
 GPS week: 1144   Day: 3   MJD: 52255                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2586      0     0.16    -0.07     5.05     0.00
 cod |   288     0  20246     14    -0.61     0.98     0.06    30.97
 emr |    96     0   3799      0  1453.37    14.88     0.11    18.14
 esa |   288     0  16761   1182  1441.12    14.96     0.12    15.49
 gfz |   288     0  13875      0    -0.07    -0.33     0.08    23.16
 igu |    96     1   2203     22    -1.14    -1.59     4.93     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2586      0     0.17    -0.07     4.76     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0   7733    306   661.91     9.02     0.14    12.25

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1580   -70  -160   102    33******     -   458     -    67 |
    2 | -4838    28    50  -143    97******     - -4315     -   -98 |
    3 |  5030    44  -207  -161   142******     -  4211     -   -89 |
    4 | -4303   -69     4    79   -75******     - -4145     -   214 |
    6 |  -588    37  -165   271  -138******     -    49     -   -78 |
    7 |  2037    25    86  -345   130******     -  2104     -    64 |
    8 | -7610    67  -114  -222   164******     - -6821     -  -142 |
    9 | -5588   -34  -184   395  -184******     - -4931     -    25 |
   10 |  4222    61    44   -60   -25******     -  3699     -   -53 |
   11 |  5307  -169   -13   -30   107******     -  5215     -   270 |
   13 |  3592   -42   -20    41   -94******     -  3526     -   242 |
   14 |  4000   -14   -34     X   -80******     -  4010     -   204 |
   15 |  -762     1    45     -     6     -     - -1118     -   -37 |
   17 |  3633    83    45    63   -49     -     -  2858     -  -218 |
   18 |  5120  -146    41   367   -62******     -  5356     -     X |
   20 |  4525  -130   130  -135   101******     -  4271     -   246 |
   21 |  4461    -6  -139     X    -1******     -  3808     -    86 |
   22 |  7614   140  -205  -181   148******     -  6014     -  -305 |
   23 |  1332    44   -99   233     2     -     -   546     -  -362 |
   24 | -7878   -37    42   139  -133******     - -7526     -   150 |
   25 |   453    66  -179   -48    16******     -   405     -   -48 |
   26 | -4136   -71   -12    61    16******     - -3770     -    77 |
   27 | -6922     3  -190  -193   311******     - -5624     -  -259 |
   28 | -1577    38    12  -410    98******     - -1079     -   230 |
   29 | -3071    13  -212   -96    43     -     - -2830     -   112 |
   30 | -1384    23  -323   536  -176******     - -1809     -  -245 |
   31 | -4192    14  -114  -403   296******     - -2483     -   -65 |
 -----+-------------------------------------------------------------+
 ALGO |     -   -10   147     X   -28     -     -     -     -     - |
 BAHR |     -     8   -11     -    -8     -     -     -     -     - |
 BILI |     -    31     -     -   -41     -     -     -     -     - |
 BRMU |     -   -27     -    47     4     -     -     -     -     - |
 CAS1 |     -   -22     -     -    29     -     -     -     -     - |
 CEDU |     -   162     -  -323     -     -     -     -     -     - |
 CRO1 |     -   -43     -    86     -     -     -     -     -     - |
 DAV1 |     -   -31     -     -    41     -     -     -     -     - |
 DRAO |     -   -48    82     -     -     -     -     -     -     - |
 EISL |     -     1     -    -1     -     -     -     -     -     - |
 FLIN |     -   -71     -   141     -     -     -     -     -     - |
 FORT |     -    -4     -     9     -     -     -     -     -     - |
 GALA |     -   -21     -   -21    42     -     -     -     -     - |
 GUAM |     -  -117     -   189    29     -     -     -     -     - |
 HOB2 |     -   -60   102     -     -     -     -     -     -     - |
 HRAO |     -  -135     -     -   180     -     -     -     -     - |
 LPGS |     -   545     -     -  -728     -     -     -     -     - |
 MAC1 |     -    12     -  -110    57     -     -     -     -     - |
 MAS1 |     -    76   201   -33  -131     -     -     -     -     - |
 MATE |     -   120   158  -267     -     -     -     -     -     - |
 MAW1 |     -   131     -     -  -175     -     -     -     -     - |
 MCM4 |     -   113     -  -176   -34     -     -     -     -     - |
 MDO1 |     -   -27     -    53     -     -     -     -     -     - |
 MKEA |     -  -103   173     -     -     -     -     -     -     - |
 MSKU |     -   -41     -     -    55     -     -     -     -     - |
 NLIB |     -    45     -   -90     -     -     -     -     -     - |
 NRC2 |     -   -86   183    98     -     -     -     -     -     - |
 NYA1 |     -    43     -     -   -59     -     -     -     -     - |
 ONSA |     -   -54   128    58     -     -     -     -     -     - |
 PERT |     -   101     -  -202     -     -     -     -     -     - |
 PIE1 |     -  -382   261   583     -     -     -     -     -     - |
 POTS |     -     6     -   -13     -     -     -     -     -     - |
 REYK |     -  -104     -   207     -     -     -     -     -     - |
 RIOG |     -    61     -     -   -82     -     -     -     -     - |
 SANT |     -   117     -    37  -177     -     -     -     -     - |
 SCH2 |     -    15     -   -30     -     -     -     -     -     - |
 SFER |     -   107     -  -214     -     -     -     -     -     - |
 STJO |     -   -10   229     X   -46     -     -     -     -     - |
 SUTH |     -    -7     -    14     -     -     -     -     -     - |
 TRO1 |     -   -73     -     -    97     -     -     -     -     - |
 TSKB |     -     -   209  -244     -     -     -     -     -     - |
 USNO |     -    61     -  -123     -     -     -     -     -     - |
 USUD |     -    13     -   -26     -     -     -     -     -     - |
 VILL |     -   -15     -    30     -     -     -     -     -     - |
 WHIT |     -   -31     -   195   -90     -     -     -     -     - |
 WSRT |     -    29     -   -58     -     -     -     -     -     - |
 WTZR |     -   -42     -    85     -     -     -     -     -     - |
 WUHN |     -    37     -  -112    26     -     -     -     -     - |
 YAR2 |     -     8     -   -17     -     -     -     -     -     - |
 YELL |     -  -100    35   198     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6826    65    66    66    60  5177     -  5605     -   220 |  288   3.92
    2 |  2128    48   112    81   109  5180     -  2203     -    93 |  288   1.82
    3 |  4209    70   137   177    99  5526     -  4107     -   113 |  288   2.15
    4 |  1830    44   105   111    91  3488     -  1887     -   114 |  288   0.59
    6 | 15452   176   114    71   237  6711     - 13773     -    92 |  280  11.75
    7 |  4761   118    96   176    80  2779     -  4759     -   194 |  281   0.69
    8 |  5514    29    69   107   115  5107     -  5908     -   137 |  288   5.07
    9 |  3947   136    65    71    89  5316     -  3325     -   134 |  288   2.25
   10 |  4183    39    84   294   172  4476     -  4068     -    65 |  288   2.75
   11 |  1112    73   100   181    62  3879     -  1293     -    98 |  288   0.34
   13 |  1312    73    69    48    77  3340     -  1438     -   198 |  288   0.21
   14 |  1743    60    76     X    72  3526     -  1850     -   135 |  288   0.24
   15 |  7681    78    67     -    65     -     -  6606     -   231 |  288   2.38
   17 |  2914    63   128   117    66     -     -  3170     -    78 |  287   2.73
   18 |  1558    63   121   187   101  3485     -  1404     -     X |  288   0.36
   20 |  1749    53    48    87    62  3285     -  1488     -    78 |  288   0.19
   21 |  3878    73    89     X   106  5422     -  3828     -   240 |  288   3.54
   22 |  4280    41   162   106    55  4462     -  4897     -   100 |  288   1.18
   23 |  8764    57   147   191   179     -     -  9027     -   101 |  288   7.49
   24 |  1770    63    88   130   105  4800     -  1744     -    99 |  288   1.32
   25 |  1729    48    59    70    51  3966     -  1534     -    92 |  288   1.91
   26 |  1925    61    45   166    83  3298     -  1930     -   148 |  288   0.80
   27 |  6176    88    71    50    52  3820     -  5684     -   253 |  288   2.03
   28 |  2099    49   149   234    87  4422     -  2294     -   107 |  288   0.63
   29 |  1997    59    61   214    93     -     -  1818     -   119 |  288   0.70
   30 |  3902    81   215   126    42 10647     -  3759     -    88 |  288   1.85
   31 |  6572    91   182   126   128  5822     -  6413     -    96 |  284   4.89
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    20    67     X    19     -     -     -     -     - |  268   0.04
 BAHR |     -    30    36     -    42     -     -     -     -     - |  286   0.46
 BILI |     -    18     -     -    24     -     -     -     -     - |  282  15.14
 BRMU |     -    32     -    53    27     -     -     -     -     - |  288  31.22
 CAS1 |     -    46     -     -    62     -     -     -     -     - |  288   9.06
 CEDU |     -    53     -   107     -     -     -     -     -     - |  288  15.08
 CRO1 |     -    36     -    71     -     -     -     -     -     - |  288   0.10
 DAV1 |     -    28     -     -    38     -     -     -     -     - |  287  22.92
 DRAO |     -    48    83     -     -     -     -     -     -     - |   96   0.14
 EISL |     -    52     -   104     -     -     -     -     -     - |  208  30.67
 FLIN |     -    17     -    35     -     -     -     -     -     - |  286  12.18
 FORT |     -    21     -    42     -     -     -     -     -     - |  138   0.19
 GALA |     -    33     -    97    30     -     -     -     -     - |  288  37.93
 GUAM |     -    33     -    92    54     -     -     -     -     - |  288  33.41
 HOB2 |     -    24    42     -     -     -     -     -     -     - |   91   0.10
 HRAO |     -    73     -     -    98     -     -     -     -     - |  288  32.42
 LPGS |     -    14     -     -    19     -     -     -     -     - |  150  37.06
 MAC1 |     -    62     -   142    90     -     -     -     -     - |  288  16.88
 MAS1 |     -    15    64    42    27     -     -     -     -     - |  288   3.32
 MATE |     -    83   114   128     -     -     -     -     -     - |  161   0.70
 MAW1 |     -    41     -     -    56     -     -     -     -     - |  287  24.90
 MCM4 |     -    55     -   157    90     -     -     -     -     - |  288   9.16
 MDO1 |     -    53     -   105     -     -     -     -     -     - |  267  16.56
 MKEA |     -    36    60     -     -     -     -     -     -     - |   96  49.44
 MSKU |     -    49     -     -    66     -     -     -     -     - |  288  39.07
 NLIB |     -    44     -    88     -     -     -     -     -     - |  288   0.02
 NRC2 |     -    27    57    45     -     -     -     -     -     - |  287   0.06
 NYA1 |     -    21     -     -    29     -     -     -     -     - |  288   0.10
 ONSA |     -    42    36    86     -     -     -     -     -     - |  287   0.09
 PERT |     -    70     -   139     -     -     -     -     -     - |  286  21.20
 PIE1 |     -    56   223   103     -     -     -     -     -     - |  246   0.46
 POTS |     -    51     -   103     -     -     -     -     -     - |  288  15.58
 REYK |     -    58     -   115     -     -     -     -     -     - |  272   9.10
 RIOG |     -    44     -     -    59     -     -     -     -     - |  274  11.36
 SANT |     -    83     -   166    80     -     -     -     -     - |  287  15.34
 SCH2 |     -    47     -    94     -     -     -     -     -     - |  156  11.72
 SFER |     -    18     -    35     -     -     -     -     -     - |  287   0.90
 STJO |     -    33    74     X    35     -     -     -     -     - |  288  41.99
 SUTH |     -    70     -   139     -     -     -     -     -     - |  207  24.31
 TRO1 |     -    14     -     -    19     -     -     -     -     - |  288   9.50
 TSKB |     -     -    90   105     -     -     -     -     -     - |   87   1.03
 USNO |     -    51     -   102     -     -     -     -     -     - |  280   0.07
 USUD |     -    53     -   105     -     -     -     -     -     - |  286   0.27
 VILL |     -    31     -    63     -     -     -     -     -     - |  288  35.72
 WHIT |     -    21     -    44    37     -     -     -     -     - |  285  11.78
 WSRT |     -    51     -   103     -     -     -     -     -     - |  285   0.06
 WTZR |     -    23     -    47     -     -     -     -     -     - |  227   0.06
 WUHN |     -    31     -    60    51     -     -     -     -     - |  287  37.80
 YAR2 |     -    88     -   175     -     -     -     -     -     - |  286   4.31
 YELL |     -   104   146   193     -     -     -     -     -     - |  251   0.07
 -----+-------------------------------------------------------------+--------------
 TOT  |  5053    60   105   125    85  4931     -  4761     -   142 |


 BEST CLOCK FIT: NLIB   288   0.02 (ns) 

