
 GPS week: 1158   Day: 6   MJD: 52356                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2686      0    -0.08    -0.01     4.23     0.00
 cod |   288     0  22276    199     0.01    -0.34     0.08    23.81
 emr |   288     0  10556      0   864.27    20.16     0.08    23.52
 esa |     0     0      0      0    -0.41     0.00     0.00     0.00
 gfz |   288     0  15776    258    -0.71     0.86     0.09    19.46
 igu |    96     0   2208      0    -0.11    -0.01     4.99     0.00
 jpl |   275     0  11087   1385    -1.58    -3.53     0.10    17.02
 ngs |    96     0   2686      0    -0.08    -0.02     3.90     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23332   1456   459.87    -5.16     0.11    16.20

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  5633    84   232     -  -161  7381   -66  5103     -  -226 |
    2 | -8029    -5   252     -   140     -   116 -6333     -  -562 |
    3 | -6160   -94   154     -     8   -27    22 -6377     -  -105 |
    4 | -4247   257  -399     -    85  -328   284 -3800     -     6 |
    5 |  2147   101  -248     -   202  7988     X  2201     -   -30 |
    6 |  6594   140  -195     -    35  5939   247  4879     -   -59 |
    7 |  3820    51  -197     -   258 -2039   294  3896     -  -216 |
    8 | -1822   -10   -52     -    94 -5365   167 -1950     -   -93 |
    9 | -4117   177  -239     -    61  4389     7 -3522     -    22 |
   10 | -1096    16  -311     -   333  4062   233 -1181     -  -106 |
   11 |  1334    -1   252     -  -271  2176   -52  1825     -   -18 |
   13 |  5187   133   208     -  -239  1489  -196  5338     -  -128 |
   14 |  4296    76   168     -  -220  1702  -184  4273     -    18 |
   15 | -3220   -27  -134     -   265     -  -134 -2736     -   -10 |
   17 |  6990    17  -266     -   313     -   246  6120     -  -110 |
   18 |  4251   -10   -75     -    15  3769    -5  4249     -   110 |
   20 |  3952  -101   296     -  -169  3381   268  3945     -  -235 |
   21 |   567    71    46     -   -54     -     8   100     -  -101 |
   22 | -4940  -274   461     -    94 -8189  -179 -4702     -  -271 |
   23 | -2870    75  -406     -   263     -   300 -2698     -     X |
   24 |  -758   123  -248     -   155 -1203     X -1077     -     X |
   25 | -2623    54   189     -   -99  4549  -184 -2827     -  -124 |
   26 |  -994   203  -341     -   171 -2028    90 -1236     -   -52 |
   27 |  5626    65    55     -    67  9393   169  4903     -  -312 |
   28 |  6747   159   106     -  -223  6722  -133  7109     -   -35 |
   29 | -2143   148  -150     -   -25 -2800   119 -2290     -   -18 |
   30 | -3836   226  -223     -    71-16981    69 -3765     -  -114 |
   31 |-10452   -27   285     -   -86-23972    81 -9577     -  -304 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -183     -     -     -     -    38     -     -   233 |
 AMC2 |     -  -165     -     -     -     -     -     -     -   242 |
 AOML |     -    41     -     -     -     -  -197     -     -   139 |
 AREQ |     -   -17     -     -    -2     -   -68     -     -    93 |
 ARTU |     -    55     -     -  -123     -    64     -     -     - |
 BILI |     -    38     -     -   -32     -   -18     -     -     - |
 BOR1 |     -    99     -     -     -     -     -     -     -  -146 |
 BRMU |     -    94     -     -  -108     -     -     -     -    -8 |
 BRUS |     -   -87     -     -     -     -     -     -     -   128 |
 CAS1 |     -     -     -     -  -105     -     -     -     -   126 |
 CRO1 |     -   -95     -     -     -     -    79     -     -    60 |
 DAV1 |     -     -     -     -   -51     -     -     -     -    61 |
 DRAO |     -   -54    21     -     -     -     -     -     -    48 |
 DUBO |     -   -40     -     -     -     -    56     -     -     - |
 FAIR |     -     -    30     -   -56     -     X     -     -    24 |
 FORT |     -  -172   177     -     9     -    25     -     -  -112 |
 GALA |     -  -139     -     -  -212     -   -26     -     -   493 |
 GOLD |     -   -56     -     -   -95     -     X     -     -   197 |
 GRAZ |     -    -2     -     -     -     -     -     -     -     3 |
 GUAM |     -    80     -     -     -     -  -133     -     -    27 |
 GUAT |     -     -     -     -  -201     -     -     -     -   242 |
 HERS |     -     -     -     -     -     -   484     -     -  -508 |
 HOFN |     -     -     -     -    84     -   -96     -     -     - |
 HRAO |     -   114     -     -   -21     -  -137     -     -     X |
 KERG |     -    87     -     -   -11     -     -     -     -   -79 |
 KIRU |     -    -3     -     -     -     -     4     -     -     - |
 KWJ1 |     -     -     -     -   120     -   -33     -     -   -99 |
 LAMA |     -  -886     -     -     -     -  1240     -     -     - |
 LPGS |     -   -25     -     -     -     -     -     -     -    37 |
 MAC1 |     -     -     -     -  -132     -     -     -     -   159 |
 MADR |     -     X     -     -     -     -  -438     -     -   460 |
 MALI |     -   -61     -     -     X     -     -     -     -    89 |
 MAS1 |     -   -12     -     -   -66     -     -     -     -    97 |
 MATE |     -   -61    14     -     -     -     X     -     -    69 |
 MAW1 |     -     -     -     -   -74     -     -     -     -    89 |
 MBAR |     -   -16     -     -    20     -     -     -     -     X |
 MCM4 |     -   156     -     -     -     -     -     -     -  -230 |
 MDO1 |     -  -242   110     -     -     -     -     -     -   155 |
 MEDI |     -   -47     -     -     -     -     -     -     -    69 |
 METS |     -  -149     -     -     -     -     -     -     -   218 |
 MKEA |     -    35    37     -  -145     -   -30     -     -   101 |
 NKLG |     -    47     -     -   -75     -     -     -     -    24 |
 NLIB |     -    98   124     -  -394     -     -     -     -   161 |
 NPLD |     -   -34     -     -     -     -     -     -     -    49 |
 NTUS |     -   -55     -     -     -     -     -     -     -    80 |
 NYAL |     -     -    81     -     -     -     -     -     -  -118 |
 ONSA |     -   -28     -     -     -     -     -     -     -    41 |
 PETP |     -     0     -     -     -     -    -1     -     -     - |
 PIMO |     -     -     -     -   887     -  -209     -     - -1129 |
 POL2 |     -     8     -     -     -     -   -11     -     -     - |
 POTS |     -    39     -     -     -     -     -     -     -   -58 |
 REYK |     -   -29     -     -     -     -     -     -     -    43 |
 SANT |     -    24     -     -     -     -   -37     -     -     4 |
 SEY1 |     -  -363     -     -     -     -     -     -     -   534 |
 SUTH |     -   -42     -     -     -     -     -     -     -    62 |
 THU1 |     -   182     -     -     -     -     -     -     -  -268 |
 TIDB |     -    33     -     -   -40     -     X     -     -     X |
 TRO1 |     -  -311     -     -   -53     -     -     -     -   555 |
 URUM |     -     1     -     -   -53     -     -     -     -    62 |
 USUD |     -    78     -     -     -     -   -20     -     -   -95 |
 VILL |     -   -26     -     -     -     -     -     -     -    38 |
 WSRT |     -   -35     -     -     -     -     -     -     -    51 |
 WTZR |     -   -34     -     -     -     -     -     -     -    51 |
 YAKT |     -   326     -     -     -     -  -456     -     -     - |
 YAR2 |     -  -897   246     -     -     -     -     -     -   399 |
 YSSK |     -    25     -     -     -     -   -35     -     -     - |
 ZWEN |     -   -49     -     -    40     -     -     -     -    24 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  2868   123   121     -    56  4210    44  2714     -    66 |  288   2.74
    2 |  5465   228   158     -   109     -   106  4568     -   237 |  283   2.25
    3 |  3768    73    74     -    61  2510   149  3725     -   118 |  288   1.85
    4 |  1779    81   105     -   109  1215   105  1709     -   111 |  288   0.71
    5 |  3964    62   110     -    62  5110     X  3849     -   174 |  288   2.28
    6 |  7034    82    40     -   137  4364   207  5546     -   101 |  288   6.70
    7 |  3303    96    64     -   151  2834   137  3111     -    56 |  288   1.90
    8 |  3636    71    92     -   150  2771    82  3849     -   180 |  288   2.69
    9 |  4528    81    53     -    84  4426   135  4038     -   124 |  288   1.54
   10 |  4231   104    62     -    97  2622    79  4159     -   169 |  288   2.86
   11 |  1139    85    38     -   131  1480   100  1082     -    49 |  288   0.61
   13 |   842   102    93     -    53  1500   111   692     -    82 |  288   0.26
   14 |   657    42    98     -   138  1554    43   697     -    94 |  288   0.23
   15 |  6314    87   100     -    75     -    97  5929     -   200 |  288   3.40
   17 |  7676    64    67     -    68     -   117  6790     -    88 |  288   2.79
   18 |  1027    61   121     -    93  2123   173  1114     -   202 |  288   0.31
   20 |  1018    75    91     -    45  2193    75   991     -   159 |  288   0.23
   21 |  2522    53    59     -   147     -   111  2498     -   148 |  288   1.61
   22 |  1744    51   124     -   204  4475   108  1521     -    68 |  288   0.99
   23 |  6240   156    78     -    85     -   126  6281     -     X |  288   5.95
   24 |  6043    69    44     -    47  3005     X  6248     -     X |  288   3.18
   25 |  2274    95   102     -    80  2335    54  2347     -    98 |  288   1.57
   26 |  2104   131    96     -    49  2060   146  1926     -   132 |  288   0.76
   27 |  7562   107    64     -   116  9539   120  7073     -    55 |  288   5.71
   28 |  3694   101    46     -   109  5082   115  3345     -   120 |  288   0.44
   29 |  1183    89    68     -   154  1236   207  1103     -    98 |  288   0.55
   30 |   844   122    74     -   113  9432   129   629     -   122 |  288   1.19
   31 |  7264    75    86     -   124 14233   139  6130     -   102 |  288   4.45
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    33     -     -     -     -    40     -     -    51 |  288   0.30
 AMC2 |     -    29     -     -     -     -     -     -     -    42 |  286   0.06
 AOML |     -    51     -     -     -     -    55     -     -    67 |  288  36.25
 AREQ |     -    36     -     -    34     -    54     -     -    88 |  288  31.20
 ARTU |     -    39     -     -    29     -    56     -     -     - |  287  28.88
 BILI |     -    49     -     -    33     -    59     -     -     - |  287  14.45
 BOR1 |     -    31     -     -     -     -     -     -     -    45 |  286   0.56
 BRMU |     -    89     -     -    34     -     -     -     -   146 |  288  33.37
 BRUS |     -   105     -     -     -     -     -     -     -   154 |  286   2.97
 CAS1 |     -     -     -     -   151     -     -     -     -   182 |  278   8.09
 CRO1 |     -   136     -     -     -     -    67     -     -   169 |  288   0.10
 DAV1 |     -     -     -     -    99     -     -     -     -   119 |  287  21.89
 DRAO |     -    26    46     -     -     -     -     -     -    64 |  288   0.09
 DUBO |     -    28     -     -     -     -    40     -     -     - |  275  11.59
 FAIR |     -     -    92     -    79     -     X     -     -   136 |  276   0.25
 FORT |     -    47    40     -    55     -    58     -     -    96 |  288   0.21
 GALA |     -    73     -     -    92     -    81     -     -   157 |  288  46.45
 GOLD |     -    24     -     -    34     -     X     -     -    53 |  288  34.53
 GRAZ |     -    68     -     -     -     -     -     -     -   100 |  285    >>>
 GUAM |     -    45     -     -     -     -    67     -     -    60 |  283  30.85
 GUAT |     -     -     -     -    47     -     -     -     -    57 |  284    >>>
 HERS |     -     -     -     -     -     -    56     -     -    59 |   97  15.67
 HOFN |     -     -     -     -    41     -    47     -     -     - |  240    >>>
 HRAO |     -    51     -     -    67     -   127     -     -     X |  287  29.64
 KERG |     -    91     -     -    50     -     -     -     -   106 |  287   1.65
 KIRU |     -    44     -     -     -     -    61     -     -     - |  255   1.51
 KWJ1 |     -     -     -     -   158     -   136     -     -   173 |  252 182.41
 LAMA |     -    59     -     -     -     -    82     -     -     - |  106   6.52
 LPGS |     -   170     -     -     -     -     -     -     -   250 |  217  84.88
 MAC1 |     -     -     -     -    26     -     -     -     -    32 |  276  14.55
 MADR |     -     X     -     -     -     -   173     -     -   182 |  161 340.45
 MALI |     -    31     -     -     X     -     -     -     -    46 |  258  32.69
 MAS1 |     -    47     -     -    24     -     -     -     -    88 |  288   2.55
 MATE |     -    38    46     -     -     -     X     -     -    40 |  288   0.06
 MAW1 |     -     -     -     -    64     -     -     -     -    76 |  286  27.43
 MBAR |     -    40     -     -    49     -     -     -     -     X |  237  34.35
 MCM4 |     -    90     -     -     -     -     -     -     -   132 |  171  13.64
 MDO1 |     -    24    45     -     -     -     -     -     -    90 |  229  14.68
 MEDI |     -    20     -     -     -     -     -     -     -    29 |  285   1.68
 METS |     -    22     -     -     -     -     -     -     -    33 |  285  53.88
 MKEA |     -    38    29     -    36     -    45     -     -    72 |  288  49.77
 NKLG |     -    26     -     -    37     -     -     -     -    56 |  287    >>>
 NLIB |     -    42    76     -    38     -     -     -     -   116 |  288   0.04
 NPLD |     -    31     -     -     -     -     -     -     -    46 |  285   0.07
 NTUS |     -    37     -     -     -     -     -     -     -    54 |  285   8.16
 NYAL |     -     -    53     -     -     -     -     -     -    77 |  282   0.10
 ONSA |     -    32     -     -     -     -     -     -     -    48 |  288   0.12
 PETP |     -    47     -     -     -     -    66     -     -     - |  274  19.37
 PIMO |     -     -     -     -   135     -   261     -     -   178 |  246  36.74
 POL2 |     -    33     -     -     -     -    45     -     -     - |  274  36.25
 POTS |     -   130     -     -     -     -     -     -     -   191 |  264  14.66
 REYK |     -    25     -     -     -     -     -     -     -    36 |  278   9.80
 SANT |     -   123     -     -     -     -   147     -     -    88 |  287  40.01
 SEY1 |     -    64     -     -     -     -     -     -     -    94 |  100  30.76
 SUTH |     -    30     -     -     -     -     -     -     -    44 |  283  32.45
 THU1 |     -    94     -     -     -     -     -     -     -   138 |  247  32.15
 TIDB |     -    34     -     -    41     -     X     -     -     X |  280   0.11
 TRO1 |     -    33     -     -    62     -     -     -     -    46 |  288   9.29
 URUM |     -    75     -     -    48     -     -     -     -    75 |  288  38.88
 USUD |     -    36     -     -     -     -    43     -     -    72 |  288   0.49
 VILL |     -    20     -     -     -     -     -     -     -    29 |  286  20.87
 WSRT |     -    14     -     -     -     -     -     -     -    21 |  288   0.08
 WTZR |     -    32     -     -     -     -     -     -     -    47 |  288   0.11
 YAKT |     -    33     -     -     -     -    47     -     -     - |  267   0.44
 YAR2 |     -   151    65     -     -     -     -     -     -   133 |  274   3.95
 YSSK |     -    21     -     -     -     -    29     -     -     - |  270  17.44
 ZWEN |     -   111     -     -    69     -     -     -     -    90 |  266  16.24
 -----+-------------------------------------------------------------+--------------
 TOT  |  4231    77    82     -    92  4985   101  3902     -   112 |


 BEST CLOCK FIT: NLIB   288   0.04 (ns) 

