
 GPS week: 1141   Day: 2   MJD: 52233                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2646      0     0.11    -0.13     4.77     0.00
 cod |   288     0  25201      0     0.09    -0.03     0.08    16.93
 emr |    96     0   3879      0  1130.80     8.75     0.09    16.13
 esa |   288    10  17793   1790  1779.02     3.14     0.10    13.05
 gfz |   288     0  14690      0     0.33    -1.23     0.10    12.83
 igu |    96     0   2457      0     0.06    -0.09     3.75     0.00
 jpl |    96     4   2341      0     0.04    -0.09     0.06    27.14
 ngs |    96     0   2646      0     0.11    -0.12     4.57     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24949     41   690.14    -3.83     0.10    13.91

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -5506    21  -109   183  -103     -    90 -5304     -  -106 |
    2 | -4413    -3  -137    56  -113 -2952    32 -4343     -    92 |
    3 |  9115   -34  -104    92   207 12457   109  8505     -  -250 |
    4 | -8239   -10   -88   152    33   208   -50 -7586     -   -93 |
    5 |  5366   125   -28    -7  -102  3918    13  4559     -   -49 |
    6 | -1733   -11    10    35   203  6558   -47 -2172     -  -175 |
    7 | -7876   113  -102    33   -40-11190   -42 -8037     -   -69 |
    8 | -1601    37   -46    59   -97  6567    77  -795     -   -35 |
    9 | -6012    73    59    -2    37 -8171  -121 -5528     -   -74 |
   10 | -5311    35   -63   -62    41  3786  -203 -4973     -   115 |
   11 |  4077  -112   113   109   181  -775    10  3873     -  -180 |
   13 |  1106    60    63   171   -68 -3636  -128  1165     -  -115 |
   14 |  4275    87   238   -51    68  -672   -42  4135     -  -188 |
   15 |  -849    17    52     -    -7  -690   -13 -1150     -   -27 |
   17 |  3253   118   -21    59   107  1966   -47  2918     -  -260 |
   18 |  3220   -92   209    48     0  -463   -64  3420     -    25 |
   20 |  5318   -41   -63   -45    -1 -1503    91  5255     -    64 |
   21 | -5720   160    56   -32   -32-12974    41 -3825     -  -186 |
   22 |  5877    23  -391    13    -8 -3947   387  4910     -  -104 |
   23 |  1677   135  -113     X   127     -   -93  2555     -  -186 |
   24 |  1404    68  -101  -108   107  -987  -154   845     -    46 |
   25 | -2354   166  -175   182   110   523    24 -2310     -  -415 |
   26 | -2845    12    69   -25   219 -1367  -112 -2707     -  -156 |
   27 |  2187    15  -248   196   -13 11427    58  2033     -  -121 |
   28 |  6721    11    57    25  -149 -3916    87  6480     -    30 |
   29 |  -987   115    65   217   -47  3958   -14  -964     -  -310 |
   30 | -2992   109   -42   184    62 -4393   -63 -2819     -  -304 |
   31 |  3608   -75  -109    96   168  6430   170  2639     -  -203 |
 -----+-------------------------------------------------------------+
 ALBH |     -    31     -  -246     -     -     -     -     -   138 |
 ALGO |     -     5   148   -87   -53     -     -     -     -    63 |
 AMC2 |     -    13     -     -     -     -     -     -     -   -15 |
 ANKR |     -    42     -   -54     -     -     -     -     -     - |
 AOML |     -    -5     -     -     -     -     -     -     -     6 |
 ARTU |     -    65     -     -   -85     -     -     -     -     - |
 AUCK |     -    52     -     X  -138     -     -     -     -    63 |
 BAHR |     -    54    17   -97   -16     -     -     -     -    31 |
 BILI |     -   561     -     -  -740     -     -     -     -     - |
 BOR1 |     -  -115     -     -     -     -     -     -     -   140 |
 BRMU |     -   144     -  -240   -58     -     -     -     -    68 |
 CAS1 |     -  -102     -    68   -42     -     -     -     -   101 |
 CRO1 |     -  -186     -     -     -     -     -     -     -   227 |
 DAV1 |     -   -21     -     -  -102     -     -     -     -   121 |
 DRAO |     -    -9    34     -     -     -     -     -     -    -2 |
 FAIR |     -     -   121  -115     -     -     -     -     -    58 |
 GALA |     -   -40     -   -64    99     -     -     -     -    16 |
 GODE |     -     -     -    10     -     -     -     -     -    -9 |
 GOLD |     -   -25     -     -     -     -     -     -     -    31 |
 GRAZ |     -  -124     -     -     -     -     -     -     -   151 |
 GUAM |     -   -71     -     X    72     -     -     -     -    21 |
 HOB2 |     -    17     -     X     -     -     -     -     -   -21 |
 HRAO |     -    69     -     -     -     -     -     -     -   -84 |
 KARR |     -   -66     -     -    87     -     -     -     -     - |
 KERG |     -    47     -     -     -     -     -     -     -   -58 |
 KIRU |     -    44     -   -57     -     -     -     -     -     - |
 KOKB |     -     -     -     X   -76     -     -     -     -    70 |
 KOSG |     -  -123     -    60     -     -     -     -     -    96 |
 KWJ1 |     -     -     -   -66   125     -     -     -     -   -58 |
 MATE |     -   -49   -33     -     -     -     -     -     -    73 |
 MAW1 |     -    36     -     -     -     -     -     -     -   -43 |
 MCM4 |     -     -     -   -79   -21     -     -     -     -    90 |
 MDO1 |     -  -133     -     -     -     -     -     -     -   162 |
 MEDI |     -   -76     -     -     -     -     -     -     -    93 |
 METS |     -   -73     -     -     -     -     -     -     -    89 |
 MKEA |     -   -50   105   -96     -     -     -     -     -   106 |
 MSKU |     -   -46     -     -    60     -     -     -     -     - |
 NKLG |     -     -     -   -87     -     -     -     -     -    81 |
 NLIB |     -  -148  -100     -     -     -     -     -     -   218 |
 NPLD |     -   -65     -     -     -     -     -     -     -    79 |
 NRC2 |     -   -37   206     -     -     -     -     -     -   -35 |
 NTUS |     -   -59     -     -     -     -     -     -     -    72 |
 NYA1 |     -    78     -     -  -127     -     -     -     -    22 |
 NYAL |     -     -     -    98     -     -     -     -     -   -92 |
 OHIG |     -     3     -   -91   -59     -     -     -     -   133 |
 ONSA |     -  -118     -   -48    72     -     -     -     -   120 |
 PENC |     -   186     -     -     -     -     -     -     -  -227 |
 PERT |     -   -20     -    24     -     -     -     -     -     4 |
 PIE1 |     -   -97   -13     X     -     -     -     -     -   123 |
 POTS |     -   -35     -    38     -     -     -     -     -     8 |
 REYK |     -   -71     -     -     -     -     -     -     -    87 |
 RIOG |     -   -88     -    88    33     -     -     -     -    -2 |
 SANT |     -   -46     -   -26    35     -     -     -     -    44 |
 SELE |     -   -80     -   104     -     -     -     -     -     - |
 SFER |     -  -453     -     -     -     -     -     -     -   552 |
 STJO |     -  -103   208     -   -55     -     -     -     -    96 |
 SUTH |     -   255     -  -166     -     -     -     -     -  -158 |
 THTI |     -     -     -   139     -     -     -     -     -  -131 |
 TRO1 |     -   -57     -     -    75     -     -     -     -     - |
 TROM |     -     -     -    60     -     -     -     -     -   -56 |
 TSKB |     -   -42    -6  -144     -     -     -     -     -   199 |
 USNO |     -    60   207  -264     -     -     -     -     -    85 |
 USUD |     -   -74     -     3     -     -     -     -     -    88 |
 VILL |     -     4     -    45     -     -     -     -     -   -45 |
 WHIT |     -    21     -     -   -28     -     -     -     -     - |
 WSRT |     -   -20     -     -     -     -     -     -     -    24 |
 WTZR |     -   -77     -     0     -     -     -     -     -    94 |
 WUHN |     -   -42     -  -316    91     -     -     -     -   253 |
 YAR2 |     -   -42     -    25     -     -     -     -     -    29 |
 YELL |     -    67    91   -88     -     -     -     -     -   -38 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5471   105    66   134    56     -    34  5658     -    51 |  288   4.62
    2 |  4399   199    94   101    86  5722    44  4282     -   145 |  287   2.64
    3 |  3233    81    56    43    63  4675    58  3780     -    81 |  278   1.59
    4 |  2496    80    82    62    60  1424    50  2248     -    74 |  288   1.03
    5 |  7046    58    37    49    57  7314    40  5896     -    62 |  288   4.76
    6 |  9589    99    39   140   160  4398    44  8934     -    30 |  280   8.52
    7 |  4649    74    66   117    90  5417    58  4162     -    45 |  282   0.97
    8 |  7751    66   108    62   104  7881    31  7540     -    66 |  288   5.51
    9 |  3353    95    81    83   114  4507    35  2816     -   110 |  288   1.62
   10 |  2878    73   117    88    70  2392    80  3189     -    51 |  281   2.30
   11 |  1346    73   150   144   201   362    71  1254     -    52 |  288   0.39
   13 |  1847    66    76    69   145  1669    51  1618     -    90 |  288   0.26
   14 |  1891   100    69   133    76   644   119  1689     -   313 |  221   0.27
   15 |  3100    65   111     -    54  2238    52  3476     -    58 |  288   2.40
   17 |  1543   148   218   188    99  1582    53  1688     -   190 |  287   2.68
   18 |  1136    98   123   106   117   791    30   864     -    59 |  288   0.31
   20 |  1007    61    77    85   105  1036    51   713     -    33 |  288   0.43
   21 |  9972   154   131   174   204  4672   101  9740     -   168 |  281   4.78
   22 |  3623    42    76    37    51  2697    59  3614     -    51 |  288   0.84
   23 |  6176   103   143     X   138     -    71  5677     -    59 |  279   5.35
   24 |  5083    87    56   108    72  3225    75  5026     -    41 |  288   2.03
   25 |  2144    50    59    47    85  2430    34  2156     -    25 |  288   2.05
   26 |   975    63    59   174    77  1110    50   817     -   102 |  288   0.57
   27 |  3055    67    66    83    35  4019    24  3045     -    72 |  288   2.10
   28 |  1931   152    54    97   142  2612    85  1999     -    34 |  288   0.33
   29 |  2784    54    40    25    61  1571    28  2443     -    74 |  288   0.87
   30 |  1721    65    57    79   113  2793    34  1504     -    85 |  288   1.44
   31 | 10302   100    86   105   177  5302   101 10014     -   119 |  284   6.00
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    76     -   196     -     -     -     -     -    76 |  286   0.09
 ALGO |     -    55    30   163    45     -     -     -     -    68 |  288   0.05
 AMC2 |     -    15     -     -     -     -     -     -     -    18 |  286   0.07
 ANKR |     -    23     -    29     -     -     -     -     -     - |  278  14.42
 AOML |     -    32     -     -     -     -     -     -     -    39 |  286  30.53
 ARTU |     -    82     -     -   108     -     -     -     -     - |  280  20.60
 AUCK |     -    37     -     X    33     -     -     -     -    41 |  264  19.23
 BAHR |     -    41    45    39    32     -     -     -     -    30 |  288   0.32
 BILI |     -    12     -     -    15     -     -     -     -     - |  287  17.01
 BOR1 |     -   142     -     -     -     -     -     -     -   172 |  272  83.68
 BRMU |     -    89     -   335   120     -     -     -     -    82 |  288  38.73
 CAS1 |     -    79     -    61    43     -     -     -     -    23 |  288   9.04
 CRO1 |     -    92     -     -     -     -     -     -     -   112 |  286   0.13
 DAV1 |     -    66     -     -    76     -     -     -     -    21 |  288  17.28
 DRAO |     -    25    65     -     -     -     -     -     -    27 |  288   0.07
 FAIR |     -     -    79    91     -     -     -     -     -    67 |  282   0.20
 GALA |     -    33     -    53    27     -     -     -     -    62 |  288  33.84
 GODE |     -     -     -   128     -     -     -     -     -   120 |  123  59.86
 GOLD |     -    26     -     -     -     -     -     -     -    32 |  286  32.51
 GRAZ |     -    23     -     -     -     -     -     -     -    28 |  284  18.40
 GUAM |     -    64     -     X    33     -     -     -     -    77 |  288  36.62
 HOB2 |     -    54     -     X     -     -     -     -     -    65 |  288   0.10
 HRAO |     -    45     -     -     -     -     -     -     -    55 |  288  27.13
 KARR |     -    26     -     -    34     -     -     -     -     - |  288  17.21
 KERG |     -    30     -     -     -     -     -     -     -    36 |  287   1.27
 KIRU |     -    18     -    24     -     -     -     -     -     - |  278   3.90
 KOKB |     -     -     -     X   340     -     -     -     -   314 |  265   0.50
 KOSG |     -    26     -    34     -     -     -     -     -    19 |  288   8.15
 KWJ1 |     -     -     -   145   112     -     -     -     -   127 |  257  97.89
 MATE |     -    30    43     -     -     -     -     -     -    22 |  288   0.15
 MAW1 |     -    26     -     -     -     -     -     -     -    31 |  286  28.81
 MCM4 |     -     -     -   134   118     -     -     -     -   215 |  287  70.52
 MDO1 |     -    21     -     -     -     -     -     -     -    26 |  278  21.09
 MEDI |     -    23     -     -     -     -     -     -     -    28 |  286   0.30
 METS |     -   227     -     -     -     -     -     -     -   277 |  285   0.61
 MKEA |     -    51    42   104     -     -     -     -     -    63 |  288  45.23
 MSKU |     -    64     -     -    84     -     -     -     -     - |  272  38.18
 NKLG |     -     -     -    39     -     -     -     -     -    37 |  278    >>>
 NLIB |     -   212   118     -     -     -     -     -     -   289 |  288   0.13
 NPLD |     -    17     -     -     -     -     -     -     -    21 |  285   0.04
 NRC2 |     -    31    60     -     -     -     -     -     -    35 |  286   0.08
 NTUS |     -    29     -     -     -     -     -     -     -    35 |  288   7.86
 NYA1 |     -    24     -     -    40     -     -     -     -    41 |  288   0.08
 NYAL |     -     -     -    15     -     -     -     -     -    14 |  278   0.08
 OHIG |     -   141     -    49    89     -     -     -     -    61 |  288  10.55
 ONSA |     -    26     -    28    19     -     -     -     -    11 |  288   3.42
 PENC |     -    26     -     -     -     -     -     -     -    32 |  285   7.11
 PERT |     -    31     -    98     -     -     -     -     -    64 |  288  17.76
 PIE1 |     -    21    65     X     -     -     -     -     -    36 |  284   0.10
 POTS |     -    41     -    64     -     -     -     -     -    21 |  277  16.43
 REYK |     -    17     -     -     -     -     -     -     -    21 |  286   9.16
 RIOG |     -   117     -    37    81     -     -     -     -    70 |  288  14.06
 SANT |     -    52     -   111    26     -     -     -     -    38 |  288  24.18
 SELE |     -    30     -    39     -     -     -     -     -     - |  278  28.17
 SFER |     -    19     -     -     -     -     -     -     -    23 |  213   0.64
 STJO |     -    26    41     -    28     -     -     -     -    34 |  288  16.90
 SUTH |     -    52     -    75     -     -     -     -     -    29 |  288  23.05
 THTI |     -     -     -    29     -     -     -     -     -    27 |  278   4.31
 TRO1 |     -    32     -     -    43     -     -     -     -     - |  288  10.99
 TROM |     -     -     -    15     -     -     -     -     -    14 |  276  11.73
 TSKB |     -    29    68    57     -     -     -     -     -    81 |  251   1.65
 USNO |     -    51    67    69     -     -     -     -     -    35 |  288   0.06
 USUD |     -    40     -    39     -     -     -     -     -    63 |  288   0.43
 VILL |     -    17     -    33     -     -     -     -     -    36 |  288  37.85
 WHIT |     -    28     -     -    37     -     -     -     -     - |  288   7.63
 WSRT |     -    19     -     -     -     -     -     -     -    23 |  288   0.06
 WTZR |     -    25     -    26     -     -     -     -     -    33 |  288   0.16
 WUHN |     -    39     -    35    30     -     -     -     -    48 |  287  36.08
 YAR2 |     -   206     -    84     -     -     -     -     -   276 |  265   5.94
 YELL |     -   134    66   118     -     -     -     -     -   125 |  288   0.07
 -----+-------------------------------------------------------------+--------------
 TOT  |  4768    79    85   100   102  3751    60  4574     -    96 |


 BEST CLOCK FIT: NPLD   285   0.04 (ns) 

