
 GPS week: 1140   Day: 3   MJD: 52227                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2674      0    -0.03    -0.07     4.73     0.00
 cod |   288     0  22877     20    -0.39     0.49     0.07    33.37
 emr |    96     0   3632    203  1054.83    13.47     0.12    17.76
 esa |   288     0  14083    349  1051.48     1.09     0.35     0.00
 gfz |   288     0  13608      0    -0.19    -0.23     0.11    21.75
 igu |    96     0   2482      0    -0.15     0.57     7.62     0.00
 ngs |    96     0   2674      0    -0.04    -0.02     4.45     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23076     65   688.34     2.16     0.09    27.12

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  2973   153    23   110    16 20749  1884     -  -207 |
    2 |  4204     -     X -1286  -144 14207  3771     -   115 |
    3 | -7343   -19   105   125   256-10279 -7060     -  -206 |
    4 | -6671    70   -11   344   127 -3693 -6331     -  -186 |
    5 | 12442    21  -113  -111  -104 21799 10627     -    82 |
    6 |  2531   -90    27   316   128-13343  2674     -     2 |
    7 | -2227    93     X   100   -20-36909 -2103     -   -98 |
    8 |  -200   147  -106  -153  -107-14953  -429     -   -72 |
    9 | -1395   131   -95   111  -119 15737 -1428     -   -44 |
   10 | -8919    59   -21  -276   -79 -2581 -8103     -    -4 |
   11 |  3630    34   164   328   125 16933  3693     -  -177 |
   13 |  3882    96   119   208    66 14953  3916     -  -193 |
   14 |  3936    98   153    54   -38 21575  4015     -  -121 |
   15 | -3264    11   242     -   -90-18572 -2542     -     6 |
   17 |  4567   114   156  -154   -22     -  4704     -  -158 |
   18 |  4087   -65   201  -133   107 15153  4330     -   -47 |
   20 |  3071    65    38   208    -6 11084  3649     -   -83 |
   21 | -3083     -    35  -696   141 27651 -3031     -  -119 |
   22 | -6141   -12  -176    18   -54-69868 -5709     -    97 |
   23 |  8247    90  -254  -297    48 33068  7214     -  -117 |
   24 |  -985    23   140   -56   -11 20480  -987     -   -51 |
   25 | -4470   103  -194  -716     -     - -4227     -     - |
   26 | -5191   187   -59    69    45-18023 -4590     -  -246 |
   27 |  1292    76  -133   -15    32 29685  -428     -   -90 |
   28 |  4465    91   -41   123  -168 26589  4097     -    32 |
   29 | -3834    78  -128   167   160 -5759 -3461     -  -194 |
   30 | -1398    70   -81   202    23-87985 -1458     -   -87 |
   31 | -4346   110   185    18   147 -5285 -2837     -  -291 |
 -----+-------------------------------------------------------+
 ALBH |     -   -16     -    15     -     -     -     -    19 |
 ALGO |     -    -9   -17  5135   -11     -     -     -    23 |
 AMC2 |     -   -21     -     -     -     -     -     -    26 |
 AOML |     -    -7     -     -     -     -     -     -     9 |
 AUCK |     -    41     -   -24     -     -     -     -   -50 |
 BAHR |     -   -49     -    37   -22     -     -     -    77 |
 BILI |     -   -28     -     -    43     -     -     -     - |
 BOR1 |     -   274     -     -     -     -     -     -  -337 |
 BRMU |     -     -     -     -    31     -     -     -   -25 |
 BRUS |     -   -20     -     -     -     -     -     -    25 |
 CAS1 |     -  -158     -     -   -28     -     -     -   217 |
 CRO1 |     -  -125     -     -     -     -     -     -   154 |
 DAEJ |     -  -558     -     -     -     -     -     -   687 |
 DAV1 |     -   -27     -     -  -111     -     -     -   125 |
 DRAO |     -    20   -62     -     -     -     -     -   -11 |
 GODE |     -   -89     -  -174     -     -     -     -   109 |
 GOLD |     -    -5     -     -     -     -     -     -     6 |
 GRAZ |     -   -33     -     -     -     -     -     -    40 |
 GUAM |     -  -120     -  -184  -112     -     -     -   238 |
 HOB2 |     -   -34     -     -     -     -     -     -    42 |
 HRAO |     -    -8     -     -     -     -     -     -    10 |
 KARR |     -   -74     -     -   113     -     -     -     - |
 KERG |     -   -79     -     -     -     -     -     -    98 |
 KOKB |     -     -     -   463   581     -     -     -  -466 |
 KWJ1 |     -   -65     -  -155   259     -     -     -  -103 |
 LPGS |     -     -     -  -825  -285     -     -     -   228 |
 MAC1 |     -    47     -     -  -264     -     -     -   155 |
 MALI |     -   -38     -  -449   -69     -     -     -   102 |
 MAW1 |     -   -36     -     -     -     -     -     -    44 |
 MCM4 |     -   115     -   -36    97     -     -     -  -210 |
 MEDI |     -    49     -     -     -     -     -     -   -61 |
 METS |     -   -82     -     -     -     -     -     -   101 |
 MKEA |     -   -85   147  -259     -     -     -     -    72 |
 NLIB |     -  -137  -166     -     -     -     -     -   205 |
 NPLD |     -     2     -     -     -     -     -     -    -2 |
 NRC2 |     -  -126     3     -     -     -     -     -   154 |
 NTUS |     -   -75     -     -     -     -     -     -    93 |
 NYA1 |     -    33     -     -   -86     -     -     -    29 |
 OHIG |     -     -     -  -249  -158     -     -     -   127 |
 ONSA |     -   -70     -     -     -     -     -     -    87 |
 PENC |     -   231     -     -     -     -     -     -  -284 |
 PIE1 |     -  -232  -318  -217     -     -     -     -   355 |
 POTS |     -   -43     -    71     -     -     -     -    53 |
 REYK |     -   -23     -     -     -     -     -     -    28 |
 RIOG |     -    14     -   257   -86     -     -     -    52 |
 SANT |     -   -54     -   222   -55     -     -     -   111 |
 SFER |     -  -258     -     -     -     -     -     -   317 |
 STJO |     -   -49    75     -   -84     -     -     -   112 |
 TRO1 |     -   -12     -     -    19     -     -     -     - |
 TSKB |     -   118    99  -535     -     -     -     -  -166 |
 USNO |     -   -11    60  -415     -     -     -     -     1 |
 USUD |     -     9     -   -33     -     -     -     -   -11 |
 VILL |     -   -23     -   -75     -     -     -     -    29 |
 WES2 |     -    17     -     -     -     -     -     -   -20 |
 WHIT |     -     8     -     -   -12     -     -     -     - |
 WSRT |     -   -21     -     -     -     -     -     -    26 |
 WTZR |     -  -120     -    49     -     -     -     -   148 |
 WUHN |     -   135     -  -193    45     -     -     -  -202 |
 YAR2 |     -   114     -   -42     -     -     -     -  -140 |
 YELL |     -    91     2  -226     -     -     -     -  -112 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6094    58   102   131   158  5804  6334     -   156 |  288   3.04
    2 |  5051     -     X   796   156  7247  4674     -   125 |  274   3.07
    3 |  2667    67    70   134    57  2811  2412     -    44 |  288   3.13
    4 |  2188    82   216    92   105  3995  2378     -    72 |  288   0.94
    5 |  6260    70    61   125    66 11973  5254     -    94 |  288   2.29
    6 |  8915    79   147   288   100  7401  8581     -    60 |  288   7.48
    7 |   667    66     X   408   112  9537   747     -    66 |  288   0.66
    8 |  6192    58   192   340   141  7089  5688     -    51 |  288   5.17
    9 |  3454    54   199    99    80  3075  3363     -    59 |  288   2.15
   10 |  4028   109    70   196   118  5890  3692     -   194 |  277   1.47
   11 |   939    52   137   331   115  3278   813     -    81 |  288   0.45
   13 |  1225    55   113    74    95  2451  1101     -   103 |  288   0.30
   14 |  1386   117   186   274   112  4227  1555     -    58 |  288   0.33
   15 |  6055   106    65     -   128  3582  6354     -    57 |  288   2.38
   17 |  1938   108    49   194   175     -  1875     -    79 |  287   2.42
   18 |   868    77    67   299    73  2925   838     -    40 |  288   0.34
   20 |  1599    74    95   286    88  2288  1583     -   101 |  288   0.29
   21 |  2401     -   178  1062    89  4095  2282     -    64 |  276   2.14
   22 |  1785   140   167   207   144 17748  1445     -   253 |  288   1.15
   23 |  9350   126   161   658    83  4415  8960     -   187 |  278   5.50
   24 |  3596    49   238   102   142  4742  3573     -    61 |  288   3.33
   25 |  4646    45    84  1162     -     -  4371     -     - |   96   2.19
   26 |  2186    44    48   124   108  4174  2154     -   109 |  288   0.56
   27 | 10076    42   166   156    61  6668  9233     -    44 |  288   4.48
   28 |  2264    50    93   128    50  5754  1919     -    39 |  288   0.76
   29 |  2430   162   173   216   165  1361  2492     -    59 |  288   0.55
   30 |  3857    35    64   287   104 21432  3689     -    68 |  288   0.90
   31 |  7829    84    94   129   118  6192  6665     -    47 |  288   4.97
 -----+-------------------------------------------------------+--------------
 ALBH |     -    27     -   663     -     -     -     -    34 |  286   0.07
 ALGO |     -    33    24   829    56     -     -     -    29 |  288   0.07
 AMC2 |     -    15     -     -     -     -     -     -    18 |  286   0.08
 AOML |     -    57     -     -     -     -     -     -    71 |  286  21.57
 AUCK |     -    67     -   600     -     -     -     -    82 |  264  21.25
 BAHR |     -    65     -   134   101     -     -     -    96 |  288   0.57
 BILI |     -    31     -     -    47     -     -     -     - |  287  21.06
 BOR1 |     -   102     -     -     -     -     -     -   125 |  178 156.42
 BRMU |     -     -     -     -    38     -     -     -    30 |  288  48.83
 BRUS |     -    42     -     -     -     -     -     -    52 |  286   0.06
 CAS1 |     -    41     -     -    62     -     -     -    36 |  288   8.31
 CRO1 |     -   100     -     -     -     -     -     -   123 |  240   0.11
 DAEJ |     -    34     -     -     -     -     -     -    42 |  203   2.28
 DAV1 |     -    45     -     -    45     -     -     -    79 |  288  18.34
 DRAO |     -    52    81     -     -     -     -     -    48 |  288   0.05
 GODE |     -    19     -   860     -     -     -     -    24 |  286   0.17
 GOLD |     -    37     -     -     -     -     -     -    46 |  286  25.56
 GRAZ |     -    45     -     -     -     -     -     -    55 |  283  33.09
 GUAM |     -    21     -   125    35     -     -     -    39 |  288  33.56
 HOB2 |     -    32     -     -     -     -     -     -    40 |  288   0.13
 HRAO |     -   113     -     -     -     -     -     -   139 |  282  34.14
 KARR |     -    31     -     -    47     -     -     -     - |  288  23.57
 KERG |     -    78     -     -     -     -     -     -    96 |  287   1.54
 KOKB |     -     -     -   252   178     -     -     -   143 |  133   0.12
 KWJ1 |     -   132     -   488   159     -     -     -   207 |  238 143.33
 LPGS |     -     -     -   614   184     -     -     -   148 |  125 152.72
 MAC1 |     -   111     -     -    92     -     -     -    79 |  288  16.75
 MALI |     -    75     -   160    81     -     -     -    42 |  288 167.19
 MAW1 |     -    29     -     -     -     -     -     -    35 |  281  30.42
 MCM4 |     -   194     -   563   309     -     -     -   304 |  274    >>>
 MEDI |     -    15     -     -     -     -     -     -    19 |  286   1.14
 METS |     -    53     -     -     -     -     -     -    66 |  285   1.46
 MKEA |     -    39    78   158     -     -     -     -    35 |  286  46.78
 NLIB |     -    24    41     -     -     -     -     -    24 |  288   0.08
 NPLD |     -    45     -     -     -     -     -     -    55 |  285   0.11
 NRC2 |     -    27    36     -     -     -     -     -    30 |  286   0.12
 NTUS |     -    43     -     -     -     -     -     -    52 |  288   7.42
 NYA1 |     -    47     -     -    35     -     -     -    41 |  288   0.04
 OHIG |     -     -     -   152    32     -     -     -    26 |  288  12.03
 ONSA |     -    21     -     -     -     -     -     -    26 |  288   2.50
 PENC |     -    27     -     -     -     -     -     -    33 |  285   7.37
 PIE1 |     -    64    77   166     -     -     -     -    67 |  288   0.08
 POTS |     -    25     -   106     -     -     -     -    31 |  286  19.85
 REYK |     -    78     -     -     -     -     -     -    96 |  285   8.55
 RIOG |     -    62     -   154    26     -     -     -    66 |  288  19.66
 SANT |     -    42     -   129    39     -     -     -    49 |  288  18.77
 SFER |     -   168     -     -     -     -     -     -   206 |  275  49.09
 STJO |     -    26    27     -    39     -     -     -    26 |  288   1.94
 TRO1 |     -    44     -     -    68     -     -     -     - |  288  11.18
 TSKB |     -    94    57   149     -     -     -     -   106 |  287   0.91
 USNO |     -    24    42    74     -     -     -     -    26 |  288   0.06
 USUD |     -    58     -    87     -     -     -     -    72 |  286   0.35
 VILL |     -    20     -   159     -     -     -     -    24 |  286  33.48
 WES2 |     -    47     -     -     -     -     -     -    58 |  285   0.11
 WHIT |     -    36     -     -    56     -     -     -     - |  288   8.74
 WSRT |     -    51     -     -     -     -     -     -    63 |  288   0.04
 WTZR |     -    28     -   135     -     -     -     -    35 |  288   0.23
 WUHN |     -    64     -    98    83     -     -     -    21 |  287  33.02
 YAR2 |     -    35     -   256     -     -     -     -    43 |  254   5.84
 YELL |     -   127    97   564     -     -     -     -   175 |  284   0.07
 -----+-------------------------------------------------------+--------------
 TOT  |  4726    72   119   347   107  7623  4452     -    90 |


 BEST CLOCK FIT: NYA1   288   0.04 (ns) 

