288  22.68
 DRAO |     -    40    24     -     -     -     -     -     -    16 |  288   0.05
 EISL |     -    61     -    76     -     -    31     -     -    42 |  288  20.28
 FAIR |     -     -    92     X     X     -    49     -     -     X |  275   0.93
 GALA |     -   102     -    45    42     -    35     -     -    40 |  288  29.31
 GODE |     -    49    72     -     -     -     -     -     -    48 |  282   0.15
 GOLD |     -    74     -     -     -     -    28     -     -    24 |  288  23.93
 GRAZ |     -   101    59    83     -     -     -     -     -    49 |  287    >>>
 GUAT |     -     -     -     -    36     -     -     -     -    24 |  286    >>>
 HOB2 |     -    53    31   100     -     -     -     -     -    23 |  288   0.10
 HRAO |     -    39     -     -     -     -    22     -     -    28 |  288  29.57
 IISC |     -    63     -    51    40     -     -     -     -    51 |  288  33.25
 JPLM |     -     -   119     -    50     -     -     -     -    65 |  276    >>>
 KARR |     -    55     -     -    53     -     -     -     -     - |  288  12.88
 KERG |     -    72    60     -    32     -    27     -     -    42 |  287   2.53
 KIRU |     -    45     -     -     -     -     -     -     -    29 |  286   2.12
 KOSG |     -    37     -     -     -     -     -     -     -    24 |  285  15.71
 KOUR |     -    51     -   128    41     -    40     -     -    34 |  288  25.31
 KUNM |     -     -     -     -     -     -    25     -     -    37 |  242  82.30
 KWJ1 |     -     -     -     -   166     -    99     -     -   148 |  238 162.18
 LPGS |     -   188     -     -     -     -     -     -     -   120 |  195 113.57
 MAC1 |     -    49     -   173    31     -    47     -     -    22 |  288  12.26
 MALI |     -     -     -   157    59     -     -     -     -    29 |  288  34.73
 MAS1 |     -    37    40    62    26     -     -     -     -    27 |  288   2.34
 MATE |     -    72    22   115     -     -     X     -     -    18 |  288   0.07
 MAW1 |     -    76     -     -    44     -    30     -     -    32 |  288  31.94
 MDO1 |     -     -    31    72     -     -     -     -     -    19 |  288  38.97
 MEDI |     -    55    67     -     -     -     -     -     -    41 |  288   0.13
 METS |     -    62    72     -     -     -     -     -     -    34 |  285   0.28
 MKEA |     -    92     -   144    47     -    37     -     -    32 |  288  34.91
 NOT1 |     -     -   106     -     -     -     -     -     -    82 |  286    >>>
 NPLD |     -    77    68     -     -     -     -     -     -    38 |  285   0.07
 NRC2 |     -    89    33    62    23     -     X     -     -    35 |  288   0.07
 NYA1 |     -    60     -     -     -     -    26     -     -     X |  280   0.06
 NYAL |     -     -    29    79     -     -     -     -     -    44 |  288   0.06
 ONSA |     -    65    74    66    23     -     -     -     -    47 |  288   0.07
 PENC |     -    48     -     -     -     -     -     -     -    30 |  284  13.54
 PERT |     -    79    62    83     -     -     -     -     -    21 |  288  15.99
 PIE1 |     -    48    92     X     -     -     -     -     -    57 |  288   0.06
 POL2 |     -   150     -     -     -     -    85     -     -   217 |  288  15.28
 POTS |     -    42     -    46     -     -     -     -     -    30 |  288  12.22
 PRDS |     -    91    66     -     -     -     -     -     -    37 |  288   1.60
 PTBB |     -    56     -     -     -     -     -     -     -    36 |  285   0.17
 REYK |     -    82     -     -     -     -     -     -     -    53 |  285  22.60
 SANT |     -    46     -    85    26     -    40     -     -    31 |  288  20.22
 SCH2 |     -    69    42     -     -     -     -     -     -    36 |  288  11.14
 SEY1 |     -     -     -   147     -     -    43     -     -    29 |  285  51.19
 SFER |     -    62     X     -     -     -    29     -     -    22 |  287   1.15
 STJO |     -   108    25     -     -     -    37     -     -    41 |  288   7.01
 SUTH |     -    49     -    63     -     -     -     -     -    32 |  288  24.38
 THTI |     -     -     -    55     -     -     -     -     -    21 |  287   2.27
 TIDB |     -    39    64     X    56     -     X     -     -     X |  241   0.12
 TOW2 |     -    48     -     -     -     -    21     -     -     - |  277  13.45
 TRO1 |     -   103     -     -    31     -     -     -     -    53 |  288  12.82
 TROM |     -     -     -    39     -     -     -     -     -    15 |  286  12.19
 TSKB |     -     -    49   122    55     -     -     -     -    41 |  288   1.23
 TWTF |     -     -    87     -     -     -     -     -     -    68 |  286   0.57
 USNO |     -    67    21    84     -     -    32     -     -    26 |  288   0.07
 USUD |     -   115    94   133    36     -    32     -     -    47 |  288   0.33
 VILL |     -    42     -    52     -     -     -     -     -    35 |  288  15.38
 WILL |     -    52    51     -     -     -     -     -     -    52 |  288   1.91
 WSRT |     -    54    49     -     -     -     -     -     -    29 |  288   0.07
 WTZR |     -    64    83    36     -     -    28     -     -    29 |  288   0.06
 YAR2 |     -    61     -     -     -     -    32     -     -    39 |  288   3.47
 YELL |     -   100    37    66    24     -    33     -     -    22 |  288   0.06
 ZWEN |     -    58     -     -    56     -     -     -     -     X |  275  30.76
 -----+-------------------------------------------------------------+--------------
 TOT  |  4175    79    66   110    75  3641    41  3907     -    53 |


 BEST CLOCK FIT: AMC2   288   0.04 (ns) 

