
 GPS week: 1143   Day: 3   MJD: 52248                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2679      0    -0.16     0.23     5.51     0.00
 cod |   288     0  22283     20     0.01    -0.27     0.10    19.36
 esa |   288     0  17231    184  1339.37    17.99     0.12    15.92
 gfz |   288     0  14570      0    -0.78     1.53     0.09    22.01
 igu |    96     0   2105      0    -0.18     0.29     6.26     0.00
 jpl |    96     7   2351      0    -0.18     0.19     0.09    23.01
 ngs |    96     0   2679      0    -0.16     0.23     5.31     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16157     52   597.99    12.61     0.10    19.70

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |-12339    40   171  -192    53    87-11475     -     5 |
    2 | -8503  -253    73   176 -2243   218 -7216     -   -83 |
    3 |  7134    69  -115   127  5159    55  5968     -  -138 |
    4 | -2197   -85    90   133  -377   -77 -1927     -  -119 |
    5 | -4491   164   295  -224-17219    31 -5312     -  -160 |
    6 |  4578   -35   219    73     -   -94  4626     -  -178 |
    7 |  5099  -105   189   130-12867   -39  3599     -  -168 |
    8 | -6935   218  -111   -67     -   230 -6553     -  -134 |
    9 | -6914   -11   295   -34 -1855   -92 -5810     -  -158 |
   10 |  2794    60    73    33 12750  -164  2330     -   -98 |
   11 |  2046   -73   104   -53  -907    30  2428     -    36 |
   13 |  5426    68   -29   -69   660  -181  5674     -    96 |
   14 |  3774   -59    31    17  1491  -118  3937     -    54 |
   15 | -5344   -54     -   120  4865   -43 -4706     -   -67 |
   17 |  2066    13  -101   226     -   -95  2181     -  -152 |
   18 |  6214  -159   202    26  1450  -142  6493     -    12 |
   20 |  5446  -181   280  -152  1111    47  5688     -   105 |
   21 | -3390   109  -165   -25     -    59 -3380     -    34 |
   22 |  1244   129   -56  -114-17551   439  1062     -  -103 |
   23 | -2696    31   252    83     -   -42 -2596     -  -313 |
   24 | -2289    75    56   -64  5641  -137 -2110     -     - |
   25 |    46    75    58     7   465    11   269     -  -131 |
   26 | -2719    19   -89   135 -4009  -135 -2593     -   -50 |
   27 |  4550    97  -129   270 14159    62  2907     -  -313 |
   28 |  2982   100  -179  -173 -1518   180  3036     -   154 |
   29 |   572   209   210   -75     -  -240   655     -  -209 |
   30 | -3991    99   191   -38-15658   -62 -3301     -  -188 |
   31 |  8459   167  -349   111 26723   217  6629     -   -99 |
 -----+-------------------------------------------------------+
 ALBH |     -    -9    11     -     -     -     -     -     - |
 ARTU |     -   130     -  -114     -     -     -     -     - |
 AUCK |     -   -59     -     -     -     -     -     -    58 |
 BILI |     -  -106     -    93     -     -     -     -     - |
 BRMU |     -    26  -192    18     -     -     -     -   109 |
 CAS1 |     -  -100     -   -20     -     -     -     -   120 |
 CRO1 |     -  -112   123     -     -     -     -     -    10 |
 DAV1 |     -    -6     -   -66     -     -     -     -    80 |
 DRAO |     -   -40     -     -     -     -     -     -    39 |
 EISL |     -    62   -76     -     -     -     -     -     - |
 GALA |     -   -41     -    36     -     -     -     -     - |
 GODE |     -    25   -31     -     -     -     -     -     - |
 GRAZ |     -  -152     -     -     -     -     -     -   150 |
 GUAM |     -   -56  -334    41     -     -     -     -   279 |
 HOB2 |     -   176  -489     -     -     -     -     -   223 |
 KARR |     -  -182     -   160     -     -     -     -     - |
 KERG |     -   168     -     -     -     -     -     -  -165 |
 KIRU |     -   -13    16     -     -     -     -     -     - |
 KOKB |     -     -     -   149     -     -     -     -  -166 |
 KOSG |     -   -33    40     -     -     -     -     -     - |
 KWJ1 |     -     -     -   -12     -     -     -     -    14 |
 LPGS |     -   237     -  -209     -     -     -     -     - |
 MAC1 |     -   -51   106   -32     -     -     -     -     - |
 MAS1 |     -  -175    72     -     -     -     -     -   114 |
 MATE |     -  -113   181     -     -     -     -     -   -36 |
 MAW1 |     -   152     -  -134     -     -     -     -     - |
 MCM4 |     -    38   -96   -62     -     -     -     -   110 |
 MDO1 |     -  -104   127     -     -     -     -     -     - |
 MKEA |     -   -26    32     -     -     -     -     -     - |
 NLIB |     -   -15    71     -     -     -     -     -   -43 |
 NRC2 |     -    19   -23     -     -     -     -     -     - |
 NTUS |     -  -112     -     -     -     -     -     -   110 |
 NYA1 |     -    72     -   -64     -     -     -     -     - |
 NYAL |     -     -   161     -     -     -     -     -  -130 |
 PERT |     -   -56   -56     -     -     -     -     -   100 |
 PETP |     -   -96     -    84     -     -     -     -     - |
 PIE1 |     -   -21  -423     -     -     -     -     -   318 |
 POTS |     -     8     -    -7     -     -     -     -     - |
 REYK |     -   -24    30     -     -     -     -     -     - |
 RIOG |     -   -46     -   -56     -     -     -     -   107 |
 SANT |     -  -108   214  -114     -     -     -     -    89 |
 SELE |     -    91  -111     -     -     -     -     -     - |
 SFER |     -   -65    79     -     -     -     -     -     - |
 STJO |     -     6   -85    57     -     -     -     -     - |
 THTI |     -     -  -130     -     -     -     -     -   105 |
 TIDB |     -    61     -   -54     -     -     -     -     - |
 TSKB |     -   201  -386     -     -     -     -     -   123 |
 USNO |     -    39  -353     -     -     -     -     -   247 |
 USUD |     -   -76    92     -     -     -     -     -     - |
 VILL |     -  -135    22     -     -     -     -     -   115 |
 WHIT |     -    87     -   -77     -     -     -     -     - |
 WSRT |     -   -33    47     -     -     -     -     -    -5 |
 WTZR |     -  -138   -16     -     -     -     -     -   148 |
 WUHN |     -    11    -8   -17     -     -     -     -    14 |
 YELL |     -   150  -182     -     -     -     -     -     - |
 ZWEN |     -     -     -   -57     -     -     -     -    63 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6644    87   113    35  5265    74  6714     -    62 |  288   3.87
    2 |  5265   186   237   109  3550   266  5186     -   188 |  288   2.94
    3 |  5117   336   227   229  3921    87  4797     -   212 |  282   3.09
    4 |  2019    92   156   138  1090    57  1833     -   255 |  288   1.00
    5 | 17022    62   159    48 17466    42 16470     -    66 |  288   7.32
    6 | 11092   202   123    92     -    71 11010     -    81 |  281   7.58
    7 |  5656   223   166   151  8361   167  4960     -    77 |  281   2.25
    8 |  7649    60    70    54     -    77  7612     -    82 |  288   5.46
    9 |  4448    36   175    75  2799    36  4612     -    80 |  288   1.71
   10 |  3192    67    45    39  6042    62  3182     -    61 |  288   2.00
   11 |   876    59    54    45  1860    70   672     -    71 |  288   0.49
   13 |   641    65    56    42  1396    65   814     -    53 |  288   0.27
   14 |   616    55    59    23  2133    40   777     -    75 |  288   0.21
   15 |  5060   107     -   128  6254    34  4802     -    51 |  288   2.52
   17 |  1602    57    91    69     -    66  1578     -    56 |  288   2.87
   18 |  1198    74    78    52  2191    51  1152     -    93 |  288   0.36
   20 |   802    72   196    86  1694   136   820     -    61 |  288   0.23
   21 |  4109    89    98   102     -    56  3944     -    41 |  288   3.98
   22 |  2807    67   199    52 10317   112  3418     -   115 |  288   1.45
   23 |  6103    70   275   162     -    60  5981     -    60 |  288   6.29
   24 |  3018   110    71    69  6219    72  2816     -     - |  288   1.88
   25 |  1897   140    94    83  1843    42  2118     -    48 |  288   1.77
   26 |   442    50   125    83   781    55   476     -   208 |  288   0.56
   27 |  6212   100   176   121  7576    47  5673     -    79 |  288   3.68
   28 |  2485   113   137    38  3214    56  2370     -    56 |  288   0.58
   29 |  1135    87    45    44     -    74   974     -    53 |  288   0.64
   30 |  3915    65    44    74  7031    48  3626     -    28 |  288   1.64
   31 |  7631   234    77   168  8625    64  6247     -    94 |  281   4.83
 -----+-------------------------------------------------------+--------------
 ALBH |     -    45    55     -     -     -     -     -     - |  288   0.07
 ARTU |     -    37     -    33     -     -     -     -     - |  279  27.02
 AUCK |     -    83     -     -     -     -     -     -    82 |  264  20.94
 BILI |     -    55     -    49     -     -     -     -     - |  287  18.05
 BRMU |     -    88    63    36     -     -     -     -    51 |  287  31.94
 CAS1 |     -   118     -    59     -     -     -     -    66 |  288   9.63
 CRO1 |     -    85    44     -     -     -     -     -    76 |  288   0.25
 DAV1 |     -   138     -    31     -     -     -     -   147 |  288  18.66
 DRAO |     -    38     -     -     -     -     -     -    38 |  288   0.11
 EISL |     -    49    59     -     -     -     -     -     - |  169  33.36
 GALA |     -    43     -    38     -     -     -     -     - |  288  35.22
 GODE |     -   165   200     -     -     -     -     -     - |  213   0.16
 GRAZ |     -    56     -     -     -     -     -     -    55 |  286  16.13
 GUAM |     -   108    59    52     -     -     -     -    85 |  288  32.66
 HOB2 |     -    88    43     -     -     -     -     -    78 |  288   0.14
 KARR |     -    81     -    72     -     -     -     -     - |  288  23.57
 KERG |     -   169     -     -     -     -     -     -   166 |  281    >>>
 KIRU |     -    44    53     -     -     -     -     -     - |  288   4.64
 KOKB |     -     -     -   158     -     -     -     -   176 |  238   0.20
 KOSG |     -    61    75     -     -     -     -     -     - |  288 119.22
 KWJ1 |     -     -     -   216     -     -     -     -   241 |  181 122.56
 LPGS |     -   225     -   198     -     -     -     -     - |  135  49.74
 MAC1 |     -   115    78    74     -     -     -     -     - |  288  22.45
 MAS1 |     -    46    39     -     -     -     -     -    55 |  288   1.98
 MATE |     -    52    48     -     -     -     -     -    22 |  288   0.23
 MAW1 |     -    76     -    67     -     -     -     -     - |  288  25.17
 MCM4 |     -    82   185   124     -     -     -     -   117 |  287  14.26
 MDO1 |     -    30    37     -     -     -     -     -     - |  288  22.67
 MKEA |     -    35    43     -     -     -     -     -     - |  288  46.77
 NLIB |     -   157   184     -     -     -     -     -    63 |  286 792.63
 NRC2 |     -    20    24     -     -     -     -     -     - |  288   0.06
 NTUS |     -    40     -     -     -     -     -     -    40 |  288   7.49
 NYA1 |     -    47     -    42     -     -     -     -     - |  288   0.12
 NYAL |     -     -   233     -     -     -     -     -   188 |  287   0.15
 PERT |     -    26    63     -     -     -     -     -    40 |  288  21.80
 PETP |     -    26     -    23     -     -     -     -     - |  287  28.03
 PIE1 |     -    42    22     -     -     -     -     -    46 |  288 401.35
 POTS |     -    39     -    34     -     -     -     -     - |  288  17.78
 REYK |     -   192   234     -     -     -     -     -     - |  286   9.94
 RIOG |     -    44     -    36     -     -     -     -    51 |  276  13.18
 SANT |     -   101    66    33     -     -     -     -    63 |  288  16.60
 SELE |     -    35    42     -     -     -     -     -     - |  277  40.69
 SFER |     -    68    83     -     -     -     -     -     - |  287   1.25
 STJO |     -    59   112    51     -     -     -     -     - |  288  29.23
 THTI |     -     -    35     -     -     -     -     -    28 |  287   4.31
 TIDB |     -    63     -    55     -     -     -     -     - |  288   0.17
 TSKB |     -    70    96     -     -     -     -     -    35 |  288   0.88
 USNO |     -    54    49     -     -     -     -     -    64 |  288   0.04
 USUD |     -    33    40     -     -     -     -     -     - |  288   0.42
 VILL |     -    44    43     -     -     -     -     -    47 |  288  37.19
 WHIT |     -    56     -    49     -     -     -     -     - |  288  47.99
 WSRT |     -    87    65     -     -     -     -     -    37 |  288   0.07
 WTZR |     -    50    59     -     -     -     -     -    18 |  288   0.20
 WUHN |     -    73    82    67     -     -     -     -    54 |  287  31.74
 YELL |     -    54    66     -     -     -     -     -     - |  285   0.06
 ZWEN |     -     -     -    29     -     -     -     -    33 |  288  31.47
 -----+-------------------------------------------------------+--------------
 TOT  |  5511    99   117    89  6264    87  5313     -    96 |


 BEST CLOCK FIT: USNO   288   0.04 (ns) 

