
 GPS week: 1141   Day: 3   MJD: 52234                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2509      0    -0.07     0.15     5.65     0.00
 cod |   288     0  24109      1     1.57    -0.79     0.05    45.19
 esa |   288     1  15170    159157396.13  -776.65  1887.60     0.00
 gfz |   288     0  14046      5     0.07     0.04     0.11    22.48
 igu |    96     0   2324      0    -0.16     0.07     4.67     0.00
 jpl |   281     0   9249    295     0.53     3.04     0.12     0.00
 ngs |    96     0   2509      0    -0.03     0.06     5.43     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23047    303   688.74    -1.12     0.08    32.33

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -3757    63  -353     5 -9853   456 -3283     -   -91 |
    2 | -4170    34  -370  -146  3977   274 -4281     -    53 |
    3 |  9773     9955766   264  5895   265  8610     -  -194 |
    4 | -4997    15  -388    19  -904   -86 -5170     -   -34 |
    5 | -3772   122  -349    27  -593   424 -2607     -  -189 |
    6 |  -318    63******   230  -878   355   807     -  -249 |
    7 |  -373    53******   -15 11931    34  -989     -   -64 |
    8 | 11071    85  -325  -136  5690   194  8754     -   -24 |
    9 | -3312   107  -255    55  9396    81 -3554     -  -188 |
   10 | -1581    49******  -146  3676    32 -1760     -    33 |
   11 |  6265    17   -70    16  2945   387  5964     -   -35 |
   13 |  3314   135  -296  -103  1241   -28  3612     -  -117 |
   14 |  3983    84    76  -169  3223   341  3885     -     X |
   15 | -3186     -     -   144   699  1003  -844     -  -100 |
   18 |  3385   -28  -152    79  2249   104  3234     -   -14 |
   20 |  5925    62  -431  -268   894   386  5403     -    92 |
   21 |  -191   139******    24     -   253   229     -  -212 |
   22 | -1635    20  -192   102 -9348   631 -1586     -   -99 |
   23 |  4825   137     X   148     -   251  5408     -  -299 |
   24 | -3607    -6  -462    49  -948   -21 -3762     -   -25 |
   25 |    53   187   -86    -3  -426   242  -390     -  -259 |
   26 | -2646    42  -291   307 -2120    30 -2815     -  -272 |
   27 | -9675    66  -233    35-16548    81 -8360     -  -116 |
   28 |  9329    11  -680  -135  6751   337  8444     -    78 |
   29 | -1899   158  -332    66 -1372   165 -1962     -  -266 |
   30 | -2133   157   -97   119  -184   322 -1937     -  -302 |
   31 |-12597   -27852883   153-14722   529-11561     -   -69 |
 -----+-------------------------------------------------------+
 ALBH |     -   -80345721     -     -     9     -     -   111 |
 ALGO |     -    -7******  -124     -   157     -     -    96 |
 AMC2 |     -    -2     -     -     -  -187     -     -     3 |
 AOML |     -   -93     -     -     -     -     -     -   130 |
 ARTU |     -   147     -  -295     -     -     -     -     - |
 AUCK |     -    72******     -     -     -     -     -  -100 |
 BAHR |     -     6  -353   -23     -   269     -     -     8 |
 BILI |     -   -16     -    33     -     -     -     -     - |
 BOR1 |     -   -59     -     -     -     -     -     -    83 |
 BRMU |     -   -54******     5     -     -     -     -    73 |
 BRUS |     -   -40     -     -     -   251     -     -    55 |
 CAS1 |     -   -82  -375    33     -   174     -     -    91 |
 CRO1 |     -  -187     -     -     -   411     -     -   261 |
 DAV1 |     -   -58     -   -69     -     -     -     -   130 |
 DRAO |     -   -31     -     -     -     -     -     -    43 |
 GODE |     -   -34******     -     -     -     -     -    48 |
 GOLD |     -    -3     -     -     -     X     -     -     4 |
 GUAM |     -   -28******    51     -  -132     -     -     4 |
 HOB2 |     -    27  -870     -     -     -     -     -   -38 |
 HRAO |     -   -61     -     -     -   -86     -     -    85 |
 KARR |     -   -41     -    83     -     -     -     -     - |
 KERG |     -   -75     -     -     -   -33     -     -   105 |
 KOSG |     -   -83******     -     -     -     -     -   116 |
 KWJ1 |     -     -******   395     -   728     -     -  -275 |
 LPGS |     -     -     X   190     -     -     -     -  -132 |
 MAC1 |     -   121******  -218     -     -     -     -   -17 |
 MAS1 |     -   -61******     -     -   195     -     -    86 |
 MATE |     -   -55     -     -     - -6230     -     -    77 |
 MAW1 |     -   -50     -     -     -     -     -     -    70 |
 MCM4 |     -    82-16787   -76     -     -     -     -   -65 |
 MDO1 |     -  -124     -     -     -     -     -     -   173 |
 MEDI |     -   103     -     -     -     -     -     -  -145 |
 METS |     -    38     -     -     -     -     -     -   -54 |
 MKEA |     -  -102345701     -     -     -     -     -   142 |
 MSKU |     -    -1     -     2     -     -     -     -     - |
 NLIB |     -  -308     -     -     -     -     -     -   431 |
 NPLD |     -   -74     -     -     -     -     -     -   104 |
 NRC2 |     -   -44     -     -     -   195     -     -    61 |
 NTUS |     -   -36     -     -     -     -     -     -    50 |
 NYA1 |     -    -5     -  -114     -   419     -     -    87 |
 OHIG |     -     8  -477  -150     -     -     -     -    94 |
 ONSA |     -   -93******    46     -     -     -     -    99 |
 PENC |     -   166     -     -     -     -     -     -  -232 |
 PERT |     -    60  -184     -     -     -     -     -   -84 |
 PIE1 |     -  -128******     -     -     -     -     -   178 |
 POTS |     -   -27******     -     -     -     -     -    37 |
 REYK |     -   -40     -     -     -     -     -     -    56 |
 RIOG |     -    -4   -73    33     -   294     -     -   -18 |
 SANT |     -   -52  -201    79     -     -     -     -    19 |
 SFER |     -  -229     -     -     -     -     -     -   320 |
 STJO |     -   -55     -  -217     -     -     -     -   229 |
 TRO1 |     -   -80     -   161     -     -     -     -     - |
 TSKB |     -    71******     -     -     -     -     -   -99 |
 URUM |     -     -     -   -29     -     -     -     -    20 |
 USNO |     -   -14******     -     -   183     -     -    20 |
 USUD |     -    28100682     -     -     -     -     -   -40 |
 VILL |     -    -8******     -     -     -     -     -    11 |
 WHIT |     -    23     -   -47     -     -     -     -     - |
 WSRT |     -   -35     -     -     -   121     -     -    49 |
 WTZR |     -  -108******     -     -   187     -     -   151 |
 WUHN |     -   -25 63110   -48     -   636     -     -    68 |
 YELL |     -   -13364879     -     -     -     -     -    18 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  8999    48 94601    78  9220   134  8746     -    37 |  288   6.45
    2 |  4252    75 94505    68  3801   131  4330     -    97 |  288   2.94
    3 |  3758   117******   232  3702   140  4456     -    60 |  276   1.97
    4 |  1557    50 94535    50   733   155  1703     -    42 |  288   0.83
    5 |  7792    53 94412   120  6815    87  8944     -   150 |  288   6.19
    6 | 13677    71******   110  5602   107 13275     -    81 |  278  10.24
    7 |  3771    58******   152  4712   141  3351     -   108 |  278   2.04
    8 |  8890    44 94431    72  2866   121  9006     -    50 |  288   6.34
    9 |  3153    82 94558   113  3466   145  3119     -    53 |  288   2.28
   10 |  6716    60******   144  2446    75  6444     -    46 |  277   3.02
   11 |   867    47 94450   160  2261   157   825     -    86 |  288   0.41
   13 |  2355    32 94502    43  1525   159  2223     -    33 |  288   0.20
   14 |   612    64 94511   129  2416    83   672     -     X |  288   0.32
   15 |  4848     -     -   254  2012   452  4501     -   177 |  121   1.74
   18 |   615    63 94413   129  1665   148   710     -   117 |  288   0.36
   20 |  1316    74 94511    87   989   121  1427     -    69 |  288   0.27
   21 |  5392   156******   128     -   154  5053     -   153 |  277   3.28
   22 |  1571    33 94405    53  5115   132  1429     -    36 |  288   1.35
   23 |  9705   172     X   199     -    87  8922     -   143 |  279   5.32
   24 |  2325    44 94493    80  1734    78  2170     -    35 |  288   2.13
   25 |  3595    41 94534   248  3880   137  3364     -   153 |  288   2.57
   26 |  1072    39 94422    75   934   133  1021     -    45 |  288   0.47
   27 | 10291    31 94485    84 13786   129  7929     -    77 |  288   2.81
   28 |  4905    63 94472    52  3232   118  4958     -    73 |  288   2.11
   29 |  1136    76 94612    90  1240   227  1109     -   136 |  288   0.40
   30 |  1621    46 94550   206   869    65  1681     -    97 |  288   1.95
   31 |  7106    57937544   159  5552   139  6690     -    81 |  278   5.15
 -----+-------------------------------------------------------+--------------
 ALBH |     -    23430110     -     -    59     -     -    32 |  286   0.10
 ALGO |     -    14170719    39     -    43     -     -    25 |  288   0.06
 AMC2 |     -    22     -     -     -    61     -     -    31 |  286   0.04
 AOML |     -    23     -     -     -     -     -     -    33 |  284  16.34
 ARTU |     -    13     -    26     -     -     -     -     - |  280  21.76
 AUCK |     -    32******     -     -     -     -     -    44 |  264  16.15
 BAHR |     -    61 94446    45     -    59     -     -   109 |  288   0.29
 BILI |     -    16     -    33     -     -     -     -     - |  287  16.62
 BOR1 |     -    71     -     -     -     -     -     -   100 |  283  57.55
 BRMU |     -    32******    59     -     -     -     -    35 |  288  36.61
 BRUS |     -    46     -     -     -   124     -     -    65 |  274   0.07
 CAS1 |     -    91 94527   104     -    94     -     -   197 |  288   9.71
 CRO1 |     -    42     -     -     -    62     -     -    59 |  286   0.12
 DAV1 |     -    44     -    49     -     -     -     -    42 |  288  17.39
 DRAO |     -    16     -     -     -     -     -     -    23 |  288   0.07
 GODE |     -    49******     -     -     -     -     -    68 |  285   0.13
 GOLD |     -    51     -     -     -     X     -     -    72 |  282  26.06
 GUAM |     -    34170773    67     -    88     -     -    37 |  288  34.41
 HOB2 |     -    56 94486     -     -     -     -     -    79 |  288   0.09
 HRAO |     -   153     -     -     -    97     -     -   213 |  288  34.04
 KARR |     -    49     -    99     -     -     -     -     - |  288  16.94
 KERG |     -    26     -     -     -    77     -     -    37 |  287   1.11
 KOSG |     -    33******     -     -     -     -     -    46 |  286  79.05
 KWJ1 |     -     -******   228     -   480     -     -   158 |  166  99.68
 LPGS |     -     -     X   175     -     -     -     -   122 |   84 269.91
 MAC1 |     -    24******    98     -     -     -     -    65 |  284  18.67
 MAS1 |     -    24******     -     -    77     -     -    34 |  258   2.13
 MATE |     -    21     -     -     -    53     -     -    30 |  288   0.21
 MAW1 |     -    45     -     -     -     -     -     -    63 |  286  29.31
 MCM4 |     -   106 81457   147     -     -     -     -   245 |  287    >>>
 MDO1 |     -    62     -     -     -     -     -     -    86 |  280 867.87
 MEDI |     -    25     -     -     -     -     -     -    35 |  262   0.13
 METS |     -    36     -     -     -     -     -     -    51 |  285   1.20
 MKEA |     -    35430107     -     -     -     -     -    49 |  286  46.47
 MSKU |     -    28     -    55     -     -     -     -     - |  270  42.40
 NLIB |     -    19     -     -     -     -     -     -    27 |  191   0.02
 NPLD |     -    66     -     -     -     -     -     -    92 |  285   0.05
 NRC2 |     -    14     -     -     -    54     -     -    19 |  286   0.05
 NTUS |     -    25     -     -     -     -     -     -    36 |  288   7.87
 NYA1 |     -    43     -    23     -    63     -     -    59 |  288   0.12
 OHIG |     -    53 94492    83     -     -     -     -    39 |  288  15.79
 ONSA |     -    24******    41     -     -     -     -    35 |  287   6.23
 PENC |     -    18     -     -     -     -     -     -    26 |  285    >>>
 PERT |     -    56 94442     -     -     -     -     -    79 |  288  18.77
 PIE1 |     -    20******     -     -     -     -     -    28 |  287   0.04
 POTS |     -    24 96699     -     -     -     -     -    33 |  286  20.06
 REYK |     -    32     -     -     -     -     -     -    45 |  286   9.24
 RIOG |     -    53 94463    63     -    51     -     -    52 |  288  18.14
 SANT |     -    24 94460    33     -     -     -     -    31 |  288  23.96
 SFER |     -    52     -     -     -     -     -     -    73 |  285 142.82
 STJO |     -    25     -    46     -     -     -     -    44 |  288  21.62
 TRO1 |     -    15     -    30     -     -     -     -     - |  288   9.92
 TSKB |     -    18192031     -     -     -     -     -    25 |  287   1.10
 URUM |     -     -     -    48     -     -     -     -    33 |  288  90.40
 USNO |     -    14******     -     -    48     -     -    19 |  288   0.03
 USUD |     -    41188137     -     -     -     -     -    58 |  286   0.50
 VILL |     -    21483712     -     -     -     -     -    29 |  286  32.85
 WHIT |     -    22     -    44     -     -     -     -     - |  288  18.12
 WSRT |     -    30     -     -     -    64     -     -    42 |  288   0.08
 WTZR |     -    13******     -     -    41     -     -    19 |  288   0.05
 WUHN |     -    20153031    33     -    83     -     -    22 |  287  33.39
 YELL |     -    32429354     -     -     -     -     -    45 |  285   0.03
 -----+-------------------------------------------------------+--------------
 TOT  |  5645    55******   110  4668   116  5430     -    80 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

