
 GPS week: 1138   Day: 4   MJD: 52214                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2493      0    -0.01     0.01     5.42     0.00
 cod |   288     0  21167      9     0.26     0.94     0.08    30.77
 emr |    96     0   3147      0   619.18     3.20     0.13    19.46
 esa |   288     0  14005    407   847.80    -1.74     0.31     0.00
 gfz |   288     0  13262    119    -0.40     0.36     0.10    26.11
 igu |    96     0   2301      0    -0.03     0.01     4.12     0.00
 jpl |    96     6   2198     16     6.29    -9.21     0.12     0.00
 ngs |    96     0   2493      0    -0.01     0.01     5.06     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  21398   1131   619.24     3.15     0.12    23.66

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  1662    49    65   314     6 -1044    83   677     -   -88 |
    2 |  6420    10  -264    97    21     -   -11  5077     -    37 |
    3 |  3621  -148     6    -4   120  4851    -6  2518     -    56 |
    4 | -4083    66    -1   227   216  -477    16 -3908     -  -324 |
    5 | -9351    69  -176  -261   -44-11020   145 -8090     -     8 |
    6 | -6542   -37    -8   344    45 -6700   110 -5273     -     X |
    7 | -5077    66  -159  -183    37 -2593   -76 -4703     -   -84 |
    8 |  6831    35  -131     6    -8  2108    11  6431     -     X |
    9 |  1058   159   -36  -129  -128  7992     5   873     -   -56 |
   10 | -9962    25  -269  -126    37 -6130  -327 -9357     -     X |
   11 |  5688    84   154   401    48  1408   101  5358     -  -205 |
   13 |  4006    96   196  -127   105  2290  -225  3986     -  -293 |
   14 |  4235    43   214  -151  -171  1241  -144  4197     -    75 |
   15 | -7273    24   -21     -    23 -9005   166 -6493     -   -52 |
   17 | -2143   110   -96  3057   123  -787   123 -2487     -  -253 |
   18 |  5320   -55   183   -98    33   714    20  5286     -   -13 |
   20 |  5190   -43   152   298  -122   785   304  5082     -   143 |
   22 |  5841   -21  -182  -271   -37 -9946   195  5850     -   118 |
   24 | -9810   140  -106     3    99   364    42 -8577     -  -264 |
   25 |  8859    48   -93   -30    37 10842  -188  7452     -   -78 |
   26 |   297   106   -74   -26   195 -2033    61   106     -  -332 |
   27 | -1517  -176  -130    81   227  3936  -111 -2397     -    13 |
   28 | 13175    94   -49  -105   -92  5085  -101 12079     -   -11 |
   29 | -3783    25    27   -55    52  2619  -212 -3290     -   -97 |
   30 | -2448    66    39    45    87  5309  -155 -1995     -  -193 |
   31 |-10500   -98    97   109   138     -    94 -8667     -   -51 |
 -----+-------------------------------------------------------------+
 ALBH |     -    37     -  -340     -     -     -     -     -   -48 |
 ALGO |     -    10   253  4729   -60     -     -     -     -   -16 |
 AOML |     -   120     -     -     -     -     -     -     -  -156 |
 BAHR |     -     0   -68    64  -141     -     -     -     -   174 |
 BRMU |     -   112     -  -429   -51     -     -     -     -   -90 |
 CAS1 |     -    14     -     -  -123     -     -     -     -   118 |
 CRO1 |     -  -105     -  -435     -     -     -     -     -   136 |
 DAEJ |     -   662     -     -     -     -     -     -     -  -861 |
 DAV1 |     -    24     -     -  -134     -     -     -     -   118 |
 DRAO |     -    19     5     -     -     -     -     -     -   -27 |
 GALA |     -     4     -     1   -42     -     -     -     -    41 |
 GODE |     -     6     -  -128     -     -     -     -     -    -8 |
 GUAM |     -    57     -   258   -15     -     -     -     -   -57 |
 HOB2 |     -    73    64   149     -     -     -     -     -  -113 |
 HRAO |     -   -87     -     -     -     -     -     -     -   114 |
 IISC |     -  -137     -  -302     -     -     -     -     -   178 |
 KARR |     -   -35     -     -    41     -     -     -     -     - |
 KERG |     -   191     -     -     -     -     -     -     -  -248 |
 KOKB |     -     -     -  -135   215     -     -     -     -  -237 |
 KOSG |     -  -101     -   -99     -     -     -     -     -   132 |
 KWJ1 |     -     -     -   273   247     -     -     -     -  -273 |
 LPGS |     -    -7     - -1157     X     -     -     -     -     9 |
 MAC1 |     -   101     -  -160  -249     -     -     -     -   145 |
 MATE |     -  -118     -     -     -     -     -     -     -   154 |
 MAW1 |     -    23     -     -     -     -     -     -     -   -29 |
 MCM4 |     -   242     -   -50  -285     -     -     -     -     X |
 MDO1 |     -   -63     -     -     -     -     -     -     -    82 |
 MEDI |     -  -112     -     -     -     -     -     -     -   145 |
 METS |     -  -103     -     -     -     -     -     -     -   134 |
 MKEA |     -    58   115   -13     -     -     -     -     -  -107 |
 NLIB |     -   -98     -     -     -     -     -     -     -   127 |
 NPLD |     -   -42     -     -     -     -     -     -     -    55 |
 NRC2 |     -   -34     -     -     -     -     -     -     -    44 |
 NTUS |     -   -77     -     -     -     -     -     -     -   100 |
 NYA1 |     -    68     -     -  -146     -     -     -     -    74 |
 OHIG |     -     5     -  -506  -143     -     -     -     -   152 |
 ONSA |     -  -119     -    34     -     -     -     -     -   154 |
 PENC |     -   178     -     -     -     -     -     -     -  -232 |
 POTS |     -   -64     -  -164     -     -     -     -     -    84 |
 REYK |     -   -79     -     -     -     -     -     -     -   103 |
 SANT |     -     -     -   804   289     -     -     -     -  -318 |
 SFER |     -  -515     -     -     -     -     -     -     -   670 |
 STJO |     -   -28   150     -   -84     -     -     -     -    89 |
 SUTH |     -  -399     - -1097     -     -     -     -     -   518 |
 THU1 |     -   -77     -     -     -     -     -     -     -   100 |
 TRO1 |     -   -58     -     -    68     -     -     -     -     - |
 URUM |     -     -     -     -  -128     -     -     -     -   141 |
 USUD |     -    -3     -    96     -     -     -     -     -     4 |
 WES2 |     -    47     -     -     -     -     -     -     -   -61 |
 WHIT |     -    51     -     -   -60     -     -     -     -     - |
 WSRT |     -   -50     -     -     -     -     -     -     -    65 |
 WTZR |     -  -156     -  -221     -     -     -     -     -   203 |
 WUHN |     -   -26     -   -57   103     -     -     -     -   -80 |
 YELL |     -    79   156  -268     -     -     -     -     -  -140 |
 ZWEN |     -     -     -     -   -79     -     -     -     -    87 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8491    52   117   125   103  3328   230  7593     -   131 |  288   3.77
    2 |  8165   151   187   115   112     -   171  7120     -    82 |  287   3.34
    3 |  7087    73   202   204    54  9584    65  6402     -    88 |  288   3.48
    4 |  4162    73    86   105    83  1019   107  3766     -    61 |  288   0.77
    5 |  3848    50    76   181    64  6388    89  3540     -    62 |  288   2.38
    6 |  9066    83    53   145    89  5673    47  8435     -     X |  285   8.28
    7 |  3353   106    69   136    82  2337    79  3261     -    72 |  288   1.15
    8 |  4516    77   155    81    72  1357    72  4208     -     X |  288   3.82
    9 |  2204   107    82   185    51  5001   134  1782     -    85 |  288   0.90
   10 |  4588    83   108   183    80  4574   288  3833     -     X |  277   2.10
   11 |  2256   138   181    74    62  1515    52  2052     -   252 |  288   0.44
   13 |   956    52   251   418   193   835   111  1033     -   173 |  288   0.19
   14 |   539   129   125   182   201   689    85   664     -   116 |  288   0.30
   15 |  4864   116   125     -    88  3817    87  4412     -    75 |  288   4.03
   17 |  3637   124   139   312    54  1587    70  2681     -   139 |  288   2.91
   18 |   598    75   207   354    51  1530    55   705     -   112 |  288   0.49
   20 |  1829   117   140   107    86   651   102  1902     -   189 |  288   0.30
   22 |  3232   163    68   183   150  7202   126  3019     -    47 |  288   1.36
   24 |  7221   107   119   105    70  3052    46  6885     -    97 |  288   2.87
   25 |  6595    87   166   114    56  3337    39  6971     -    53 |  288   2.15
   26 |  1772   164    96   100   116  1703   135  1915     -   136 |  288   0.60
   27 | 10728   165   128   263   135  5481    90  9841     -   236 |  288   3.65
   28 |  5918    76    70   138    84  1294    96  6125     -   135 |  288   0.90
   29 |  3386   134   192   173   128  5469    73  3315     -    95 |  288   0.69
   30 |  4568    67    79   178    51  4532   114  4335     -    48 |  288   1.61
   31 |  8431    67    52    68    69     -   156  8316     -    73 |  288   3.45
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    33     -   697     -     -     -     -     -    42 |  286   0.11
 ALGO |     -    38    49  1052    31     -     -     -     -    54 |  288   0.07
 AOML |     -    31     -     -     -     -     -     -     -    40 |  286  29.77
 BAHR |     -    42    83    60    41     -     -     -     -    42 |  288   0.49
 BRMU |     -    32     -   214    44     -     -     -     -    19 |  288  66.07
 CAS1 |     -    55     -     -   152     -     -     -     -   226 |  288   9.56
 CRO1 |     -    49     -   206     -     -     -     -     -    63 |  286   0.13
 DAEJ |     -    35     -     -     -     -     -     -     -    45 |  124   0.83
 DAV1 |     -    89     -     -    47     -     -     -     -    76 |  288  20.03
 DRAO |     -    38    28     -     -     -     -     -     -    44 |  288   0.07
 GALA |     -    62     -    98    70     -     -     -     -    50 |  288  27.46
 GODE |     -   102     -   475     -     -     -     -     -   132 |  286  11.19
 GUAM |     -    30     -   139    41     -     -     -     -    53 |  288  38.80
 HOB2 |     -    74   152   116     -     -     -     -     -   112 |  288   0.06
 HRAO |     -   192     -     -     -     -     -     -     -   249 |  287  42.09
 IISC |     -    77     -   152     -     -     -     -     -   101 |  266  39.52
 KARR |     -    39     -     -    46     -     -     -     -     - |  288  19.19
 KERG |     -    35     -     -     -     -     -     -     -    45 |  287   1.99
 KOKB |     -     -     -   177   267     -     -     -     -   294 |  225   0.24
 KOSG |     -    46     -    87     -     -     -     -     -    60 |  286  55.69
 KWJ1 |     -     -     -   663   242     -     -     -     -   267 |  165 104.40
 LPGS |     -   139     -  1096     X     -     -     -     -   181 |  136  57.52
 MAC1 |     -    63     -   232   208     -     -     -     -   254 |  287  16.01
 MATE |     -    23     -     -     -     -     -     -     -    31 |  288   0.05
 MAW1 |     -    84     -     -     -     -     -     -     -   109 |  278  29.83
 MCM4 |     -    33     -   573    39     -     -     -     -     X |  281  49.87
 MDO1 |     -   108     -     -     -     -     -     -     -   141 |  209  11.29
 MEDI |     -    29     -     -     -     -     -     -     -    38 |  286   0.34
 METS |     -    46     -     -     -     -     -     -     -    60 |  285   1.59
 MKEA |     -    84    46   115     -     -     -     -     -   102 |  285  59.19
 NLIB |     -    48     -     -     -     -     -     -     -    62 |  288   0.04
 NPLD |     -    39     -     -     -     -     -     -     -    51 |  285   0.06
 NRC2 |     -    33     -     -     -     -     -     -     -    43 |  286   0.09
 NTUS |     -    53     -     -     -     -     -     -     -    69 |  288   6.74
 NYA1 |     -    61     -     -    33     -     -     -     -    48 |  288   0.06
 OHIG |     -    79     -   134    55     -     -     -     -    86 |  288  11.90
 ONSA |     -    28     -    68     -     -     -     -     -    36 |  288   5.52
 PENC |     -    44     -     -     -     -     -     -     -    57 |  285   3.47
 POTS |     -    28     -    92     -     -     -     -     -    37 |  286  21.38
 REYK |     -    67     -     -     -     -     -     -     -    87 |  276   9.90
 SANT |     -     -     -   503   208     -     -     -     -   229 |  153  16.53
 SFER |     -    59     -     -     -     -     -     -     -    76 |  287  10.18
 STJO |     -    20    42     -    23     -     -     -     -    45 |  288  13.94
 SUTH |     -    56     -   987     -     -     -     -     -    73 |  219  37.82
 THU1 |     -    57     -     -     -     -     -     -     -    74 |  156  23.88
 TRO1 |     -    34     -     -    40     -     -     -     -     - |  288  12.30
 URUM |     -     -     -     -    19     -     -     -     -    21 |  288 107.81
 USUD |     -    27     -   115     -     -     -     -     -    35 |  288   0.31
 WES2 |     -    45     -     -     -     -     -     -     -    58 |  285   0.08
 WHIT |     -    46     -     -    54     -     -     -     -     - |  288   3.04
 WSRT |     -    48     -     -     -     -     -     -     -    62 |  288   0.07
 WTZR |     -    44     -    79     -     -     -     -     -    57 |  287   0.07
 WUHN |     -    61     -    76    35     -     -     -     -    97 |  287  39.78
 YELL |     -   242   189   273     -     -     -     -     -   271 |  272   0.21
 ZWEN |     -     -     -     -    64     -     -     -     -    71 |  277  17.65
 -----+-------------------------------------------------------------+--------------
 TOT  |  5416    85   129   308   101  4115   115  5059     -   115 |


 BEST CLOCK FIT: NLIB   288   0.04 (ns) 

