
 GPS week: 1142   Day: 6   MJD: 52244                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2677      0     0.87    -1.46     5.23     0.00
 cod |   288     0  25525     35     0.56    -2.35     0.08    23.06
 emr |    96     0   3822      5  1288.92    13.08     0.10    19.76
 esa |   288     1  16781   1236  1277.75   -23.33     0.12    14.86
 gfz |   288     0  15406    226     0.90    -1.49     0.07    29.13
 igu |    96     0   2486      0     0.83    -1.43     4.17     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23869    409   691.98    -2.03     0.14    13.20

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   sio   usn |
 -----+-------------------------------------------------+
    1 | -4043     0  -120   125    69  2802     -  -234 |
    2 | -6100    -3  -296   213    33   124     -  -171 |
    3 |  6439    -8   -38   181    98  6397     -  -369 |
    4 | -4034   -89  -221   300    93   721     -  -276 |
    5 | -2861   101   -11   302  -203-16481     -   -63 |
    6 | -3257   -70   -41   252    45     -     -  -218 |
    7 | 14839    28   -68     X    66 -2160     -  -161 |
    8 | -2512   109  -176   -45    -6  3209     -   -41 |
    9 | -7150   131   -24   -36   -22 -5469     -  -127 |
   10 |   658    58   -86   143  -118   286     -    40 |
   11 |  7175    -7    -8     6    60  4602     -  -122 |
   13 |  5305     9   -60    21    27   -86     -   -69 |
   14 |  4639   151   233  -181    -9  2179     -  -158 |
   15 | -7601   -41   167     -   -12  3796     -    17 |
   17 |  1384     -    42     X     8-18942     -   -39 |
   18 |  7767   -38   135    74   -40  1832     -     X |
   20 |  4111     3   -78   201  -120   469     -    73 |
   21 |   -29   158    69   -93    12 17453     -  -232 |
   22 |  -659   171    -7  -380    71 -2221     -   -26 |
   23 | -2910   202    67  -487    45     -     -     7 |
   24 | -1295   -22  -137   270   -95  4150     -    14 |
   25 | -5692   130   -15   -55   147 11009     -  -482 |
   26 |  -977    55    33  -295   156 -2909     -  -126 |
   27 |  2663    17  -296   110    97 -1552     -  -219 |
   28 |  5773   -24   -55   161   -84  -198     -    74 |
   29 | -1072   127    32   -21   129 -1061     -  -503 |
   30 |   190   120   -44   292   -87 -2195     -  -323 |
   31 |-10616  -103  -128   175   176 -5731     -  -329 |
 -----+-------------------------------------------------+
 ALBH |     -    28     -     -     -     -     -   -49 |
 ALGO |     -    53    46     X   -85     -     -    74 |
 AMC2 |     -   -26     -     -     -     -     -    46 |
 AOML |     -  -110     -     -     -     -     -   191 |
 AUCK |     -    -1     -     -     -     -     -     1 |
 BAHR |     -    42   104   -39    -5     -     -   -70 |
 BILI |     -    54     -     -   -43     -     -     - |
 BOR1 |     -   -64     -    87     -     -     -    13 |
 BRMU |     -   -45     -    -6    27     -     -    26 |
 BRUS |     -    -7     -     -     -     -     -    12 |
 CAS1 |     -   -89     -    21     2     -     -   128 |
 CRO1 |     -   -78     -   -48     -     -     -   197 |
 DAV1 |     -   -22     -     -   -34     -     -   112 |
 DRAO |     -    23   -29     -     -     -     -   -26 |
 FAIR |     -     -     7     -     -     -     -   -11 |
 FLIN |     -    26     -   -40     -     -     -     - |
 GALA |     -     6     -  -131   -10     -     -   160 |
 GODE |     -   124     -     -     -     -     -  -217 |
 GOLD |     -    -4     -     -     -     -     -     7 |
 GRAZ |     -   -87     -     -     -     -     -   152 |
 GUAM |     -   -35     -    77   -56     -     -    99 |
 HOB2 |     -   150   144  -322     -     -     -    26 |
 HRAO |     -   -45     -     -     -     -     -    79 |
 KARR |     -  -118     -     -    93     -     -     - |
 KIRU |     -   111     -  -172     -     -     -     - |
 KOSG |     -   -65     -   -26     -     -     -   144 |
 KSTU |     -   -47     -     -     -     -     -    81 |
 LPGS |     -    22     -     -     X     -     -   -39 |
 MAC1 |     -   113     -   -30  -180     -     -   227 |
 MAS1 |     -    77   167   -87  -110     -     -   123 |
 MATE |     -   -74    53     -     -     -     -   102 |
 MAW1 |     -     6     -     -     -     -     -   -11 |
 MCM4 |     -    88     -  -189   -44     -     -   158 |
 MDO1 |     -    -7     -  -200     -     -     -   236 |
 MEDI |     -   -40     -     -     -     -     -    70 |
 METS |     -   -69     -     -     -     -     -   121 |
 MKEA |     -    53   -22    95  -112     -     -    60 |
 MSKU |     -     5     -     -    -4     -     -     - |
 NPLD |     -   -40     -     -     -     -     -    69 |
 NRC2 |     -    19    88   -21     -     -     -   -54 |
 NTUS |     -  -151     -     -   168     -     -  -107 |
 NYA1 |     -     6     -     -   -97     -     -   206 |
 NYAL |     -     -     -    40     -     -     -   -45 |
 OHIG |     -     0     -  -120   -12     -     -   162 |
 ONSA |     -   -42     -     -     -     -     -    73 |
 PENC |     -   208     -     -     -     -     -  -364 |
 PERT |     -   -49     -   180     -     -     -  -118 |
 PETP |     -   -93     -     -    73     -     -     - |
 PIE1 |     -  -210   262  -363     -     -     -   682 |
 POTS |     -   -52     -     -     -     -     -    90 |
 REYK |     -     6     -  -107     -     -     -   110 |
 RIOG |     -     3     -     -   -43     -     -    89 |
 SANT |     -   -22     -     -   -19     -     -    81 |
 SCH2 |     -   177     -  -274     -     -     -     - |
 SELE |     -    -5     -     8     -     -     -     - |
 SFER |     -  -190     -     -     -     -     -   332 |
 STJO |     -   -22   247     X  -102     -     -   140 |
 THU1 |     -    64     -     -     -     -     -  -113 |
 TOW2 |     -   -56     -     -    44     -     -     - |
 TRO1 |     -  -147     -     -   116     -     -     - |
 TROM |     -     -     -     7     -     -     -    -8 |
 USUD |     -   -66     -   -26     -     -     -   144 |
 VILL |     -    39     -   -25     -     -     -   -40 |
 WHIT |     -    86     -    55   -96     -     -     - |
 WSRT |     -   -17     -     -     -     -     -    30 |
 WTZR |     -   -36     -   -63     -     -     -   134 |
 YAR2 |     -  -384     -   250     -     -     -   311 |
 YELL |     -   -14    59    65     -     -     -   -78 |
 ZWEN |     -     -     -  -105    15     -     -    84 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  5047    58    77   187    36  3405     -   168 |  288   4.12
    2 |  5098   101   146    67   107  6097     -   288 |  288   3.57
    3 |  2779   194   165    97   141  3322     -   123 |  277   1.51
    4 |  3757    85   139   135    41   791     -   121 |  288   0.74
    5 |  3467    67    77    57    29  7663     -    67 |  288   2.40
    6 | 12505   162   136   363   148     -     -   135 |  282  10.15
    7 |  5833    82   126     X    52  3017     -   116 |  279   3.52
    8 |  5879   110    69    95    31  3056     -   190 |  288   5.76
    9 |  2498    82    52    51    64  3127     -    69 |  288   1.44
   10 |  1953    60    71    64    48  1023     -    95 |  288   1.44
   11 |  1354    87    50   124    61  2700     -    91 |  288   0.41
   13 |  2514    53    88    56    43   592     -   137 |  288   0.20
   14 |  1180    72    85    99    89   876     -   120 |  288   0.32
   15 |  6755    75    37     -    54  2009     -   114 |  288   1.42
   17 |  2339     -   110     X    86 11011     -   196 |  288   3.50
   18 |  1816   133   141   115   108  1118     -     X |  288   0.43
   20 |  1282    80    42    74    44   730     -    83 |  288   0.21
   21 |  3955   119   126   210   127  7805     -    78 |  288   3.97
   22 |  1432   113    58   233    41  2144     -    87 |  288   1.88
   23 |  8604   167   107   250    87     -     -   273 |  288   6.35
   24 |  4391    62    50    85    72  4447     -   263 |  288   2.97
   25 |  1915    58    77   175    24  4437     -   213 |  288   2.34
   26 |  2146    79    83   162    52  1878     -   252 |  288   0.82
   27 | 11014   118    70    69    69  5261     -   292 |  288   4.22
   28 |  1109   145    57   118    74  1005     -    39 |  288   0.53
   29 |   831    66   125    58    95  1043     -   248 |  288   0.76
   30 |  3531    68   128    41    60  2678     -    49 |  288   1.63
   31 | 11715    76   141   197   124  5231     -   128 |  278   5.31
 -----+-------------------------------------------------+--------------
 ALBH |     -    40     -     -     -     -     -    69 |  286   0.11
 ALGO |     -    51    53     X    31     -     -    74 |  288   0.03
 AMC2 |     -    20     -     -     -     -     -    34 |  286   0.07
 AOML |     -    55     -     -     -     -     -    96 |  286  22.21
 AUCK |     -    41     -     -     -     -     -    71 |  264  21.08
 BAHR |     -    45    59   168    72     -     -    61 |  288   0.56
 BILI |     -    32     -     -    26     -     -     - |  286  15.45
 BOR1 |     -    58     -    40     -     -     -    97 |  288    >>>
 BRMU |     -    67     -    58    40     -     -    83 |  288  29.90
 BRUS |     -    53     -     -     -     -     -    93 |  286   0.07
 CAS1 |     -   112     -    68    40     -     -   126 |  288  10.13
 CRO1 |     -    43     -    48     -     -     -   106 |  287   0.15
 DAV1 |     -   104     -     -    36     -     -   133 |  288  18.12
 DRAO |     -    62    56     -     -     -     -    86 |  288   0.05
 FAIR |     -     -   136     -     -     -     -   204 |   96   0.15
 FLIN |     -    88     -   137     -     -     -     - |  216  16.58
 GALA |     -    44     -    52    42     -     -    71 |  288  31.12
 GODE |     -   109     -     -     -     -     -   191 |  100   8.25
 GOLD |     -    63     -     -     -     -     -   110 |  286  25.81
 GRAZ |     -    34     -     -     -     -     -    60 |  285  32.74
 GUAM |     -    62     -    78   120     -     -   202 |  288  34.85
 HOB2 |     -    93    51    72     -     -     -   100 |  288   0.07
 HRAO |     -    46     -     -     -     -     -    81 |  288  30.05
 KARR |     -    74     -     -    58     -     -     - |  288  20.12
 KIRU |     -    48     -    74     -     -     -     - |  220   1.48
 KOSG |     -    28     -    73     -     -     -    64 |  288  66.48
 KSTU |     -    35     -     -     -     -     -    62 |  283  21.23
 LPGS |     -   171     -     -     X     -     -   299 |  226  22.12
 MAC1 |     -    98     -   186    66     -     -   119 |  286  22.16
 MAS1 |     -    56   102    42    30     -     -    76 |  288   1.88
 MATE |     -    39    37     -     -     -     -    58 |  288   0.10
 MAW1 |     -    45     -     -     -     -     -    78 |  232  22.46
 MCM4 |     -   123     -   177    83     -     -   200 |  287  14.38
 MDO1 |     -    34     -    76     -     -     -    84 |  288  26.63
 MEDI |     -    37     -     -     -     -     -    65 |  286   0.64
 METS |     -    52     -     -     -     -     -    91 |  285   0.11
 MKEA |     -    37    80    63    39     -     -    52 |  288  45.27
 MSKU |     -    41     -     -    32     -     -     - |  288  38.05
 NPLD |     -    38     -     -     -     -     -    66 |  285   0.06
 NRC2 |     -    36    41    51     -     -     -    63 |  288   0.04
 NTUS |     -    42     -     -    38     -     -    46 |  288   7.68
 NYA1 |     -    28     -     -    36     -     -   112 |  288   0.13
 NYAL |     -     -     -    46     -     -     -    52 |  212   0.10
 OHIG |     -    75     -   146    40     -     -   127 |  288  15.38
 ONSA |     -    65     -     -     -     -     -   114 |  276   0.31
 PENC |     -    59     -     -     -     -     -   104 |  284  21.15
 PERT |     -    94     -    72     -     -     -   103 |  288  25.50
 PETP |     -    65     -     -    51     -     -     - |  282  22.32
 PIE1 |     -    68   166    92     -     -     -    99 |  285   0.93
 POTS |     -    51     -     -     -     -     -    89 |  255  15.19
 REYK |     -    56     -    41     -     -     -    68 |  288   9.91
 RIOG |     -    75     -     -    37     -     -   121 |  276  18.82
 SANT |     -    66     -     -    61     -     -    52 |  288  18.91
 SCH2 |     -    48     -    75     -     -     -     - |   85   0.62
 SELE |     -    33     -    51     -     -     -     - |  219  22.82
 SFER |     -    53     -     -     -     -     -    93 |  285 102.69
 STJO |     -    65    69     X    32     -     -   106 |  288  10.38
 THU1 |     -    69     -     -     -     -     -   121 |  266  27.44
 TOW2 |     -    47     -     -    37     -     -     - |  288  13.33
 TRO1 |     -    43     -     -    34     -     -     - |  288  11.20
 TROM |     -     -     -    52     -     -     -    59 |  212  11.40
 USUD |     -   163     -   158     -     -     -   456 |  288   0.43
 VILL |     -    24     -    37     -     -     -    56 |  288  29.64
 WHIT |     -    55     -    39    37     -     -     - |  288  37.78
 WSRT |     -    30     -     -     -     -     -    52 |  288   0.09
 WTZR |     -    68     -    43     -     -     -   103 |  288   0.09
 YAR2 |     -   111     -   116     -     -     -    67 |  256   6.36
 YELL |     -    47    70    55     -     -     -    78 |  288   0.06
 ZWEN |     -     -     -    42    55     -     -   106 |  288  23.83
 -----+-------------------------------------------------+--------------
 TOT  |  5226    79    96   119    67  4169     -   136 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

