
 GPS week: 1158   Day: 5   MJD: 52355                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2648      0    -0.17     0.25     4.60     0.00
 cod |   288     0  20362      0    -0.20     0.28     0.06    33.04
 emr |   288     0  10344   1119   846.88    19.40     0.15     9.66
 esa |     0     0      0      0     2.77     0.00     0.00     0.00
 gfz |   288     0  15061      0    -0.22     0.67     0.08    22.81
 igu |    96     0   2304      0    -0.19     0.35     4.27     0.00
 jpl |   281     0   6118    253    -3.21     3.39     0.13    11.29
 ngs |    96     0   2648      0    -0.16     0.25     4.51     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  17597     53   466.66    -7.16     0.08    23.21

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  -182    58   130     -  -176   412   -67   351     -    59 |
    2 | -4335    11   -43     -   112     -    69 -4053     -  -124 |
    3 |  -919   -37  -209     -   161  1312    23  -724     -   -38 |
    4 |    -1   190    50     -    41   374    11  -164     -  -329 |
    5 |  -285   -25  -122     -   169  5934   372  -172     -  -162 |
    6 |  2674    70     X     -    80  4648   -91  2434     -  -158 |
    7 | -1711    10   196     -   311-14359   -67 -2513     -  -381 |
    8 | -5513   -23    42     -   186 -7279    36 -4712     -  -173 |
    9 | -6105   178  -293     -   -20  -780    20 -6005     -  -128 |
   10 |   508  -121   145     -   380  6828   294   512     -  -332 |
   11 |  1799    40   156     -  -182  -458  -154  1736     -    91 |
   13 |  5264    64   190     -  -331  -788  -344  5125     -   239 |
   14 |  5315    99   -75     -  -357   415  -322  5160     -   312 |
   15 | -1585   -15  -203     -   285     -  -107 -1668     -  -162 |
   17 |  1066     -     X     -    67     -     X   991     -   -66 |
   18 |  5682    23  -259     -   -42  2894    -1  5606     -   121 |
   20 |  3220  -130   228     -   -57  1165   338  3337     -    75 |
   21 |  2482    70  -149     -  -104     -    24  1514     -    60 |
   22 | -8589  -148   141     -   114-11033   127 -8385     -     8 |
   23 |  4107     1  -246     -   274  1627   623  3910     -  -311 |
   24 |  1990    28  -137     -   190  5648   491  1840     -  -293 |
   25 | -1155    22   100     -  -202  5838    82 -1455     -   112 |
   26 |   314   115  -268     -    74  2614   175   414     -  -163 |
   27 |-11383    31  -115     -   116-13454   175-10552     -  -154 |
   28 |   -95   118     X     -   -51  2154     X   285     -  -117 |
   29 | -3959    30  -146     -  -158 -2415   163 -3510     -   138 |
   30 |  7375   165  -228     -   138 -3211  -170  7304     -  -250 |
   31 |  4556    22    42     -    57 11926    44  3913     -  -115 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -61     -     -     -     -     -     -     -    87 |
 ALGO |     -   -53   181     -     -     -     -     -     -     - |
 AMC2 |     -   -75     -     -     -     -     -     -     -   107 |
 AOML |     -    97     -     -     -     -   -20     -     -  -128 |
 AREQ |     -   -13     -     -   -38     -   120     -     -     - |
 ARTU |     -    35     -     -   -89     -    79     -     -     - |
 BILI |     -     -     -     -   311     -  -629     -     -     - |
 BOR1 |     -   -28     -     -     -     -     -     -     -    39 |
 BRMU |     -    57     -     -   -22     -     -     -     -   -68 |
 BRUS |     -   -83     -     -     -     -     -     -     -   117 |
 CAS1 |     -     -     -     -   -90     -     -     -     -    88 |
 DRAO |     -    10    13     -     -     -     -     -     -   -20 |
 FORT |     -  -255   165     -   190     -     -     -     -    60 |
 GALA |     -    93     -     -  -134     -     -     -     -     - |
 GRAZ |     -  -117     -     -     -     -     -     -     -   167 |
 GUAM |     -   148     -     -  -181     -   -64     -     -     - |
 GUAT |     -     -     -     -   -22     -     -     -     -    22 |
 HARB |     -    22     -     -   -32     -     -     -     -     - |
 HRAO |     -    43     -     -    28     -  -189     -     -     - |
 JPLM |     -     -     -     -    19     -   -38     -     -     - |
 KERG |     -   119     -     -  -148     -     -     -     -   -21 |
 LPGS |     -     6     -     -     -     -     -     -     -    -8 |
 MAC1 |     -     -     -     -  -143     -     -     -     -   140 |
 MADR |     -     -     -     -     -     -  -790     -     -   384 |
 MAS1 |     -   -37     -     -  -104     -     -     -     -   155 |
 MATE |     -   -37   -93     -     -     -     -     -     -    91 |
 MDO1 |     -  -192    48     -     -     -     -     -     -   197 |
 MEDI |     -   -40     -     -     -     -     -     -     -    57 |
 METS |     -   -49     -     -     -     -     -     -     -    70 |
 MKEA |     -    23   570     -  -313     -   189     -     -     - |
 NKLG |     -    30     -     -    -6     -     -     -     -   -35 |
 NLIB |     -   -60     -     -     -     -     -     -     -    85 |
 NRC2 |     -    33   -58     -   -23     -     -     -     -     - |
 NTUS |     -   -82     -     -     -     -     -     -     -   117 |
 OHI2 |     -    78     -     -  -113     -     -     -     -     - |
 ONSA |     -   -46     -     -     -     -     -     -     -    66 |
 PENC |     -   150     -     -     -     -     -     -     -  -214 |
 PERT |     -    20     -     -     -     -     -     -     -   -29 |
 PIE1 |     -   -40     -     -     -     -     -     -     -    56 |
 POTS |     -   -49     -     -     -     -     -     -     -    69 |
 REYK |     -  -116     -     -     -     -     -     -     -   166 |
 RIOG |     -    48     -     -  -143     -     -     -     -    72 |
 STJO |     -     5   -10     -    -3     -     -     -     -     - |
 THU1 |     -    59     -     -     -     -     -     -     -   -85 |
 TRO1 |     -  -187     -     -    -4     -     -     -     -   273 |
 URUM |     -     4     -     -    -5     -     -     -     -     - |
 WHIT |     -   -26     -     -    37     -     -     -     -     - |
 WSRT |     -  -114     -     -     -     -     -     -     -   163 |
 WTZR |     -  -121     -     -     -     -     -     -     -   173 |
 YELL |     -     4   -13     -     -     -     -     -     -     - |
 ZWEN |     -  -118     -     -    12     -     -     -     -   156 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5638    52   126     -    76  3493    57  5268     -    58 |  288   2.99
    2 |  5560    41   169     -    58     -    87  4646     -    70 |  288   2.39
    3 |  2901    51   129     -    59  1021    48  2708     -   111 |  288   1.49
    4 |  1420    40    97     -    73   846   124  1344     -    79 |  288   0.77
    5 |  7671   109    86     -    88  3419   160  7506     -    47 |  288   2.77
    6 |  8654    83     X     -    78  6172   107  8630     -   160 |  288   7.42
    7 |  5026    61   122     -    74  6771   190  4633     -    51 |  288   0.31
    8 |  6131    75   204     -    81  2513   132  6182     -    62 |  288   2.82
    9 |  2482   112   186     -   102  2039   101  2687     -    89 |  288   1.52
   10 |  2149    61   156     -   119  2027   179  2250     -    79 |  288   2.07
   11 |  1452    66   181     -   116   644   131  1423     -   197 |  288   0.47
   13 |  1398    71   165     -    73   596    81  1330     -   129 |  288   0.33
   14 |   603    42   125     -    80   415   247   576     -    68 |  288   0.31
   15 |  3294    71   209     -   113     -   303  3391     -   116 |  288   3.15
   17 |  1024     -     X     -    93     -     X  1012     -    91 |  167   1.79
   18 |   980    53   151     -   113  1671   130  1014     -   145 |  288   0.25
   20 |  1373    71   143     -    41   891    62  1308     -    55 |  288   0.28
   21 |  5731    53   161     -    39     -    94  4568     -    42 |  288   4.84
   22 |  5420    46   103     -   119  7323   258  5264     -    99 |  288   1.15
   23 |  8138    57   281     -   136  4500   209  8972     -    80 |  288   6.50
   24 |  3405    73   199     -   131  4426   131  3415     -    88 |  288   2.86
   25 |  1795    47   155     -    70  2522    59  1796     -    83 |  288   1.60
   26 |  1229    80   126     -    38   905    67  1115     -   144 |  288   0.60
   27 |  7197    62    66     -    64  8674   258  7218     -    75 |  288   5.17
   28 |  4258    70     X     -    42  1846     X  3968     -    65 |  288   0.74
   29 |  2876    52   137     -    54   737    64  2712     -    51 |  288   0.61
   30 |  2584    79   159     -    60  2487   143  2681     -   124 |  288   2.11
   31 |  7781    65    90     -   102 11274   100  7690     -    36 |  288   3.56
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    24     -     -     -     -     -     -     -    35 |  288   0.13
 ALGO |     -    34   115     -     -     -     -     -     -     - |  288   0.13
 AMC2 |     -    15     -     -     -     -     -     -     -    21 |  288   0.02
 AOML |     -    30     -     -     -     -    53     -     -    31 |  288  33.05
 AREQ |     -    28     -     -    42     -    49     -     -     - |  288  45.64
 ARTU |     -    36     -     -    79     -    72     -     -     - |  287  33.31
 BILI |     -     -     -     -    30     -    60     -     -     - |  281  15.26
 BOR1 |     -    21     -     -     -     -     -     -     -    29 |  288   0.57
 BRMU |     -    94     -     -   130     -     -     -     -    38 |  288  87.05
 BRUS |     -    77     -     -     -     -     -     -     -   109 |  204    >>>
 CAS1 |     -     -     -     -   177     -     -     -     -   174 |  268   8.80
 DRAO |     -    22   151     -     -     -     -     -     -    61 |  288   0.04
 FORT |     -    53   168     -    64     -     -     -     -    72 |  288   0.15
 GALA |     -    20     -     -    29     -     -     -     -     - |  287  39.87
 GRAZ |     -    41     -     -     -     -     -     -     -    58 |  285  26.72
 GUAM |     -    36     -     -   136     -   195     -     -     - |  288  29.20
 GUAT |     -     -     -     -    38     -     -     -     -    37 |  286    >>>
 HARB |     -    39     -     -    56     -     -     -     -     - |  287   6.79
 HRAO |     -    34     -     -    22     -   110     -     -     - |  288  35.60
 JPLM |     -     -     -     -    47     -    95     -     -     - |  263  27.74
 KERG |     -    59     -     -    57     -     -     -     -    58 |  287   1.88
 LPGS |     -   101     -     -     -     -     -     -     -   144 |  272  47.32
 MAC1 |     -     -     -     -    36     -     -     -     -    35 |  276  13.85
 MADR |     -     -     -     -     -     -   126     -     -    61 |   94 568.84
 MAS1 |     -    16     -     -    29     -     -     -     -    34 |  288   1.68
 MATE |     -    44    82     -     -     -     -     -     -    80 |  288   0.12
 MDO1 |     -    29    99     -     -     -     -     -     -    31 |  288  27.66
 MEDI |     -    22     -     -     -     -     -     -     -    31 |  286   0.88
 METS |     -    28     -     -     -     -     -     -     -    40 |  285  38.78
 MKEA |     -    51   180     -    64     -    55     -     -     - |  288  45.41
 NKLG |     -    44     -     -    25     -     -     -     -    47 |  287    >>>
 NLIB |     -    28     -     -     -     -     -     -     -    40 |  263   0.03
 NRC2 |     -    23    96     -    63     -     -     -     -     - |  288   0.03
 NTUS |     -    38     -     -     -     -     -     -     -    54 |  288   7.53
 OHI2 |     -    33     -     -    47     -     -     -     -     - |  288   9.67
 ONSA |     -    23     -     -     -     -     -     -     -    32 |  288   0.09
 PENC |     -    28     -     -     -     -     -     -     -    39 |  285   4.56
 PERT |     -    51     -     -     -     -     -     -     -    73 |  284  24.19
 PIE1 |     -    22     -     -     -     -     -     -     -    31 |  258   0.04
 POTS |     -    36     -     -     -     -     -     -     -    51 |  288  18.41
 REYK |     -    28     -     -     -     -     -     -     -    40 |  285  13.53
 RIOG |     -    22     -     -    32     -     -     -     -    32 |  288  19.29
 STJO |     -    25    86     -    33     -     -     -     -     - |  288   2.85
 THU1 |     -    77     -     -     -     -     -     -     -   110 |  281  32.75
 TRO1 |     -    42     -     -    23     -     -     -     -    75 |  288  11.79
 URUM |     -    63     -     -    91     -     -     -     -     - |  288  27.90
 WHIT |     -    35     -     -    50     -     -     -     -     - |  288  27.11
 WSRT |     -    25     -     -     -     -     -     -     -    35 |  288   0.03
 WTZR |     -    32     -     -     -     -     -     -     -    45 |  288   0.07
 YELL |     -    70   240     -     -     -     -     -     -     - |  244   0.10
 ZWEN |     -   163     -     -   111     -     -     -     -   142 |  277  19.53
 -----+-------------------------------------------------------------+--------------
 TOT  |  4599    56   151     -    80  4268   135  4510     -    82 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

