
 GPS week: 1146   Day: 0   MJD: 52266                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     1   2644      0     0.00    -1.11     4.64     0.00
 cod |   288     0  25538     10     1.80    -0.85     0.07    30.25
 esa |   288     0  18240    721  1621.83   -28.29     0.11    19.33
 gfz |   288     0  15242      1     0.12    -1.49     0.09    26.26
 igu |    96     1   2362      0    -0.05    -1.01     4.18     0.00
 ngs |    96     1   2644      0     0.01    -1.12     4.34     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24796    629   663.89    -6.91     0.09    24.16

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 | -1009    45   193   -78   607  -316     -  -117 |
    2 | -6770   137   -20   -77 -5963 -5920     -   -73 |
    3 | -5197    40   135   191 -1035 -4317     -  -366 |
    4 | -4685    23    50    16  -594 -5082     -   -85 |
    5 | -7507   124   306  -309-13247 -7203     -   -64 |
    6 |  8138   -49   300   -12 12689  6997     -  -165 |
    7 |  4140    12   -46   108 -1650  3971     -   -95 |
    8 |  2426   168   -19   -68  3686  1974     -  -121 |
    9 | -6993    -5    72   125  4422 -6504     -  -186 |
   10 |   360    85   -19   -39  -271   168     -   -49 |
   11 |  8451   -32   -28   112  4621  7846     -   -60 |
   13 |  4907   130    52   -51   252  4442     -  -152 |
   14 |  3925    19    29    49  2505  3843     -   -98 |
   15 |  -839   -86     -    64 -4810  -769     -    39 |
   17 |  1253   -56   -14   157     -   923     -   -90 |
   18 |  6109  -246   197    34  2094  5607     -   113 |
   20 |  5669     6   132  -157  1637  5605     -    57 |
   21 | -3152     -     X   102 -8164 -2486     -  -111 |
   22 | -6008   187   203  -218-11708 -5524     -  -158 |
   23 |  2989     1   318   -52     -  2410     -  -152 |
   24 | -5873    55   102   -78 -3106 -5661     -   -66 |
   25 |  7703    68   443    20 10468  6733     -  -461 |
   26 | -5652    48  -118   165 -1939 -5406     -  -149 |
   27 |  -893    86  -186   211  4826  -507     -  -189 |
   28 |  4585    54   215  -188  7198  4400     -   -35 |
   29 | -5636    59    21   -83     - -5223     -     X |
   30 | -1275    71   177   -13 -7957 -1219     -  -216 |
   31 |   397    79   181    41  5185   867     -  -289 |
 -----+-------------------------------------------------+
 ALBH |     -   110  -565     -     -     -     -   259 |
 ALGO |     -    11     X   -59     -     -     -    51 |
 ANKR |     -   -35    55     -     -     -     -     - |
 AOML |     -   -69     -     -     -     -     -    86 |
 AUCK |     -  -295     -   565     -     -     -  -243 |
 BAHR |     -   128   -15  -109     -     -     -   -30 |
 BOR1 |     -   -46     -     -     -     -     -    58 |
 BRMU |     -   126  -203    64     -     -     -   -65 |
 BRUS |     -     9     -     -     -     -     -   -12 |
 CAS1 |     -   -97   -83    -7     -     -     -   196 |
 CEDU |     -   239  -374     -     -     -     -     - |
 CRO1 |     -   -51    30     -     -     -     -    41 |
 DAV1 |     -   -22     -   -42     -     -     -    73 |
 DRAO |     -    20     -     -     -     -     -   -24 |
 EISL |     -  -216   338     -     -     -     -     - |
 FORT |     -  -130   204     -     -     -     -     - |
 GALA |     -     -   -54    77     -     -     -   -40 |
 GOLD |     -   -75     -     -     -     -     -    94 |
 GUAM |     -   -43  -244    -8     -     -     -   259 |
 HARB |     -    66     -   -76     -     -     -     - |
 HOB2 |     -   -88  -289     6     -     -     -   336 |
 HRAO |     -   -11     -     -     -     -     -    14 |
 IISC |     -    86  -151     -     -     -     -    13 |
 KERG |     -   124     -     -     -     -     -  -155 |
 KIRU |     -    -4     7     -     -     -     -     - |
 KOKB |     -     -     -   139     -     -     -  -151 |
 KSTU |     -    85     -     -     -     -     -  -106 |
 KWJ1 |     -  -199     -   134     -     -     -   119 |
 LPGS |     -   202     -  -445     -     -     -   227 |
 MAC1 |     -    15   256  -206     -     -     -     X |
 MALI |     -   109    34   -70     -     -     -   -86 |
 MAS1 |     -   -59    16    71     -     -     -   -17 |
 MATE |     -    23    20     -     -     -     -   -46 |
 MAW1 |     -    78     -  -107     -     -     -    19 |
 MCM4 |     -    27  -210   -58     -     -     -   189 |
 MDO1 |     -   -48  -356     -     -     -     -   344 |
 MEDI |     -   -12     -     -     -     -     -    15 |
 METS |     -   -91     -     -     -     -     -   113 |
 MKEA |     -  -117   -20     -     -     -     -   163 |
 MSKU |     -    16     -   -19     -     -     -     - |
 NKLG |     -   -88   271     -     -     -     -  -107 |
 NPLD |     -    30     -     -     -     -     -   -37 |
 NRC2 |     -   179  -275     -     -     -     -    -4 |
 NTUS |     -  -137     -     -     -     -     -   172 |
 NYA1 |     -    -2     -   -83     -     -     -    94 |
 NYAL |     -     -    89     -     -     -     -   -72 |
 ONSA |     -   -85   166     -     -     -     -   -27 |
 PERT |     -   -86   113     -     -     -     -    17 |
 POTS |     -     6     -     -     -     -     -    -8 |
 REYK |     -   -32     -     -     -     -     -    40 |
 SANT |     -  -156     -    -7     -     -     -   245 |
 SFER |     -  -298  -136     -     -     -     -   485 |
 STJO |     -    -6     -   -98     -     -     -   115 |
 SUTH |     -   -71  -287     -     -     -     -   320 |
 THTI |     -     -   -67     -     -     -     -    53 |
 TRO1 |     -   -89     -   103     -     -     -     - |
 TROM |     -     -    68     -     -     -     -   -54 |
 TSKB |     -   161  -515     -     -     -     -   210 |
 URUM |     -   -79     -     -     -     -     -    99 |
 USNO |     -   160  -381     -     -     -     -   105 |
 USUD |     -  -101   -46     -     -     -     -   164 |
 VILL |     -   -68   204     -     -     -     -   -78 |
 WES2 |     -    44   -43     -     -     -     -   -21 |
 WHIT |     -    10     -   -12     -     -     -     - |
 WSRT |     -   -17   190     -     -     -     -  -131 |
 WTZR |     -    -8    26     -     -     -     -   -11 |
 WUHN |     -   -72   127   107     -     -     -  -128 |
 YAR2 |     -   -50  -421     -     -     -     -   340 |
 YELL |     -    76     -     -     -     -     -   -95 |
 YSSK |     -  -643     -   741     -     -     -     - |
 ZWEN |     -   -92     -    40     -     -     -    71 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  8991   184   351    47  4215  7483     -    74 |  279   5.00
    2 |  6058    62    38    90  4230  5465     -   144 |  287   3.84
    3 |  4057    77   185   111  1849  3178     -   309 |  287   1.78
    4 |  4704    52    54    55  1218  4534     -    58 |  287   0.72
    5 |  5278    73    59    35  7378  5723     -    76 |  287   2.69
    6 | 10954   104    80   100  7188  9373     -   142 |  287   8.79
    7 |  1389    68    64   120  3934  1386     -    81 |  287   2.27
    8 |  3902    58    66   102  2893  4156     -    85 |  287   4.34
    9 |  2680    60   112    89  2763  2597     -   138 |  287   2.15
   10 |  3441    59   115    75  2378  3307     -    42 |  287   2.90
   11 |  1656    86    88    91  1803  1550     -    64 |  287   0.44
   13 |  2801    95   253    55   639  2691     -   187 |  287   0.20
   14 |  1188    97   159    54  1352  1139     -   100 |  287   0.31
   15 |  5588    43     -    51  4864  5586     -    69 |  287   2.26
   17 |  1489    50    93    58     -  1473     -    48 |  287   3.57
   18 |  1251    56   121    47   786  1557     -    82 |  287   0.41
   20 |  1682    96    70    50   691  1716     -    97 |  287   0.26
   21 |  7019     -     X   180  3940  6695     -   196 |  274   4.05
   22 |  3296    61   140   104  7094  2883     -    60 |  287   1.11
   23 |  6007    94   218   114     -  5515     -   119 |  287   5.58
   24 |  2373   101    46   141  2203  3098     -    52 |  287   2.15
   25 |  4181    74    99    51  7518  3788     -   120 |  287   2.01
   26 |  1373   209   244    84  1294  1210     -   112 |  283   0.55
   27 |  4323    59    49    46  3224  4912     -   104 |  287   3.55
   28 |  1046    77    67    23  3452   955     -    82 |  279   0.87
   29 |  1918   109    87    82     -  1860     -     X |  276   0.80
   30 |  1172   129    78   102  5441   997     -   180 |  287   1.86
   31 |  8611    67    68   144  6843  8495     -   163 |  287   4.98
 -----+-------------------------------------------------+--------------
 ALBH |     -    50   140     -     -     -     -    46 |  288   0.07
 ALGO |     -    46     X    64     -     -     -    27 |  287   0.05
 ANKR |     -    22    35     -     -     -     -     - |  210  12.17
 AOML |     -    19     -     -     -     -     -    23 |  287  26.78
 AUCK |     -   123     -    96     -     -     -    62 |  263  19.87
 BAHR |     -    62    67    35     -     -     -    56 |  287   0.34
 BOR1 |     -    26     -     -     -     -     -    32 |  286   0.52
 BRMU |     -    30   148    86     -     -     -    16 |  287  27.34
 BRUS |     -    38     -     -     -     -     -    47 |  286   0.05
 CAS1 |     -    28    45    35     -     -     -    60 |  287   8.56
 CEDU |     -    24    38     -     -     -     -     - |  212  16.89
 CRO1 |     -    66    67     -     -     -     -    44 |  288   0.12
 DAV1 |     -    49     -    79     -     -     -    33 |  288  17.80
 DRAO |     -    32     -     -     -     -     -    40 |  286   0.05
 EISL |     -    28    44     -     -     -     -     - |  122  19.94
 FORT |     -    83   130     -     -     -     -     - |  121   0.20
 GALA |     -     -    69    39     -     -     -    49 |  288  40.05
 GOLD |     -    14     -     -     -     -     -    17 |  286  27.08
 GUAM |     -    79   111    72     -     -     -    37 |  288  34.74
 HARB |     -    99     -   114     -     -     -     - |  287   2.47
 HOB2 |     -    60    38    56     -     -     -    44 |  287   0.09
 HRAO |     -    84     -     -     -     -     -   105 |  281  24.00
 IISC |     -    41    44     -     -     -     -    49 |  288  33.59
 KERG |     -    57     -     -     -     -     -    71 |  286   1.85
 KIRU |     -    19    30     -     -     -     -     - |  210   1.71
 KOKB |     -     -     -   147     -     -     -   160 |  197   0.35
 KSTU |     -   135     -     -     -     -     -   169 |  233  28.58
 KWJ1 |     -   129     -   151     -     -     -   172 |  235  85.29
 LPGS |     -   129     -   169     -     -     -    71 |  266  32.55
 MAC1 |     -   102    58    85     -     -     -     X |  288  24.64
 MALI |     -    65    54    69     -     -     -    82 |  287 115.60
 MAS1 |     -    33    52    72     -     -     -    79 |  287   2.15
 MATE |     -    25    51     -     -     -     -    25 |  287   0.07
 MAW1 |     -    30     -    36     -     -     -    53 |  288  21.54
 MCM4 |     -    90   255    93     -     -     -   118 |  287  21.22
 MDO1 |     -    67    78     -     -     -     -   125 |  286  16.42
 MEDI |     -    43     -     -     -     -     -    54 |  286   0.10
 METS |     -    37     -     -     -     -     -    46 |  285   0.79
 MKEA |     -    28    35     -     -     -     -    57 |  288  45.46
 MSKU |     -    75     -    87     -     -     -     - |  288  37.51
 NKLG |     -    34    56     -     -     -     -    67 |  286    >>>
 NPLD |     -    51     -     -     -     -     -    63 |  285   0.06
 NRC2 |     -    31    45     -     -     -     -    25 |  288   0.04
 NTUS |     -    17     -     -     -     -     -    22 |  287   6.76
 NYA1 |     -    46     -    20     -     -     -    51 |  288   0.05
 NYAL |     -     -    42     -     -     -     -    33 |  211   0.06
 ONSA |     -    16    42     -     -     -     -    37 |  287   0.51
 PERT |     -    27    43     -     -     -     -    42 |  288  18.99
 POTS |     -    19     -     -     -     -     -    24 |  285  16.10
 REYK |     -    43     -     -     -     -     -    54 |  286   7.82
 SANT |     -   124     -   103     -     -     -    84 |  250  14.90
 SFER |     -    71    66     -     -     -     -    47 |  287   1.46
 STJO |     -    27     -    40     -     -     -    71 |  288  11.79
 SUTH |     -    75   108     -     -     -     -   143 |  244  28.47
 THTI |     -     -    30     -     -     -     -    24 |  208   3.10
 TRO1 |     -    20     -    24     -     -     -     - |  288   9.53
 TROM |     -     -    58     -     -     -     -    47 |  209  10.38
 TSKB |     -    49    71     -     -     -     -    36 |  254   1.02
 URUM |     -    64     -     -     -     -     -    80 |  286  29.57
 USNO |     -    57    50     -     -     -     -    42 |  287   0.04
 USUD |     -    38    58     -     -     -     -    36 |  288   0.46
 VILL |     -    26    33     -     -     -     -    23 |  288  33.28
 WES2 |     -    62   156     -     -     -     -    76 |  286   0.06
 WHIT |     -    28     -    32     -     -     -     - |  288  48.14
 WSRT |     -    36    34     -     -     -     -    52 |  287   0.05
 WTZR |     -    61    49     -     -     -     -    49 |  286   0.04
 WUHN |     -    40    69    43     -     -     -    38 |  286  34.34
 YAR2 |     -   102   136     -     -     -     -   135 |  261 393.82
 YELL |     -   127     -     -     -     -     -   159 |  284   0.11
 YSSK |     -    32     -    37     -     -     -     - |   74  12.55
 ZWEN |     -    52     -    42     -     -     -    88 |  276  17.68
 -----+-------------------------------------------------+--------------
 TOT  |  4637    73   108    85  4184  4341     -    91 |


 BEST CLOCK FIT: USNO   287   0.04 (ns) 

