
 GPS week: 1161   Day: 4   MJD: 52375                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2670      0    -0.11     0.19     4.61     0.00
 cod |   288     0  26181     11    -0.01     0.16     0.06    28.92
 emr |   288     0  11863      5  1225.51    22.59     0.11    13.97
 esa |   288     0  14970   1318    -1.03    -0.47     0.10    15.56
 gfz |   288     0  15234     30    -0.14    -0.03     0.08    20.73
 igu |    96     0   2007      0    -0.05     0.03     3.83     0.00
 ngs |    96     0   2577      0    -0.06     0.13     4.34     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  27932    349   307.51    -6.16     0.08    20.82

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  4401  -204     2   775  -180   333  3456     -   -99 |
    2 | -3385    24  -175   483  -189     -     -     -     - |
    3 |   556    81  -100   -60   -13  2363   455     -    13 |
    4 | -1965    66  -286   225   153  -874 -2123     -  -219 |
    5 |  7688   116   -72   258   -27 20097  6356     -  -270 |
    6 | -1014   118    -1   -46   197  3857  -335     -  -323 |
    7 | -5989    94  -151   251    -9 -7033 -6026     -  -207 |
    8 |-10088  -143  -199   847  -108-10365 -9022     -  -203 |
    9 | -7794    96   -45    12     1 -2043 -7896     -  -113 |
   10 |  2130    14  -162   176   182  4172  1491     -  -216 |
   11 | 10936     0   118    23  -124  4571 10119     -    27 |
   13 |  4886  -241   148   680  -291  2856  4946     -    17 |
   14 |  6106    80    52  -263   -86  1444  5645     -   136 |
   15 |  1176   111  -204     -   214     -  1144     -  -227 |
   17 | -1674   247  -159  -580   421     - -1696     -  -217 |
   18 |  5229    60   141  -465    95  3363  4868     -    79 |
   20 |  5120   -28   125  -164    -2  1858  5451     -    79 |
   21 |-10346   162   -25  -473    61     - -9260     -    69 |
   22 | -1782    83    92     X  -126 -9116 -2145     -   -53 |
   23 |  4942   138  -218   -25   284     -  3604     -  -295 |
   24 | -2960    14  -255   295   170  1691 -2829     -  -239 |
   25 | -5032    60   147  -316   -71  4391 -4673     -   127 |
   26 | -2386   -67  -105     0   289 -3298 -2288     -  -126 |
   27 | -6429  -147     1  1032  -206-13976 -5525     -  -255 |
   28 |  5640   -21   -24   127     2     -  4932     -   -52 |
   29 | -1829    21   109  -283   107   396 -2011     -     2 |
   30 |  2763   242   119  -487    16     -  2665     -  -132 |
   31 |  1099    50   -48   227   -89 -4501   750     -  -117 |
 -----+-------------------------------------------------------+
 ALBH |     -  -111     -     -     -     -     -     -   154 |
 AMC2 |     -   -99     -     -     -     -     -     -   137 |
 ARTU |     -     8     -     -   -11     -     -     -     - |
 ASC1 |     -  -129     -     X     -     -     -     -   179 |
 AUCK |     -    17     -     X     -     -     -     -   -23 |
 BAHR |     -    36   -25   150  -160     -     -     -    14 |
 BOR1 |     -   -47     -     -     -     -     -     -    65 |
 BRMU |     -   141     -   -99   -58     -     -     -   -65 |
 BRUS |     -   -49     -     -     -     -     -     -    67 |
 CAS1 |     -   -22     -     -  -114     -     -     -   177 |
 CEDU |     -   302     -  -562     -     -     -     -     X |
 CHAT |     -  -148     -   173     -     -     -     -    77 |
 CHUR |     -    38     -     -     -     -     -     -   -52 |
 COCO |     -   132     -  -174     5     -     -     -   -56 |
 CRO1 |     -   323     -     -     -     -     -     -  -448 |
 DAV1 |     -    37     -     -   -82     -     -     -    31 |
 DRAO |     -   -29    84     -     -     -     -     -   -17 |
 FAIR |     -     -   140   -67   -62     -     -     -    19 |
 FORT |     -   -27   155   -84   -33     -     -     -    22 |
 GALA |     -     -     -     -  -215     -     -     -   214 |
 GOLD |     -   -80     -     -     -     -     -     -   111 |
 GRAZ |     -   -95     -     -     -     -     -     -   131 |
 GUAT |     -     -     -     -   -85     -     -     -    85 |
 HOB2 |     -   101     -  -486     -     -     -     -   223 |
 HRAO |     -  -248     -     -     -     -     -     -   344 |
 IISC |     -   -85     -     -     -     -     -     -   118 |
 JPLM |     -     -     -     -   -42     -     -     -    42 |
 KARR |     -   -15     -     -    21     -     -     -     - |
 KERG |     -     -     -     -   238     -     -     -  -237 |
 KIRU |     -   -72     -     -     -     -     -     -   100 |
 KOSG |     -  -101     -     -     -     -     -     -   141 |
 KSTU |     -  -130     -     -     -     -     -     -   181 |
 KWJ1 |     -     -     -     -   -15     -     -     -    15 |
 MAC1 |     -     2     -   132  -245     -     -     -   143 |
 MALI |     -   -65     -  -184     -     -     -     -   218 |
 MAS1 |     -   -28     -     X    40     -     -     -     - |
 MATE |     -   -99     -  -196     -     -     -     -   275 |
 MAW1 |     -   -13     -     -   -85     -     -     -   105 |
 MBAR |     -     -     -     -  -225     -     -     -   224 |
 MCM4 |     -   202     -     -     -     -     -     -  -281 |
 MDO1 |     -     -    42     -     -     -     -     -   -28 |
 MEDI |     -   -81     -     -     -     -     -     -   113 |
 METS |     -   -50     -     -     -     -     -     -    70 |
 MKEA |     -   157    39     -  -218     -     -     -   -26 |
 NPLD |     -   -26     -     -     -     -     -     -    36 |
 NRC2 |     -   152   276  -779   208     -     -     -   -22 |
 NTUS |     -  -118     -     -     -     -     -     -   164 |
 NYAL |     -     -    39   146     -     -     -     -  -136 |
 ONSA |     -   -75     -    79     -     -     -     -    44 |
 PENC |     -   173     -     -     -     -     -     -  -240 |
 PERT |     -    21     -   -40     -     -     -     -     0 |
 PIE1 |     -   242     -  -657     -     -     -     -   102 |
 PIMO |     -     -     -     -  1021     -     -     - -1017 |
 POL2 |     -   -76     -     -     -     -     -     -   106 |
 POTS |     -    12     -     -     -     -     -     -   -17 |
 PRDS |     -   -84     -     -     -     -     -     -   117 |
 PTBB |     -    -8     -     -     -     -     -     -    11 |
 REYK |     -   -49     -     -     -     -     -     -    69 |
 SANT |     -   -49     -   230  -140     -     -     -    35 |
 SCH2 |     -   -26     -     -     -     -     -     -    36 |
 SFER |     -   -83     -     -     -     -     -     -   116 |
 STJO |     -  -137   112     -     -     -     -     -   116 |
 SUTH |     -  -125     -   -79     -     -     -     -   233 |
 SUWN |     -    90     -     -     -     -     -     -  -126 |
 THTI |     -     -     -   119     -     -     -     -   -89 |
 TIXI |     -   -18     -     -    25     -     -     -     - |
 TRO1 |     -  -132     -     -   -52     -     -     -   237 |
 TSKB |     -     -   109  -126     -     -     -     -     3 |
 USNO |     -   -34    90     -     -     -     -     -   -13 |
 USUD |     -    23     -     -     -     -     -     -   -32 |
 VILL |     -   -69    75    37     -     -     -     -    17 |
 WILL |     -   -56     -     -     -     -     -     -    77 |
 WSRT |     -   -73     -     -     -     -     -     -   101 |
 WTZR |     -  -154     -   108     -     -     -     -   132 |
 YAKT |     -    27     -     -     -     -     -     -   -37 |
 YAR2 |     -     -   -82     X     -     -     -     -    55 |
 YELL |     -   -43    99   111    -4     -     -     -   -86 |
 YSSK |     -    63     -     -   -88     -     -     -     - |
 ZWEN |     -   -42     -     -    40     -     -     -    19 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6741    61    97   119    54  3710  5704     -   108 |  288   3.25
    2 |  8971    79   174   270    49     -     -     -     - |  278   2.44
    3 |  2778    61   149   147    51  3116  2965     -    38 |  288   1.35
    4 |  1329    66    65   107   130   709  1574     -   124 |  288   0.94
    5 |  6833   138   108   126   113  8633  6099     -    58 |  282   3.59
    6 | 10981    69    79    51    54  3214 11423     -   112 |  288   9.96
    7 |  1348    69   117    49    32  3358  1435     -    60 |  288   0.53
    8 |  5924    63   102    64    71  5616  6538     -    47 |  288   2.46
    9 |  3601   110   155    62    39  4325  3665     -    88 |  288   3.04
   10 |  2512   106   102   211    69  1979  2403     -   117 |  281   1.53
   11 |  2678    48   111   158    44  3196  2475     -    40 |  288   0.28
   13 |  1739    61    93   101    56  2699  1931     -    74 |  288   0.63
   14 |  1441    56   120    57   108  1902  1568     -    75 |  288   0.26
   15 |  3889    42    39     -   172     -  3562     -   160 |  288   3.40
   17 |   907    70   111    90   111     -   870     -   110 |  288   2.74
   18 |  1342    73    44   116    43  2411   979     -   106 |  288   0.33
   20 |  2372    73   119    59   100  1809  2209     -    75 |  288   0.34
   21 |  6005   123   154   100    67     -  6199     -   184 |  281   2.82
   22 |  3062    78    94     X    90  4658  2774     -    67 |  280   1.69
   23 |  6806    74   105    97   184     -  6898     -   148 |  282   5.30
   24 |  2748    73   106   140    97  1139  2457     -   133 |  288   1.12
   25 |  7248    77   157    78    67  2483  7187     -    66 |  288   2.66
   26 |   920    55    94    68    83  2197   998     -   101 |  288   0.47
   27 |  5266    43    73    69    44  7807  5179     -    76 |  288   3.08
   28 |  2500    65   214   177   105     -  2316     -   136 |  288   0.44
   29 |   715    55   101   154    26   702   765     -   108 |  288   0.45
   30 |  2617   148   152   206   104     -  2881     -   179 |  281   1.42
   31 |  3685    58   189    79    55  3594  3671     -    70 |  288   3.40
 -----+-------------------------------------------------------+--------------
 ALBH |     -    29     -     -     -     -     -     -    40 |  286   0.08
 AMC2 |     -    42     -     -     -     -     -     -    59 |  286   0.04
 ARTU |     -    21     -     -    29     -     -     -     - |  287  20.98
 ASC1 |     -    35     -     X     -     -     -     -    49 |  284    >>>
 AUCK |     -    32     -     X     -     -     -     -    45 |  264  18.24
 BAHR |     -    82    52    59    53     -     -     -    85 |  288   0.54
 BOR1 |     -    28     -     -     -     -     -     -    39 |  286   0.49
 BRMU |     -    41     -    66    44     -     -     -    69 |  288  28.86
 BRUS |     -    44     -     -     -     -     -     -    61 |  199 359.30
 CAS1 |     -    60     -     -    40     -     -     -    70 |  288   8.76
 CEDU |     -    18     -    33     -     -     -     -     X |  284  15.12
 CHAT |     -    48     -    77     -     -     -     -    36 |  287  18.66
 CHUR |     -    35     -     -     -     -     -     -    48 |  286   0.89
 COCO |     -    51     -    84    34     -     -     -    73 |  288  12.81
 CRO1 |     -    23     -     -     -     -     -     -    31 |  241   0.10
 DAV1 |     -   129     -     -   128     -     -     -   109 |  277  22.80
 DRAO |     -    45    58     -     -     -     -     -    79 |  288   0.07
 FAIR |     -     -    89   153    80     -     -     -   114 |  284   0.21
 FORT |     -    35   109    92    47     -     -     -    48 |  288   0.26
 GALA |     -     -     -     -    46     -     -     -    46 |  251  41.02
 GOLD |     -    34     -     -     -     -     -     -    48 |  286  31.23
 GRAZ |     -    49     -     -     -     -     -     -    68 |  282  61.52
 GUAT |     -     -     -     -    38     -     -     -    38 |  286    >>>
 HOB2 |     -    34     -    39     -     -     -     -    34 |  288   0.12
 HRAO |     -   101     -     -     -     -     -     -   140 |  221  28.10
 IISC |     -    77     -     -     -     -     -     -   107 |  188  52.22
 JPLM |     -     -     -     -    79     -     -     -    78 |  286  28.28
 KARR |     -    27     -     -    37     -     -     -     - |  288  14.46
 KERG |     -     -     -     -   258     -     -     -   257 |  169   2.39
 KIRU |     -    21     -     -     -     -     -     -    30 |  286   1.61
 KOSG |     -    30     -     -     -     -     -     -    42 |  286  44.67
 KSTU |     -    75     -     -     -     -     -     -   105 |  282  16.20
 KWJ1 |     -     -     -     -   194     -     -     -   193 |  179  99.49
 MAC1 |     -    25     -    28    43     -     -     -    55 |  276  15.84
 MALI |     -    43     -    50     -     -     -     -    31 |  288 187.24
 MAS1 |     -    45     -     X    63     -     -     -     - |  261   2.27
 MATE |     -    28     -    52     -     -     -     -    50 |  275   0.34
 MAW1 |     -    79     -     -    63     -     -     -   118 |  287  24.75
 MBAR |     -     -     -     -    94     -     -     -    93 |  288  37.39
 MCM4 |     -   124     -     -     -     -     -     -   172 |  219  17.94
 MDO1 |     -     -   102     -     -     -     -     -    68 |  288   6.41
 MEDI |     -    28     -     -     -     -     -     -    40 |  286   2.45
 METS |     -    27     -     -     -     -     -     -    38 |  285  37.14
 MKEA |     -    65   113     -    51     -     -     -   163 |  247  32.20
 NPLD |     -    26     -     -     -     -     -     -    36 |  285   0.03
 NRC2 |     -    50    63    68    35     -     -     -    90 |  288   0.09
 NTUS |     -    46     -     -     -     -     -     -    64 |  275   6.88
 NYAL |     -     -    50    16     -     -     -     -    38 |  288   0.09
 ONSA |     -    26     -    74     -     -     -     -    52 |  288    >>>
 PENC |     -    27     -     -     -     -     -     -    37 |  285  12.08
 PERT |     -    25     -    53     -     -     -     -    34 |  288  21.14
 PIE1 |     -    37     -    97     -     -     -     -    51 |  266   0.06
 PIMO |     -     -     -     -    78     -     -     -    77 |  195  34.91
 POL2 |     -    82     -     -     -     -     -     -   114 |  286  27.49
 POTS |     -    79     -     -     -     -     -     -   110 |  269  19.95
 PRDS |     -    39     -     -     -     -     -     -    55 |  286   1.49
 PTBB |     -    60     -     -     -     -     -     -    84 |  284   0.06
 REYK |     -    28     -     -     -     -     -     -    38 |  282  11.17
 SANT |     -    43     -    44    63     -     -     -    31 |  288  30.02
 SCH2 |     -    76     -     -     -     -     -     -   105 |  286  30.68
 SFER |     -    50     -     -     -     -     -     -    70 |  287 172.47
 STJO |     -    38    57     -     -     -     -     -    68 |  288   1.97
 SUTH |     -    81     -   105     -     -     -     -    48 |  288  38.26
 SUWN |     -    34     -     -     -     -     -     -    48 |  284   1.88
 THTI |     -     -     -    84     -     -     -     -    63 |  287   3.73
 TIXI |     -    18     -     -    26     -     -     -     - |  287  11.55
 TRO1 |     -    33     -     -    43     -     -     -    33 |  288  10.54
 TSKB |     -     -   106    57     -     -     -     -    80 |  281   1.26
 USNO |     -    17    65     -     -     -     -     -    52 |  288   0.03
 USUD |     -    21     -     -     -     -     -     -    29 |  284   0.37
 VILL |     -    32    49    28     -     -     -     -    52 |  288  23.10
 WILL |     -    55     -     -     -     -     -     -    77 |  286   0.95
 WSRT |     -    27     -     -     -     -     -     -    38 |  288   0.03
 WTZR |     -    33     -    41     -     -     -     -    31 |  287   0.07
 YAKT |     -    16     -     -     -     -     -     -    22 |  286   1.82
 YAR2 |     -     -   110     X     -     -     -     -    74 |  222 299.20
 YELL |     -    22    51    53    50     -     -     -    74 |  288   0.09
 YSSK |     -    25     -     -    35     -     -     -     - |  287  14.72
 ZWEN |     -    62     -     -    70     -     -     -    23 |  288  16.86
 -----+-------------------------------------------------------+--------------
 TOT  |  4605    60   110   101    82  3832  4339     -    85 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

