
 GPS week: 1166   Day: 0   MJD: 52406                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2660      0   -25.46    87.28     5.09     0.00
 cod |   288     0  25749      0   -25.41    86.92     0.06    32.25
 emr |   288     0  17155    585  1954.21   112.73     0.09    25.27
 gfz |   288     0  14609     28   -25.89    88.12     0.11    17.28
 igu |    96     0   2294      0   -25.48    87.30     3.70     0.00
 jpl |   274     0  11963    527   -36.93    91.45     0.13    10.72
 ngs |    96     0   2660      0   -25.45    87.25     4.94     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24547   1522  -373.09   178.24     0.12    14.48

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -4464   -45   -47    51 -4375   262 -3966     -    45 |
    2 |  -316   151  -203    29     -   170   -46     -   -66 |
    3 |  1529    71   -99   -10 -2951   231  1694     -   -43 |
    4 | -3142   115   -35    29 -4200  -156 -3014     -  -167 |
    5 |  2165   139   -83    18 -6119   284  2171     -  -269 |
    6 |  2684   158  -125   219 11024  -262  2370     -  -257 |
    7 |    -9    81  -138   209-13382   -21  -759     -  -188 |
    8 |  5630    17  -120   101 -1178   176  3748     -     X |
    9 |  -255    22   -97   142  6500   172   463     -   -99 |
   10 | -4582   209  -164    86  3527    51 -3726     -  -306 |
   11 |  5170    82    54  -145  1773  -216  5013     -   -15 |
   13 |  5211   -80    75    40  2155    33  5206     -    -9 |
   14 |  1216    -2    62    88  -809  -289  1341     -   -90 |
   15 | -4449   239  -214    69 12959  -300 -4403     -  -108 |
   17 |  3238     -     X   291     -   358  4275     -  -512 |
   18 |  4479   -71    42   156  2431   -49  4545     -   -79 |
   20 |  3201    50   -37  -119  2437   337  3148     -    -7 |
   21 | -3971   198  -217   146     -  -376 -3478     -  -107 |
   22 |  -443    61  -171   137  -844   210   -44     -   -63 |
   23 |  1291   197  -200   138     -    80   560     -  -286 |
   24 | -5439   160  -119   107  -323  -107 -5561     -  -234 |
   25 |  2914    67   -28    44  2488  -170  1440     -   -83 |
   26 |  -884   -16    22     1 -3558   -11  -915     -     X |
   27 |  3151    45  -126   103  7353   103  2474     -   -45 |
   28 |  5855   -67   116   -82  3274   286  5673     -   -39 |
   29 | -2759     3    51    98 -2014  -126 -2492     -  -162 |
   30 | -5937    83   -84    69-14653  -311 -5558     -     X |
   31 |-10876    89   -40  -143 -1680   218 -9759     -   -21 |
 -----+-------------------------------------------------------+
 ALBH |     -   -24     -     -     -   125     -     -   -33 |
 ALGO |     -   -86   101     -     -     -     -     -    16 |
 ALIC |     -   -38     -     -     -   115     -     -     - |
 AMC2 |     -  -213   222     -     -     -     -     -    88 |
 AUCK |     -    12     -     -     -   -76     -     -    29 |
 BAHR |     -    71   -82   -91     -     -     -     -    95 |
 BJFS |     -     -    29   -86     -     -     -     -    52 |
 BOR1 |     -    74   -79     -     -   -38     -     -     X |
 BRMU |     -   -11     -    41     -     -     -     -   -24 |
 BRUS |     -   -34   -38     -     -     -     -     -   143 |
 CAS1 |     -    37     -  -121     -   -32     -     -    85 |
 CHAT |     -     0     -     -     -   -82     -     -    57 |
 CHUR |     -   129     X     -     -     -     -     -  -288 |
 COCO |     -    43     -   -11     -  -189     -     -    53 |
 CRO1 |     -   -14    36     -     -  -149     -     -    75 |
 DARW |     -    14     -     -     -   -43     -     -     - |
 DAV1 |     -    51     -  -155     -   -63     -     -   118 |
 DRAO |     -     9    54     -     -     -     -     -  -131 |
 EISL |     -    -1     -  -208     -   354     -     -     - |
 FAIR |     -     -    62   -24     -     X     -     -   -82 |
 FLIN |     -    26     -     -     -   -78     -     -     - |
 FORT |     -     -    17    65     -   151     -     -  -213 |
 GALA |     -    57     -    64     -   -90     -     -  -140 |
 GODE |     -     -   305     -     -     -     -     -  -532 |
 GOLD |     -    61     -     -     -  -161     -     -   -22 |
 GRAZ |     -   -72     -     -     -     -     -     -   160 |
 HERS |     -     -     X     -     -   617     -     -  -456 |
 HOB2 |     -   -69     7     -     -     -     -     -   142 |
 HRAO |     -  -160     -   -35     -   -56     -     -   437 |
 IISC |     -  -154     -   -67     -     -     -     -   377 |
 JPLM |     -     -   106   -92     -     -     -     -   -74 |
 KARR |     -   -22     -    62     -   -36     -     -     - |
 KIRU |     -  -100   127     -     -     -     -     -     - |
 LAE1 |     -   -73     -    98     -     -     -     -    45 |
 LAMA |     -  -245     -     -     -   737     -     -     - |
 MAC1 |     -    62     -  -429     -   156     -     -   265 |
 MADR |     -    19   -24     -     -     -     -     -     X |
 MALI |     -   -48     -     -     -     -     -     -   107 |
 MAS1 |     -    -7   -42     -     -     -     -     -    91 |
 MATE |     -    82     -     -     -     X     -     -  -182 |
 MDO1 |     -   -62     -     -     -   138     -     -    44 |
 MEDI |     -   -28     -     -     -     -     -     -    62 |
 MKEA |     -   277     -  -225     -  -160     -     -  -239 |
 NLIB |     -   -42   154     -     -   -40     -     -  -131 |
 NPLD |     -  -131   119     -     -     -     -     -    82 |
 NRC2 |     -   -82   133   -78     -     -     -     -    43 |
 NYA1 |     -  -535     -     -     -     -     -     -  1192 |
 OHI2 |     -    37     -   -69     -     -     -     -     - |
 ONSA |     -    10     -   -18     -     -     -     -     - |
 PENC |     -   147     -     -     -     -     -     -  -327 |
 PERT |     -   -36    -2     -     -     -     -     -    85 |
 PIE1 |     -   -79   202     -     -     -     -     -  -173 |
 POL2 |     -   -66     -     -     -  -162     -     -   264 |
 PRDS |     -   -61   121     -     -     -     -     -   -73 |
 PTBB |     -   -30   -72     -     -     -     -     -   193 |
 RAMO |     -   -14     -     -     -    42     -     -     - |
 REYK |     -   -19     -   -55     -     -     -     -   109 |
 SANT |     -     3     -     6     -   -21     -     -     - |
 SCH2 |     -   -60    55     -     -     -     -     -    40 |
 SEY1 |     -     -     -  -260     -   126     -     -   148 |
 SFER |     -  -141   164     -     -   -72     -     -   112 |
 STJO |     -   -45    44     -     -     -     -     -    24 |
 SUTH |     -    -6     -     -     -     -     -     -    14 |
 TOW2 |     -    21     -     -     -   -65     -     -     - |
 TSKB |     -   -93   143   -66     -     -     -     -    37 |
 TWTF |     -     -   -13     -     -     -     -     -    23 |
 USNO |     -   -58   102     -     -     -     -     -   -49 |
 USUD |     -     1   -12     -     -    11     -     -    11 |
 VILL |     -    12     -     -     -     -     -     -   -27 |
 WES2 |     -   -79   101     -     -     -     -     -     - |
 WILL |     -   -42   199     -     -     -     -     -  -252 |
 WTZR |     -   -66     -     -     -     -     -     -   146 |
 YELL |     -    38     -     -     -     -     -     -   -84 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4308    51    51    76  2746   176  3975     -    73 |  288   3.16
    2 |  3222    85    53    73     -   175  2775     -   153 |  288   2.54
    3 |  3087   113    78    74  3689   197  3113     -    86 |  281   2.02
    4 |  1933   147    93   116  1170   153  1841     -   150 |  288   0.91
    5 |  3319    74    52    74  5087   180  3329     -   198 |  288   2.06
    6 | 10205    94    66   262  6316   148 10303     -   225 |  288  10.33
    7 |  4184    65    85   150  6134   189  3910     -   141 |  284   0.70
    8 | 11714    52    83   159  5936   119 11931     -     X |  288   6.09
    9 |  6698    32    76    80  4168   157  6197     -   131 |  288   1.82
   10 |  3230   132   154   213  3425   222  3920     -   188 |  276   1.25
   11 |  1241    39   102    46  1645   151   905     -   145 |  288   0.39
   13 |  1232    38    71    46  2232   174  1018     -   112 |  288   0.35
   14 |   822    47    65    55   860   149   826     -   110 |  288   0.21
   15 |  4462    59    88    67  4191   157  4583     -    81 |  288   3.34
   17 |  2912     -     X   184     -   260  3933     -   231 |  242   2.67
   18 |  1439    67    81    63  2708   229  1214     -   107 |  288   0.38
   20 |  1480    45    83   109  2230   188  1344     -    63 |  288   0.31
   21 |  9858   101   106   111     -   110  8360     -    69 |  286   3.59
   22 |  4579    59    56    81  1283   177  4249     -    83 |  288   1.29
   23 |  8525   107   120    94     -   165  8506     -   172 |  277   7.70
   24 |  3972   131    71   110  2228   134  4040     -   193 |  288   2.95
   25 |  7966    47    83   161  3082   147  7628     -    66 |  288   2.15
   26 |   679    61    99   108  1428   308   670     -     X |  288   0.61
   27 |  5211    49    82    93  3331   140  4811     -   113 |  288   3.49
   28 |  1734   112    61    76  3159   180  1474     -   204 |  288   0.25
   29 |  1400    62    55   119   813   148  1313     -   186 |  288   0.61
   30 |  1662    96    78    73  7771    55  2032     -     X |  288   1.19
   31 |  4707   232   101   207  1851   182  4063     -   190 |  278   1.46
 -----+-------------------------------------------------------+--------------
 ALBH |     -    21     -     -     -    73     -     -    77 |  288   0.42
 ALGO |     -    14    54     -     -     -     -     -    93 |  288   0.26
 ALIC |     -    19     -     -     -    58     -     -     - |  272  83.44
 AMC2 |     -    35    62     -     -     -     -     -    70 |  288   0.22
 AUCK |     -    50     -     -     -    69     -     -   111 |  264  19.29
 BAHR |     -    39    54    92     -     -     -     -    72 |  288   0.30
 BJFS |     -     -   102   310     -     -     -     -   269 |  288    >>>
 BOR1 |     -    68    91     -     -   153     -     -     X |  266  83.82
 BRMU |     -    22     -    50     -     -     -     -    88 |  288  27.96
 BRUS |     -    49    91     -     -     -     -     -    65 |  288   0.23
 CAS1 |     -    67     -    90     -    67     -     -    69 |  288   7.37
 CHAT |     -    49     -     -     -    86     -     -   100 |  287  18.44
 CHUR |     -    85     X     -     -     -     -     -   188 |  275   0.86
 COCO |     -    34     -    53     -    90     -     -   108 |  288  11.67
 CRO1 |     -    31    93     -     -   115     -     -    78 |  287   0.28
 DARW |     -    27     -     -     -    81     -     -     - |  270  20.90
 DAV1 |     -    96     -    85     -    73     -     -   161 |  288  19.63
 DRAO |     -    42    75     -     -     -     -     -   176 |  287 193.11
 EISL |     -    68     -    75     -    93     -     -     - |  260  33.54
 FAIR |     -     -    63   111     -     X     -     -   201 |  276   0.65
 FLIN |     -    31     -     -     -    93     -     -     - |  274   9.06
 FORT |     -     -    42    72     -    86     -     -    75 |  288   0.26
 GALA |     -    24     -    32     -    74     -     -    56 |  288  30.00
 GODE |     -     -   101     -     -     -     -     -   177 |  106 235.62
 GOLD |     -    19     -     -     -    67     -     -    67 |  288  27.70
 GRAZ |     -    36     -     -     -     -     -     -    80 |  279  41.01
 HERS |     -     -     X     -     -   370     -     -   273 |  107  11.88
 HOB2 |     -    41    59     -     -     -     -     -   115 |  288   0.19
 HRAO |     -    30     -    32     -    85     -     -    73 |  288  33.53
 IISC |     -   101     -    68     -     -     -     -   163 |  288  34.99
 JPLM |     -     -    69    54     -     -     -     -    98 |  287  24.52
 KARR |     -    30     -    55     -    62     -     -     - |  288  13.93
 KIRU |     -    58    74     -     -     -     -     -     - |  274   1.83
 LAE1 |     -    48     -    39     -     -     -     -   100 |  287  23.84
 LAMA |     -    62     -     -     -   185     -     -     - |  129  11.43
 MAC1 |     -    56     -    49     -    70     -     -   104 |  288  14.69
 MADR |     -    42    54     -     -     -     -     -     X |  288  20.29
 MALI |     -    48     -     -     -     -     -     -   107 |  274  33.19
 MAS1 |     -    24    46     -     -     -     -     -    55 |  288   3.55
 MATE |     -    69     -     -     -     X     -     -   153 |  242   0.23
 MDO1 |     -    24     -     -     -    72     -     -    75 |  288   8.22
 MEDI |     -    21     -     -     -     -     -     -    47 |  278   0.35
 MKEA |     -    70     -    99     -    68     -     -    82 |  288  36.92
 NLIB |     -   107   209     -     -   140     -     -    89 |  288   0.24
 NPLD |     -    32    60     -     -     -     -     -    66 |  285   0.25
 NRC2 |     -    16    44    34     -     -     -     -    84 |  288   0.20
 NYA1 |     -    37     -     -     -     -     -     -    83 |  277   0.25
 OHI2 |     -    27     -    50     -     -     -     -     - |  288   7.69
 ONSA |     -    15     -    27     -     -     -     -     - |  288   0.25
 PENC |     -    23     -     -     -     -     -     -    52 |  277   8.86
 PERT |     -    32    45     -     -     -     -     -   104 |  288  17.53
 PIE1 |     -    39    63     -     -     -     -     -    82 |  288   0.21
 POL2 |     -    28     -     -     -    91     -     -    90 |  288  13.32
 PRDS |     -    56    93     -     -     -     -     -    90 |  287   2.03
 PTBB |     -    50    69     -     -     -     -     -    54 |  288   0.20
 RAMO |     -    28     -     -     -    84     -     -     - |  268  27.37
 REYK |     -    16     -    37     -     -     -     -    48 |  288   9.95
 SANT |     -    15     -    32     -    83     -     -     - |  215  24.08
 SCH2 |     -    39    72     -     -     -     -     -    79 |  288  41.07
 SEY1 |     -     -     -   114     -   232     -     -   221 |  258  59.97
 SFER |     -   103   235     -     -   122     -     -   114 |  287   0.75
 STJO |     -    28    39     -     -     -     -     -    79 |  288   1.81
 SUTH |     -    33     -     -     -     -     -     -    74 |  279  34.52
 TOW2 |     -    24     -     -     -    73     -     -     - |  272  13.30
 TSKB |     -    47    72    66     -     -     -     -    84 |  288   1.48
 TWTF |     -     -    46     -     -     -     -     -    79 |  271   0.72
 USNO |     -    24    60     -     -     -     -     -   116 |  288   0.21
 USUD |     -    56    79     -     -    97     -     -    77 |  288   0.42
 VILL |     -    21     -     -     -     -     -     -    46 |  279  20.43
 WES2 |     -    75    95     -     -     -     -     -     - |  288  10.93
 WILL |     -    56    88     -     -     -     -     -    77 |  288   2.28
 WTZR |     -    28     -     -     -     -     -     -    63 |  278 299.09
 YELL |     -    62     -     -     -     -     -     -   139 |  279   0.24
 -----+-------------------------------------------------------+--------------
 TOT  |  5093    64    85   108  3700   132  4943     -   122 |


 BEST CLOCK FIT: HOB2   288   0.19 (ns) 

