
 GPS week: 1145   Day: 4   MJD: 52263                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2592      0     0.00    -0.10     4.95     0.00
 cod |   288     0  22558      5     0.17    -0.79     0.09    15.05
 emr |    96     0   3853     32  1572.50    13.10     0.06    27.77
 esa |   288     0  16775    890  1574.98    12.85     0.10    13.55
 gfz |   263     0  12730    229     0.46    -2.50     0.09    14.58
 igu |    96     0   2496     15    -0.22     1.17     4.85     0.00
 jpl |   280     0  11082    540     1.77     1.09     0.08    15.39
 ngs |    96     0   2592      0    -0.01    -0.09     4.85     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16442    685   665.62    -2.46     0.09    13.67

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  -749   109   -68   201   -68  7128   -55 -1123     -  -175 |
    2 | -1120    82    85  -240    -4  6283    78 -1350     -    50 |
    3 | -8315    49  -180   228   194 -3274    77 -7351     -  -385 |
    4 | -2436   -46   -56   232   128  1357  -284 -2451     -  -111 |
    5 | -2025    56  -129    69  -170 -7643    16 -1373     -   114 |
    6 |  5383   -93   -64   111   250 14556   -12  4736     -  -193 |
    7 |  3534   -26  -100   -20   173 -9281   -62  2784     -   -19 |
    8 |   474    87   -10  -130    94 -2140   -11   335     -   -46 |
    9 |  1174  -194  -103    87    41 17025   -42  1330     -   177 |
   10 | -5417   164    86  -306   -70  1298   139 -5276     -    52 |
   11 |  2346   -65   -17   116   -26  2265    31  2265     -   -25 |
   13 |  6113   -21   158    26   -76  3348  -113  5694     -    18 |
   14 |  5094    32   -62    74  -140  5859   121  5043     -     X |
   15 |   705   -47    73     -    41  4079    44  -231     -   -62 |
   17 | -1114    35   122   -12    54-26650   106 -1223     -  -219 |
   18 | 13091  -255    32   307   156  6805   -93 12863     -  -146 |
   20 |  6481   125    37   -34   -67  4620   106  6051     -  -120 |
   21 | -9561   174   -63    18    61-23468   153 -7740     -  -309 |
   22 |  -587    98   -98    94   -61 -1984   347  -604     -  -258 |
   23 | -7763    35     4     X  -101     -   107 -7336     -     - |
   24 |  1166    29    35     X   -48  2157   -87  1153     -    39 |
   25 | -4426   155  -192   147   116  5499   114 -4199     -  -360 |
   26 | -3577  -139   -75    71   -18 -2520  -139 -3660     -   232 |
   27 | -2889    86    12    -5    88   863   -79 -2864     -  -141 |
   28 |    26  -113   -51    81  -120  2465   -59   178     -   227 |
   30 |  1548    40  -110    93    33 -7577     7  2396     -   -97 |
   31 |  2843    66  -181    23   -37 -5152   258  1952     -   -77 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -58     -     -     -     -    57     -     -     - |
 ALGO |     -  -200    33     X     -     -    -3     -     -   201 |
 AMC2 |     -   188     -     -     -     -  -184     -     -     - |
 AUCK |     -   -35     -     -     -     -   -12     -     -    52 |
 BAHR |     -    75    12   -11     -     -   -20     -     -   -57 |
 BRMU |     -  -135     -   106     -     -     -     -     -    44 |
 BRUS |     -   -10     -     -     -     -    10     -     -     - |
 CAS1 |     -    15     -  -123     -     -     2     -     -   103 |
 CRO1 |     -   -80     -     -     -     -    78     -     -     - |
 DARW |     -     0     -     -     -     -     0     -     -     - |
 DAV1 |     -     1     -     -     -     -     -     -     -    -1 |
 DRAO |     -   -28    50     -     -     -     -     -     -    -3 |
 FAIR |     -     -     X     -     -     -    -4     -     -     4 |
 FORT |     -     -     -   378     -     -     -     -     -  -375 |
 GALA |     -  -211     -   212     -     -    -7     -     -    20 |
 GUAM |     -   -65     -  -123     -     -   -76     -     -   277 |
 HOB2 |     -   -53     -  -119     -     -     -     -     -   176 |
 HRAO |     -   -84     -     -     -     -    82     -     -     - |
 IISC |     -  -442     -   265     -     -     -     -     -   222 |
 KARR |     -  -147     -     -   152     -     -     -     -     - |
 KERG |     -   101     -     -     -     -   187     -     -  -310 |
 KOKB |     -     -     -     -    -4     -     4     -     -     X |
 KWJ1 |     -     -     -     -    35     -   -33     -     -     X |
 LPGS |     -    -7     -     -     X     -     7     -     -     - |
 MAC1 |     -   -20     -   107   -86     -     -     -     -     - |
 MALI |     -     -     -  -170   158     -     -     -     -     - |
 MAS1 |     -  -205    49   180     -     -    38     -     -   -27 |
 MATE |     -    73    23   328     -     -  -400     -     -    12 |
 MAW1 |     -    88     -     -   -91     -     -     -     -     - |
 MCM4 |     -   -71     -   260    -2     -     -     -     -  -178 |
 MDO1 |     -    80     -   -89     -     -     -     -     -     - |
 MKEA |     -     -    99     -  -189     -     -     -     -     - |
 NLIB |     -   385     -  -603   -65     -     -     -     -   261 |
 NRC2 |     -   -65   100     4     -     -     -     -     -     - |
 NTUS |     -   -24     -     -     -     -     -     -     -    26 |
 NYA1 |     -    91     -     -  -141     -    34     -     -     - |
 NYAL |     -     -   182  -308     -     -     -     -     -   190 |
 ONSA |     -  -205    44   282   -40     -     -     -     -   -45 |
 PERT |     -   101     -  -168     -     -     -     -     -    55 |
 PETP |     -   -27     -     -     -     -    27     -     -     - |
 PIE1 |     -    35   -25  -169     -     -     -     -     -   146 |
 POTS |     -  -143     -   242   -85     -     -     -     -     - |
 SANT |     -   -61     -  -215   121     -     -     -     -   163 |
 SELE |     -   510     -  -676     -     -   100     -     -     - |
 STJO |     -     9    42     -   -39     -     -     -     -     - |
 SUTH |     -    10     -  -116     -     -     -     -     -   104 |
 TIDB |     -    98     -     -  -101     -     X     -     -     - |
 TOW2 |     -   -49     -     -    51     -     -     -     -     - |
 TRO1 |     -   -68     -     -    71     -     -     -     -     - |
 TSKB |     -   179   191  -585     -     -     -     -     -   266 |
 URUM |     -   -75     -     -   -83     -     -     -     -   164 |
 USNO |     -   100     -  -365     -     -     X     -     -   252 |
 USUD |     -    52     -  -222     -     -   151     -     -     - |
 VILL |     -   -37     -    41     -     -     -     -     -     - |
 WHIT |     -    39     -     -   -41     -     -     -     -     - |
 WSRT |     -   -41     -   218     -     -  -128     -     -   -32 |
 WTZR |     -  -111     -   228     -     -   -82     -     -   -14 |
 WUHN |     -   182     -    32   -48     -  -155     -     -   -14 |
 YELL |     -   -35   133    35   -88     -     -     -     -     - |
 YSSK |     -    35     -     -   -36     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4929   130    52    73   191  4604   110  5050     -   149 |  288   4.22
    2 |  6877    73    71    45    49  4785    45  7043     -   100 |  288   2.61
    3 |  5048   144    71   104    99  2986    57  5286     -    71 |  288   2.22
    4 |  1738    79    49    60    62  1521    43  1712     -    56 |  288   1.06
    5 |  5972    58    54    51    55  3484    49  6542     -    65 |  288   3.47
    6 | 11050    70    57   107   111  4478    29 10554     -    51 |  288  10.13
    7 |  3753   130    88    78   132  7279    81  3021     -    48 |  288   1.94
    8 |  4843    67    58    63    70  2618    42  4746     -    63 |  288   4.17
    9 |  5129    86    50    60    66  7914    36  5256     -    78 |  288   1.42
   10 |  1630    98    44   183   118  1905   106  1648     -    89 |  288   1.18
   11 |  1203   107    41    56   117  1247    98  1277     -    71 |  288   0.80
   13 |  1748    99   106   154    80  1517   236  1660     -   192 |  288   0.46
   14 |  1353    86    81   112    72  3089    82  1326     -     X |  288   0.30
   15 |  8434   111    60     -   237  3801   127  8038     -   135 |  286   3.36
   17 |  1069    55    52   136   130 15264    54  1042     -    75 |  288   2.98
   18 |  2221    62    91    46    57  3627   161  2285     -   111 |  288   0.35
   20 |  2330    61    82    81   124  2283   120  2200     -   186 |  288   0.24
   21 |  6841   111    40    65    74  8318   154  6129     -   126 |  288   3.60
   22 |  1363   120    37   110    58  1712    86  1536     -   137 |  288   0.46
   23 |  5593    57    43     X    45     -    88  5806     -     - |  280   4.75
   24 |  2370    80    34     X   151  1653    90  2300     -    80 |  288   2.08
   25 |  3850    76    60    65    59  4662    84  4170     -   225 |  288   1.88
   26 |  1003   171    64   124    59  2078    74   905     -   137 |  286   0.68
   27 |  7030   110    35   142    44  2573    32  6415     -    71 |  288   3.44
   28 |  1251   114    72   240   119  1938    63  1271     -    93 |  288   0.28
   30 |  4270    50    49    92    92  4035    45  2685     -    53 |  288   1.12
   31 |  9194    91    70    63   162  5553    78  9580     -   127 |  288   4.90
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    40     -     -     -     -    39     -     -     - |  280   0.05
 ALGO |     -    43    53     X     -     -    33     -     -    25 |  288   0.03
 AMC2 |     -    36     -     -     -     -    35     -     -     - |  280   0.04
 AUCK |     -    62     -     -     -     -    50     -     -    46 |  264  19.19
 BAHR |     -    27    36    54     -     -    36     -     -    42 |  288   0.54
 BRMU |     -    47     -    39     -     -     -     -     -    70 |  288  28.88
 BRUS |     -    26     -     -     -     -    25     -     -     - |  279   0.04
 CAS1 |     -    47     -    49     -     -   102     -     -    62 |  288   8.19
 CRO1 |     -    56     -     -     -     -    55     -     -     - |  269   0.10
 DARW |     -   130     -     -     -     -   127     -     -     - |  265  28.22
 DAV1 |     -    45     -     -     -     -     -     -     -    49 |  288  18.93
 DRAO |     -    27    26     -     -     -     -     -     -    33 |  288   0.05
 FAIR |     -     -     X     -     -     -   177     -     -   199 |  109   0.12
 FORT |     -     -     -    94     -     -     -     -     -    93 |  156   0.18
 GALA |     -   337     -   197     -     -    69     -     -   157 |  288  43.19
 GUAM |     -    93     -    55     -     -    48     -     -    92 |  288  33.25
 HOB2 |     -    59     -    52     -     -     -     -     -    37 |  288   0.07
 HRAO |     -   131     -     -     -     -   128     -     -     - |  277  22.79
 IISC |     -   143     -   125     -     -     -     -     -    96 |  288  39.56
 KARR |     -    23     -     -    24     -     -     -     -     - |  263  17.68
 KERG |     -    52     -     -     -     -    57     -     -    66 |  287   1.23
 KOKB |     -     -     -     -    96     -    91     -     -     X |  199   7.82
 KWJ1 |     -     -     -     -   191     -   181     -     -     X |  195  81.63
 LPGS |     -   114     -     -     X     -   112     -     -     - |  250  44.20
 MAC1 |     -    85     -    41    76     -     -     -     -     - |  288  17.33
 MALI |     -     -     -    65    61     -     -     -     -     - |  263 230.27
 MAS1 |     -    60    22    53     -     -    46     -     -    33 |  288   2.03
 MATE |     -    30    29    46     -     -    26     -     -    36 |  288   0.24
 MAW1 |     -    28     -     -    29     -     -     -     -     - |  259  16.85
 MCM4 |     -    47     -   110    81     -     -     -     -    30 |  287  36.91
 MDO1 |     -    41     -    46     -     -     -     -     -     - |  288  24.69
 MKEA |     -     -    24     -    46     -     -     -     -     - |   89  49.47
 NLIB |     -    99     -   100    83     -     -     -     -   108 |  280   0.12
 NRC2 |     -    47    47    37     -     -     -     -     -     - |  288   0.05
 NTUS |     -    93     -     -     -     -     -     -     -   102 |  288   8.34
 NYA1 |     -    47     -     -    51     -    83     -     -     - |  287   0.05
 NYAL |     -     -    70    73     -     -     -     -     -    72 |  282   0.05
 ONSA |     -    53    33    55    62     -     -     -     -    50 |  288   1.24
 PERT |     -    40     -    42     -     -     -     -     -    39 |  288  20.86
 PETP |     -    62     -     -     -     -    61     -     -     - |  280  23.61
 PIE1 |     -    55    34    35     -     -     -     -     -    60 |  288   0.04
 POTS |     -    12     -    48    51     -     -     -     -     - |  288  15.49
 SANT |     -    65     -   108    49     -     -     -     -    57 |  288  22.39
 SELE |     -    58     -    80     -     -    40     -     -     - |  288  34.42
 STJO |     -    38    25     -    40     -     -     -     -     - |  270  14.02
 SUTH |     -   207     -   222     -     -     -     -     -    87 |  288  20.35
 TIDB |     -    29     -     -    30     -     X     -     -     - |  263   0.09
 TOW2 |     -    26     -     -    27     -     -     -     -     - |  263  11.35
 TRO1 |     -    15     -     -    15     -     -     -     -     - |  263  10.87
 TSKB |     -   130    60    89     -     -     -     -     -    76 |  288   1.64
 URUM |     -    74     -     -    31     -     -     -     -    95 |  288  39.73
 USNO |     -    72     -    31     -     -     X     -     -    65 |  288   0.03
 USUD |     -    57     -    93     -     -    41     -     -     - |  288   0.72
 VILL |     -    35     -    39     -     -     -     -     -     - |  288  26.87
 WHIT |     -    49     -     -    50     -     -     -     -     - |  263  37.12
 WSRT |     -    81     -    33     -     -    34     -     -    43 |  288   0.03
 WTZR |     -    64     -    38     -     -    29     -     -    35 |  288   0.07
 WUHN |     -    56     -    36    54     -    30     -     -   101 |  287  41.11
 YELL |     -   111   105   226    81     -     -     -     -     - |  288   0.09
 YSSK |     -    47     -     -    49     -     -     -     -     - |  262  18.80
 -----+-------------------------------------------------------------+--------------
 TOT  |  4950    89    58    98    92  4851    82  4854     -    94 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

