
 GPS week: 1138   Day: 5   MJD: 52215                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2661      8     0.08    -0.21     4.64     0.00
 cod |   288     0  22976      5     0.27    -0.56     0.10    30.48
 emr |    96     0   3784    256   860.32    15.40     0.17    15.68
 esa |   288     0  15867    584   857.01     4.03     0.25     0.00
 gfz |   288     0  14521    242     0.13    -0.58     0.09    31.72
 igu |    96     0   2286      0     0.10    -0.29     4.33     0.00
 jpl |    96     6   2340      0     3.42    -2.26     0.12     0.00
 ngs |    96     0   2661      0     0.08    -0.20     4.36     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23925    886   621.85     6.92     0.14    22.12

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |    92    23    24   114    13  7303   192    10     -   -55 |
    2 | -7331   194  -100   189   -76     -    89 -6621     -  -136 |
    3 |  7539   -14  -138   -56    44  4751   134  7360     -   -11 |
    4 | -2688    58   151   143   137 -3383  -206 -2407     -  -312 |
    5 |  1180   114     6   347  -110 13794    39  1005     -     X |
    6 | -5608    47   -41   110   105-14358  -250 -3889     -  -207 |
    7 | -3632    82   -11    33    28 -3479   -17 -3613     -  -151 |
    8 |  8780    59   -13    86     9 -2423    23  7044     -   -92 |
    9 | -8297    94    57   286   -12-12089  -131 -7573     -  -126 |
   10 |  1470    79   -10   409   -31  8405   234  1248     -   -63 |
   11 |  4458   -84    50   226   117  1347   189  4462     -   -64 |
   13 |  4684   -50   286   269   151  1754  -173  4818     -  -214 |
   14 |  6270   107     X   -74  -113  1448    31  6069     -    18 |
   15 |  -574    66   112     -  -135 12842    78 -1182     -    82 |
   17 |   686   169  -118    10    -7     -   -93   706     -  -195 |
   18 |  5798    -2     X  -405     2  2997   -61  5522     -     X |
   20 |  5290   -78    84     7    12   951   261  5521     -    70 |
   21 | -3108   -63  -220  -248   283     -  -166 -3292     -  -262 |
   22 | -4618    97  -303   -48   -96-12608   336 -4583     -    75 |
   23 |  2365     -   237   563    56     -    77  2107     -  -124 |
   24 |  4431    82    36   288    61 23333   -52  3120     -  -210 |
   25 |  -259   126  -300  -104    71 -1176  -278     2     -  -205 |
   26 | -2288   -41   -57  -117    49 -5856  -104 -2363     -     X |
   27 | -7010  -139   -20   194   213-10895   -90 -5670     -  -109 |
   28 |  2864    36   230    29  -101 -4002   175  3032     -    41 |
   29 |  2127    66  -323     1    80  -285   -54  1654     -  -144 |
   30 |  -941   155   -92   309   132 -9305  -315 -1390     -  -382 |
   31 |-10697   -63  -203  -146   209  1779   141-10243     -  -167 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -55     -     X     -     -     -     -     -    76 |
 ALGO |     -    12   242     X   -68     -     -     -     -    24 |
 AMC2 |     -   -37     -     -     -     -     -     -     -    51 |
 AOML |     -   -13     -     -     -     -     -     -     -    18 |
 BAHR |     -    88  -145   -94   -82     -     -     -     -    30 |
 BILI |     -   228     -     -  -219     -     -     -     -     - |
 BOR1 |     -  -162     -     -     -     -     -     -     -   223 |
 BRMU |     -   127     -  -489   -67     -     -     -     -   -79 |
 CRO1 |     -     9     -     -     -     -     -     -     -   -13 |
 DAEJ |     -  -614     -     -     -     -     -     -     -   846 |
 DRAO |     -    36   118     -     -     -     -     -     -   -77 |
 FAIR |     -     -  -266  -478     -     -     -     -     -   189 |
 GALA |     -    14     -  -100     1     -     -     -     -   -21 |
 GODE |     -     7     -  -210     -     -     -     -     -    -9 |
 GRAZ |     -  -121     -     -     -     -     -     -     -   166 |
 GUAM |     -   178     -  -169   -91     -     -     -     -  -111 |
 HRAO |     -  -307     -     -     -     -     -     -     -   423 |
 KERG |     -   177     -     -  -181     -     -     -     -    16 |
 KOKB |     -     -     -   220   174     -     -     -     -  -250 |
 KOSG |     -  -100     -  -129     -     -     -     -     -   138 |
 KOUR |     -   -64     -    85     -     -     -     -     -    88 |
 KWJ1 |     -     -     -   888   172     -     -     -     -  -247 |
 LPGS |     -    63     -  -688     X     -     -     -     -   -87 |
 MALI |     -     -     -    96  -220     -     -     -     -   316 |
 MATE |     -   -31  -154     -     -     -     -     -     -    79 |
 MAW1 |     -   157     -     -  -116     -     -     -     -   -50 |
 MCM4 |     -    81     -   153    26     -     -     -     -  -149 |
 MDO1 |     -   -81   -32     -     -     -     -     -     -   118 |
 MEDI |     -   -83     -     -     -     -     -     -     -   115 |
 METS |     -  -196     -     -     -     -     -     -     -   270 |
 MKEA |     -   -29   196  -143     -     -     -     -     -    -7 |
 NKLG |     -     1     -  -243     -     -     -     -     -    -1 |
 NLIB |     -  -138     -     -     -     -     -     -     -   190 |
 NPLD |     -   -51     -     -     -     -     -     -     -    70 |
 NRC2 |     -   -50   194     -     -     -     -     -     -    23 |
 NTUS |     -  -108     -     -     -     -     -     -     -   150 |
 NYA1 |     -   100     -     -  -153     -     -     -     -    84 |
 OHIG |     -    94     -  -281   -68     -     -     -     -   -32 |
 ONSA |     -  -125     -   145     -     -     -     -     -   172 |
 PENC |     -   172     -     -     -     -     -     -     -  -238 |
 PIE1 |     -  -152     -  -422     -     -     -     -     -   209 |
 POTS |     -  -104     -  -189     -     -     -     -     -   143 |
 REYK |     -   -76     -     -     -     -     -     -     -   105 |
 RIOG |     -    45     -   199    -2     -     -     -     -   -59 |
 SANT |     -     -     -    19   301     -     -     -     -  -432 |
 STJO |     -   -68   174     -   -38     -     -     -     -   108 |
 THU1 |     -    34     -     -     -     -     -     -     -   -47 |
 TRO1 |     -   -81     -     -    78     -     -     -     -     - |
 TSKB |     -   104   -97  -806     -     -     -     -     -  -116 |
 URUM |     -     -     -     -   -88     -     -     -     -   126 |
 USNO |     -   -32   204  -445     -     -     -     -     -    -4 |
 USUD |     -    51     -    67     -     -     -     -     -   -71 |
 VILL |     -   -50     -   -59     -     -     -     -     -    69 |
 WES2 |     -    41     -     -     -     -     -     -     -   -57 |
 WHIT |     -    85     -     -   -82     -     -     -     -     - |
 WSRT |     -   -18     -     -     -     -     -     -     -    25 |
 WTZR |     -   -98     -   -73     -     -     -     -     -   135 |
 WUHN |     -    -5     -   -57     5     -     -     -     -     0 |
 YAR2 |     -   -26     -   147  -133     -     -     -     -   225 |
 YELL |     -    37   185   112     -     -     -     -     -   -96 |
 ZWEN |     -     -     -     -   -19     -     -     -     -    27 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4531    84    45    77    92  4585    79  4473     -   230 |  288   3.82
    2 |  4646   210   150   389    78     -   139  4048     -   167 |  287   3.19
    3 |  4467    77   186    83    58  3375   200  4567     -    83 |  288   1.72
    4 |  2506    62    80   190    66   823    80  2406     -    60 |  288   0.72
    5 |  3943    81   121   110    79  6053    46  3897     -     X |  288   2.91
    6 | 11755   111   173    57   113  3171    84 10343     -    87 |  288   9.22
    7 |  2176   121    91   207    64  3599    64  2151     -    98 |  288   1.78
    8 |  6679    96    72   176    57  3198    74  6538     -   193 |  288   3.74
    9 |  5380   111   280   124    75  7756    55  5006     -   130 |  288   1.58
   10 |  7772   230    48   412    80  6006    59  7033     -   378 |  277   2.11
   11 |   805   109   128   148    67  1212    82   818     -   105 |  288   0.60
   13 |  1078    58    74   139    82  1234    60  1042     -   108 |  288   0.24
   14 |  1051    94     X   109   169  1274   118  1133     -   359 |  288   0.27
   15 |  4534   164   338     -    57  6068    64  4627     -   308 |  288   3.44
   17 |  1510    74   321   111   165     -   170  1481     -   122 |  288   2.67
   18 |  1021    75     X   228    72  1739    84  1089     -     X |  261   0.35
   20 |  1551    76    74   105   131  1405    91  1540     -   222 |  288   0.22
   21 |  3455    72   287   405   111     -   400  3563     -   139 |  276   3.36
   22 |  3225   142   254   174    81  8522    73  3174     -    59 |  288   1.97
   23 |  7322     -   361   559   120     -   170  7334     -   160 |  275   6.82
   24 |  6203   102    90    51    59  7939    41  6184     -    86 |  288   2.59
   25 |  1645    83   348   109    56  1945    79  1861     -   100 |  288   1.50
   26 |   888   126   132   137   103  2209    61   891     -     X |  287   0.59
   27 |  7659   127    61   133    73  2985    44  6709     -   228 |  288   2.93
   28 |  1434    92   134   160    59  2396   106  1436     -    60 |  288   0.53
   29 |  2755   126   361   100    84   970    71  2606     -   104 |  288   0.95
   30 |  3586    97   153   181   109  5455    98  3583     -    47 |  288   1.08
   31 |  4234   122   160   318    72  4146   101  4011     -   114 |  288   4.44
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    41     -     X     -     -     -     -     -    56 |  286   0.12
 ALGO |     -    47    75     X    54     -     -     -     -    60 |  288   0.05
 AMC2 |     -    52     -     -     -     -     -     -     -    71 |  286   0.12
 AOML |     -    32     -     -     -     -     -     -     -    44 |  285  31.73
 BAHR |     -    52    91    75    41     -     -     -     -    82 |  288   0.41
 BILI |     -    54     -     -    52     -     -     -     -     - |  287  16.62
 BOR1 |     -   158     -     -     -     -     -     -     -   218 |  268  85.75
 BRMU |     -    84     -    62    51     -     -     -     -    87 |  288  34.04
 CRO1 |     -    45     -     -     -     -     -     -     -    61 |  284   0.10
 DAEJ |     -    66     -     -     -     -     -     -     -    91 |  286   1.70
 DRAO |     -    51   115     -     -     -     -     -     -    46 |  288   0.05
 FAIR |     -     -    66   655     -     -     -     -     -    47 |   80   0.03
 GALA |     -   184     -   132   102     -     -     -     -   113 |  288  35.73
 GODE |     -    74     -   360     -     -     -     -     -   102 |  262  21.90
 GRAZ |     -    31     -     -     -     -     -     -     -    42 |  285  50.33
 GUAM |     -   169     -   187    89     -     -     -     -   346 |  286  32.15
 HRAO |     -    56     -     -     -     -     -     -     -    78 |  285  40.64
 KERG |     -   104     -     -    70     -     -     -     -    67 |  287   2.23
 KOKB |     -     -     -   299   268     -     -     -     -   384 |  221   0.63
 KOSG |     -    60     -    75     -     -     -     -     -    82 |  284  13.00
 KOUR |     -    66     -   132     -     -     -     -     -    91 |  288  42.26
 KWJ1 |     -     -     -   697   254     -     -     -     -   364 |  179  88.99
 LPGS |     -   214     -   632     X     -     -     -     -   295 |  252  84.11
 MALI |     -     -     -   156    22     -     -     -     -    32 |  288  27.57
 MATE |     -    47    63     -     -     -     -     -     -    61 |  288   0.11
 MAW1 |     -   132     -     -    87     -     -     -     -    69 |  285  29.42
 MCM4 |     -    58     -   347   117     -     -     -     -   200 |  288  34.09
 MDO1 |     -    53    64     -     -     -     -     -     -    59 |  274   8.03
 MEDI |     -    46     -     -     -     -     -     -     -    63 |  286   0.25
 METS |     -    26     -     -     -     -     -     -     -    36 |  285   2.22
 MKEA |     -    74   125    98     -     -     -     -     -    83 |  286  56.18
 NKLG |     -    61     -   142     -     -     -     -     -    84 |  269    >>>
 NLIB |     -   126     -     -     -     -     -     -     -   173 |  286    >>>
 NPLD |     -    50     -     -     -     -     -     -     -    69 |  285   0.05
 NRC2 |     -    46    50     -     -     -     -     -     -    62 |  286   0.06
 NTUS |     -   104     -     -     -     -     -     -     -   143 |  288   6.38
 NYA1 |     -    78     -     -    46     -     -     -     -    52 |  288   0.06
 OHIG |     -    37     -   106    64     -     -     -     -    78 |  288  12.85
 ONSA |     -    46     -    62     -     -     -     -     -    63 |  288   3.70
 PENC |     -    45     -     -     -     -     -     -     -    63 |  285   5.32
 PIE1 |     -    27     -    97     -     -     -     -     -    37 |  277   0.06
 POTS |     -    44     -    92     -     -     -     -     -    61 |  286  35.20
 REYK |     -    38     -     -     -     -     -     -     -    52 |  286   6.91
 RIOG |     -    43     -    96    52     -     -     -     -    72 |  288  14.00
 SANT |     -     -     -   308   132     -     -     -     -   189 |  186  26.56
 STJO |     -    68    78     -    48     -     -     -     -    38 |  288  12.29
 THU1 |     -   128     -     -     -     -     -     -     -   177 |  266  28.60
 TRO1 |     -    29     -     -    28     -     -     -     -     - |  288  10.54
 TSKB |     -    83    74   848     -     -     -     -     -   100 |  239   1.64
 URUM |     -     -     -     -    33     -     -     -     -    48 |  288  87.75
 USNO |     -    40    46    76     -     -     -     -     -    57 |  288   0.04
 USUD |     -   103     -   111     -     -     -     -     -   143 |  286   0.33
 VILL |     -    38     -   134     -     -     -     -     -    52 |  285  39.15
 WES2 |     -    16     -     -     -     -     -     -     -    22 |  285   0.12
 WHIT |     -    80     -     -    77     -     -     -     -     - |  288   5.79
 WSRT |     -    62     -     -     -     -     -     -     -    85 |  288   0.05
 WTZR |     -    33     -    49     -     -     -     -     -    45 |  288   0.06
 WUHN |     -    86     -    49    52     -     -     -     -   105 |  287  34.63
 YAR2 |     -   247     -   139    98     -     -     -     -   210 |  270 558.62
 YELL |     -    66    88   151     -     -     -     -     -    76 |  286   0.05
 ZWEN |     -     -     -     -    20     -     -     -     -    28 |  288  13.73
 -----+-------------------------------------------------------------+--------------
 TOT  |  4638    96   168   245    92  4327   120  4364     -   140 |


 BEST CLOCK FIT: USNO   288   0.04 (ns) 

