
 GPS week: 1155   Day: 4   MJD: 52333                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2676      0    -0.03     0.14     5.18     0.00
 cod |   288     0  24515    273    -0.01     0.12     0.07    24.74
 emr |   288     0  11626      0    12.18     1.36     0.09    17.97
 esa |   288     0  16955    984    -1.57     0.50     0.10    15.15
 gfz |   288     0  15769    288    -0.23     0.36     0.08    22.96
 igu |    96     0   2196      0    -0.07     0.21     3.85     0.00
 ngs |    96     0   2676      0    -0.04     0.14     5.06     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25728    329   594.74    -2.10     0.09    19.18

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |-10043   -16    87   216   -58-17314 -8933     -  -162 |
    2 |  2938    -5  -191   164   275     -  1920     -  -273 |
    3 | -9503   -18   -68   143    69 -6465 -9106     -  -109 |
    4 | -2875   197  -187     4    73 -1982 -2867     -  -170 |
    5 | -1145   141  -155    -3    62 -6727 -1020     -  -108 |
    6 |  -873   169  -166   154   -64     -  -338     -  -106 |
    7 |  4031   228  -147  -146    85  3767  3943     -  -144 |
    8 |   209     0  -112   267   -11 -7613   210     -   -80 |
    9 |  2619    83  -215    -1   259  3721  2109     -  -234 |
   10 |  3432   120  -311   -57   192 12157  2667     -   -49 |
   11 |  1872   -68   335    90  -201  -368  1796     -   -56 |
   13 |  3780   -39   120   153  -110 -1557  3797     -   -51 |
   14 |  4453  -141    53   124    52  1317  4454     -   -28 |
   15 |  4322    66  -130     -   114     -  3785     -   -98 |
   17 |   446    93   -18  -205    86     -   481     -   -79 |
   18 |  5372  -122   -54   133     1  -185  5185     -   101 |
   20 |  2890  -100   129   159   -88  -192  3136     -   -14 |
   21 | -6279   -56   -31    87    27     - -5139     -     X |
   22 | -2758  -103    42   157    69   181 -2107     -  -114 |
   23 | -3071   141   -98   -41   135  7098 -2853     -  -221 |
   24 |  -244   150  -272    85   156 -9023   193     -  -192 |
   25 | -1390   -31   -72   186   151  3945 -1990     -  -216 |
   26 | -1914    74   -46   -84   120    43 -1721     -  -131 |
   27 |  2556    -4   -69   282   110 12109  2027     -  -271 |
   28 |   -73    83    94   -29   -39  1546   538     -  -125 |
   29 | -3814   -77   -73     9    99 -1253 -3572     -    41 |
   30 |  2164   144  -168   109    78 -2482  2235     -  -209 |
   31 |  3048    67   112   -55    48  9543  1265     -  -206 |
 -----+-------------------------------------------------------+
 ALBH |     -  -101     -     -     -     -     -     -   130 |
 ALGO |     -  -109   155     X   -83     -     -     -    95 |
 AMC2 |     -   -80     -     -     -     -     -     -   104 |
 ANKR |     -   -74     -   120     -     -     -     -     - |
 AOML |     -   135     -     -     -     -     -     -  -174 |
 AREQ |     -   -46     -  -123     -     -     -     -   158 |
 ASC1 |     -  -220     -     X     -     -     -     -   284 |
 AUCK |     -   -11     -     X     -     -     -     -    15 |
 BAHR |     -  -106    43    20     -     -     -     -    78 |
 BILI |     -    26     -     -   -28     -     -     -     - |
 BJFS |     -     -     -     -  -251     -     -     -   301 |
 BRMU |     -   224     -  -269    56     -     -     -  -144 |
 BRUS |     -  -126     -     -     -     -     -     -   163 |
 CAS1 |     -  -126     -   109   -51     -     -     -   137 |
 CEDU |     -   517     -  -845     -     -     -     -     - |
 COCO |     -   104     -     -   -91     -     -     -   -25 |
 CRO1 |     -   -65     -     -     -     -     -     -    84 |
 DAV1 |     -    70     -     -   -13     -     -     -   -74 |
 DRAO |     -    19    79     -     -     -     -     -   -99 |
 FAIR |     -     -    82  -139     -     -     -     -    30 |
 GALA |     -    41     -  -109   -52     -     -     -   106 |
 GOLD |     -   -55     -     -     -     -     -     -    71 |
 GRAZ |     -   -84     -     -     -     -     -     -   108 |
 GUAM |     -   212     -  -186   -51     -     -     -   -66 |
 GUAT |     -     -     -     -    55     -     -     -   -66 |
 HOB2 |     -    30   193  -535     -     -     -     -   204 |
 HRAO |     -   -21     -     -   -14     -     -     -    43 |
 IISC |     -  -318     -   750     -     -     -     -  -189 |
 KARR |     -   -81     -     -    88     -     -     -     - |
 KERG |     -   -11     -     -     -     -     -     -    15 |
 KWJ1 |     -     -     -     -   -57     -     -     -    68 |
 LPGS |     -     -     -     -  -234     -     -     -   280 |
 MAC1 |     -    10     -   -93  -127     -     -     -   214 |
 MAS1 |     -   -43   190   -93   -85     -     -     -    45 |
 MATE |     -   -63    20   -53     -     -     -     -   105 |
 MAW1 |     -    67     -     -   -35     -     -     -   -45 |
 MCM4 |     -   302     -     -  -433     -     -     -   132 |
 MDO1 |     -     -    85  -311     -     -     -     -   107 |
 MEDI |     -  -198     -     -     -     -     -     -   256 |
 METS |     -  -157     -     -     -     -     -     -   202 |
 MKEA |     -   131    92   -59   -76     -     -     -  -100 |
 MSKU |     -   -78     -     -    84     -     -     -     - |
 NLIB |     -     -     -  -490     -     -     -     -   388 |
 NPLD |     -   -43     -     -     -     -     -     -    55 |
 NRC2 |     -   -44   182  -215     -     -     -     -    56 |
 NTUS |     -   -75     -     -     -     -     -     -    97 |
 NYA1 |     -    16     -     -  -146     -     -     -   161 |
 NYAL |     -     -     -    72     -     -     -     -   -57 |
 ONSA |     -  -157     -   202     X     -     -     -    43 |
 PENC |     -    15     -     -     -     -     -     -   -20 |
 POTS |     -   -66     -    -9     -     -     -     -    93 |
 REYK |     -   -45     -     -     -     -     -     -    58 |
 RIOG |     -    16     -   156  -163     -     -     -    52 |
 SANT |     -    48     -     X   -96     -     -     -    54 |
 SFER |     -  -268     -     -     -     -     -     -   345 |
 STJO |     -   -10   199     -  -193     -     -     -    59 |
 SUTH |     -   -54     -    45     -     -     -     -    33 |
 THTI |     -     -     -   136     -     -     -     -  -108 |
 TRO1 |     -   255     -     -   123     -     -     -  -548 |
 TROM |     -     -     -    -8     -     -     -     -     7 |
 URUM |     -   -41     -     -     -     -     -     -    53 |
 USNO |     -    25   162     -     -     -     -     -  -184 |
 USUD |     -    20     -    69     -     -     -     -   -80 |
 VILL |     -   -52     -   107     -     -     -     -   -18 |
 WHIT |     -   -33     -     -    35     -     -     -     - |
 WSRT |     -   -66     -     -     -     -     -     -    86 |
 WTZR |     -  -163     -   141     -     -     -     -   100 |
 YAR2 |     -     -     -  -325     -     -     -     -   257 |
 YELL |     -     X   168  -189     -     -     -     -    25 |
 ZWEN |     -  -101     -     -    11     -     -     -   118 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4992    70   113   111    89  7136  4772     -    28 |  288   3.10
    2 |  8011   146    96   159   136     -  7517     -    76 |  288   4.19
    3 |  5704    57    93    58   133  5631  5729     -   160 |  288   1.83
    4 |   822    57    87    61    28   757   873     -    66 |  288   0.64
    5 |  5519    58    91    99    93  4186  5498     -    54 |  288   3.00
    6 | 10056    84    91    83    52     -  9894     -   104 |  288   6.70
    7 |  1179    60    88    69    62  1921  1365     -   101 |  288   2.57
    8 |  2853    82   147   332    93  4065  2975     -    71 |  280   2.67
    9 |  3216   110   183   213   130  3398  3289     -   167 |  281   1.85
   10 |  5944    45    34    86    75  7311  5618     -    75 |  288   2.32
   11 |   701    54   111   103    26   922   715     -   160 |  288   0.42
   13 |   993    79    88   155    56  1025  1036     -    77 |  288   0.42
   14 |   751    74   126   108   132  1753   825     -   212 |  288   0.22
   15 |  4908    67    52     -    77     -  4795     -   116 |  288   3.30
   17 |  1757    81    93   201    97     -  1684     -    89 |  288   3.28
   18 |  1517    59   108   104    45  1318  1689     -    92 |  288   0.37
   20 |  1113   105   106   201    61  1019  1285     -    81 |  288   0.26
   21 |  7583    67    31   164    52     -  7287     -     X |  288   4.31
   22 |  5251    78    81   115    57  2370  5106     -    65 |  288   0.84
   23 |  8126    62    57    51    67  7023  8394     -    88 |  288   6.57
   24 |  4340    41    51   111    90  5039  4249     -    54 |  288   2.90
   25 |  6223   119    68    84   134  2149  6204     -    72 |  283   2.24
   26 |  1762    57    92    67    93  1147  1702     -   138 |  288   0.50
   27 |  5713    45   108   210   149  5244  5145     -    71 |  278   3.89
   28 |  1397    69    53    46    55  1151  1566     -   121 |  288   0.58
   29 |  2067   107    86   103    50   825  1974     -   211 |  288   0.86
   30 |  2530    69   107    41    53   790  2565     -    68 |  288   1.36
   31 | 12661   127   137   151    86  5925 12198     -   187 |  288   5.73
 -----+-------------------------------------------------------+--------------
 ALBH |     -    31     -     -     -     -     -     -    40 |  286   0.22
 ALGO |     -    55    68     X    12     -     -     -    31 |  288   0.05
 AMC2 |     -    23     -     -     -     -     -     -    30 |  286   0.04
 ANKR |     -    17     -    27     -     -     -     -     - |  288  11.88
 AOML |     -    68     -     -     -     -     -     -    88 |  286  36.31
 AREQ |     -    44     -    50     -     -     -     -    72 |  288  33.46
 ASC1 |     -   154     -     X     -     -     -     -   198 |  114    >>>
 AUCK |     -    57     -     X     -     -     -     -    74 |  264  17.23
 BAHR |     -    57    24    59     -     -     -     -    49 |  288   0.42
 BILI |     -    30     -     -    33     -     -     -     - |  287  21.12
 BJFS |     -     -     -     -    47     -     -     -    56 |  286    >>>
 BRMU |     -    27     -    40    21     -     -     -    53 |  288  42.19
 BRUS |     -    27     -     -     -     -     -     -    34 |  286   0.19
 CAS1 |     -    60     -    28    39     -     -     -    46 |  288   8.70
 CEDU |     -    25     -    41     -     -     -     -     - |  264  16.68
 COCO |     -    61     -     -    50     -     -     -    48 |  288  10.06
 CRO1 |     -    27     -     -     -     -     -     -    35 |  285   0.09
 DAV1 |     -    92     -     -    40     -     -     -   114 |  288  16.82
 DRAO |     -    32    62     -     -     -     -     -    43 |  288   0.06
 FAIR |     -     -   103   110     -     -     -     -   100 |  273   0.18
 GALA |     -    34     -    46    31     -     -     -    47 |  288  44.03
 GOLD |     -    51     -     -     -     -     -     -    65 |  286  38.60
 GRAZ |     -    14     -     -     -     -     -     -    19 |  286  34.16
 GUAM |     -   107     -    43    34     -     -     -    93 |  288  26.78
 GUAT |     -     -     -     -    31     -     -     -    37 |  282    >>>
 HOB2 |     -    46    82    44     -     -     -     -    83 |  288   0.06
 HRAO |     -    32     -     -    37     -     -     -    38 |  288  35.92
 IISC |     -    68     -    38     -     -     -     -    79 |  270  46.87
 KARR |     -    55     -     -    60     -     -     -     - |  288  15.31
 KERG |     -    82     -     -     -     -     -     -   106 |  286   1.30
 KWJ1 |     -     -     -     -   123     -     -     -   147 |  252    >>>
 LPGS |     -     -     -     -   157     -     -     -   187 |  113    >>>
 MAC1 |     -    45     -    38    78     -     -     -   137 |  288  17.63
 MAS1 |     -    44    52    40    17     -     -     -    26 |  288   3.11
 MATE |     -    34    42    35     -     -     -     -    16 |  288   0.20
 MAW1 |     -   131     -     -   106     -     -     -    79 |  264  24.82
 MCM4 |     -    64     -     -    86     -     -     -   149 |  288  36.40
 MDO1 |     -     -    54    55     -     -     -     -    32 |  286  33.45
 MEDI |     -    24     -     -     -     -     -     -    31 |  286   0.05
 METS |     -    24     -     -     -     -     -     -    31 |  285  59.55
 MKEA |     -    98    90    70    52     -     -     -    43 |  287  51.97
 MSKU |     -    62     -     -    66     -     -     -     - |  248  27.30
 NLIB |     -     -     -    44     -     -     -     -    35 |  251   0.03
 NPLD |     -    12     -     -     -     -     -     -    15 |  285   0.04
 NRC2 |     -    41    41    44     -     -     -     -    38 |  288   0.04
 NTUS |     -    56     -     -     -     -     -     -    73 |  288   6.14
 NYA1 |     -    50     -     -    56     -     -     -    91 |  288   0.08
 NYAL |     -     -     -    58     -     -     -     -    46 |  276   0.08
 ONSA |     -    17     -    14     X     -     -     -    21 |  288   0.19
 PENC |     -   241     -     -     -     -     -     -   311 |  285   7.45
 POTS |     -    30     -    20     -     -     -     -    32 |  288  14.10
 REYK |     -    28     -     -     -     -     -     -    36 |  270   9.31
 RIOG |     -    84     -    76    66     -     -     -    51 |  288  20.52
 SANT |     -    35     -     X    44     -     -     -    50 |  288  36.51
 SFER |     -    23     -     -     -     -     -     -    29 |  285   1.00
 STJO |     -    33    36     -    20     -     -     -    38 |  288   2.05
 SUTH |     -    45     -    53     -     -     -     -    35 |  288  38.67
 THTI |     -     -     -    54     -     -     -     -    43 |  287   1.95
 TRO1 |     -    37     -     -    22     -     -     -    59 |  288  11.73
 TROM |     -     -     -    78     -     -     -     -    62 |  266  12.74
 URUM |     -    53     -     -     -     -     -     -    68 |  288  33.62
 USNO |     -    41    33     -     -     -     -     -    38 |  288   0.03
 USUD |     -    63     -    28     -     -     -     -    82 |  288   0.41
 VILL |     -    25     -    31     -     -     -     -    18 |  288  30.19
 WHIT |     -    41     -     -    44     -     -     -     - |  287   6.52
 WSRT |     -    18     -     -     -     -     -     -    24 |  288   0.03
 WTZR |     -    27     -    24     -     -     -     -    29 |  288   0.05
 YAR2 |     -     -     -    52     -     -     -     -    41 |  288   4.98
 YELL |     -     X   127   228     -     -     -     -    94 |  258   0.94
 ZWEN |     -   117     -     -    94     -     -     -    99 |  280  18.83
 -----+-------------------------------------------------------+--------------
 TOT  |  5183    69    89   104    75  3853  5061     -    90 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

