
 GPS week: 1166   Day: 3   MJD: 52409                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2574      0     0.15    -0.11     4.78     0.00
 cod |   288     0  25336     10     0.22    -0.13     0.07    21.80
 emr |   288     0  17890    313  2057.81    27.06     0.12    12.57
 esa |   288     0  17985   1403    -0.17    -0.22     0.15     8.35
 gfz |   288     0  15229     11     0.66    -1.18     0.11    13.87
 igu |    96     0   2286      0     0.09     0.05     4.20     0.00
 jpl |   281     0  13598    813     0.39     2.87     0.07    24.52
 ngs |    96     0   2574      0     0.16    -0.14     4.49     0.00
 usn |   288     0  24910    939   322.09   -17.54     0.08    18.89

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 | -6001   -51   -49   412  -124 -8729    65 -5540   -66 |
    2 | -2087   -26   -63   205   -61     -    78 -2130     9 |
    3 |   289    72   -14  -210   112  -890   162  1245  -122 |
    4 |  1611    95  -101     3   198 -1156   229  1372  -237 |
    5 |  7997    -7  -145   237   178 17458    57  5674  -190 |
    6 | -4829   153  -227    67   210  7237    26 -5109  -243 |
    7 | -5539    83  -119     7    80 -7050   118 -5591  -212 |
    8 |-16356   -81  -211   527    -3-18508   139-14190  -118 |
    9 | -2621    46  -176   -42   252  4836    81 -1975  -186 |
   10 |  8804    85   -23  -260   125  5286   219  8756  -112 |
   11 |  6617   -33    74   394  -275 -2355   121  6446  -109 |
   13 |  5152    36   -46   126  -112   315    97  5018    -4 |
   14 |  2506   -41   170   -41   -98 -1216   -23  2523    48 |
   15 |  3699    83  -124     -   184     -    46  3023  -196 |
   18 |  4110   -12   125   -76   123  1443  -138  3974   -94 |
   20 |  3866   -37    38    31  -139  -531   160  3918   -64 |
   21 | -6850    59   -68   -84   119     -     1 -5874   -80 |
   22 | -4732   -81   -19   121   -66  -345   149 -3648    69 |
   23 | -1881    41  -195     X   226 -2193   105 -1866  -209 |
   24 |  1125   158  -186  -144   232 -3180   123   825  -192 |
   25 |  4769   -11   -15   288   -48  7341    97  4651   -66 |
   26 |  -209    33  -187   187   241 -2420   184  -193  -212 |
   27 | -2568   -73   -91   272     6  1458   131 -2505  -115 |
   28 | 12261   -14    90  -340    86  9426   210 10416   -20 |
   29 |  -646  -257     X     X   221 -2058   108  -906     X |
   30 | -4009    31  -141   235   191  3481    52 -3849  -197 |
   31 | -4437   119   -43     X  -133 -7750    84 -4453   -31 |
 -----+-------------------------------------------------------+
 ALBH |     -  -154   -82   -30     -     -   145     -    67 |
 ALGO |     -   -85   158     X     -     -   -62     -    71 |
 AMC2 |     -  -163    50     -     -     -     -     -   156 |
 ANKR |     -     5     -   -14     -     -     -     -     - |
 AOML |     -   -18     -     -     -     -     -     -    21 |
 ARTU |     -     5     -     -  -167     -    92     -     - |
 AUCK |     -   -16     -   190     -     -   -15     -   -34 |
 BAHR |     -   112   -89   -60  -130     -   -13     -    69 |
 BJFS |     -     -   -76     -  -534     -     -     -   490 |
 BOR1 |     -   -43   110     -     -     -     -     -   -22 |
 BRMU |     -     7     -  -492   193     -     -     -    68 |
 BRUS |     -    24   -42     -     -     -     -     -     - |
 CAS1 |     -    -6     -    54  -141     -    79     -   -12 |
 CEDU |     -   -59     -    63     -     -    20     -    15 |
 CHAT |     -  -130     -   369     -     -     -     -   -13 |
 CHUR |     -    91   185     -     -     -     -     -  -212 |
 COCO |     -   -79     -   150  -130     -    33     -    79 |
 CRO1 |     -     -  -172     -   -95     -    38     -   124 |
 DARW |     -   -20     -     -     -     -    17     -     - |
 DAV1 |     -     6     -     -  -126     -     -     -    86 |
 DRAO |     -   -19   104     -     -     -     -     -   -48 |
 FAIR |     -     -    78     -   -70     -     X     -     X |
 GALA |     -  -103     -   124   137     -   -30     -     X |
 GODE |     -   -23  -121     -     -     -     -     -    98 |
 GOLD |     -    16     -     -     -     -  -107     -   117 |
 GRAZ |     -    -9    44  -300     -     -     -     -   104 |
 HOB2 |     -   -58    46   181     -     -     -     -   -44 |
 HRAO |     -   179     -     -     -     -  -255     -   114 |
 IISC |     -   570     -     -     -     -     -     -  -658 |
 IRKT |     -   125  -238    26     -     -     -     -     - |
 JPLM |     -     -   159     -  -130     -     -     -    -9 |
 KARR |     -   -74     -     -    -5     -    71     -     - |
 KERG |     -   201   236     -   158     -  -628     -   271 |
 KIRU |     -   -79    77  -626     -     -    90     -   209 |
 KOUR |     -    21     -  -217     -     -    33     -    30 |
 KUNM |     -     -     -     -     -     -   -13     -    17 |
 KWJ1 |     -     -     -     -  -253     -    64     -   124 |
 LAE1 |     -   -28     -     -  -202     -     -     -   181 |
 LPGS |     -  -170     -     -     -     -   102     -    67 |
 MAC1 |     -  -100     -   352  -239     -    98     -    13 |
 MADR |     -   -33    58     -     -     -     X     -     X |
 MALI |     -     -     -  -116  -316     -     -     -   283 |
 MAS1 |     -   152   -97  -243   -62     -     -     -    43 |
 MATE |     -     -  -143  -262     -     -     X     -   205 |
 MAW1 |     -    11     -     -   -71     -    27     -     5 |
 MCM4 |     -     -   -29     -     -     -     X     -    19 |
 MDO1 |     -     -     -   -50     -     -     -     -    22 |
 MEDI |     -     7    -8     -     -     -     -     -    -2 |
 METS |     -   -78   135     -     -     -     -     -     - |
 MKEA |     -   342     -   -29   -28     -  -161     -  -159 |
 NLIB |     -     -   360  -313     -     -   -33     -   -36 |
 NPLD |     -  -111   193     -     -     -     -     -     - |
 NRC2 |     -     1   145  -431   124     -  -135     -   174 |
 NYAL |     -     -   -55    83     -     -     -     -     - |
 ONSA |     -    11    88  -162     -     -     -     -     - |
 PERT |     -   -81    89   209     -     -     -     -   -58 |
 PIE1 |     -     -   -28    37     -     -     -     -     2 |
 POL2 |     -   -92     -     -     -     -   -57     -   178 |
 POTS |     -    22     -     -  -102     -     -     -    50 |
 PRDS |     -  -149   127     -     -     -     -     -    88 |
 RAMO |     -   -43     -     -     -     -    38     -     - |
 SANT |     -   -62     -     -   -32     -     -     -    94 |
 SCH2 |     -   -24   -33     -     -     -     -     -    48 |
 SFER |     -   -24   282  -337     -     -     -     -     - |
 STJO |     -     0    74     -     -     -   -82     -    55 |
 SUTH |     -  -148     -   139     -     -     -     -   110 |
 THTI |     -     -     -   263     -     -     -     -  -116 |
 TIDB |     -     -   104     X     -     -     -     -   -69 |
 TIXI |     -   -24     -     -    38     -     -     -     - |
 TOW2 |     -    -6     -     -     -     -     5     -     - |
 TSKB |     -     -    89   -98     -     -     -     -   -16 |
 USNO |     -   -76    83   192     -     -   -12     -   -39 |
 USUD |     -   -86     -   -46     -     -    19     -    97 |
 VILL |     -   -39     -  -450   427     -     -     -   -69 |
 WES2 |     -    74     -  -192     -     -     -     -     - |
 WILL |     -   -52     -     -     -     -     -     -    60 |
 YAKT |     -   294     -     -     -     -  -483     -   269 |
 YELL |     -    53     -   -38    96     -   -86     -    -6 |
 YSSK |     -    49     -     -   -77     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5236    70    77    82    53  3023    33  4680    49 |  288   3.80
    2 |  8717   117   124    59   112     -    69  7888   169 |  288   2.79
    3 |  4587   213   147    90   100  2232    98  3838    71 |  283   1.59
    4 |  1505    75   163   124    29  1046    27  1466    54 |  288   0.64
    5 |  5732    69   156   154    54  9694    87  5369   307 |  288   3.16
    6 | 10826    82   134   170   185  6231   139 10183   100 |  286  10.62
    7 |  2277    94   113   285   148  4479   100  2206    69 |  288   0.90
    8 |  8012    38    79   170    98 10349    40  6984    27 |  288   3.68
    9 |  5427    54   163    86    51  4857    38  5245   114 |  288   2.60
   10 |  4848    87   107   133   163  4863   227  5101    98 |  284   1.41
   11 |  1091    81    87   181    62   624    56  1227    53 |  288   0.35
   13 |  1446    56    78    26    68   878    32  1454    52 |  288   0.44
   14 |  1681    87    77   207   190   675   109  1426    25 |  288   0.29
   15 |  4534    63   181     -   187     -    46  3911    85 |  288   2.30
   18 |  1940   110   130   122   166   508   134  1772   160 |  288   0.40
   20 |  1552   104    95   128    49   671    56  1510    28 |  288   0.18
   21 |  6676    96   129   275    96     -    75  6523    84 |  288   3.22
   22 |  3637    55   106   170   114  2453    34  2967    61 |  288   1.94
   23 |  6107   189    95     X   220  3271   188  5911   242 |  286   6.69
   24 |  3821    64   121   191    79  3515    59  3760    49 |  288   2.03
   25 |  3512    53   107   317   245  2990    71  3600    51 |  288   3.03
   26 |   901   149   212   243    65  1360    79  1060    79 |  288   0.45
   27 |  3900    48   133    93    65  4371    54  3861    65 |  288   3.56
   28 |  5604    59    57   205    64  3938   161  5760    56 |  288   1.72
   29 |  2132   167     X     X   217  1916    87  1963     X |  264   0.61
   30 |  1496    41   127    90    26  1405    90  1227   109 |  288   2.17
   31 |  4050   194   175     X    77  4633    37  3973    76 |  282   0.93
 -----+-------------------------------------------------------+--------------
 ALBH |     -    38    72   121     -     -    31     -    42 |  288   0.32
 ALGO |     -    27    60     X     -     -    32     -    33 |  288   0.08
 AMC2 |     -    25    82     -     -     -     -     -    36 |  288   0.09
 ANKR |     -    59     -   154     -     -     -     -     - |  288  42.68
 AOML |     -    18     -     -     -     -     -     -    21 |  286  24.24
 ARTU |     -    31     -     -    54     -    54     -     - |  287  10.83
 AUCK |     -    56     -   316     -     -    69     -    53 |  264  17.16
 BAHR |     -    39    35   137   106     -    32     -    44 |  288   0.72
 BJFS |     -     -   171     -   117     -     -     -   105 |  288    >>>
 BOR1 |     -    43   170     -     -     -     -     -    77 |  288   0.97
 BRMU |     -    43     -   128    74     -     -     -    88 |  288  28.40
 BRUS |     -    65   114     -     -     -     -     -     - |  288   0.05
 CAS1 |     -    44     -   202    91     -    76     -    94 |  288   7.91
 CEDU |     -    26     -   124     -     -    36     -    42 |  288  14.06
 CHAT |     -    23     -    79     -     -     -     -    33 |  287  17.23
 CHUR |     -    58   115     -     -     -     -     -    66 |  288   0.81
 COCO |     -    62     -   134    88     -    54     -    40 |  288  11.88
 CRO1 |     -     -   208     -    42     -    44     -    69 |  288   0.10
 DARW |     -    46     -     -     -     -    41     -     - |  272  21.55
 DAV1 |     -    61     -     -    76     -     -     -    38 |  288  26.75
 DRAO |     -    11    62     -     -     -     -     -    41 |  288   0.09
 FAIR |     -     -    71     -    64     -     X     -     X |  162   0.51
 GALA |     -    30     -   130   117     -    84     -     X |  286  32.97
 GODE |     -    95   109     -     -     -     -     -    84 |  239    >>>
 GOLD |     -    34     -     -     -     -    37     -    22 |  288  22.33
 GRAZ |     -   112   118   321     -     -     -     -    57 |  286    >>>
 HOB2 |     -    27    43   140     -     -     -     -    50 |  288   0.08
 HRAO |     -    28     -     -     -     -    32     -    27 |  288  27.77
 IISC |     -    32     -     -     -     -     -     -    37 |  171  11.53
 IRKT |     -    52   135   111     -     -     -     -     - |  287   0.44
 JPLM |     -     -   104     -    52     -     -     -    74 |  288  24.72
 KARR |     -    63     -     -    69     -    28     -     - |  288  12.40
 KERG |     -    26    40     -    59     -    31     -    19 |  287   1.34
 KIRU |     -    62   153    85     -     -    39     -    61 |  288   1.99
 KOUR |     -    65     -   179     -     -    40     -    29 |  288  26.38
 KUNM |     -     -     -     -     -     -    49     -    64 |  206  64.83
 KWJ1 |     -     -     -     -   205     -   126     -   215 |  249 115.09
 LAE1 |     -    91     -     -    72     -     -     -    62 |  287  20.87
 LPGS |     -   114     -     -     -     -   132     -   134 |  280  35.35
 MAC1 |     -    43     -   183   121     -    53     -    40 |  288  14.07
 MADR |     -    51    89     -     -     -     X     -     X |  117  10.58
 MALI |     -     -     -   135    64     -     -     -    37 |  288  48.14
 MAS1 |     -    42    44   185    29     -     -     -    38 |  288   1.59
 MATE |     -     -   203    69     -     -     X     -   119 |  288   0.07
 MAW1 |     -    80     -     -    64     -    63     -    41 |  288  25.78
 MCM4 |     -     -    86     -     -     -     X     -    57 |  287    >>>
 MDO1 |     -     -     -    52     -     -     -     -    23 |  288   9.24
 MEDI |     -    29   106     -     -     -     -     -    56 |  288   0.10
 METS |     -    81   141     -     -     -     -     -     - |  285   0.13
 MKEA |     -    65     -   107    48     -    63     -    51 |  288  40.78
 NLIB |     -     -   184    56     -     -    50     -    62 |  287   0.09
 NPLD |     -    68   117     -     -     -     -     -     - |  285   0.07
 NRC2 |     -    22    62    26    27     -    41     -    29 |  288   0.05
 NYAL |     -     -    39    58     -     -     -     -     - |  287   0.10
 ONSA |     -    66    99    62     -     -     -     -     - |  288   0.12
 PERT |     -    21    42   100     -     -     -     -    48 |  288  25.16
 PIE1 |     -     -   100    87     -     -     -     -    47 |  288   0.08
 POL2 |     -   133     -     -     -     -    86     -   255 |  245  10.43
 POTS |     -    25     -     -   100     -     -     -    61 |  277  12.49
 PRDS |     -    41    47     -     -     -     -     -    38 |  288   1.52
 RAMO |     -    36     -     -     -     -    32     -     - |  276  25.46
 SANT |     -    56     -     -    35     -     -     -    48 |  284  26.56
 SCH2 |     -    24    57     -     -     -     -     -    19 |  288  14.90
 SFER |     -   103   264   141     -     -     -     -     - |  287   1.74
 STJO |     -    39    59     -     -     -    37     -    25 |  288   4.02
 SUTH |     -    34     -   116     -     -     -     -    63 |  288  30.93
 THTI |     -     -     -   163     -     -     -     -    72 |  287   2.00
 TIDB |     -     -    51     X     -     -     -     -    34 |  133   0.09
 TIXI |     -    14     -     -    22     -     -     -     - |  287   9.15
 TOW2 |     -    58     -     -     -     -    51     -     - |  275  14.61
 TSKB |     -     -    72   120     -     -     -     -    72 |  288   0.96
 USNO |     -    24    73    32     -     -    32     -    35 |  288   0.07
 USUD |     -    62     -   129     -     -    54     -    59 |  288   0.32
 VILL |     -    31     -    77    30     -     -     -    31 |  288  14.62
 WES2 |     -     8     -    21     -     -     -     -     - |  286  13.67
 WILL |     -    13     -     -     -     -     -     -    16 |  285   0.87
 YAKT |     -    51     -     -     -     -    59     -    52 |  288   0.45
 YELL |     -    47     -   143    49     -    41     -    30 |  288   0.09
 YSSK |     -    29     -     -    45     -     -     -     - |  285  12.41
 -----+-------------------------------------------------------+--------------
 TOT  |  4784    73   119   150   106  4198    69  4492    83 |


 BEST CLOCK FIT: NRC2   288   0.05 (ns) 

