
 GPS week: 1161   Day: 2   MJD: 52373                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2653      0    -0.23     0.43     4.52     0.00
 cod |   288     0  20315      0    -0.48     1.02     0.07    24.06
 emr |   288     0  12451     29  1187.72    19.54     0.14    10.66
 esa |   288     0  15882   2496     0.49    -0.42     0.18     7.78
 gfz |   288     0  13609      0     0.02    -0.92     0.08    22.43
 igu |    96     0   2097      0    -0.20     0.29     4.30     0.00
 jpl |   283     0  10170    507    -0.51    -6.82     0.08    22.33
 ngs |    96     0   2565      0    -0.14     0.19     4.54     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0   8251    575   327.34    -9.50     0.12    12.74

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4714  -144     4     X    13 -6695    63 -3816     -   187 |
    2 |  4427     9   -56   593  -130     -    25  4810     -   -41 |
    3 |    86    30   -66    46   -58 -4352    80   115     -     X |
    4 | -2158   117  -191   -46    66 -1929  -158 -1969     -   -25 |
    5 |   630   132  -122  -356   111 16364     X   -25     -  -145 |
    6 | -6577   157   -21  -453   147-10441   -13 -6428     -  -250 |
    7 | -6182    32  -118     X   -24 -7273   -61 -5450     -   137 |
    8 |   655   -87  -270   566   -73 -4637    75   456     -   150 |
    9 | -7230    66  -118  -219    48   286    79 -7061     -   -39 |
   10 | -4818     1  -309  -424   141  1198   137 -4467     -   134 |
   11 | 11482  -117    23   427  -228  5429   123 10752     -   286 |
   13 |  2674   -94   151   341  -117  1274  -150  3197     -   167 |
   14 |  8681    65   168    38  -132  1061   -63  8346     -    -5 |
   15 | -5744     -    12     -   -23     -    38 -5606     -     X |
   17 |   451   116  -252     X   115     -    57   581     -  -261 |
   18 |   590   -46    78     X    48  3756  -112  1178     -    41 |
   20 |  4286  -215   114  -188  -107  3430   223  4746     -   432 |
   21 |  5893    62   -41  -151    38     -    68  5772     -  -117 |
   22 |  1428    27    89   148  -126  1950     7  2571     -    17 |
   23 |  -302    66  -323  -230   189     -    79   275     -  -115 |
   24 |   194   102  -311     X   122   322   -68   403     -   -86 |
   25 | -5729    42   177   152    -4 -7364  -133 -5367     -  -194 |
   26 | -3981    -8  -187   186   197 -2081   -33 -3406     -  -263 |
   27 | -4483   -58  -113   405  -100 -5178    60 -3524     -    84 |
   28 |  5741     -    52     X    18  3094  -164     -     -    96 |
   29 |  -700    20  -101    14   130   218   -38  -452     -  -157 |
   30 |   684   226    -7  -151   158     -  -310  1095     -  -338 |
   31 |  5323   -62   -23   315  -128 12470   132  3382     -    86 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -18     -     -     -     -    19     -     -     - |
 ALGO |     -   -90   114   120     -     -     -     -     -     - |
 ALIC |     -    17     -     -     -     -   -19     -     -     - |
 ARTU |     -    99     -     -  -106     -     -     -     -     - |
 AUCK |     -    63     -  -194     -     -     -     -     -     - |
 BAHR |     -   -37    86    -4     -     -     -     -     -     - |
 BRMU |     -    93     -  -330    14     -     -     -     -     - |
 BRUS |     -  -138     -     -     -     -   148     -     -     - |
 CAS1 |     -    -6     -   -99    43     -    -3     -     -     - |
 CEDU |     -   152     -  -471     -     -     -     -     -     X |
 CHAT |     -     5     -  -199    84     -   -21     -     -     - |
 COCO |     -    45     -  -222    41     -   -12     -     -     - |
 CRO1 |     -   -71     -     -     -     -    76     -     -     - |
 DAV1 |     -    56     -     -   -60     -     -     -     -     - |
 DRAO |     -   -66   -73     -     -     -     -     -     -   186 |
 FAIR |     -     -   170   -99   -50     -     X     -     -     - |
 FORT |     -  -161   472   190  -131     -     -     -     -     - |
 GALA |     -    97     -   -86    11     -   -81     -     -     - |
 GRAZ |     -   -38     -   118     -     -     -     -     -     - |
 HOB2 |     -    94   176  -536     -     -     -     -     -     - |
 HRAO |     -   -98     -     -     -     -   106     -     -     - |
 KARR |     -   -16     -     -    17     -     -     -     -     - |
 KIRU |     -    13     -   -41     -     -     -     -     -     - |
 KSTU |     -    38     -     -     -     -   -41     -     -     - |
 KWJ1 |     -     -     -     -   -85     -    85     -     -     - |
 LPGS |     -    41     -     -     -     -   -44     -     -     - |
 MAC1 |     -    67     -  -209     -     -     -     -     -     - |
 MAG0 |     -     4     -     -     -     -    -4     -     -     - |
 MAS1 |     -    78     -     X   -83     -     -     -     -     - |
 MATE |     -     -  -373   513     -     -     X     -     -     - |
 MAW1 |     -    20     -     -     -     -   -22     -     -     - |
 MBAR |     -   -35     -     -    37     -     -     -     -     - |
 MDO1 |     -     -    72  -100     -     -     -     -     -     - |
 MKEA |     -   111   -26    19  -108     -    -7     -     -     - |
 MSKU |     -     8     -     -    -9     -     -     -     -     - |
 NLIB |     -     -  -152   209     -     -     -     -     -     - |
 NYAL |     -     -    27   -37     -     -     -     -     -     - |
 OHI2 |     -    34     -     -   -36     -     -     -     -     - |
 POL2 |     -   -62     -     -     -     -    66     -     -     - |
 POTS |     -  -112     -   347     -     -     -     -     -     - |
 SANT |     -   -31     -   -12    36     -     -     -     -     - |
 SFER |     -   -89     -   274     -     -     -     -     -     - |
 STJO |     -   -68   153     -     -     -     -     -     -     - |
 SUTH |     -   -56     -   173     -     -     -     -     -     - |
 THTI |     -     -     -  -152     -     -    53     -     -     - |
 TIXI |     -     8     -     -    -9     -     -     -     -     - |
 TRO1 |     -   -48     -     -    51     -     -     -     -     - |
 TSKB |     -     -   183  -255     -     -     -     -     -     - |
 USNO |     -     3    75     -     -     -   -42     -     -     - |
 USUD |     -   -71     -   198     -     -     1     -     -     X |
 VILL |     -   -72   161     -     -     -     -     -     -     - |
 WSRT |     -   -81     -   250     -     -     -     -     -     - |
 WTZR |     -   -74     -     -     -     -    79     -     -     - |
 YAR2 |     -     -   376     X     -     -  -179     -     -     X |
 YELL |     -    29   125    56   -19     -   -95     -     -     - |
 ZWEN |     -   -57     -     -    62     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6391    53   115     X    89  4979    43  6734     -    70 |  288   4.36
    2 |  3438   105   227   224    46     -    50  3397     -   133 |  282   2.37
    3 |  3560    50    99   115    69  2078    83  3221     -     X |  288   1.46
    4 |  1351    96   190   208    44  1144    52  1236     -    74 |  288   0.79
    5 |  7076   198   100   244   130  9599     X  6588     -    95 |  281   3.97
    6 |  7580    77   184   282   144  6592    71  7434     -    87 |  288   7.62
    7 |  2938   133   107     X   117  2975    38  2549     -    61 |  288   0.70
    8 |  3351    86   100   235    79  4211    88  3701     -   114 |  288   2.38
    9 |  3611    78    50   136    83  2023   106  3454     -    63 |  288   1.59
   10 |  3271    60   145   239    73  2834    86  3294     -    81 |  282   3.19
   11 |  4030   116    96   160   106  3018    67  3717     -   128 |  288   0.31
   13 |  1007    43   200   165    54  1263    50   901     -   121 |  288   0.33
   14 |  1814    72    97   154    50  1114    79  2222     -    70 |  288   0.17
   15 |  4190     -   283     -   132     -   192  2937     -     X |  277   3.13
   17 |  2659    59   137     X    63     -    65  2629     -   145 |  270   2.51
   18 |  1855    80   121     X    30  2252    50  1925     -    61 |  288   0.40
   20 |   865   101   164   133    74  1972    43   926     -   141 |  288   0.28
   21 |  5088   118   233   307   139     -   182  4479     -   204 |  282   3.49
   22 | 10564    93   167   248    77  4244   255 10594     -    63 |  282   1.29
   23 |  5830    67   159   126    84     -   117  6235     -   209 |  282   6.04
   24 |  2596    43    81     X    20  2630    32  2729     -    74 |  288   2.09
   25 |  2697    54   152   253    90  2767    70  2595     -    45 |  288   1.51
   26 |  1058    64   134   108    58  1645    46   883     -    56 |  288   0.69
   27 |  6644    86   160   235    44 10586    56  6737     -   112 |  288   4.66
   28 |  5735     -   282     X   149  3921    90     -     -   277 |  261   3.89
   29 |  1762    64   116   190    52   964    45  1768     -    42 |  288   0.71
   30 |  1216   187   165   236    71     -   142  1181     -   217 |  281   1.37
   31 |  6651    59   230   285    45  4918    99  8715     -   154 |  288   3.25
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    31     -     -     -     -    32     -     -     - |  279   0.13
 ALGO |     -    38    59    79     -     -     -     -     -     - |  288   0.05
 ALIC |     -    44     -     -     -     -    47     -     -     - |  278  55.69
 ARTU |     -    35     -     -    38     -     -     -     -     - |  283  24.77
 AUCK |     -   110     -   339     -     -     -     -     -     - |  187  16.06
 BAHR |     -    50    74    94     -     -     -     -     -     - |  288   0.47
 BRMU |     -   152     -   111   174     -     -     -     -     - |  288  22.00
 BRUS |     -    37     -     -     -     -    40     -     -     - |  282   0.24
 CAS1 |     -   161     -   186   150     -   123     -     -     - |  288   8.71
 CEDU |     -    23     -    71     -     -     -     -     -     X |  287  17.24
 CHAT |     -    31     -   131    33     -    44     -     -     - |  287  17.24
 COCO |     -    37     -   213    24     -    64     -     -     - |  288  12.97
 CRO1 |     -    44     -     -     -     -    47     -     -     - |  271   0.10
 DAV1 |     -    49     -     -    52     -     -     -     -     - |  288  21.30
 DRAO |     -    23    28     -     -     -     -     -     -    45 |  288   0.06
 FAIR |     -     -   108   166    59     -     X     -     -     - |  286   0.17
 FORT |     -    57   200   335    52     -     -     -     -     - |  279   0.29
 GALA |     -   100     -   142    93     -    42     -     -     - |  288  39.04
 GRAZ |     -    84     -   261     -     -     -     -     -     - |  214    >>>
 HOB2 |     -    42   145   139     -     -     -     -     -     - |  288   0.09
 HRAO |     -    53     -     -     -     -    56     -     -     - |  273  32.86
 KARR |     -    31     -     -    33     -     -     -     -     - |  288  16.38
 KIRU |     -    18     -    56     -     -     -     -     -     - |  288   2.70
 KSTU |     -    72     -     -     -     -    77     -     -     - |  274  20.90
 KWJ1 |     -     -     -     -   218     -   219     -     -     - |  188  86.22
 LPGS |     -    93     -     -     -     -   100     -     -     - |  255  26.60
 MAC1 |     -    34     -   103     -     -     -     -     -     - |  288  14.76
 MAG0 |     -    27     -     -     -     -    30     -     -     - |  278  12.63
 MAS1 |     -   109     -     X   117     -     -     -     -     - |  263   2.47
 MATE |     -     -   142   187     -     -     X     -     -     - |  105    >>>
 MAW1 |     -    60     -     -     -     -    65     -     -     - |  279  24.24
 MBAR |     -    28     -     -    30     -     -     -     -     - |  251  41.35
 MDO1 |     -     -   125   172     -     -     -     -     -     - |  264   5.85
 MKEA |     -    58   164   106    25     -    32     -     -     - |  288  38.54
 MSKU |     -    64     -     -    69     -     -     -     -     - |  184  26.80
 NLIB |     -     -   135   186     -     -     -     -     -     - |  262   0.08
 NYAL |     -     -    69    94     -     -     -     -     -     - |  288   0.11
 OHI2 |     -    72     -     -    77     -     -     -     -     - |  288   9.38
 POL2 |     -    17     -     -     -     -    19     -     -     - |  279  36.41
 POTS |     -    17     -    52     -     -     -     -     -     - |  288  20.08
 SANT |     -    45     -   194    49     -     -     -     -     - |  288  30.78
 SFER |     -    32     -   100     -     -     -     -     -     - |  287   1.72
 STJO |     -    22    50     -     -     -     -     -     -     - |  287   2.44
 SUTH |     -    52     -   161     -     -     -     -     -     - |  280  38.16
 THTI |     -     -     -   217     -     -    75     -     -     - |  274    >>>
 TIXI |     -    28     -     -    30     -     -     -     -     - |  287 477.67
 TRO1 |     -    18     -     -    20     -     -     -     -     - |  288   9.95
 TSKB |     -     -    52    62     -     -     -     -     -     - |  177   0.85
 USNO |     -    48    57     -     -     -    73     -     -     - |  288   0.03
 USUD |     -    52     -   159     -     -    60     -     -     X |  288   0.36
 VILL |     -    41    91     -     -     -     -     -     -     - |  288  16.59
 WSRT |     -    17     -    53     -     -     -     -     -     - |  288   0.07
 WTZR |     -    42     -     -     -     -    45     -     -     - |  282   0.08
 YAR2 |     -     -    90     X     -     -    43     -     -     X |  278   4.03
 YELL |     -    43    61   201    21     -    54     -     -     - |  288   0.09
 ZWEN |     -    51     -     -    53     -     -     -     -     - |  277  22.84
 -----+-------------------------------------------------------------+--------------
 TOT  |  4518    74   144   184    84  4303    82  4535     -   123 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

