
 GPS week: 1145   Day: 5   MJD: 52264                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2685      0    -0.12    -0.01     4.25     0.00
 cod |   288     0  21517      6     2.10    -2.42     0.09    21.52
 emr |    96     0   3874     96  1587.83    12.35     0.10    20.01
 esa |   288     0  18505   1082  1574.09    11.87     0.12    15.29
 gfz |   288     0  14658      0    -0.04    -0.23     0.07    31.05
 igu |    96     0   2397     11    -0.29     1.11     5.68     0.00
 jpl |   285     5   8604    134   837.65  -710.05   654.73     0.00
 ngs |    96     0   2685      0    -0.11    -0.01     4.18     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0   8039    351   664.89    -4.26     0.14    12.13

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -1399   -79  -145   294   -56 11084****** -1542     -     4 |
    2 | -6114   112    55  -378   110 -7185     - -5336     -   -32 |
    3 | -6048  -116  -275   153    61  4988****** -4678     -     7 |
    4 | -1220  -124  -101    84    43  -455****** -1103     -    60 |
    5 |  7157   208   -36   294  -247 13483******  6638     -   -87 |
    6 | -1815   -93     X    82    67  4286****** -2146     -  -112 |
    7 |  4270   -68   -97   -44   138 -7385******  4031     -  -124 |
    8 |   165   130   -64   -76   -38 -6456******    86     -     X |
    9 |  6414   -98   -54   220    -4  6948******  4936     -   -65 |
   10 | -4163    70   -37    27   -97  7121****** -3893     -   142 |
   11 |  4649  -183   185    32   -35  5528******  4599     -   264 |
   13 |  3592   -68   116    -1   -47  2112******  3415     -   172 |
   14 |  2785    44   169  -167   -72  2382******  2962     -   197 |
   15 | -7906   -29     7     -    14  1026****** -7390     -    12 |
   17 | -4456    25   -34     X    50-33227****** -4677     -  -153 |
   18 |  9305  -183   162   107    10  5561******  8718     -    76 |
   20 |  6894   -35   188   292  -180  2741******  6829     -    53 |
   21 | -1434    51   -19     X   -10  8486******  -197     -   -55 |
   22 |  5249   120  -309   120     7 -5037******  4017     -  -208 |
   23 |   724   167   142     X  -120     -******   369     -   -67 |
   24 | -1240    -1   -50    86   -43     -****** -1706     -    32 |
   25 |  2197    88  -225   -51    49  2300******  1660     -   -93 |
   26 | -1832   -66   -72    74     9 -1086****** -1595     -    45 |
   27 |  3083    44   -75  -212   139 11013******  2732     -  -125 |
   28 | -2406    54    74  -135   -82   573****** -2324     -   241 |
   29 | -8566    -2  -224     X    54     -****** -7848     -   -11 |
   30 |   934    64  -114   143   -33-19038******    70     -  -147 |
   31 | -8865   -68  -183   -27    99-13664****** -6665     -     0 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -59     -    82     -     -******     -     -     - |
 ALGO |     -    63   141     X  -134     -******     -     -     - |
 ANKR |     -    24     -   -33     -     -     -     -     -     - |
 ARTU |     -   -15     -     -    10     -******     -     -     - |
 BAHR |     -    21    86     3   -35     -******     -     -     - |
 BILI |     -     8     -     -    -6     -     -     -     -     - |
 BRMU |     -    88     -    37   -79     -     -     -     -     - |
 CAS1 |     -   -99     -   -54    95     -******     -     -     - |
 CEDU |     -   172     -  -242     -     -     -     -     -     - |
 CRO1 |     -   -57     -    79     -     -******     -     -     - |
 DAV1 |     -     6     -     -    -4     -     -     -     -     - |
 DRAO |     -   -28    30     -     -     -     -     -     -     - |
 FORT |     -  -172     -   243     -     -     -     -     -     - |
 GALA |     -  -107     -   -97   122     -******     -     -     - |
 GUAM |     -   -29     -   -61    50     -******     -     -     - |
 HOB2 |     -   245     -  -345     -     -     -     -     -     - |
 IISC |     -   178     -  -251     -     -     -     -     -     - |
 KARR |     -  -160     -     -   111     -     -     -     -     - |
 KIRU |     -   -52     -    73     -     -     -     -     -     - |
 LPGS |     -   184     -     -  -128     -******     -     -     - |
 MAC1 |     -    90     -   -34   -46     -     -     -     -     - |
 MALI |     -     -     -  -153    75     -     -     -     -     - |
 MAS1 |     -    -7   140   -50     -     -******     -     -     - |
 MATE |     -    39   -29   -42     -     -******     -     -     - |
 MAW1 |     -    59     -     -   -41     -     -     -     -     - |
 MCM4 |     -   -36     -   111   -30     -     -     -     -     - |
 MDO1 |     -     0     -     0     -     -     -     -     -     - |
 MKEA |     -   -22    32    17     -     -     -     -     -     - |
 NKLG |     -     -     -   -73    36     -     -     -     -     - |
 NLIB |     -    84     -  -118     -     -     -     -     -     - |
 NRC2 |     -  -115    93   121     -     -     -     -     -     - |
 NYA1 |     -    84     -     -   -58     -******     -     -     - |
 NYAL |     -     -  -105   137     -     -     -     -     -     - |
 ONSA |     -   -82   107   115   -22     -     -     -     -     - |
 PERT |     -    53     -   -75     -     -     -     -     -     - |
 PIE1 |     -  -198    22   256     -     -     -     -     -     - |
 REYK |     -    16     -   -22     -     -     -     -     -     - |
 SANT |     -  -272     -   292    46     -     -     -     -     - |
 SELE |     -   185     -  -261     -     -     -     -     -     - |
 SFER |     -    51     -   -72     -     -     -     -     -     - |
 STJO |     -    24   198     -   -59     -     -     -     -     - |
 SUTH |     -  -212     -  -316   283     -     -     -     -     - |
 TIDB |     -    50     -     -   -34     -******     -     -     - |
 TRO1 |     -   -61     -     -    42     -     -     -     -     - |
 TSKB |     -     -   182  -238     -     -     -     -     -     - |
 USNO |     -    20     -   -28     -     -******     -     -     - |
 USUD |     -   -45     -    63     -     -     -     -     -     - |
 VILL |     -    15     -   -21     -     -     -     -     -     - |
 WHIT |     -   108     -     -   -75     -     -     -     -     - |
 WSRT |     -   -31     -    44     -     -******     -     -     - |
 WTZR |     -    19     -   -26     -     -******     -     -     - |
 WUHN |     -    84     -   -58   -30     -******     -     -     - |
 YAR2 |     -   -64     -    91     -     -******     -     -     - |
 YELL |     -    -8   135   -40     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4411   211    79   172    74  4976580127  4180     -    68 |  286   3.49
    2 |  7959    58    51   146    63  3410     -  8196     -   104 |  287   3.11
    3 |  5641    95   164   180    54  5114574834  5308     -   110 |  288   2.31
    4 |  1760   115   111    54    40  1626627761  1713     -    99 |  288   0.93
    5 |  4024    85    66    95   109  6808627742  4018     -    91 |  288   2.20
    6 |  8547   138     X   169    51  3970627726  8101     -   111 |  288   8.38
    7 |  2257    93    91   157    61  5223642493  2482     -    42 |  288   1.92
    8 |  3884    65    43   118    69  4041583709  3922     -     X |  288   3.87
    9 |  4209   124    67    58    97  4208629473  4127     -    64 |  288   1.21
   10 |  1399   105    74   160    81  3657580106  1647     -   325 |  288   1.96
   11 |   553   104    77   115    59  2926583715   583     -   119 |  288   0.31
   13 |  1304    91   122    94   112  1235627800  1302     -   162 |  288   0.28
   14 |   842   110    91   350   113  2124574861   714     -   126 |  288   0.30
   15 |  3122    70    85     -    59  2892642503  2683     -    88 |  288   2.60
   17 |  2254   158   227     X    54 17952574869  2460     -   280 |  288   3.06
   18 |  1806    96   155   155   108  3075629529  2306     -   137 |  288   0.31
   20 |  1160   112   100   125    36  1889580099  1028     -   331 |  288   0.29
   21 |  7606   157   154     X   190  6765583743  7248     -   300 |  288   3.66
   22 |  3347    65   108   244    56  4446580062  3415     -    81 |  288   1.08
   23 |  5377    67    72     X    49     -580098  5083     -    96 |  288   4.51
   24 |  2734   142    62    53    79     -629483  2934     -    35 |  288   1.83
   25 |  3862    56    76    40    41  1506574875  4244     -    40 |  288   1.15
   26 |  1209   187   112   112    66  1649583696  1273     -    76 |  285   0.63
   27 |  4202    77   141   146    42  7506642483  4058     -    78 |  288   2.97
   28 |  3952   120   152   224    38   752642478  3862     -    42 |  288   0.42
   29 |  2088   127    68     X    83     -642507  2212     -    66 |  288   0.47
   30 |  5263    75    71   127    98 10426629464  4738     -    49 |  288   0.93
   31 |  7329    77    92    70    52  7246583698  7543     -    25 |  288   4.02
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    99     -   140     -     -707502     -     -     - |  288   0.13
 ALGO |     -    94    44     X    42     -757811     -     -     - |   96   0.02
 ANKR |     -    83     -   117     -     -     -     -     -     - |  288  22.12
 ARTU |     -    45     -     -    31     -616704     -     -     - |  279  25.80
 BAHR |     -    40    48   104    40     -707488     -     -     - |  288   0.60
 BILI |     -    66     -     -    45     -     -     -     -     - |  287  13.34
 BRMU |     -   116     -    65    66     -     -     -     -     - |  288  28.85
 CAS1 |     -    72     -    64    28     -707465     -     -     - |  288   8.72
 CEDU |     -    29     -    41     -     -     -     -     -     - |  287  14.83
 CRO1 |     -    30     -    43     -     -707473     -     -     - |  288   0.09
 DAV1 |     -    42     -     -    29     -     -     -     -     - |  288  16.65
 DRAO |     -    39    42     -     -     -     -     -     -     - |   96   0.08
 FORT |     -    59     -    83     -     -     -     -     -     - |  167   0.45
 GALA |     -    56     -    87    26     -707462     -     -     - |  288  35.08
 GUAM |     -    41     -    65    26     -707488     -     -     - |  288  34.93
 HOB2 |     -    48     -    67     -     -     -     -     -     - |  288   0.10
 IISC |     -    24     -    34     -     -     -     -     -     - |  288  38.78
 KARR |     -    19     -     -    14     -     -     -     -     - |  288  19.77
 KIRU |     -   128     -   180     -     -     -     -     -     - |  265   2.95
 LPGS |     -    70     -     -    48     -530560     -     -     - |  156  19.97
 MAC1 |     -   145     -   125    46     -     -     -     -     - |  288  16.76
 MALI |     -     -     -    95    47     -     -     -     -     - |  287 144.11
 MAS1 |     -    41    62    68     -     -707435     -     -     - |  288   2.18
 MATE |     -    80    36   111     -     -707470     -     -     - |  288   0.27
 MAW1 |     -    32     -     -    23     -     -     -     -     - |  282  26.60
 MCM4 |     -   144     -   104    58     -     -     -     -     - |  288  26.82
 MDO1 |     -    36     -    51     -     -     -     -     -     - |  263  21.78
 MKEA |     -    49    55    63     -     -     -     -     -     - |  288  49.33
 NKLG |     -     -     -    48    24     -     -     -     -     - |   89  80.71
 NLIB |     -    52     -    73     -     -     -     -     -     - |  187   0.05
 NRC2 |     -    28    58    59     -     -     -     -     -     - |  288   0.03
 NYA1 |     -    58     -     -    40     -688762     -     -     - |  288   0.10
 NYAL |     -     -    28    36     -     -     -     -     -     - |   81   0.19
 ONSA |     -    84    38   145    23     -     -     -     -     - |  288   0.38
 PERT |     -    38     -    54     -     -     -     -     -     - |  288  20.08
 PIE1 |     -    78    65   127     -     -     -     -     -     - |  263   0.08
 REYK |     -   138     -   195     -     -     -     -     -     - |  270   8.62
 SANT |     -   119     -   237    54     -     -     -     -     - |  288  17.95
 SELE |     -    60     -    85     -     -     -     -     -     - |  288  34.35
 SFER |     -    60     -    84     -     -     -     -     -     - |  287   1.11
 STJO |     -    44    46     -    32     -     -     -     -     - |  288  17.15
 SUTH |     -   167     -   182   111     -     -     -     -     - |  283  30.43
 TIDB |     -    69     -     -    48     -707429     -     -     - |  288   0.08
 TRO1 |     -    68     -     -    47     -     -     -     -     - |  288  11.31
 TSKB |     -     -    39    51     -     -     -     -     -     - |   83   1.81
 USNO |     -    14     -    20     -     -707464     -     -     - |  288   0.03
 USUD |     -    51     -    72     -     -     -     -     -     - |  288   0.16
 VILL |     -    53     -    75     -     -     -     -     -     - |  288  28.04
 WHIT |     -    48     -     -    33     -     -     -     -     - |  286  72.23
 WSRT |     -    81     -   113     -     -700418     -     -     - |  285   0.04
 WTZR |     -    89     -   125     -     -707480     -     -     - |  288   0.07
 WUHN |     -    43     -    68    26     -707497     -     -     - |  287  42.98
 YAR2 |     -    25     -    35     -     -639633     -     -     - |  282   2.82
 YELL |     -   111   222   146     -     -     -     -     -     - |  287   0.07
 -----+-------------------------------------------------------------+--------------
 TOT  |  4246    91    99   125    66  5683654726  4184     -   143 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

