
 GPS week: 1142   Day: 2   MJD: 52240                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2673      0     0.01    -0.07     4.34     0.00
 cod |   288     0  25313      3    -2.50     4.44     0.07    26.09
 esa |   288     1  18145    593  1209.00    14.96     0.12    15.53
 gfz |   288     0  14085      0    -0.02    -0.10     0.08    23.69
 igu |    96     0   2203      0     0.01    -0.11     4.37     0.00
 jpl |    96     6   2357      0    -0.06     0.05     0.10    17.97
 ngs |    96     0   2673      0     0.01    -0.07     4.16     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24426    349   689.76     0.00     0.11    16.72

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |   226    22   117    -3  5208   -34   487     -  -127 |
    2 |   225    43    -1   -59  5355    43   687     -     3 |
    3 | -2382    27   193   -26  2431   -23 -2115     -  -166 |
    4 | -5378   -32   196   107  1472  -182 -5421     -  -227 |
    5 | -4025   -32   189    -5 -2126    89 -4317     -  -147 |
    6 |  2941  -117   589    88     -  -119  2354     -  -323 |
    7 |  5732    91  -219    14     -    50  5271     -    11 |
    8 | -2560   108    50  -127 -8825   -40 -2667     -   -21 |
    9 | -4867    -2    73   113-13666    83 -4536     -  -250 |
   10 | -2254    12    77    42  1853  -294 -2511     -   -51 |
   11 |  1383   132    38  -152  -647   141  1615     -   -70 |
   13 |  6491   168    64  -111   187  -221  6087     -   -94 |
   14 |  4521    93    53   -72  1909   150  4390     -  -138 |
   15 |   296    37     -    15 19122    79   -79     -  -105 |
   17 | -3437     -     X    12 -5030   -14 -3059     -   -13 |
   18 |  7182   -57   133    14   264    43  7009     -   -67 |
   20 |  4513    11   168  -149   347    66  4445     -     9 |
   21 | -3069   142    42    17 -3060    73 -3183     -  -305 |
   22 | -9065     7    14   -82  -733   288 -9170     -     X |
   23 | -2195    85     X    41     -    99 -1305     -  -224 |
   24 | -4990   -43   -33   153 -8058  -260 -5151     -   -37 |
   25 | -8071     9   276    74-13861   -37 -7052     -  -363 |
   26 |  1150    35   -38   245  2953  -119   993     -  -327 |
   27 |  8893    77   -20    71 10326   -90  8824     -  -174 |
   28 |  3600   107  -154   -45 -3816    54  3543     -    22 |
   29 |   682    18    51   162     -    67   590     -  -325 |
   30 | -1763    66   132   115  8382    26 -1038     -  -396 |
   31 |  6375    31     9   -11     -    86  5456     -   -70 |
 -----+-------------------------------------------------------+
 ALBH |     -   -72   -39     -     -     -     -     -   146 |
 AMC2 |     -   -29     -     -     -     -     -     -    46 |
 AOML |     -  -181     -     -     -     -     -     -   283 |
 ARTU |     -    60  -101     -     -     -     -     -     - |
 AUCK |     -    35     -     -     -     -     -     -   -55 |
 BAHR |     -    53  -120    20     -     -     -     -     - |
 BILI |     -   127     -  -139     -     -     -     -     - |
 BOR1 |     -   -39     -     -     -     -     -     -    60 |
 BRMU |     -   -23  -185   -14     -     -     -     -   227 |
 BRUS |     -   -70     -     -     -     -     -     -   109 |
 CAS1 |     -  -211   121    48     -     -     -     -   149 |
 CRO1 |     -   -41  -117     -     -     -     -     -   173 |
 DAV1 |     -   -85     -   -61     -     -     -     -   220 |
 FAIR |     -     -   -81     -     -     -     -     -    75 |
 FLIN |     -    31   -52     -     -     -     -     -     - |
 GOLD |     -   -17     -     -     -     -     -     -    27 |
 GRAZ |     -  -109     -     -     -     -     -     -   170 |
 GUAM |     -    45   114   -62     -     -     -     -   -87 |
 HOB2 |     -    72  -227     -     -     -     -     -    98 |
 HRAO |     -  -103     -     -     -     -     -     -   161 |
 KARR |     -   -87     -    96     -     -     -     -     - |
 KERG |     -    57     -     -     -     -     -     -   -89 |
 KIRU |     -    49   -83     -     -     -     -     -     - |
 KOKB |     -     -    67    17     -     -     -     -   -85 |
 KOSG |     -  -112    35     -     -     -     -     -   144 |
 KSTU |     -    28     -     -     -     -     -     -   -44 |
 KUNM |     -     1     -     -     -     -     -     -    -2 |
 KWJ1 |     -   -23     -     -     -     -     -     -    35 |
 MAC1 |     -   208  -140  -316     -     -     -     -   270 |
 MADR |     -   182     -     -     -     -     -     -  -285 |
 MAS1 |     -    47   -81  -138     -     -     -     -   197 |
 MATE |     -  -204     -     -     -     -     -     -   318 |
 MAW1 |     -    24     -     -     -     -     -     -   -38 |
 MCM4 |     -    69     -  -124     -     -     -     -    68 |
 MDO1 |     -   -37  -104     -     -     -     -     -   155 |
 MEDI |     -   -88     -     -     -     -     -     -   137 |
 METS |     -   -36     -     -     -     -     -     -    56 |
 MKEA |     -    18     -   -13     -     -     -     -   -10 |
 NLIB |     -    39  -167     -     -     -     -     -    95 |
 NPLD |     -   -46     -     -     -     -     -     -    71 |
 NRC2 |     -    63   -22     -     -     -     -     -   -79 |
 NTUS |     -     4     -     -     -     -     -     -    -6 |
 NYA1 |     -    18     -   -18     -     -     -     -    -2 |
 NYAL |     -     -   132     -     -     -     -     -  -123 |
 OHIG |     -    40   -91   -76     -     -     -     -   129 |
 ONSA |     -   -90   -40     -     -     -     -     -   178 |
 PENC |     -   125     -     -     -     -     -     -  -194 |
 PERT |     -   115  -154     -     -     -     -     -   -37 |
 PIE1 |     -  -124   -54     -     -     -     -     -   244 |
 POTS |     -    10  -160     -     -     -     -     -   133 |
 REYK |     -   -75    72     -     -     -     -     -    50 |
 RIOG |     -  -138   226   -54     -     -     -     -    83 |
 SANT |     -  -224     -   247     -     -     -     -     - |
 SFER |     -  -193  -116     -     -     -     -     -   411 |
 STJO |     -   -29  -250     8     -     -     -     -   266 |
 THTI |     -     -    94     1     -     -     -     -   -88 |
 TRO1 |     -  -187     -   206     -     -     -     -     - |
 TSKB |     -    -1   122     -     -     -     -     -  -112 |
 USNO |     -    59  -255     -     -     -     -     -   145 |
 USUD |     -     3   114     -     -     -     -     -  -110 |
 VILL |     -    16  -123     -     -     -     -     -    89 |
 WHIT |     -    40     -   -44     -     -     -     -     - |
 WSRT |     -   -41     -     -     -     -     -     -    64 |
 WTZR |     -   -74   -40     -     -     -     -     -   153 |
 WUHN |     -    38  -164    31     -     -     -     -    49 |
 YAR2 |     -   -48   126     -     -     -     -     -   -41 |
 YELL |     -    -2   -92     -     -     -     -     -    89 |
 ZWEN |     -     -     -    45     -     -     -     -   -64 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6002    77   156    48  4011    37  5362     -    97 |  288   3.03
    2 |  8582    53   188    55  9593    84  7680     -   159 |  288   3.15
    3 |  4690   159   146   140  1942    83  4863     -   153 |  281   1.64
    4 |  1487    56    24   116  1097    75  1451     -    92 |  288   1.23
    5 |  3547    48    50    71  3356    88  3499     -   117 |  288   2.63
    6 |  9976   174   162   183     -   106  9939     -   101 |  279   9.36
    7 |  3521    78   197    91     -   225  3297     -   149 |  282   1.98
    8 |  6536    61   150    53  9306    72  6431     -    97 |  288   4.95
    9 |  2715   143    77   160  4739    54  2709     -    44 |  288   1.32
   10 |  5099    86   134    96  2812    76  4800     -    81 |  288   2.79
   11 |  1040    96   129   151   591   141  1082     -    89 |  288   0.38
   13 |   878    72    86    51   493    64   860     -    99 |  288   0.22
   14 |  1254    45   116    68  1547    43  1274     -    55 |  288   0.55
   15 |  3897    42     -   140  6871    83  3602     -   204 |  288   3.17
   17 |  2253     -     X   125  2908   249  1608     -   217 |  255   3.76
   18 |   782   100    96   126   481   104   877     -    90 |  288   0.27
   20 |  1382   101   115    52   693   161  1347     -   155 |  288   0.25
   21 |  3219    59   129    90  2396    87  3315     -   100 |  288   2.64
   22 |  3688    86   115    62  1319    88  3689     -     X |  288   1.26
   23 |  5974    87     X    71     -    82  5455     -    99 |  278   4.71
   24 |  2717    44   108    31  3995    62  2637     -    89 |  288   1.89
   25 |  5741    41   117    24  6744    32  5048     -    83 |  288   3.61
   26 |   680    61    64    45  1838    58   672     -    42 |  288   0.53
   27 |  5334    74    27   135  6505    54  5336     -    87 |  288   2.90
   28 |   893    79   127    85  2446    94   922     -   302 |  288   0.23
   29 |   935   175   113   175     -    52  1006     -   106 |  288   0.95
   30 |  5182    52   121    52  4662    78  4685     -    62 |  288   1.51
   31 |  4281    70    75   110     -   126  4861     -    71 |  282   4.19
 -----+-------------------------------------------------------+--------------
 ALBH |     -   115   288     -     -     -     -     -    83 |  288   0.13
 AMC2 |     -    26     -     -     -     -     -     -    40 |  285   0.06
 AOML |     -    29     -     -     -     -     -     -    46 |  286  32.10
 ARTU |     -    40    68     -     -     -     -     -     - |  286  16.86
 AUCK |     -    39     -     -     -     -     -     -    61 |  264  18.78
 BAHR |     -    48   127    52     -     -     -     -     - |  288   0.57
 BILI |     -    49     -    54     -     -     -     -     - |  287  14.18
 BOR1 |     -   248     -     -     -     -     -     -   386 |  282  17.17
 BRMU |     -    64    55    75     -     -     -     -    48 |  288  40.05
 BRUS |     -    20     -     -     -     -     -     -    32 |  286   0.09
 CAS1 |     -    46    82    37     -     -     -     -   151 |  288   8.75
 CRO1 |     -    33    43     -     -     -     -     -    74 |  288   0.11
 DAV1 |     -    50     -    19     -     -     -     -    61 |  288  21.52
 FAIR |     -     -   131     -     -     -     -     -   122 |  286   0.14
 FLIN |     -    25    41     -     -     -     -     -     - |  287  11.32
 GOLD |     -    37     -     -     -     -     -     -    57 |  286  22.71
 GRAZ |     -    30     -     -     -     -     -     -    47 |  284  50.15
 GUAM |     -    62    99    41     -     -     -     -   118 |  288  31.95
 HOB2 |     -    68    35     -     -     -     -     -    92 |  288   0.08
 HRAO |     -   137     -     -     -     -     -     -   213 |  288  29.46
 KARR |     -    23     -    26     -     -     -     -     - |  288  21.76
 KERG |     -    42     -     -     -     -     -     -    66 |  287   1.53
 KIRU |     -    34    57     -     -     -     -     -     - |  287   5.24
 KOKB |     -     -   220    84     -     -     -     -   254 |  286   0.23
 KOSG |     -    58    75     -     -     -     -     -    32 |  288  46.06
 KSTU |     -    66     -     -     -     -     -     -   103 |  268  16.00
 KUNM |     -    44     -     -     -     -     -     -    69 |  243  61.93
 KWJ1 |     -   116     -     -     -     -     -     -   181 |  150 189.58
 MAC1 |     -    99    92    96     -     -     -     -   163 |  288  19.01
 MADR |     -    22     -     -     -     -     -     -    35 |  210  20.68
 MAS1 |     -    28    35    30     -     -     -     -    33 |  288   2.02
 MATE |     -   137     -     -     -     -     -     -   213 |  205   0.28
 MAW1 |     -    30     -     -     -     -     -     -    47 |  286  29.61
 MCM4 |     -    84     -    45     -     -     -     -    89 |  288  36.95
 MDO1 |     -    28   116     -     -     -     -     -    89 |  288  23.81
 MEDI |     -    18     -     -     -     -     -     -    27 |  286   0.17
 METS |     -    27     -     -     -     -     -     -    42 |  285   0.90
 MKEA |     -    48     -    39     -     -     -     -    40 |  280  40.99
 NLIB |     -   107   160     -     -     -     -     -   102 |  283  83.87
 NPLD |     -    34     -     -     -     -     -     -    53 |  285   0.10
 NRC2 |     -    32    38     -     -     -     -     -    57 |  288   0.05
 NTUS |     -    44     -     -     -     -     -     -    68 |  288   7.01
 NYA1 |     -    52     -    37     -     -     -     -    52 |  288   0.10
 NYAL |     -     -    79     -     -     -     -     -    73 |  260   0.06
 OHIG |     -    27   129    57     -     -     -     -    55 |  288   8.56
 ONSA |     -    52    49     -     -     -     -     -    42 |  288   0.44
 PENC |     -    28     -     -     -     -     -     -    44 |  285   4.92
 PERT |     -    55    39     -     -     -     -     -    78 |  288  21.45
 PIE1 |     -    78   204     -     -     -     -     -    74 |  288   0.09
 POTS |     -    36    55     -     -     -     -     -    21 |  288  16.91
 REYK |     -    59    70     -     -     -     -     -    39 |  288   9.29
 RIOG |     -    40    70    43     -     -     -     -    55 |  288  14.42
 SANT |     -    83     -    92     -     -     -     -     - |  164 131.44
 SFER |     -    52   270     -     -     -     -     -   271 |  287 164.96
 STJO |     -    55   143    93     -     -     -     -    93 |  288   2.82
 THTI |     -     -    43    46     -     -     -     -    74 |  287   3.06
 TRO1 |     -    29     -    32     -     -     -     -     - |  288  10.40
 TSKB |     -    50    87     -     -     -     -     -    88 |  288   1.08
 USNO |     -    32    52     -     -     -     -     -    35 |  288   0.04
 USUD |     -    69    80     -     -     -     -     -    85 |  288   0.40
 VILL |     -    51    89     -     -     -     -     -    25 |  288  29.31
 WHIT |     -    23     -    25     -     -     -     -     - |  288  25.57
 WSRT |     -    35     -     -     -     -     -     -    55 |  288   0.02
 WTZR |     -    53    61     -     -     -     -     -    33 |  288   0.03
 WUHN |     -    37    91    23     -     -     -     -    66 |  287  31.17
 YAR2 |     -    45    59     -     -     -     -     -   113 |  288   2.73
 YELL |     -    24    50     -     -     -     -     -    60 |  288   0.06
 ZWEN |     -     -     -    39     -     -     -     -    56 |  266  14.47
 -----+-------------------------------------------------------+--------------
 TOT  |  4343    73   115    85  4369   103  4158     -   113 |


 BEST CLOCK FIT: WSRT   288   0.02 (ns) 

