
 GPS week: 1145   Day: 6   MJD: 52265                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2667      0    -0.15     0.26     5.12     0.00
 cod |   288     0  22733    298     1.06     0.76     0.07    21.85
 emr |    96     0   3875     96  1600.99    15.49     0.08    20.34
 esa |   288     0  18453    561  1586.45    15.18     0.09    16.92
 gfz |   288     0  15078    100    -0.55     0.76     0.08    20.71
 igu |    96     0   2381      0    -0.14     0.26     4.01     0.00
 ngs |    96     0   2667      3 -1031.97  3175.15     4.90     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16480     68   662.40    -0.29     0.08    20.18

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -2343    27   -60   210  -135  7635 -2480     -   -42 |
    2 | -3854   143     X  -349   147 -3649 -3351     -   -68 |
    3 | -2127    14  -241   177   109  -652 -1704     -  -194 |
    4 | -5690  -144  -130    87   232 -8278 -5095     -  -111 |
    5 |  4114    90  -116   298  -172  1469  3089     -  -132 |
    6 | -2038  -116    -1   231   -10  3107 -1474     -   -57 |
    7 |  -785   -44   -40    56   260-11078 -1698     -  -254 |
    8 | -5021   178   -37     7    22 -9347 -3921     -  -208 |
    9 | -1674   -66  -116   199   165 -8194 -1817     -  -225 |
   10 |  2140   118   -95  -104    77  5403  2558     -   -87 |
   11 |  6981   -71    44   -24   -37  4395  6684     -   120 |
   13 |  5462    44   181   -75   -88  4328  5404     -    42 |
   14 |  3741    28   147   -98   -33  2886  3872     -    34 |
   15 |  -199   -40    24     -    64 11160  -502     -   -30 |
   17 | -6966    21    22   110    10     - -6123     -  -133 |
   18 |  7936  -162    51   154   -89  1991  7492     -   120 |
   20 |  7918   -16    -2   171   -53  2345  7721     -   -70 |
   21 | -1899    87  -103  -123    -3     - -1897     -    46 |
   22 |   854   134   -19   234  -149 -6535   542     -  -182 |
   23 |  3557    20   -56     X    -3 -1325  3098     -     - |
   24 | -1939   -93    -6    59   124  4176 -2036     -   -73 |
   25 |  4522   -68   -74   201   -10 12587  3696     -   -60 |
   26 | -2043    40   -43   -84   149 -2612 -2232     -  -115 |
   27 | -4652   162    23  -176   161 -5669 -4378     -  -201 |
   28 | -1425   148   219  -146   -91  -168 -1048     -   -17 |
   29 | -6914    74  -121     X   -42     - -5893     -     1 |
   30 | -1740   117    53   105  -122-13811 -1585     -  -108 |
   31 |  3556   108  -214   117    93  9938  2575     -  -239 |
 -----+-------------------------------------------------------+
 ALBH |     -   258     -  -333     -     -     -     -     - |
 ALGO |     -   -89    55     X     X     -     -     -    41 |
 ANKR |     -    90     -  -117     -     -     -     -     - |
 AUCK |     -   -49     -     -     -     -     -     -    53 |
 BAHR |     -    68    72   -61   -53     -     -     -     8 |
 BRMU |     -    50     -  -284    23     -     -     -   160 |
 CAS1 |     -  -161     -   -37   -22     -     -     -   228 |
 CEDU |     -   383     -  -495     -     -     -     -     - |
 CRO1 |     -   -47     -    61     -     -     -     -     - |
 DAV1 |     -     8     -     -   -54     -     -     -    47 |
 DRAO |     -    40    56     -     -     -     -     -   -63 |
 EISL |     -    83     -  -108     -     -     -     -     - |
 FAIR |     -     -  -117     -     -     -     -     -   118 |
 FORT |     -   -32     -    41     -     -     -     -     - |
 GALA |     -   -55     -    40    25     -     -     -     - |
 GUAM |     -  -201     -   -36   -17     -     -     -   266 |
 HARB |     -    72     -     -   -76     -     -     -     - |
 HOB2 |     -  -149     -   -95    34     -     -     -   198 |
 IISC |     -     X     -   -65   -59     -     -     -   115 |
 KERG |     -    45     -     -     -     -     -     -   -48 |
 KIRU |     -    -3     -     4     -     -     -     -     - |
 KOKB |     -     -     -     -   264     -     -     -  -271 |
 KWJ1 |     -  -186     -     -    93     -     -     -   105 |
 LPGS |     -   138     -     -  -146     -     -     -     - |
 MAC1 |     -   103     -  -172    28     -     -     -     - |
 MALI |     -    92     -  -186    55     -     -     -     - |
 MAS1 |     -   -82    96    53   -56     -     -     -    69 |
 MAW1 |     -    80     -     -   -84     -     -     -     - |
 MCM4 |     -     2     -   162     7     -     -     -  -175 |
 MDO1 |     -  -150     -   110     -     -     -     -    68 |
 MKEA |     -   -67   100    46     -     -     -     -     - |
 NKLG |     -   111     -  -216     -     -     -     -    61 |
 NLIB |     -   228     -  -295     -     -     -     -     - |
 NRC2 |     -   -39    90    15     -     -     -     -     - |
 NTUS |     -  -124     -     -     -     -     -     -   134 |
 NYA1 |     -   114     -     -  -120     -     -     -     - |
 NYAL |     -     -    -2   135     -     -     -     -  -113 |
 ONSA |     -   -97    40   111     -     -     -     -    -1 |
 PERT |     -    13     -   -81     -     -     -     -    54 |
 PIE1 |     -  -103    41  -232     -     -     -     -   277 |
 POTS |     -   -70     -     -     -     -     -     -    76 |
 SANT |     -   -76     -    17   -44     -     -     -   114 |
 SFER |     -  -117     -   151     -     -     -     -     - |
 STJO |     -     6   192     -   -69     -     -     -     - |
 SUTH |     -  -184     -   238     -     -     -     -     - |
 THTI |     -     -     -   -44     -     -     -     -    37 |
 TIDB |     -    -7     -     -     8     -     -     -     - |
 TRO1 |     -   -37     -     -    39     -     -     -     - |
 TSKB |     -    99    73    50  -241     -     -     -    78 |
 USNO |     -    45     -  -232     -     -     -     -   146 |
 USUD |     -   -71     -    91     -     -     -     -     - |
 VILL |     -   -38     -    48     -     -     -     -     - |
 WHIT |     -    24     -     -   -25     -     -     -     - |
 WSRT |     -   -30     -    -4     -     -     -     -    36 |
 WTZR |     -   -71     -   -63     -     -     -     -   130 |
 WUHN |     -  -103     -    -1   -67     -     -     -   181 |
 YAR2 |     -  -235     -   304     -     -     -     -     - |
 YELL |     -   -46    64   -12     -     -     -     -    39 |
 ZWEN |     -   -28     -     -   -63     -     -     -    95 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4310    76    76   206    55  3469  4268     -   133 |  284   3.60
    2 |  5196   130     X   186    71  2180  5021     -   124 |  287   1.85
    3 |  4749    68    96    81   136  2533  4755     -   132 |  288   2.34
    4 |  3455    64    78    61    39  3614  3467     -    47 |  288   0.53
    5 |  4739    73    59    69    50  3749  5449     -    45 |  288   3.24
    6 | 11199    94    55    87    44  3535 11814     -    41 |  288  10.72
    7 |  4693    78    53    67   101  4362  4187     -    60 |  288   0.44
    8 |  7676    71    59    75   106  3034  6944     -    44 |  288   3.42
    9 |  4751    66    62    77    24  5003  4984     -    71 |  288   1.44
   10 |  3827   105    86   102    48  3373  3815     -    52 |  288   2.09
   11 |   865    94    36    43    83  2843   936     -    47 |  288   0.41
   13 |  1682    99    92   230    73  2797  1482     -   183 |  288   0.20
   14 |   676   101    65    70   110  2009   575     -    45 |  288   0.25
   15 |  3691    66    20     -    79  6614  3685     -    37 |  288   2.08
   17 |  4049    52    44    39    52     -  4113     -    41 |  288   3.19
   18 |  1393    57   159    63   101  2064  1522     -   176 |  288   0.39
   20 |  1135    89    63   154    35  1586  1239     -    59 |  288   0.27
   21 |  3761    79    41    39    87     -  3626     -    25 |  288   3.20
   22 |  1484    69    49    45    27  4216  1601     -   106 |  288   1.05
   23 |  7638    50    53     X    53  5210  6960     -     - |  288   6.40
   24 |  2199    64   103   108    72  2582  2239     -    45 |  288   1.98
   25 |  3745   104    69    77    82  5468  3583     -    95 |  288   1.26
   26 |  1451   199   134   152   139  1788  1497     -   114 |  284   1.01
   27 | 10149    68    42   136   102  6606  7707     -    46 |  288   4.00
   28 |  4122    72    60   113    68  1386  3817     -   143 |  242   0.71
   29 |  5270    91    60     X    63     -  4964     -    67 |  286   0.95
   30 |  1124    99    35    74    92  7858  1345     -    72 |  288   1.22
   31 | 10502    61    57   135    63  3579 10117     -    82 |  288   3.94
 -----+-------------------------------------------------------+--------------
 ALBH |     -   171     -   220     -     -     -     -     - |  204   0.23
 ALGO |     -    65    20     X     X     -     -     -    59 |   96   0.02
 ANKR |     -    36     -    47     -     -     -     -     - |  288  12.33
 AUCK |     -    43     -     -     -     -     -     -    47 |  264  18.96
 BAHR |     -    20    35    24    28     -     -     -    21 |  288   0.61
 BRMU |     -    78     -    36    69     -     -     -    46 |  288  32.14
 CAS1 |     -    24     -    26    37     -     -     -    60 |  288   8.77
 CEDU |     -    40     -    52     -     -     -     -     - |  288  14.13
 CRO1 |     -    24     -    32     -     -     -     -     - |  288   0.11
 DAV1 |     -    55     -     -    69     -     -     -    34 |  288  17.57
 DRAO |     -    23    56     -     -     -     -     -    36 |  288   0.04
 EISL |     -   107     -   139     -     -     -     -     - |  227  35.86
 FAIR |     -     -   235     -     -     -     -     -   237 |   89   0.36
 FORT |     -    57     -    73     -     -     -     -     - |  183   0.35
 GALA |     -    64     -    28    53     -     -     -     - |  288  36.68
 GUAM |     -    48     -    65    36     -     -     -    35 |  288  36.88
 HARB |     -    74     -     -    78     -     -     -     - |  287   5.23
 HOB2 |     -    26     -    32    68     -     -     -    52 |  288   0.05
 IISC |     -     X     -    58    68     -     -     -    29 |  286  36.91
 KERG |     -    69     -     -     -     -     -     -    75 |  287   1.72
 KIRU |     -    44     -    56     -     -     -     -     - |  287   3.02
 KOKB |     -     -     -     -    77     -     -     -    79 |  173   0.13
 KWJ1 |     -    94     -     -   159     -     -     -   105 |  231  91.24
 LPGS |     -    69     -     -    73     -     -     -     - |  117  67.31
 MAC1 |     -   106     -    39    91     -     -     -     - |  287  25.83
 MALI |     -    48     -    59    47     -     -     -     - |  288 112.89
 MAS1 |     -    26    40    76    38     -     -     -    40 |  288   2.64
 MAW1 |     -    20     -     -    21     -     -     -     - |  288  25.60
 MCM4 |     -    68     -   152   213     -     -     -   145 |  286  10.41
 MDO1 |     -    51     -    28     -     -     -     -    41 |  270  53.67
 MKEA |     -    30    44    31     -     -     -     -     - |  288  47.73
 NKLG |     -    40     -    44     -     -     -     -    60 |  287    >>>
 NLIB |     -    38     -    49     -     -     -     -     - |  156   0.05
 NRC2 |     -    19    32    22     -     -     -     -     - |  288   0.03
 NTUS |     -    21     -     -     -     -     -     -    22 |  288   7.32
 NYA1 |     -    35     -     -    37     -     -     -     - |  288   0.06
 NYAL |     -     -    30    51     -     -     -     -    50 |  288   0.06
 ONSA |     -    59    40    61     -     -     -     -    16 |  288   0.31
 PERT |     -    53     -    55     -     -     -     -    37 |  288  17.39
 PIE1 |     -    58    67    92     -     -     -     -    59 |  273   0.06
 POTS |     -    79     -     -     -     -     -     -    85 |  277  15.56
 SANT |     -    72     -    33    30     -     -     -    99 |  288  19.44
 SFER |     -    43     -    55     -     -     -     -     - |  287   0.90
 STJO |     -    60    48     -    62     -     -     -     - |  288   5.20
 SUTH |     -    44     -    57     -     -     -     -     - |  288  14.25
 THTI |     -     -     -    30     -     -     -     -    25 |  287   1.97
 TIDB |     -    37     -     -    39     -     -     -     - |  288   0.06
 TRO1 |     -    44     -     -    46     -     -     -     - |  288  12.73
 TSKB |     -    34    59    34    22     -     -     -    34 |  212   1.14
 USNO |     -    44     -    23     -     -     -     -    63 |  288   0.04
 USUD |     -    53     -    69     -     -     -     -     - |  288   0.43
 VILL |     -    83     -   108     -     -     -     -     - |  288  36.56
 WHIT |     -    29     -     -    31     -     -     -     - |  288  19.76
 WSRT |     -    58     -    61     -     -     -     -    26 |  288   0.03
 WTZR |     -    40     -    60     -     -     -     -    21 |  288   0.05
 WUHN |     -    45     -    76    29     -     -     -    40 |  287  34.93
 YAR2 |     -    35     -    45     -     -     -     -     - |  175   3.17
 YELL |     -    91   111   135     -     -     -     -    52 |  288   0.13
 ZWEN |     -    43     -     -    20     -     -     -    36 |  288  21.10
 -----+-------------------------------------------------------+--------------
 TOT  |  5115    70    76    88    75  4005  4901     -    76 |


 BEST CLOCK FIT: WSRT   288   0.03 (ns) 

