
 GPS week: 1141   Day: 4   MJD: 52235                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2669      0     0.00    -0.14     4.93     0.00
 cod |   288     0  25212    174     0.21    -1.58     0.08    18.14
 emr |    96     0   3996    231  1153.44    13.87     0.13     9.17
 esa |   288     0  17549    537  1153.63    11.28     0.12    10.35
 gfz |   288     0  14367    276    -0.44     0.46     0.08    18.16
 igu |    96     0   2003      1     0.00    -0.25     3.38     0.00
 jpl |   279     0   6605    472     1.24     0.70     0.06    26.16
 ngs |    96     0   2669      0     0.01    -0.16     4.79     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24695    941   687.57    -0.15     0.08    18.04

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -9960    20  -173    88   -64     -   226 -9078     -  -196 |
    2 |   578   106  -183   170  -234  3164    50   141     -    11 |
    3 | -3099    -8   -66   170    94-16123   182 -3883     -  -240 |
    4 | -6684    33    21   202    91  -344  -110 -5997     -  -136 |
    5 |  7486   188   -69    98   -66     -   -35  5215     -  -152 |
    6 |  2655  -164  -134   420    57  6278   -76  1718     -     X |
    7 |  -285    61  -144    69   -58 -1131   -87   151     -    17 |
    8 |  6880    36  -218   140     4 -9283    27  6250     -   -94 |
    9 | -9913    82     X    49    26 -3441   -85 -9208     -  -101 |
   10 | -2272   100   -65   143    40  1673  -171 -2869     -   -34 |
   11 |  8279   -92   -49   151   137  1516    -9  8383     -  -116 |
   13 |  7066   165   224     6  -100  1036   -74  7218     -   -76 |
   14 |  5268    56    58   145   -62  1916    75  5213     -  -118 |
   15 | -3911    53    70     -   -24     -    86 -3815     -   -77 |
   17 |  4402    87    39    42   155     -     2  4521     -  -276 |
   18 |  6531   -50    77   134   -12  1333   -21  6657     -    -1 |
   20 |  5180  -119  -151    21   -41   581   144  5065     -    34 |
   21 |  6374   107   -28   -13    34 16900    65  5174     -  -156 |
   22 | -7763   -35     X   -44   -55 -1163   281 -6894     -     X |
   23 |  5382   175   -44     X     X     -    14  5390     -  -184 |
   24 | -3740    22    82   276    45  2811  -218 -3736     -   -28 |
   25 | -2253   217  -152   175    73  -562    75 -1921     -  -397 |
   26 | -4275    53   -77   191   128   790  -123 -4037     -  -228 |
   27 | -4998   103  -255    44   129     -    53 -3899     -  -237 |
   28 |  4365   109    64  -190  -209 -1688    58  4135     -   143 |
   29 | -3824    79   -97   138   160  1194    93 -3505     -  -392 |
   30 | -6843   152   -52   235   155 -4957  -120 -6029     -  -385 |
   31 |  -138   -78  -169   -22   151     -   190    10     -  -215 |
 -----+-------------------------------------------------------------+
 ALBH |     -    25     -  -185     -     -  -101     -     -   128 |
 ALGO |     -   -19   127     X   -35     -   -95     -     -    78 |
 AMC2 |     -    50     -     -     -     -  -261     -     -    82 |
 AOML |     -  -140     -     -     -     -     -     -     -   141 |
 AUCK |     -    47     -   -75     -     -     -     -     -   -12 |
 BAHR |     -   103  -107   106   -74     -   -13     -     -   -64 |
 BILI |     -    -7     -     -     7     -     -     -     -     - |
 BOR1 |     -    32     -     -     -     -     -     -     -   -33 |
 BRMU |     -    19     -  -295   -18     -     -     -     -   164 |
 BRUS |     -     8     -     -     -     -   -27     -     -     5 |
 CAS1 |     -   -69     -   130   -57     -   -67     -     -    85 |
 CRO1 |     -  -136     -     -     -     -   -62     -     -   167 |
 DAV1 |     -   -72     -     -  -146     -     -     -     -   220 |
 DRAO |     -   -49    31     -     -     -     -     -     -    44 |
 EISL |     -    16     -   -28     -     -     -     -     -     - |
 FAIR |     -     -   167  -108     -     -     X     -     -    34 |
 GOLD |     -    11     -     -     -     -     X     -     -   -11 |
 GRAZ |     -   -83     -     -     -     -     -     -     -    83 |
 GUAM |     -   -46     -   -83   118     -  -271     -     -   110 |
 HOB2 |     -   189     -  -504     -     -     -     -     -    99 |
 HRAO |     -  -165     -     -     -     -   -79     -     -   205 |
 KARR |     -  -141     -     -   141     -     -     -     -     - |
 KIRU |     -    43     -   -75     -     -     -     -     -     - |
 KOKB |     -     -     -    18    34     -   -88     -     -     X |
 KOSG |     -    21     -  -127     -     -     -     -     -    51 |
 KWJ1 |     -     -     -    19   -14     -   -13     -     -    13 |
 MAC1 |     -   -64     -    81  -133     -     -     -     -   153 |
 MAS1 |     -  -269   259    19   -28     -    -9     -     -   247 |
 MATE |     -   -19     6     -     -     -     X     -     -    18 |
 MAW1 |     -   -54     -     -     -     -     -     -     -    54 |
 MCM4 |     -    62     -  -198   -18     -     -     -     -    81 |
 MDO1 |     -  -179     -     -     -     -     -     -     -   180 |
 MEDI |     -    16     -     -     -     -     -     -     -   -16 |
 MKEA |     -  -126   340   -30     -     -     -     -     -    91 |
 NKLG |     -     -     -     6     -     -     -     -     -    -3 |
 NLIB |     -   -59   -30     -     -     -     -     -     -    64 |
 NPLD |     -   -48     -     -     -     -     -     -     -    48 |
 NRC2 |     -   -65   110     -     -     -   -23     -     -    58 |
 NTUS |     -   -49     -     -     -     -     -     -     -    50 |
 NYA1 |     -    -8     -     -   -60     -    33     -     -    52 |
 OHIG |     -    67     -   -39  -172     -     -     -     -   129 |
 ONSA |     -   -84     -    -5     -     -     -     -     -    88 |
 PENC |     -   247     -     -     -     -     -     -     -  -249 |
 PERT |     -    13     -   -55     -     -     -     -     -    18 |
 PETP |     -   -39     -     -    38     -     -     -     -     - |
 PIE1 |     -  -540     2    -7     -     -     -     -     -   482 |
 POTS |     -    34     -   -45     -     -     -     -     -    -9 |
 REYK |     -     6     -     -     -     -     -     -     -    -6 |
 RIOG |     -    63     -    34    14     -   -55     -     -   -71 |
 SANT |     -  -157     -   248   -14     -     -     -     -    59 |
 SELE |     -   314     -  -401     -     -  -172     -     -     - |
 SFER |     -  -256     -     -     -     -     -     -     -   258 |
 STJO |     -   -34   130     -   -54     -     -     -     -    67 |
 SUTH |     -     -     -  -402     -     -     -     -     -   230 |
 THTI |     -     -     -     -     -     -   -51     -     -    74 |
 TIDB |     -     X     -     -     -     -   -75     -     -   109 |
 TIXI |     -   -27     -     -     -     -    19     -     -     - |
 TRO1 |     -  -111     -     -   110     -     -     -     -     - |
 TROM |     -     -     -   -30     -     -     -     -     -    17 |
 TSKB |     -   315    84  -508     -     -     -     -     -   -34 |
 USNO |     -   133   275  -620     -     -    -7     -     -   169 |
 USUD |     -    19     -    69     -     -     -     -     -   -59 |
 VILL |     -    -8     -    21     -     -     -     -     -    -4 |
 WHIT |     -    75     -     -   -75     -     -     -     -     - |
 WSRT |     -    47     -     -     -     -   -84     -     -    -6 |
 WTZR |     -   -73     -    18     -     -   -51     -     -    87 |
 WUHN |     -   -76     -   175   -84     -    85     -     -    19 |
 YAR2 |     -  -111     -   184     -     -     -     -     -   -29 |
 YELL |     -   -38   181   -16     -     -     -     -     -    18 |
 YSSK |     -    62     -     -     -     -   -43     -     -     - |
 ZWEN |     -     -     -     -    59     -     -     -     -   -59 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7268    82   123   106    44     -    53  6986     -    42 |  288   3.80
    2 |  3342   101    87    87    55  3091    44  3815     -    69 |  288   2.05
    3 |  7751   140   106   118   168  7470   105  6047     -    75 |  280   2.58
    4 |  2424    96   125   130    97   679    49  2141     -   107 |  288   0.84
    5 |  9786    79   107    77    81     -   100  8466     -   110 |  288   3.76
    6 | 10317   101   154   267    64  5821    41 11003     -     X |  282  10.09
    7 |  5020   112   175    86    56  2162   119  4624     -    80 |  282   0.79
    8 |  9682    78   122    49    34  6963    45  9443     -    98 |  288   6.74
    9 |  2389    74     X    90    87  2570    49  2410     -    95 |  288   1.99
   10 |  3648    83    72   156    57  2504    63  3934     -    51 |  279   1.96
   11 |  1194    75    73    52    67   865    74  1186     -    31 |  288   0.38
   13 |  1150    70    95   224    65   521    82  1039     -    39 |  288   0.32
   14 |  1008   110    88    81    29   595    52  1162     -   130 |  288   0.35
   15 |  4212    95   130     -   106     -    41  4726     -    45 |  287   2.48
   17 |  2141    72    75    87    76     -    37  2002     -    53 |  287   3.20
   18 |   469    68   226   189   105   432    41   674     -    60 |  288   0.46
   20 |   669    73   131   111   127   564    83   758     -    46 |  288   0.23
   21 |  6825   122   124   194   146  6126    77  6427     -   127 |  279   2.99
   22 |  3714   106     X    82    93  1804    94  3538     -     X |  288   0.96
   23 |  5170    86   163     X     X     -   141  5069     -   192 |  276   5.76
   24 |  4356    90   107    80    61  4413    54  4040     -    82 |  288   1.97
   25 |  2423    77    57    57   176  3262    35  2547     -   226 |  288   2.63
   26 |   961    52   128   124    52   699    90  1014     -    63 |  288   0.54
   27 |  6524    91    65   147    77     -    47  7194     -    70 |  288   4.37
   28 |  2508    55   157    95    73  1193    83  2050     -    46 |  288   0.56
   29 |  1244    72   153    85    72  1369    75  1357     -    76 |  288   0.69
   30 |  1828    50   136   197    71  1451    93  1470     -    70 |  288   1.02
   31 |  5150   138   167   127   102     -    86  5360     -    52 |  284   4.39
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    35     -   126     -     -    31     -     -    53 |  288   0.08
 ALGO |     -    24    60     X    42     -    27     -     -    40 |  288   0.08
 AMC2 |     -    49     -     -     -     -    63     -     -    72 |  286   0.06
 AOML |     -    98     -     -     -     -     -     -     -    99 |  286  20.74
 AUCK |     -    87     -   252     -     -     -     -     -    99 |  264  18.19
 BAHR |     -    25    32    79    64     -    34     -     -   105 |  288   0.40
 BILI |     -    22     -     -    22     -     -     -     -     - |  287  17.37
 BOR1 |     -    41     -     -     -     -     -     -     -    41 |  283 243.70
 BRMU |     -    49     -   260    87     -     -     -     -    49 |  288  32.16
 BRUS |     -    29     -     -     -     -    22     -     -    29 |  286   0.10
 CAS1 |     -    69     -    51    39     -    45     -     -    50 |  288   8.47
 CRO1 |     -   130     -     -     -     -    22     -     -   132 |  286   0.34
 DAV1 |     -    22     -     -    48     -     -     -     -    51 |  288  18.85
 DRAO |     -    38    62     -     -     -     -     -     -    32 |  288   0.06
 EISL |     -    70     -   123     -     -     -     -     -     - |  199  40.50
 FAIR |     -     -    97   116     -     -     X     -     -    64 |  285   0.18
 GOLD |     -   111     -     -     -     -     X     -     -   111 |  286  28.40
 GRAZ |     -    19     -     -     -     -     -     -     -    19 |  279  18.50
 GUAM |     -    30     -    46    49     -    53     -     -    30 |  288  32.95
 HOB2 |     -    41     -    70     -     -     -     -     -    32 |  288   0.09
 HRAO |     -   134     -     -     -     -    28     -     -   138 |  288  30.94
 KARR |     -    20     -     -    20     -     -     -     -     - |  288  23.69
 KIRU |     -    45     -    79     -     -     -     -     -     - |  288   3.96
 KOKB |     -     -     -   118    81     -    42     -     -     X |  269   1.15
 KOSG |     -    33     -    50     -     -     -     -     -    30 |  288  32.74
 KWJ1 |     -     -     -   234   140     -    96     -     -   162 |  210 139.54
 MAC1 |     -    54     -    48    45     -     -     -     -    34 |  288  16.30
 MAS1 |     -   285   127   103   103     -    50     -     -   126 |  288   2.44
 MATE |     -    29    51     -     -     -     X     -     -    23 |  288   0.23
 MAW1 |     -    45     -     -     -     -     -     -     -    46 |  285  21.91
 MCM4 |     -    95     -   171   151     -     -     -     -   173 |  277    >>>
 MDO1 |     -    34     -     -     -     -     -     -     -    35 |  286  21.94
 MEDI |     -    26     -     -     -     -     -     -     -    26 |  286   2.70
 MKEA |     -    48   261    76     -     -     -     -     -    51 |  288  51.15
 NKLG |     -     -     -    51     -     -     -     -     -    30 |  287    >>>
 NLIB |     -    70   103     -     -     -     -     -     -    69 |  287   0.12
 NPLD |     -    30     -     -     -     -     -     -     -    30 |  285   0.10
 NRC2 |     -    64    80     -     -     -    26     -     -    49 |  286   0.09
 NTUS |     -    51     -     -     -     -     -     -     -    52 |  288   7.65
 NYA1 |     -    61     -     -    35     -    43     -     -    57 |  288   0.07
 OHIG |     -    30     -    39    27     -     -     -     -    53 |  287  14.51
 ONSA |     -    30     -    50     -     -     -     -     -    45 |  288   9.56
 PENC |     -    31     -     -     -     -     -     -     -    31 |  285   9.75
 PERT |     -    28     -    74     -     -     -     -     -    32 |  288  18.35
 PETP |     -    42     -     -    42     -     -     -     -     - |  282  24.94
 PIE1 |     -    81    55   107     -     -     -     -     -    29 |  287   0.06
 POTS |     -   126     -    61     -     -     -     -     -   100 |  277  22.55
 REYK |     -    64     -     -     -     -     -     -     -    65 |  283   9.36
 RIOG |     -    83     -    55    30     -    42     -     -    92 |  288  16.42
 SANT |     -    38     -    49    46     -     -     -     -    55 |  288  19.71
 SELE |     -    34     -    44     -     -    58     -     -     - |  288  25.72
 SFER |     -    26     -     -     -     -     -     -     -    26 |  285   1.39
 STJO |     -    44    40     -    20     -     -     -     -    42 |  288  16.02
 SUTH |     -     -     -   345     -     -     -     -     -   198 |  222  38.73
 THTI |     -     -     -     -     -     -    21     -     -    30 |   96   2.46
 TIDB |     -     X     -     -     -     -    18     -     -    26 |   97   0.09
 TIXI |     -    33     -     -     -     -    23     -     -     - |   99  13.81
 TRO1 |     -    14     -     -    14     -     -     -     -     - |  287   9.75
 TROM |     -     -     -    64     -     -     -     -     -    37 |  266  10.99
 TSKB |     -    73   226    60     -     -     -     -     -    33 |  288   1.63
 USNO |     -    90    97    70     -     -    30     -     -    42 |  288   0.09
 USUD |     -    22     -    23     -     -     -     -     -    18 |  288   0.47
 VILL |     -    21     -    35     -     -     -     -     -    19 |  288  32.96
 WHIT |     -    31     -     -    31     -     -     -     -     - |  288   4.83
 WSRT |     -    39     -     -     -     -    26     -     -    31 |  288   0.11
 WTZR |     -    35     -    47     -     -    29     -     -    30 |  287   0.13
 WUHN |     -    28     -    70    37     -    47     -     -    38 |  287  36.02
 YAR2 |     -    39     -    67     -     -     -     -     -    49 |  169 562.64
 YELL |     -    66   199    70     -     -     -     -     -    36 |  288   0.08
 YSSK |     -    49     -     -     -     -    34     -     -     - |   99  11.29
 ZWEN |     -     -     -     -    31     -     -     -     -    31 |  263    >>>
 -----+-------------------------------------------------------------+--------------
 TOT  |  4927    75   125   119    78  3376    63  4790     -    77 |


 BEST CLOCK FIT: DRAO   288   0.06 (ns) 

