
 GPS week: 1149   Day: 3   MJD: 52290                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2630      0     0.06    -0.15     4.68     0.00
 cod |   288     0  22444      5    -0.24     1.87     0.06    30.82
 emr |   288     0  11518    136  1963.11    13.84     0.09    17.72
 esa |   288     1  15771    600   -61.18  -205.63     0.37     0.00
 gfz |   288     0  14418    234    -0.56     0.84     0.08    23.60
 igu |    96     0   2158      0    55.09  -181.06     4.50     0.00
 ngs |    96     0   2569      0  -249.82   818.66     4.45     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   238     0  20211   1001   689.99    -0.65     0.06    27.86

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -5036   110    12  1025   -67 -9831 -4068     -   -87 |
    2 |  9613   129   -96  -521   153 10517  7919     -  -256 |
    3 |  2929    56  -255  1434   153  -477  2709     -   -37 |
    4 | -4719     0   -39   -73   100 -2099 -4856     -   -74 |
    5 | -4521    61    38   317   -26 -7718 -4256     -   -84 |
    6 |  1457    45   -55  -471   116  1382  1389     -  -137 |
    7 | -2450   -11    59   180    89-14236 -2861     -  -122 |
    8 | -9245     -   203  -788   -92 -1205     -     -   -51 |
    9 | -3381   -30   -92  -225   108  4022 -3651     -     X |
   10 |  -985   105   107   141  -124  3795 -1532     -   -95 |
   11 |  7212    -6    23   248   -61   185  6943     -    50 |
   13 |  4417    44   122  -498  -109 -1347  4129     -   -45 |
   14 |  2293    87    -4  -727  -125   330  2129     -     9 |
   15 | -6973    16   102     -    73     - -7624     -  -210 |
   17 | -5343    14    55  -256    55     - -4110     -  -118 |
   18 |  3384   -20   117   152   -41   397  3116     -   -21 |
   20 |  5922    67    30  -730  -209   738  5532     -   102 |
   21 |  4325    81   -76  -312    56     -  3214     -  -119 |
   22 | -3208    79  -338  1333   151 -5943 -3062     -     X |
   23 | -2847   100   -44  1210    10     - -2404     -  -111 |
   24 |   106    -2   -45   300    19  6562  -894     -    18 |
   25 | -3171   141  -149  1394    53  4848 -3018     -  -128 |
   26 | -2415    89   -35   866    36     - -2509     -  -131 |
   27 |  5661    75    68  -123    42 19851  5037     -  -196 |
   28 |  6610    45    28   160    53  4499  6261     -  -137 |
   29 | -2074   155  -255  -730    95 -2959 -2005     -  -108 |
   30 |   911    35  -210  1494   110-13714   383     -     X |
   31 | -2656    55  -189  1255   166  1710 -2778     -   -98 |
 -----+-------------------------------------------------------+
 ALBH |     -  -118     -     -     -     -     -     -   131 |
 ALGO |     -    12    75  -193  -143     -     -     -    73 |
 AMC2 |     -   -84     -     -     -     -     -     -    93 |
 AOML |     -  -129     -     -     -     -     -     -   142 |
 BAHR |     -    40    69   385   -70     -     -     -   -36 |
 BILI |     -    73     -     -   -95     -     -     -     - |
 BRMU |     -   -41     -  -159    54     -     -     -     X |
 BRUS |     -    -8     -     -     -     -     -     -     9 |
 CAS1 |     -   -74     -   301   -82     -     -     -   183 |
 CHAT |     -  -113     - -3840     -     -     -     -   125 |
 COCO |     -   -51     -  -133   119     -     -     -   -54 |
 CRO1 |     -   -82     -     -     -     -     -     -    91 |
 DAV1 |     -    66     -     -   -56     -     -     -   -31 |
 DRAO |     -    61     -     -     -     -     -     -   -67 |
 FAIR |     -     -    32   211     -     -     -     -   -21 |
 FORT |     -   -68     - -5115     -     -     -     -    76 |
 GALA |     -    24     -     X   -49     -     -     -    18 |
 GOLD |     -   -48     -     -     -     -     -     -    54 |
 GUAM |     -    46     -   396  -134     -     -     -    76 |
 HOB2 |     -    68   146   132   -89     -     -     -  -112 |
 HRAO |     -    -2     -     -     -     -     -     -     3 |
 KERG |     -   130     -     -     -     -     -     -  -144 |
 KWJ1 |     -     -     -     -    48     -     -     -   -40 |
 MAC1 |     -   -75     -    77    25     -     -     -    75 |
 MAS1 |     -  -103   125   257   -29     -     -     -    72 |
 MATE |     -  -115    53   247     -     -     -     -   113 |
 MAW1 |     -    74     -     -     -     -     -     -   -82 |
 MCM4 |     -    89     -  1480    56     -     -     -  -176 |
 MDO1 |     -  -180     -   674     -     -     -     -   199 |
 MEDI |     -   -25     -     -     -     -     -     -    27 |
 METS |     -  -118     -     -     -     -     -     -   130 |
 MKEA |     -     -     -   222   -63     -     -     -    53 |
 MSKU |     -    -4     -     -     5     -     -     -     - |
 NLIB |     -   -56     -   185     -     -     -     -    62 |
 NPLD |     -   -88     -     -     -     -     -     -    97 |
 NRC2 |     -   -43    60    81     -     -     -     -    10 |
 NTUS |     -  -121     -     -     -     -     -     -   134 |
 NYA1 |     -     7     -     -  -133     -     -     -   126 |
 NYAL |     -     -    79   533     -     -     -     -   -50 |
 ONSA |     -   -92   105   198     -     -     -     -    43 |
 PENC |     -   314     -     -     -     -     -     -  -348 |
 PERT |     -    45     -   258     -     -     -     -   -49 |
 PIE1 |     -  -153     -     X     -     -     -     -   169 |
 POTS |     -   -58     -     -     -     -     -     -    64 |
 REYK |     -   -33     -     -     -     -     -     -    36 |
 RIOG |     -     -     -     -   -22     -     -     -    18 |
 SANT |     -  -121     -     -     X     -     -     -   134 |
 SFER |     -  -225     -     -     -     -     -     -   249 |
 STJO |     -   -75   168     -  -173     -     -     -   148 |
 SUTH |     -  -162     -   770     -     -     -     -   180 |
 TLSE |     -    80     -     -     -     -     -     -   -88 |
 TRO1 |     -    -6     -     -     8     -     -     -     - |
 TSKB |     -    83    49  -290     -     -     -     -  -132 |
 USNO |     -   -48    27     -     -     -     -     -    42 |
 USUD |     -  -111     -   379     -     -     -     -   123 |
 VILL |     -   -31     -   375     -     -     -     -    34 |
 WES2 |     -    -5     -   167     -     -     -     -     6 |
 WHIT |     -    68     -     -   -89     -     -     -     - |
 WSRT |     -   -32     -   366     -     -     -     -    36 |
 WTZR |     -   -63     -   378     -     -     -     -    70 |
 WUHN |     -   -84     - -7199    19     -     -     -    93 |
 YELL |     -   -10    45    73     -     -     -     -   -21 |
 ZWEN |     -  -113     -     -    82     -     -     -    68 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8299    70   103   294    80  4948  6507     -    77 |  276   4.66
    2 |  5402    55    59   110    73  5468  5770     -    47 |  288   3.43
    3 |  2096    58   107   124   139  1198  2160     -   150 |  288   1.60
    4 |  1769    75    67   288    96   785  1939     -    89 |  278   0.81
    5 |  4967    75    80    91    31  3220  4958     -    66 |  288   2.04
    6 |  8062    44    61   121    64  2517  7946     -    28 |  288   8.10
    7 |  9729    40   146   168    49  8612  8877     -    85 |  288   0.51
    8 |  4422     -    69  1271   146  2026     -     -   110 |  183   3.25
    9 |  4175    49    57   222    67  2782  4221     -     X |  288   2.29
   10 |  3477    55   129   176    59  2370  3336     -    66 |  288   2.53
   11 |  1445    71    66   105    37   410  1616     -    51 |  288   0.47
   13 |  1239    63    51   239    89   789  1480     -    37 |  288   0.20
   14 |   825    88   140   210    38  1480  1017     -    87 |  288   0.23
   15 |  3139   148   169     -   223     -  3240     -   124 |  278   2.90
   17 |  6828    93    83   375    51     -  5991     -    95 |  288   3.22
   18 |   935    75   127   162    71  1093  1044     -    35 |  288   0.38
   20 |   885    68   107   230    54   621  1191     -    47 |  288   0.18
   21 |  6562   105   227  1070    58     -  6099     -   159 |  288   3.79
   22 |  1695    36    80    91    59  3637  1919     -     X |  288   0.53
   23 |  6572    77   126   191    63     -  6545     -    21 |  288   6.31
   24 |  5048    81    76   140    61  3013  5048     -    46 |  276   1.43
   25 |  2250    87    64   243    58  3678  2316     -    49 |  288   1.29
   26 |   741    78    81  1124    64     -   841     -    33 |  277   0.80
   27 |  7605    60    59   151    84 11592  7303     -    96 |  288   4.44
   28 |  3146    46   144   133    90  3208  3021     -    27 |  288   0.48
   29 |  2896    88   119   188    49   551  2776     -    82 |  277   0.55
   30 |  1715    45    46   168    42  7198  1772     -     X |  288   1.04
   31 |  4060    60   103   113   127  7745  4114     -    71 |  288   3.64
 -----+-------------------------------------------------------+--------------
 ALBH |     -    26     -     -     -     -     -     -    29 |  237   0.04
 ALGO |     -    25    29   121    44     -     -     -    45 |  288   0.02
 AMC2 |     -    18     -     -     -     -     -     -    20 |  238   0.02
 AOML |     -    25     -     -     -     -     -     -    28 |  238  50.87
 BAHR |     -    68    53   150    96     -     -     -    71 |  288   0.41
 BILI |     -    27     -     -    35     -     -     -     - |  287  17.11
 BRMU |     -    28     -   228    36     -     -     -     X |  288  33.27
 BRUS |     -    16     -     -     -     -     -     -    18 |  238   0.04
 CAS1 |     -    46     -   141    54     -     -     -    30 |  288  10.01
 CHAT |     -    22     -   741     -     -     -     -    24 |  218  14.35
 COCO |     -    46     -   132    52     -     -     -    36 |  288  12.79
 CRO1 |     -    36     -     -     -     -     -     -    40 |  238   0.11
 DAV1 |     -    32     -     -    16     -     -     -    46 |  287  22.82
 DRAO |     -    17     -     -     -     -     -     -    19 |  238   0.04
 FAIR |     -     -   152   323     -     -     -     -    97 |  236  70.40
 FORT |     -    23     -   521     -     -     -     -    25 |  139   0.07
 GALA |     -    24     -     X    36     -     -     -    28 |  269  40.11
 GOLD |     -    32     -     -     -     -     -     -    35 |  238  27.29
 GUAM |     -    47     -   196    57     -     -     -    53 |  288  34.23
 HOB2 |     -    34    58   117    25     -     -     -    34 |  288   0.06
 HRAO |     -    26     -     -     -     -     -     -    29 |  233  30.45
 KERG |     -    28     -     -     -     -     -     -    31 |  237   0.97
 KWJ1 |     -     -     -     -   180     -     -     -   153 |  177 126.81
 MAC1 |     -    66     -   166    73     -     -     -    23 |  288  18.00
 MAS1 |     -    25    28   127    20     -     -     -    38 |  288   2.08
 MATE |     -    61    64   109     -     -     -     -   107 |  288   0.15
 MAW1 |     -    53     -     -     -     -     -     -    58 |  232  23.06
 MCM4 |     -    36     -   114    38     -     -     -    26 |  288  14.13
 MDO1 |     -    30     -   304     -     -     -     -    33 |  225 235.70
 MEDI |     -    25     -     -     -     -     -     -    27 |  238   0.35
 METS |     -    28     -     -     -     -     -     -    31 |  237   0.49
 MKEA |     -     -     -   148    47     -     -     -    40 |  238  29.39
 MSKU |     -    65     -     -    85     -     -     -     - |  265  37.61
 NLIB |     -    98     -   810     -     -     -     -   108 |  238   0.08
 NPLD |     -    18     -     -     -     -     -     -    20 |  237   0.04
 NRC2 |     -    29    35   119     -     -     -     -    30 |  288   0.03
 NTUS |     -    25     -     -     -     -     -     -    28 |  236   5.87
 NYA1 |     -    27     -     -    40     -     -     -    21 |  288   0.13
 NYAL |     -     -    13   158     -     -     -     -     8 |  238   0.11
 ONSA |     -    23    40   104     -     -     -     -    15 |  288   0.16
 PENC |     -    35     -     -     -     -     -     -    39 |  237   8.18
 PERT |     -    28     -   202     -     -     -     -    31 |  238  25.71
 PIE1 |     -    19     -     X     -     -     -     -    21 |  211   0.50
 POTS |     -    57     -     -     -     -     -     -    63 |  216  16.08
 REYK |     -    32     -     -     -     -     -     -    36 |  238   9.88
 RIOG |     -     -     -     -   181     -     -     -   154 |  220    >>>
 SANT |     -   136     -     -     X     -     -     -   151 |  237  23.43
 SFER |     -   146     -     -     -     -     -     -   162 |  236  55.50
 STJO |     -    43    55     -    38     -     -     -    34 |  288   2.57
 SUTH |     -    31     -   762     -     -     -     -    34 |  193  21.56
 TLSE |     -    25     -     -     -     -     -     -    27 |  227   0.32
 TRO1 |     -    28     -     -    37     -     -     -     - |  288  10.27
 TSKB |     -    55   129   193     -     -     -     -    53 |  288   1.12
 USNO |     -    36    46     -     -     -     -     -    32 |  286   0.05
 USUD |     -    82     -   161     -     -     -     -    91 |  238   0.42
 VILL |     -    18     -   153     -     -     -     -    20 |  238  27.46
 WES2 |     -    26     -   242     -     -     -     -    28 |  238   0.08
 WHIT |     -    12     -     -    15     -     -     -     - |  288  47.02
 WSRT |     -    18     -   147     -     -     -     -    20 |  238   0.04
 WTZR |     -    13     -   145     -     -     -     -    15 |  238   0.06
 WUHN |     -    64     -  1130    68     -     -     -    22 |  287  35.68
 YELL |     -    99    75   153     -     -     -     -    74 |  288   0.06
 ZWEN |     -    28     -     -    13     -     -     -    37 |  276  18.70
 -----+-------------------------------------------------------+--------------
 TOT  |  4675    58    95   372    76  4495  4452     -    65 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

