
 GPS week: 1153   Day: 6   MJD: 52321                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2668      0     0.01     0.08     5.10     0.00
 cod |   288     0  22841     40    -0.04     0.18     0.08    18.89
 emr |   288     0  10842    288   237.10    16.04     0.09    16.23
 esa |   288     0  17019    704    -0.10    -0.17     0.10    14.26
 gfz |   288     0  14483      0     0.13    -0.15     0.07    22.87
 igu |    96     0   2293     99   732.71    80.96     3.60     0.00
 jpl |   278     0  11234    663     3.17    -0.36     0.06    27.75
 ngs |    96     0   2668      0     0.01     0.07     4.93     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 | -9269  -129    65   160   -42-10322     4 -8478     - |
    2 |  6532   -24  -185   269   -54 11991    81  4841     - |
    3 | -2389   -79  -147   333   -68   832    45 -2248     - |
    4 | -5425    49  -140   -88    80 -2203    46 -4365     - |
    5 |  8971    53  -214    95   -10 16355   118  7149     - |
    6 |  6474    42  -264   226   128  1642  -228  6059     - |
    7 |  1137   109  -331  -132    84  -202   220  1081     - |
    8 |-15417  -107    11   107   -24  -408    88-12853     - |
    9 | -5601   -30  -144   105    65 -9715    -2 -4922     - |
   10 |  4613   -39   -70   150   -31  5794    29  4504     - |
   11 |  7758  -127   120    47   -87  3428   113  7209     - |
   13 |  6293  -155   221   133   -53  2486  -117  6482     - |
   14 |  6090   -48   -16    47    74  2002  -104  5843     - |
   15 |  1305   206  -117     -   -76     -   -18   643     - |
   17 |  2796   130    -2    -2   -48     -   -90  2774     - |
   18 |  5626    53     X    -2   -43  1060     X  5584     - |
   20 |  7486  -244   178   -28    28  1331   128  7286     - |
   21 | -2923    52   -67   108   -36     -   -54 -2144     - |
   22 |  3252  -196   -69   113    98 -2130    83  2645     - |
   23 | -4711   114   -74  -186    45   872    60 -4885     - |
   24 | -1391    70  -248    -9    10     -   171 -2617     - |
   25 | -6584  -131  -123    54   211  -849   -85 -5966     - |
   26 |  2397    62  -171   185    32 -2380  -119  2144     - |
   27 | -7787  -161    44   113   -60-11206   148 -7177     - |
   28 | -4068    35    95    -1  -187 -2990   139 -3982     - |
   29 | -1052     9   -87    16   109  -778  -102 -1294     - |
   30 |   848   -13  -179   121   130 -2889  -136   722     - |
   31 | -5821   -47  -110    58     3  2867   152 -4811     - |
 -----+-------------------------------------------------------+
 ALBH |     -  -254     -     -     -     -   173     -     - |
 ALGO |     -   -61   239     X  -109     -    -8     -     - |
 ANKR |     -   -38     -    51     -     -     -     -     - |
 AREQ |     -    12     -   -13     -     -    -2     -     - |
 ARTU |     -    52     -     -  -101     -    49     -     - |
 ASC1 |     -   307     -  -406     -     -     -     -     - |
 AUCK |     -    71     -     X   -70     -    10     -     - |
 BAHR |     -     -   -75    85     -     -     -     -     - |
 BILI |     -   -80     -     -    66     -     -     -     - |
 BRMU |     -    21     -  -311   176     -     -     -     - |
 BRUS |     -    10     -     -     -     -    -7     -     - |
 CAS1 |     -  -162     -   148   -23     -    55     -     - |
 CEDU |     -   503     -  -666     -     -     -     -     - |
 COCO |     -  -144     -  -116   122     -    60     -     - |
 CRO1 |     -   -49     -     -    52     -   -10     -     - |
 DARW |     -    39     -     -     -     -   -27     -     - |
 DAV1 |     -   -12     -     -    10     -     -     -     - |
 DRAO |     -   -88   103     -     -     -     -     -     - |
 FAIR |     -     -    43   -49     -     -     X     -     - |
 GALA |     -   -90     -     -   -51     -   103     -     - |
 GODE |     -    34     -   -44     -     -     -     -     - |
 GUAM |     -   118     -    98   -55     -   -89     -     - |
 HARB |     -    -4     -     -     4     -     -     -     - |
 HOB2 |     -   169     -  -224     -     -     -     -     - |
 HRAO |     -   178     -     -     -     -  -121     -     - |
 IISC |     -   -12     -    16     -     -     -     -     - |
 KARR |     -   -30     -     -    25     -     -     -     - |
 KERG |     -   774     -     -     -     -  -527     -     - |
 KIRU |     -   -16     -   -32     -     -    28     -     - |
 KOSG |     -     9     -   -12     -     -     -     -     - |
 KWJ1 |     -   117     -     -   -97     -     -     -     - |
 LPGS |     -     -     -     -   -73     -    60     -     - |
 MATE |     -   -70     -    93     -     -     X     -     - |
 MAW1 |     -    53     -     -     -     -   -36     -     - |
 MDO1 |     -   -25   131  -117     -     -     -     -     - |
 MKEA |     -   -34   255   106  -125     -   -80     -     - |
 MSKU |     -  -102     -     -    84     -     -     -     - |
 NRC2 |     -   -21   299  -331     -     -    10     -     - |
 ONSA |     -   -11     -    22    -5     -     -     -     - |
 PERT |     -    -9     -    12     -     -     -     -     - |
 PETP |     -    40     -     -   -33     -     -     -     - |
 PIE1 |     -   -37     -    48     -     -     -     -     - |
 POTS |     -    15     -     -   -12     -     -     -     - |
 SANT |     -   -10     -     -     8     -     -     -     - |
 SELE |     -    81     -  -108     -     -     -     -     - |
 SFER |     -    -5     -     7     -     -     -     -     - |
 STJO |     -  -164   317     -   -90     -     -     -     - |
 THTI |     -     -     -   153     -     -   -79     -     - |
 TIXI |     -    63     -     -     -     -   -43     -     - |
 USNO |     -     2   366  -703     -     -   152     -     - |
 VILL |     -   -13     -    18     -     -     -     -     - |
 WHIT |     -    36     -     -   -30     -     -     -     - |
 WSRT |     -   -51     -    68     -     -     -     -     - |
 WTZR |     -   -34     -   117     -     -   -39     -     - |
 YAR2 |     -  -229     -   -28     -     -   181     -     - |
 YELL |     -    95   319  -225     -     -  -141     -     - |
 YSSK |     -    21     -     -     -     -   -15     -     - |
 ZWEN |     -   -51     -   131   -40     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7028   123   103    72    39  4262    80  6460     - |  288   4.68
    2 |  8884    90    74   196    49  2892    55  8358     - |  288   2.99
    3 |  3383   122    84   115    83  3036    59  3482     - |  288   1.73
    4 |  5476   149   105    57    45  1321    40  4632     - |  280   0.95
    5 |  6355    83    67   131    47  6808    50  6529     - |  288   3.75
    6 |  7000    72    54    67    52  3436    50  6702     - |  288   5.81
    7 |  2239    67    58   191    56  2299    44  2150     - |  288   1.92
    8 |  9124   158    72   136    57  3137    73  8079     - |  282   3.27
    9 |  4387   239    65    68   185  4247    65  3937     - |  283   2.86
   10 |  2827    51    63    75    45 27043    80  2877     - |  288   1.97
   11 |  1893    62    60   101    53  1926    28  1688     - |  288   0.42
   13 |  2046    93    58   109    40  1646    39  1733     - |  288   0.43
   14 |   993    73   135   203    64  1705    68   674     - |  288   0.27
   15 |  6084    84   130     -   121     -    62  6041     - |  277   2.89
   17 |  1887   130   124   185    94     -   105  1791     - |  281   2.60
   18 |   971    38     X    76    50  1252     X   692     - |  288   0.33
   20 |  1520    81   150    77    55  1014    93  1517     - |  288   0.25
   21 |  8124    67   112    58    95     -    59  7399     - |  288   3.04
   22 |  5439    70    98    90    72  4693    56  6070     - |  288   2.57
   23 |  5169   106    88   135    83  2529    56  5281     - |  288   5.06
   24 |  5376   153   111   164    41     -    64  4637     - |  281   2.35
   25 |  2836   164   150   223   136  3146    75  3317     - |  280   1.55
   26 |   790    74    36    79    40   727    44   870     - |  288   0.66
   27 |  9822   104   115   101    74 10515   167 10133     - |  281   5.37
   28 |  2326    78    98    88    85   761    62  2381     - |  288   0.46
   29 |  1700    58    82   160    67   751    39  1314     - |  288   0.79
   30 |  1901   119   120    88    53  1110    40  1866     - |  288   1.42
   31 |  6629    61    56    79    45  3125    40  7006     - |  288   4.21
 -----+-------------------------------------------------------+--------------
 ALBH |     -    26     -     -     -     -    17     -     - |  277   0.30
 ALGO |     -    70    38     X    21     -    39     -     - |  288   0.03
 ANKR |     -    17     -    22     -     -     -     -     - |  287  12.78
 AREQ |     -    51     -   108     -     -    69     -     - |  288  34.83
 ARTU |     -    41     -     -    37     -    43     -     - |  287  43.25
 ASC1 |     -   122     -   162     -     -     -     -     - |   92    >>>
 AUCK |     -   113     -     X    58     -    63     -     - |  264  19.16
 BAHR |     -     -    22    25     -     -     -     -     - |  288   0.31
 BILI |     -    20     -     -    17     -     -     -     - |  286  22.40
 BRMU |     -    47     -    49    24     -     -     -     - |  288  33.28
 BRUS |     -    72     -     -     -     -    49     -     - |  255   0.10
 CAS1 |     -    76     -    54    37     -    46     -     - |  288   9.01
 CEDU |     -    37     -    49     -     -     -     -     - |  288  16.02
 COCO |     -    83     -    57    76     -    55     -     - |  286  11.38
 CRO1 |     -    31     -     -    36     -    40     -     - |  288   0.12
 DARW |     -    89     -     -     -     -    60     -     - |  271  24.43
 DAV1 |     -    74     -     -    61     -     -     -     - |  228  20.76
 DRAO |     -    36    42     -     -     -     -     -     - |  288   0.10
 FAIR |     -     -   100   114     -     -     X     -     - |  282   0.08
 GALA |     -    77     -     -   127     -    91     -     - |  280  49.60
 GODE |     -    67     -    89     -     -     -     -     - |  287  19.46
 GUAM |     -    87     -    79    47     -    43     -     - |  288  34.36
 HARB |     -    39     -     -    32     -     -     -     - |  287   7.70
 HOB2 |     -    51     -    68     -     -     -     -     - |  288   0.10
 HRAO |     -    34     -     -     -     -    23     -     - |  274  32.77
 IISC |     -   155     -   205     -     -     -     -     - |  259  54.13
 KARR |     -    60     -     -    50     -     -     -     - |  288  20.21
 KERG |     -   108     -     -     -     -    74     -     - |  247   1.34
 KIRU |     -    47     -    45     -     -    51     -     - |  288   3.50
 KOSG |     -    25     -    33     -     -     -     -     - |  288  89.48
 KWJ1 |     -   190     -     -   157     -     -     -     - |  192 157.79
 LPGS |     -     -     -     -   191     -   157     -     - |  122 105.55
 MATE |     -    26     -    34     -     -     X     -     - |  288   0.09
 MAW1 |     -    81     -     -     -     -    55     -     - |  270  23.00
 MDO1 |     -    48    55    31     -     -     -     -     - |  288  13.65
 MKEA |     -    26   125    45    84     -    25     -     - |  288  51.12
 MSKU |     -    70     -     -    58     -     -     -     - |  279  31.02
 NRC2 |     -    64    26    44     -     -    52     -     - |  288   0.06
 ONSA |     -    25     -    25    18     -     -     -     - |  288   0.10
 PERT |     -    46     -    61     -     -     -     -     - |  288  18.22
 PETP |     -    38     -     -    31     -     -     -     - |  286  22.56
 PIE1 |     -    17     -    23     -     -     -     -     - |  269   0.09
 POTS |     -    24     -     -    20     -     -     -     - |  287  14.21
 SANT |     -    57     -     -    47     -     -     -     - |  274  29.40
 SELE |     -    90     -   119     -     -     -     -     - |  228  32.90
 SFER |     -    40     -    54     -     -     -     -     - |  287  28.63
 STJO |     -    21    24     -    12     -     -     -     - |  288   1.72
 THTI |     -     -     -    44     -     -    23     -     - |  272   3.57
 TIXI |     -    62     -     -     -     -    42     -     - |  277  13.90
 USNO |     -    59    31    35     -     -    45     -     - |  288   0.05
 VILL |     -    19     -    25     -     -     -     -     - |  288  24.54
 WHIT |     -    31     -     -    25     -     -     -     - |  288  53.88
 WSRT |     -    27     -    36     -     -     -     -     - |  288   0.05
 WTZR |     -    46     -    44     -     -    48     -     - |  288   0.06
 YAR2 |     -    52     -    44     -     -    41     -     - |  288   4.41
 YELL |     -    71    37    35     -     -    44     -     - |  288   0.08
 YSSK |     -    40     -     -     -     -    27     -     - |  277  20.25
 ZWEN |     -    40     -    35    16     -     -     -     - |  288  16.55
 -----+-------------------------------------------------------+--------------
 TOT  |  5104    81    88    97    70  3604    59  4932     - |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

