
 GPS week: 1147   Day: 2   MJD: 52275                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2581      0    -0.01    -0.01     4.32     0.00
 cod |   288     0  19368    281    -0.55    -2.47     0.08    31.05
 emr |    96     0   3327     94  1745.07    15.89     0.16    12.70
 gfz |   288     0  14546      0    -0.18    -0.11     0.08    32.02
 igu |    96     0   2389      0    -0.01    -0.02     3.30     0.00
 ngs |    96     0   2581      0     0.00    -0.01     4.21     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  18876    688   662.30     3.82     0.10    24.23

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 | -2851    44  -110   -18  1765 -3082     -   -14 |
    2 | -1995    37     X    96 -6132 -1754     -  -175 |
    3 | -2250    24   163   108  -956 -1996     -  -203 |
    4 | -4322  -113  -333   329 -6289 -4398     -  -303 |
    5 |  2480    -7  -185    84     -  1642     -   -70 |
    6 |   924   -58  -152    95  1020  1414     -   -31 |
    7 | -2711    -2  -107   349  6519 -2475     -  -439 |
    8 | -6871   138   170   -30-11320 -6845     -  -166 |
    9 |  -967    40  -122    29   334  -780     -   -68 |
   10 | -3197   187     7   -27   293 -3511     -  -205 |
   11 |  5967    49   261  -180  1013  5966     -   131 |
   13 |  5109  -161     9   156   271  4978     -     X |
   14 |  6564   -67   -48   -47  3720  6397     -   154 |
   15 | -1314     1   202   -17 -2836 -2330     -   -14 |
   17 | -2440    63   215    57   695 -2398     -  -210 |
   18 |  5349  -117  -189    54  1071  5287     -   112 |
   20 |  6315   -12  -109   -29   865  6186     -    72 |
   21 |  5659    76  -230     2  -158  5704     -   -60 |
   22 |  5695   137    96  -183  4362  4878     -    48 |
   23 | -4755   128  -143    -1     - -4601     -  -139 |
   25 |   745   -17   -75    89  9597   428     -   -82 |
   26 | -1578   -45  -248    76  8371 -1671     -     X |
   27 |   556   -14     5   159  4452  1051     -  -193 |
   28 |  4640   231   144  -175   -92  4727     -   -89 |
   29 | -2382    39     0   -28 -3855 -2508     -   -14 |
   30 | -3259    21  -270    88  -974 -3703     -   -95 |
   31 | -9383    12   170   116-11484 -6902     -  -198 |
 -----+-------------------------------------------------+
 ALBH |     -  -128     -     -     -     -     -   164 |
 ALGO |     -   117   100  -244     -     -     -   155 |
 AMC2 |     -   -83     -     -     -     -     -   106 |
 AOML |     -     2     -     -     -     -     -    -3 |
 ARTU |     -     7     -    -7     -     -     -     - |
 AUCK |     -    -2     -     -     -     -     -     2 |
 BILI |     -    -3     -     3     -     -     -     - |
 BOR1 |     -   -51     -     -     -     -     -    66 |
 BRMU |     -    24     -    31     -     -     -   -71 |
 CAS1 |     -   -53     -   -15     -     -     -    88 |
 CRO1 |     -    -2     -     -     -     -     -     3 |
 DAV1 |     -    21     -  -145     -     -     -   165 |
 DRAO |     -   -44    46     -     -     -     -    48 |
 FAIR |     -     -    12     -     -     -     -    -6 |
 GALA |     -    -2     -   -62     -     -     -    85 |
 GOLD |     -  -113     -     -     -     -     -   145 |
 GUAM |     -    37     -   -33     -     -     -    -3 |
 HARB |     -   -78     -    76     -     -     -     - |
 HOB2 |     -   -33     -    28     -     -     -     6 |
 HRAO |     -  -176     -     -     -     -     -   225 |
 KERG |     -   263     -  -298     -     -     -    57 |
 KOKB |     -     -     -   117     -     -     -  -154 |
 LPGS |     -     -     -  -160     -     -     -   211 |
 MAC1 |     -  -103     -    -1     -     -     -   134 |
 MAS1 |     -   -27   193   -19     -     -     -    25 |
 MATE |     -   -77     -     -     -     -     -    98 |
 MAW1 |     -   138     -  -123     -     -     -   -15 |
 MDO1 |     -  -183     -     -     -     -     -   234 |
 MEDI |     -     5     -     -     -     -     -    -6 |
 MKEA |     -     -   215  -138     -     -     -   145 |
 NLIB |     -   -76     -     -     -     -     -    97 |
 NRC2 |     -   149   142     -     -     -     -  -216 |
 PERT |     -    23     -     -     -     -     -   -30 |
 PETP |     -  -112     -   109     -     -     -     - |
 PIE1 |     -  -185     -     -     -     -     -   237 |
 POTS |     -   -24     -     9     -     -     -    20 |
 SANT |     -   111     -   -67     -     -     -   -53 |
 STJO |     -    65    65  -194     -     -     -   163 |
 SUTH |     -     -     -  -182     -     -     -   241 |
 USNO |     -   -25     -     -     -     -     -    33 |
 USUD |     -   -53     -     -     -     -     -    67 |
 WES2 |     -   -15     -     -     -     -     -    20 |
 WHIT |     -   -82     -    80     -     -     -     - |
 WUHN |     -   171     -    51     -     -     -  -286 |
 YELL |     -   -41    74     -     -     -     -    39 |
 ZWEN |     -     X     -   -19     -     -     -    25 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  5597   173   237    80  2950  5467     -   264 |  277   3.52
    2 |  2390    62     X    46  2447  2313     -    41 |  288   2.09
    3 |  2794    63   119    42  2998  2761     -   107 |  288   2.12
    4 |  1772   126   123   110  2216  1659     -   280 |  288   0.68
    5 |  4833    57    73    62     -  3927     -    42 |  288   2.27
    6 | 10433    60   150   146  3686 10747     -   276 |  288   8.14
    7 |  3673   115   129    69  5851  3486     -    71 |  288   0.55
    8 |  2927    75   283    43  3528  3042     -    58 |  288   2.81
    9 |  3889    63    55    61  3617  3713     -    56 |  288   3.11
   10 |  2744    79    62    61  2832  2970     -    59 |  288   2.60
   11 |  2386   113   154   112  1868  2292     -   121 |  288   0.53
   13 |   622   166   147   166   604   800     -     X |  269   0.20
   14 |  1684    86   186    97  2468  1420     -    63 |  288   0.29
   15 |  7039   103   274    39  3344  6210     -   107 |  288   2.67
   17 |  1621   159   221   120  1149  1535     -   357 |  288   2.80
   18 |   678   111   197    89  1064   611     -    40 |  288   0.29
   20 |  1061    65   204    69   517  1074     -    52 |  288   0.20
   21 |  2599    98   263    83  2661  2576     -    67 |  288   2.79
   22 |  4118    81    65   117  4215  3218     -    68 |  288   0.52
   23 |  6454    64    88    43     -  6314     -    79 |  288   5.71
   25 |  5472    56   154    58  3766  5407     -    83 |  288   2.82
   26 |  1730   174    72   167  4685  1834     -     X |  274   0.80
   27 |  7165    63   189    94  6261  7870     -    87 |  288   5.89
   28 |  1771    96   213    89  1734  1891     -    83 |  288   0.74
   29 |   868   159   166   106  1483   777     -   104 |  278   0.56
   30 |  3648    96    69    72  1004  3512     -    67 |  288   1.33
   31 |  7344    89   161    38  5967  6562     -    72 |  288   3.83
 -----+-------------------------------------------------+--------------
 ALBH |     -    31     -     -     -     -     -    39 |  285   0.06
 ALGO |     -    48    79    17     -     -     -    43 |  288   0.03
 AMC2 |     -    29     -     -     -     -     -    37 |  286   0.04
 AOML |     -    27     -     -     -     -     -    35 |  286  20.78
 ARTU |     -    42     -    41     -     -     -     - |  287  30.96
 AUCK |     -    46     -     -     -     -     -    59 |  264  29.14
 BILI |     -    16     -    16     -     -     -     - |  287  17.68
 BOR1 |     -   165     -     -     -     -     -   212 |  285   0.43
 BRMU |     -    35     -    31     -     -     -    44 |  288  27.02
 CAS1 |     -    77     -    29     -     -     -    76 |  288   8.33
 CRO1 |     -    30     -     -     -     -     -    38 |  281   0.11
 DAV1 |     -    39     -    16     -     -     -    49 |  288  17.45
 DRAO |     -    29   101     -     -     -     -    42 |  288   0.09
 FAIR |     -     -   199     -     -     -     -   104 |   94   0.24
 GALA |     -    81     -    69     -     -     -   156 |  288  38.86
 GOLD |     -    44     -     -     -     -     -    57 |  286  36.35
 GUAM |     -    38     -    41     -     -     -    72 |  288  32.08
 HARB |     -    18     -    17     -     -     -     - |  287   6.91
 HOB2 |     -    30     -    26     -     -     -    39 |  288   0.04
 HRAO |     -    48     -     -     -     -     -    62 |  286  28.01
 KERG |     -   104     -    36     -     -     -   105 |  287   1.61
 KOKB |     -     -     -   200     -     -     -   264 |  153   0.11
 LPGS |     -     -     -   130     -     -     -   171 |  143  37.75
 MAC1 |     -    28     -    23     -     -     -    38 |  287  19.63
 MAS1 |     -    43    62    34     -     -     -    38 |  288   2.43
 MATE |     -    23     -     -     -     -     -    30 |  288   0.18
 MAW1 |     -    41     -    52     -     -     -    91 |  285  12.20
 MDO1 |     -    33     -     -     -     -     -    43 |  276   9.45
 MEDI |     -    36     -     -     -     -     -    46 |  286   1.77
 MKEA |     -     -   106    70     -     -     -    78 |  288  62.71
 NLIB |     -    76     -     -     -     -     -    97 |  272   0.26
 NRC2 |     -    45    59     -     -     -     -    51 |  285   0.11
 PERT |     -    41     -     -     -     -     -    53 |  288  27.47
 PETP |     -    32     -    31     -     -     -     - |  282  27.55
 PIE1 |     -    30     -     -     -     -     -    39 |  269   0.04
 POTS |     -    91     -    51     -     -     -    60 |  278  17.41
 SANT |     -    85     -    28     -     -     -   114 |  288  24.52
 STJO |     -    43    50    17     -     -     -    39 |  288   1.89
 SUTH |     -     -     -   106     -     -     -   141 |  243  52.81
 USNO |     -    31     -     -     -     -     -    39 |  288   0.05
 USUD |     -    29     -     -     -     -     -    37 |  288   0.36
 WES2 |     -    54     -     -     -     -     -    69 |  287   0.11
 WHIT |     -    34     -    33     -     -     -     - |  287  18.01
 WUHN |     -    31     -    45     -     -     -    42 |  287  34.60
 YELL |     -    38   106     -     -     -     -    37 |  288   0.04
 ZWEN |     -     X     -    22     -     -     -    29 |  280  18.27
 -----+-------------------------------------------------+--------------
 TOT  |  4321    78   156    76  3304  4207     -   104 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

