
 GPS week: 1143   Day: 4   MJD: 52249                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2674      0     0.02     0.12     4.15     0.00
 cod |   288     0  24963     13    -0.18     0.48     0.08    22.95
 emr |    96     0   3907     97  1368.18    16.48     0.11    16.07
 esa |   288     0  18220    528  1356.75    16.34     0.12    13.64
 gfz |   288     0  14563    268     0.23    -0.19     0.12    13.86
 igu |    96     0   2290      0     0.03     0.07     5.03     0.00
 jpl |    96     7   2345      0    -0.42    -0.54     0.10    17.17
 ngs |    96     0   2674      0     0.02     0.12     3.94     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24440    887   693.62    -0.07     0.11    16.30

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  2459    -2  -114   180   -32 20602    62  1614     -  -102 |
    2 | -6650   -81  -271  -115   190  2897   194 -6244     -    77 |
    3 |  1455   100  -344   -36   -26   254    72   862     -     X |
    4 | -1843    55    69    96   154  -663  -140 -1678     -  -267 |
    5 | -6394   182   -37   225   -98     -   -52 -5510     -  -333 |
    6 | -6665    66   -50   138    75 -3646    57 -5378     -  -268 |
    7 | -3755   -63    26   -72   163-12120   -84 -3727     -    25 |
    8 |-11113    70   -93  -147   137     -   109-10155     -   -96 |
    9 |  3030   104    13   127   129 13077   -92  2499     -  -338 |
   10 | -4844    93   122    55    26 -7632  -129 -4850     -  -200 |
   11 |  4726  -115   125    51   125  4011   -82  4937     -    -4 |
   13 |  5794    64   252  -137    52  2587  -194  5811     -   -43 |
   14 |  3360    -7   -17   187  -131  4410   -97  3365     -     X |
   15 | -4855    78    79     -    16 -8189   -35 -4871     -  -139 |
   17 |  3220   201    32  -105    62     -   -13  2619     -  -254 |
   18 |  6049    -8   106   318  -150  2086   -80  6135     -  -138 |
   20 |  5170   -59  -173   238  -109  1840    35  5195     -    23 |
   21 |    92     -     X     X   120 -1988    85    -8     -  -128 |
   22 |  1230   124  -467  -202   -43 -6565   415  1215     -    56 |
   23 | -2186   237    82   -79   133     -    29 -2255     -  -419 |
   24 |  3781    35    75   240    31  4646  -136  3293     -  -259 |
   25 |   424   160  -148    34   -53  2572    78   153     -  -184 |
   26 | -2408    91   167    95   178 -3604  -142 -2298     -  -369 |
   27 |  6675    72  -255  -130   175  3439   147  6341     -  -102 |
   28 |  8227   -40   271    -6  -138  1722  -104  8136     -   122 |
   29 |  1323    87  -125   131    -8 -1163    24  1218     -  -191 |
   30 | -3580   210   -80   204  -109-17670     2 -3753     -  -349 |
   31 | -2548   139  -197  -231    39 -1150    64 -2487     -     X |
 -----+-------------------------------------------------------------+
 ALBH |     -   -40     -    50     -     -     -     -     -    22 |
 ALGO |     -   -73   105     X   -63     -     -     -     -    53 |
 AMC2 |     -   -11     -     -     -     -     -     -     -    16 |
 AOML |     -  -129     -     -     -     -     -     -     -   181 |
 ARTU |     -    68     -     -  -112     -     -     -     -     - |
 AUCK |     -   -45     -     -     -     -     -     -     -    63 |
 BAHR |     -    86     -  -118   -27     -     -     -     -     - |
 BILI |     -   -42     -     -    69     -     -     -     -     - |
 BOR1 |     -   -70     -     -     -     -     -     -     -    99 |
 BRMU |     -    27     -  -236    85     -     -     -     -    87 |
 BRUS |     -   -61     -     -     -     -     -     -     -    86 |
 CAS1 |     -  -105     -   110   -23     -     -     -     -    75 |
 CRO1 |     -  -129     -   -84     -     -     -     -     -   254 |
 DAEJ |     -  -735     -     -     -     -     -     -     -  1034 |
 DAV1 |     -   -33     -     -  -126     -     -     -     -   153 |
 DRAO |     -    94    13     -     -     -     -     -     -  -136 |
 EISL |     -    26     -   -44     -     -     -     -     -     - |
 FORT |     -   148     -  -249     -     -     -     -     -     - |
 GALA |     -    34     -     1   -97     -     -     -     -    34 |
 GODE |     -   -37     -     -     -     -     -     -     -    53 |
 GOLD |     -   -59     -     -     -     -     -     -     -    84 |
 GRAZ |     -  -118     -     -     -     -     -     -     -   166 |
 GUAM |     -  -194     -   553  -266     -     -     -     -   150 |
 HOB2 |     -     3   108  -102     -     -     -     -     -    46 |
 HRAO |     -   -34     -     -     -     -     -     -     -    48 |
 IRKT |     -     -    30   -35     -     -     -     -     -     - |
 KARR |     -  -108     -     -   178     -     -     -     -     - |
 KERG |     -   217     -     -     -     -     -     -     -  -305 |
 KIRU |     -   -39     -    66     -     -     -     -     -     - |
 KOKB |     -     -     -     -  -185     -     -     -     -   157 |
 KWJ1 |     -     -     -     -  -114     -     -     -     -    97 |
 LPGS |     -   -56     -     -     X     -     -     -     -    79 |
 MAC1 |     -   -90     -    98   -84     -     -     -     -   117 |
 MAS1 |     -  -132   277   -32     -     -     -     -     -   122 |
 MAW1 |     -    92     -     -   -73     -     -     -     -   -68 |
 MCM4 |     -    27     -    15    71     -     -     -     -  -111 |
 MDO1 |     -    67     -   -48     -     -     -     -     -   -54 |
 MEDI |     -   -82     -     -     -     -     -     -     -   115 |
 METS |     -  -104     -     -     -     -     -     -     -   146 |
 MKEA |     -     4    56    67     -     -     -     -     -   -81 |
 MSKU |     -   -11     -     -    19     -     -     -     -     - |
 NKLG |     -     -     -  -148     -     -     -     -     -   124 |
 NLIB |     -   140     -  -391     -     -     -     -     -   131 |
 NPLD |     -   -22     -     -     -     -     -     -     -    31 |
 NRC2 |     -   -80   119    96     -     -     -     -     -    -7 |
 NTUS |     -   -88     -     -     -     -     -     -     -   124 |
 NYA1 |     -     1     -     -  -110     -     -     -     -    94 |
 NYAL |     -     -   -48   147     -     -     -     -     -  -107 |
 ONSA |     -  -110     -   111   -44     -     -     -     -   100 |
 PENC |     -   199     -     -     -     -     -     -     -  -280 |
 PERT |     -   -19     -    63     -     -     -     -     -   -26 |
 PETP |     -    71     -     -  -118     -     -     -     -     - |
 PIE1 |     -   -17  -171  -181     -     -     -     -     -   227 |
 POTS |     -   -83     -    74     -     -     -     -     -    54 |
 REYK |     -    12     -     -     -     -     -     -     -   -17 |
 SANT |     -   114     -  -339    27     -     -     -     -   100 |
 SFER |     -  -292     -     -     -     -     -     -     -   410 |
 STJO |     -     9   242  -348     8     -     -     -     -   181 |
 SUTH |     -     -     -  -196     -     -     -     -     -   164 |
 THTI |     -     -     -    -5     -     -     -     -     -     4 |
 TRO1 |     -  -101     -     -   168     -     -     -     -     - |
 TROM |     -     -     -   184     -     -     -     -     -  -154 |
 TSKB |     -    97   -22  -205     -     -     -     -     -    46 |
 USNO |     -    58   231  -433     -     -     -     -     -   205 |
 USUD |     -   -16     -   138     -     -     -     -     -   -93 |
 VILL |     -   -58     -    53     -     -     -     -     -    37 |
 WSRT |     -    36     -   -79     -     -     -     -     -    15 |
 WTZR |     -   -91     -    64     -     -     -     -     -    75 |
 WUHN |     -   124     -    36  -192     -     -     -     -   -42 |
 YELL |     -  -156    -7   172     -     -     -     -     -    78 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5594    81    45    99    42 10948    57  4408     -    69 |  288   4.21
    2 |  6268    58    35    39   228  7328   147  5841     -   109 |  288   4.16
    3 |  5112   133   115   218   107  2698    79  4044     -     X |  278   1.52
    4 |  2819    79    84    85   182   904    83  3269     -   113 |  288   1.03
    5 |  4284    59   114    56    55     -    71  4799     -    62 |  288   2.65
    6 |  7840   196   277   273   385 11059   170  7768     -   278 |  281   7.84
    7 |  1698   138   145   220   214  5222   140  1776     -   145 |  282   0.77
    8 |  7501    47    57    53    85     -    86  6806     -    79 |  288   4.81
    9 |  2712    66   136   148    65  6054    67  2107     -   115 |  288   1.64
   10 |  3312   137    49   177   159  3322    88  3227     -   100 |  288   2.49
   11 |  1721    65   139   169   112  2742   103  1403     -   126 |  288   0.36
   13 |   758    68   105   177    71  2334   123   750     -   220 |  288   0.18
   14 |   770    74    64   105    67  3367    73   861     -     X |  288   0.34
   15 |  3065    68   133     -    49  3437    78  2904     -   114 |  288   2.66
   17 |  1936    63   114   116   124     -    88  2570     -    97 |  288   2.34
   18 |   888    88   139    89    57  2307    56   934     -   176 |  288   0.33
   20 |   913   121   182   119    67  2067   137   932     -    78 |  288   0.23
   21 |  2858     -     X     X   146  2325   144  2801     -   137 |  288   2.86
   22 |  7969    62   179    59    56  2687    90  7267     -    66 |  288   1.80
   23 |  7811   121    82   252   105     -    95  7722     -   177 |  288   8.09
   24 |  3877   128   138   135   132  3529   136  3496     -    63 |  288   2.30
   25 |  2746    59   105   121    55  3690    28  3054     -    89 |  288   2.53
   26 |  1070    53    62    90    78  1739   120  1091     -    62 |  288   0.57
   27 |  3646    61    96    71    77  4580    76  3387     -    93 |  288   3.97
   28 |  1057   111    53   144   118  1927   150  1103     -   100 |  272   0.38
   29 |  1587    73    65   183    48  1062    56  1556     -   153 |  288   1.01
   30 |  2731    54    89   140   215  9591    50  2640     -   141 |  288   1.53
   31 |  5050   153   154   189   264  5506   109  5038     -     X |  275   3.74
 -----+-------------------------------------------------------------+--------------
 ALBH |     -   117     -   334     -     -     -     -     -   120 |  288   0.12
 ALGO |     -    36    49     X    73     -     -     -     -    80 |  105   0.04
 AMC2 |     -    35     -     -     -     -     -     -     -    49 |  286   0.10
 AOML |     -    24     -     -     -     -     -     -     -    34 |  286  25.59
 ARTU |     -    17     -     -    28     -     -     -     -     - |  279  25.05
 AUCK |     -    42     -     -     -     -     -     -     -    59 |  264  16.51
 BAHR |     -    60     -    63    68     -     -     -     -     - |  288   0.62
 BILI |     -    22     -     -    37     -     -     -     -     - |  287  17.53
 BOR1 |     -   158     -     -     -     -     -     -     -   222 |  283  68.40
 BRMU |     -    37     -    60    63     -     -     -     -    47 |  288  36.14
 BRUS |     -    18     -     -     -     -     -     -     -    26 |  285   0.19
 CAS1 |     -    82     -    77    64     -     -     -     -    72 |  284   7.73
 CRO1 |     -    30     -    52     -     -     -     -     -    43 |  288   0.12
 DAEJ |     -    18     -     -     -     -     -     -     -    26 |  223   1.83
 DAV1 |     -    62     -     -    43     -     -     -     -    72 |  288  17.41
 DRAO |     -    34    27     -     -     -     -     -     -    47 |  288   0.05
 EISL |     -    73     -   123     -     -     -     -     -     - |  194  29.63
 FORT |     -    25     -    43     -     -     -     -     -     - |  153   0.20
 GALA |     -    18     -    54    53     -     -     -     -    51 |  288  32.98
 GODE |     -    91     -     -     -     -     -     -     -   129 |  270  10.32
 GOLD |     -    60     -     -     -     -     -     -     -    85 |  286  30.44
 GRAZ |     -    21     -     -     -     -     -     -     -    30 |  284  22.77
 GUAM |     -    75     -   105   103     -     -     -     -    60 |  288  31.63
 HOB2 |     -    67    81    55     -     -     -     -     -    65 |  288   0.10
 HRAO |     -    41     -     -     -     -     -     -     -    57 |  288  26.45
 IRKT |     -     -   100   118     -     -     -     -     -     - |   96   0.75
 KARR |     -    36     -     -    60     -     -     -     -     - |  288  21.52
 KERG |     -    38     -     -     -     -     -     -     -    54 |  287   1.07
 KIRU |     -    26     -    44     -     -     -     -     -     - |  288   6.00
 KOKB |     -     -     -     -   271     -     -     -     -   231 |  219   0.19
 KWJ1 |     -     -     -     -   150     -     -     -     -   127 |  247  94.05
 LPGS |     -   141     -     -     X     -     -     -     -   198 |  267  27.99
 MAC1 |     -    96     -    80    92     -     -     -     -    93 |  288  18.73
 MAS1 |     -    37    68    58     -     -     -     -     -    28 |  288   2.12
 MAW1 |     -    41     -     -    50     -     -     -     -    34 |  288  24.88
 MCM4 |     -   180     -   171   109     -     -     -     -   237 |  288    >>>
 MDO1 |     -    23     -   106     -     -     -     -     -    71 |  288  14.23
 MEDI |     -    14     -     -     -     -     -     -     -    20 |  285   0.15
 METS |     -    17     -     -     -     -     -     -     -    24 |  285   0.22
 MKEA |     -    31    53    50     -     -     -     -     -    30 |  288  46.91
 MSKU |     -    67     -     -   111     -     -     -     -     - |  287  36.45
 NKLG |     -     -     -    50     -     -     -     -     -    42 |  287    >>>
 NLIB |     -    25     -   103     -     -     -     -     -    61 |  288   0.11
 NPLD |     -    16     -     -     -     -     -     -     -    23 |  285   0.07
 NRC2 |     -    49    50    66     -     -     -     -     -    71 |  288   0.10
 NTUS |     -    20     -     -     -     -     -     -     -    28 |  288   7.39
 NYA1 |     -    16     -     -    18     -     -     -     -    34 |  288   0.09
 NYAL |     -     -   167   117     -     -     -     -     -    73 |  283   0.21
 ONSA |     -    21     -    29    53     -     -     -     -    44 |  288   0.20
 PENC |     -    22     -     -     -     -     -     -     -    31 |  285   9.89
 PERT |     -    35     -    69     -     -     -     -     -    55 |  288  18.10
 PETP |     -    27     -     -    44     -     -     -     -     - |  284  27.10
 PIE1 |     -    24    47   101     -     -     -     -     -    58 |  287   0.17
 POTS |     -    23     -    49     -     -     -     -     -    29 |  288  17.34
 REYK |     -    28     -     -     -     -     -     -     -    40 |  284   9.36
 SANT |     -   117     -    70    88     -     -     -     -    65 |  288  17.16
 SFER |     -   240     -     -     -     -     -     -     -   337 |  285  28.59
 STJO |     -    37    62    94    54     -     -     -     -    60 |  288  17.44
 SUTH |     -     -     -   267     -     -     -     -     -   223 |  258  48.65
 THTI |     -     -     -    52     -     -     -     -     -    43 |  287   3.30
 TRO1 |     -    16     -     -    26     -     -     -     -     - |  288  11.41
 TROM |     -     -     -    84     -     -     -     -     -    71 |  284  21.34
 TSKB |     -    50    43    99     -     -     -     -     -    34 |  288   0.82
 USNO |     -    26    76    46     -     -     -     -     -    48 |  288   0.04
 USUD |     -    48     -   116     -     -     -     -     -   118 |  288   0.35
 VILL |     -    21     -    41     -     -     -     -     -    24 |  288  34.20
 WSRT |     -    19     -    57     -     -     -     -     -    37 |  288   0.04
 WTZR |     -    19     -    42     -     -     -     -     -    37 |  288   0.09
 WUHN |     -    22     -    83    89     -     -     -     -    47 |  287  33.44
 YELL |     -    45    41   127     -     -     -     -     -    65 |  287   0.06
 -----+-------------------------------------------------------------+--------------
 TOT  |  4148    76   107   123   121  5030   102  3937     -   107 |


 BEST CLOCK FIT: USNO   288   0.04 (ns) 

