
 GPS week: 1140   Day: 4   MJD: 52228                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2580      0    -0.06     0.16     5.34     0.00
 cod |   288     0  24211      1    -3.65     2.42     0.07    30.34
 emr |    96     0   3536    107  1070.39    13.74     0.10    23.03
 gfz |   288     0  14191      0    -0.24     0.47     0.09    26.16
 igu |    96     0   2204      0    -0.07     0.18     5.23     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2580      0    -0.05     0.15     5.07     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23395    616   692.28     1.09     0.11    20.47

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -1935    53    60    13   393     - -1037     -  -118 |
    2 |  3412    35  -307   -88     -     -  3667     -   176 |
    3 | -5621    47    52   115   777     - -5303     -  -236 |
    4 | -3921     4  -100   131  1149     - -3427     -  -136 |
    5 |  2671    23   -60   -19-14531     -   963     -    13 |
    6 | -3518    34    39   121  -834     - -2894     -  -220 |
    7 | -5504   101     X  -117 -9851     - -5667     -     X |
    8 |  2256    59   -85   -36  1999     -  2379     -   -10 |
    9 | -1658   -26   -76    32  8182     - -1462     -    25 |
   10 | -6242   -22   -13    77 13271     - -5768     -   -62 |
   11 |   586   149   229   -19  -712     -   330     -  -283 |
   13 |  3104   -29    83    35  3192     -  2955     -   -33 |
   14 |  4151   117   135   -70  5815     -  4177     -  -134 |
   15 | -2185    23   142   126 -4911     - -2553     -  -250 |
   18 |  6050     3   150    13  4035     -  6121     -   -77 |
   20 |  5988    42    74   -28  3303     -  5743     -   -56 |
   21 | -1477   199   -90   129     -     - -1295     -  -427 |
   22 | -9951    -7  -110    95-20054     - -8874     -   -69 |
   23 |  4096   133  -170  -110     -     -  3814     -     X |
   24 |   437    43    43   -58   977     -    48     -    -5 |
   25 | -2831   163  -114    87     -     - -2376     -  -309 |
   26 |  -789    52  -119   101  -607     -  -842     -  -161 |
   27 |  6985    40  -177   111 14099     -  5809     -  -134 |
   28 |  4987   -32  -134   -64 -4945     -  4713     -   178 |
   29 |   650   172    20    12 -3259     -   486     -  -278 |
   30 | -3876    97   -63   111-12110     - -3830     -  -262 |
   31 |  4041    96    83   156 15182     -  4013     -  -373 |
 -----+-------------------------------------------------------+
 ALBH |     -  -123     -     -     -     -     -     -   183 |
 ALGO |     -    10    95  -111     -     -     -     -    91 |
 AMC2 |     -   -42     -     -     -     -     -     -    63 |
 AOML |     -     3     -     -     -     -     -     -    -4 |
 ARTU |     -   316     -  -367     -     -     -     -     - |
 AUCK |     -    15     -     -     -     -     -     -   -23 |
 BAHR |     -   -28     -    13     -     -     -     -    25 |
 BOR1 |     -   -51     -     -     -     -     -     -    76 |
 BRMU |     -     -     -    -4     -     -     -     -     5 |
 BRUS |     -   -20     -     -     -     -     -     -    30 |
 CAS1 |     -  -107     -     8     -     -     -     -   149 |
 CRO1 |     -    22     -     -     -     -     -     -   -33 |
 DAV1 |     -   -18     -   -52     -     -     -     -    95 |
 DRAO |     -   -17    36     -     -     -     -     -    12 |
 FAIR |     -     -    57     -     -     -     -     -   -64 |
 GALA |     -   -91     -   -34     -     -     -     -   179 |
 GODE |     -   -22     -     -     -     -     -     -    32 |
 GOLD |     -   -37     -     -     -     -     -     -    55 |
 GUAM |     -  -109     -    87     -     -     -     -    51 |
 HOB2 |     -     4     -     -     -     -     -     -    -6 |
 HRAO |     -   -26     -     -     -     -     -     -    38 |
 KARR |     -  -108     -   125     -     -     -     -     - |
 KERG |     -   -96     -     -     -     -     -     -   143 |
 KOSG |     -   -86     -     -     -     -     -     -   127 |
 KSTU |     -   -43     -     -     -     -     -     -    64 |
 KWJ1 |     -     -     -   -27     -     -     -     -    34 |
 MAC1 |     -   115     -  -286     -     -     -     -   196 |
 MADR |     -    90     -     -     -     -     -     -  -133 |
 MAW1 |     -    32     -     -     -     -     -     -   -47 |
 MCM4 |     -   126     -   -55     -     -     -     -  -138 |
 MDO1 |     -  -305     -     -     -     -     -     -   453 |
 MEDI |     -    20     -     -     -     -     -     -   -29 |
 MSKU |     -    77     -   -90     -     -     -     -     - |
 NLIB |     -   -39   -31     -     -     -     -     -    69 |
 NPLD |     -   -25     -     -     -     -     -     -    36 |
 NRC2 |     -     0   180     -     -     -     -     -   -69 |
 NTUS |     -   -88     -     -     -     -     -     -   130 |
 NYA1 |     -    22     -   -82     -     -     -     -    76 |
 OHIG |     -  -154     -    63     -     -     -     -   148 |
 ONSA |     -   -50     -     -     -     -     -     -    74 |
 PENC |     -   176     -     -     -     -     -     -  -261 |
 PIE1 |     -  -222  -112     -     -     -     -     -   369 |
 POTS |     -     6     -     -     -     -     -     -    -9 |
 REYK |     -     5     -     -     -     -     -     -    -8 |
 RIOG |     -    18     -   100     -     -     -     -  -156 |
 SANT |     -   -71     -   106     -     -     -     -   -31 |
 SFER |     -  -307     -     -     -     -     -     -   455 |
 STJO |     -   -55   188  -111     -     -     -     -   153 |
 THU1 |     -   110     -     -     -     -     -     -  -163 |
 TRO1 |     -   -24     -    28     -     -     -     -     - |
 TSKB |     -    59   -92     -     -     -     -     -   -51 |
 URUM |     -   -50     -     -     -     -     -     -    74 |
 USNO |     -   -77   100     -     -     -     -     -    76 |
 USUD |     -     8     -     -     -     -     -     -   -11 |
 WES2 |     -     8     -     -     -     -     -     -   -11 |
 WHIT |     -    23     -   -26     -     -     -     -     - |
 WSRT |     -   -39     -     -     -     -     -     -    57 |
 WTZR |     -   -78     -     -     -     -     -     -   115 |
 WUHN |     -     2     -   -82     -     -     -     -   101 |
 YAR2 |     -  -393     -     -     -     -     -     -   582 |
 YELL |     -   -31    56     -     -     -     -     -    24 |
 YSSK |     -    71     -   -82     -     -     -     -     - |
 ZWEN |     -     -     -   -12     -     -     -     -    15 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 | 12222   116   127   148  6859     - 11534     -   179 |  288   4.81
    2 |  4604   104   160   117     -     -  4696     -    71 |  288   2.56
    3 |  2313   109   119   114  2712     -  1966     -   152 |  288   1.88
    4 |  3108   108   100    86  1350     -  2891     -   121 |  288   0.72
    5 |  8947    53    84    97  8615     -  7214     -   156 |  288   2.98
    6 |  9575    47    84    98  5099     - 10467     -   165 |  288  10.00
    7 |  3676    57     X    66  4048     -  3606     -     X |  288   0.82
    8 |  6359    46   162    79  9261     -  6836     -    42 |  288   5.17
    9 |  2777   133   102    55  5356     -  2703     -   185 |  288   1.66
   10 |  3154   170    46    71  5047     -  3701     -   320 |  276   2.47
   11 |  2399   102    63    65  2873     -  2299     -   109 |  288   0.50
   13 |  1345   151    87   114  3027     -  1443     -   148 |  288   0.31
   14 |   949   134    72    52  4284     -  1060     -   166 |  288   0.26
   15 |  5456    67   101    96  4577     -  5057     -    86 |  288   4.31
   18 |   690    68    63    62  3124     -   827     -    59 |  288   0.34
   20 |  1048    78    52   103  3049     -  1176     -   152 |  288   0.21
   21 | 12029   154   156    68     -     - 10030     -   192 |  276   4.82
   22 |  4181    93   121    43 10227     -  4142     -    82 |  288   1.35
   23 |  5802   136   219   154     -     -  5937     -     X |  276   6.01
   24 |  2702    77    50    85  2122     -  2655     -   121 |  288   1.99
   25 |  6904    71    63    35     -     -  6150     -    74 |  288   2.06
   26 |  1635    63   114    64  1587     -  1414     -   104 |  288   0.74
   27 |  6360    58    74    48  7827     -  6077     -    82 |  288   4.02
   28 |  2899    84   133   107  2919     -  3029     -    91 |  288   0.59
   29 |   861    62   130   107  1872     -   902     -    95 |  288   0.91
   30 |  1549    69   120    68  5961     -  1559     -    89 |  288   1.06
   31 |  2988    69    86   153  5074     -  2915     -   133 |  288   2.88
 -----+-------------------------------------------------------+--------------
 ALBH |     -    21     -     -     -     -     -     -    31 |  286   0.13
 ALGO |     -    55    25    43     -     -     -     -    47 |  288   0.05
 AMC2 |     -    35     -     -     -     -     -     -    52 |  286   0.09
 AOML |     -    45     -     -     -     -     -     -    67 |  286  21.99
 ARTU |     -    28     -    32     -     -     -     -     - |  280  22.67
 AUCK |     -    41     -     -     -     -     -     -    61 |  264  18.98
 BAHR |     -    59     -   113     -     -     -     -   141 |  288   0.44
 BOR1 |     -    83     -     -     -     -     -     -   124 |  280 167.12
 BRMU |     -     -     -    32     -     -     -     -    41 |  288  44.30
 BRUS |     -    31     -     -     -     -     -     -    46 |  286   0.06
 CAS1 |     -    68     -   107     -     -     -     -    49 |  288   7.69
 CRO1 |     -    98     -     -     -     -     -     -   145 |  286   0.18
 DAV1 |     -    51     -   123     -     -     -     -   206 |  288  16.45
 DRAO |     -    59    92     -     -     -     -     -    55 |  288   0.05
 FAIR |     -     -    39     -     -     -     -     -    44 |   92   0.04
 GALA |     -    54     -    30     -     -     -     -   112 |  288  37.19
 GODE |     -    40     -     -     -     -     -     -    59 |  270 587.85
 GOLD |     -    38     -     -     -     -     -     -    57 |  286  30.24
 GUAM |     -    52     -    74     -     -     -     -    63 |  288  34.63
 HOB2 |     -    30     -     -     -     -     -     -    45 |  288   0.07
 HRAO |     -    33     -     -     -     -     -     -    49 |  287  34.04
 KARR |     -    35     -    41     -     -     -     -     - |  288  21.43
 KERG |     -    34     -     -     -     -     -     -    50 |  287   1.43
 KOSG |     -    29     -     -     -     -     -     -    43 |  286  11.74
 KSTU |     -   160     -     -     -     -     -     -   237 |  235  11.91
 KWJ1 |     -     -     -   198     -     -     -     -   253 |  206 111.37
 MAC1 |     -    27     -    54     -     -     -     -    86 |  287  17.89
 MADR |     -   119     -     -     -     -     -     -   176 |  229  28.26
 MAW1 |     -    53     -     -     -     -     -     -    78 |  283  26.32
 MCM4 |     -    55     -   109     -     -     -     -   132 |  288  12.20
 MDO1 |     -    47     -     -     -     -     -     -    70 |  236  12.55
 MEDI |     -    45     -     -     -     -     -     -    66 |  286   2.96
 MSKU |     -    84     -    98     -     -     -     -     - |  252  47.01
 NLIB |     -    19    30     -     -     -     -     -    29 |  287   0.05
 NPLD |     -    26     -     -     -     -     -     -    39 |  285   0.06
 NRC2 |     -    46    52     -     -     -     -     -    57 |  286   0.06
 NTUS |     -    30     -     -     -     -     -     -    44 |  288   8.44
 NYA1 |     -    49     -    43     -     -     -     -   125 |  288   0.07
 OHIG |     -   160     -    48     -     -     -     -   257 |  279  13.04
 ONSA |     -    43     -     -     -     -     -     -    64 |  288   8.27
 PENC |     -    17     -     -     -     -     -     -    25 |  285   9.37
 PIE1 |     -    40    35     -     -     -     -     -    55 |  282   0.06
 POTS |     -    39     -     -     -     -     -     -    58 |  288  19.41
 REYK |     -    52     -     -     -     -     -     -    77 |  286   7.78
 RIOG |     -    52     -    72     -     -     -     -   159 |  288  19.73
 SANT |     -    81     -   145     -     -     -     -   255 |  288  23.73
 SFER |     -    18     -     -     -     -     -     -    27 |  287   1.32
 STJO |     -    31    53    28     -     -     -     -    39 |  288   5.40
 THU1 |     -    90     -     -     -     -     -     -   133 |  239  39.12
 TRO1 |     -    21     -    25     -     -     -     -     - |  288  11.91
 TSKB |     -    80    92     -     -     -     -     -    83 |  279   1.47
 URUM |     -    45     -     -     -     -     -     -    66 |  288  89.04
 USNO |     -    45    53     -     -     -     -     -    51 |  288   0.03
 USUD |     -    37     -     -     -     -     -     -    55 |  286   0.35
 WES2 |     -    39     -     -     -     -     -     -    57 |  285   0.06
 WHIT |     -    19     -    22     -     -     -     -     - |  288  10.13
 WSRT |     -    29     -     -     -     -     -     -    43 |  287   0.06
 WTZR |     -    58     -     -     -     -     -     -    85 |  248 409.54
 WUHN |     -    63     -    57     -     -     -     -    34 |  287  37.63
 YAR2 |     -    37     -     -     -     -     -     -    55 |  205   4.73
 YELL |     -   126   168     -     -     -     -     -   122 |  285   0.11
 YSSK |     -    22     -    25     -     -     -     -     - |  278  24.25
 ZWEN |     -     -     -    44     -     -     -     -    57 |  288  17.25
 -----+-------------------------------------------------------+--------------
 TOT  |  5343    73   101    87  5226     -  5067     -   115 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

