
 GPS week: 1138   Day: 0   MJD: 52210                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2577      0     0.16     0.09     4.91     0.00
 cod |   288     0  22966    264     0.10     0.03     0.12    19.26
 emr |    96     0   3847     99   -66.26    -3.64     0.13    18.33
 esa |   288     1  16841   1550  2285.96     5.84     0.16    13.53
 gfz |   288     0  14345      2    -1.88     2.28     0.08    31.77
 igu |    96     0   2298      0     0.18     0.02     4.70     0.00
 ngs |    96     0   2577      0     0.16     0.10     4.69     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23331    671   610.05     0.85     0.14    17.10

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  2295    66   -57    60    13  4155  1310     -  -125 |
    2 |  -533   114  -175   119   -67  1982  -472     -   -39 |
    3 |  -535  -146   -65   177   136  3837 -1034     -  -205 |
    4 | -4950    54   -10   -13   144 -8340 -3921     -  -314 |
    5 |  7798    76    63  -251   -10 11551  6479     -    63 |
    6 | -3790   -19    46   -32   128-13912 -2781     -  -207 |
    7 |  2153    70  -124   -48    64 11631  2245     -  -115 |
    8 | -1274   101  -174    53     2 -4113 -1039     -   -94 |
    9 |  3345    81   -84   159   -21 -1466  3050     -  -148 |
   10 | -5053   -35  -126   133    18  1510 -4488     -   -49 |
   11 |  -711    47    59   209   -86 -3819  -571     -   -78 |
   13 |  1541   138   196   317  -138 -7393  1835     -  -220 |
   14 | 32408    46   143    12  -113 30201 27205     -    98 |
   15 |-11742  -325   -59     -   151     - -9892     -   104 |
   18 |   -33  -154   137    38   -10 -6634  -137     -   112 |
   20 |   662   -61   -51   -59    21 -3735   510     -    96 |
   21 | -5081   -38   -44     X    30     - -4305     -    -7 |
   22 | -9722   -21   -57     X    68-12224 -8593     -   -76 |
   23 |  1482     -    27     X   -27     -  1638     -    41 |
   24 |  1631    70   -39   -15   109  -473  2319     -  -255 |
   25 | -3643    54  -114    63    87 -7758 -3020     -  -231 |
   26 | -3347   -66     X   161   -29 -3589 -2867     -     X |
   27 |  4477    22  -117   233    95 11381  3865     -  -343 |
   28 |  2495   111   -50    41   -86  5411  2573     -    19 |
   29 | -7608   -21   -46   -10   130 -6922 -7354     -  -192 |
   30 | -1862    25   -12    10    96 -1734 -1797     -  -209 |
   31 |  -628   -77   -95   238    55   538  -942     -  -172 |
 -----+-------------------------------------------------------+
 ALBH |     -   -27     -     X     -     -     -     -    30 |
 ALGO |     -   200   149  -349    -8     -     -     -    15 |
 AMC2 |     -     4     -     -     -     -     -     -    -5 |
 AOML |     -    27     -     -     -     -     -     -   -30 |
 ARTU |     -   317     -     -  -192     -     -     -     - |
 BAHR |     -   -27   222   -99   -37     -     -     -    98 |
 BILI |     - -1042     -     -   632     -     -     -     - |
 BOR1 |     -    -3     -     -     -     -     -     -     4 |
 BRUS |     -    -7     -     -     -     -     -     -     8 |
 CAS1 |     -   -25     -    22  -105     -     -     -   226 |
 CRO1 |     -   -77     -  -340     -     -     -     -   356 |
 DAEJ |     -  -861     -     -     -     -     -     -   969 |
 DAV1 |     -    71     -     -  -134     -     -     -   172 |
 DRAO |     -   128   -83     -     -     -     -     -  -115 |
 FAIR |     -     -    19    86     -     -     -     -   -70 |
 GALA |     -   125     -  -233  -111     -     -     -   257 |
 GRAZ |     -  -102     -     -     -     -     -     -   114 |
 GUAM |     -    13     -   326   -81     -     -     -  -121 |
 HOB2 |     -    81     6     X     -     -     -     -   -98 |
 HRAO |     -  -130     -     -     -     -     -     -   147 |
 IISC |     -     -     -  -132     -     -     -     -   105 |
 KARR |     -  -130     -     -    79     -     -     -     - |
 KIRU |     -    10     -   -14     -     -     -     -     - |
 KOSG |     -   -63     -  -150     -     -     -     -   191 |
 KWJ1 |     -     -     -   108     7     -     -     -  -112 |
 MAC1 |     -    45     -   191  -105     -     -     -     - |
 MAS1 |     -    37   141  -121   -40     -     -     -    78 |
 MATE |     -   -14   -49     -     -     -     -     -    33 |
 MAW1 |     -   212     -     -  -231     -     -     -   198 |
 MCM4 |     -   400     -     2   -34     -     -     -  -363 |
 MDO1 |     -   102  -287     -     -     -     -     -    -6 |
 MEDI |     -   -49     -     -     -     -     -     -    55 |
 METS |     -  -123     -     -     -     -     -     -   138 |
 MKEA |     -   136   107   -10   -82     -     -     -   -30 |
 NLIB |     -   -28     -     -     -     -     -     -    31 |
 NPLD |     -   -75     -     -     -     -     -     -    84 |
 NRC2 |     -    20   157  -221     -     -     -     -    99 |
 NTUS |     -  -198     -     -     -     -     -     -   223 |
 ONSA |     -   -46     -   -30     -     -     -     -    76 |
 PENC |     -   168     -     -     -     -     -     -  -189 |
 PERT |     -    16     -    51     -     -     -     -   -58 |
 PIE1 |     -    59     -  -321     -     -     -     -   187 |
 PIMO |     -   -37     -    53     -     -     -     -     X |
 POTS |     -    29     -  -138     -     -     -     -    76 |
 REYK |     -   -59     -   -64     -     -     -     -   124 |
 RIOG |     -   -19     -    61    39     -     -     -  -100 |
 SANT |     -     X     -     X    65     -     -     -  -121 |
 STJO |     -    80   122     -  -171     -     -     -   184 |
 SUTH |     -     -     -   -71    30     -     -     -     - |
 THTI |     -     -     -   205     -     -     -     -  -162 |
 THU1 |     -   214     -     -     -     -     -     -  -241 |
 TRO1 |     -   -37     -     -    23     -     -     -     - |
 TROM |     -     -     -    -1     -     -     -     -     1 |
 UNSA |     -     -     -     -   159     -     -     -  -295 |
 URUM |     -   -25     -     -     -     -     -     -    28 |
 USNO |     -    72   197  -433     -     -     -     -   190 |
 USUD |     -  -100     -   190     -     -     -     -   -38 |
 VILL |     -     9    99   -77     -     -     -     -    15 |
 WES2 |     -    91     -     -     -     -     -     -  -102 |
 WHIT |     -   -53     -     -    32     -     -     -     - |
 WSRT |     -   -31     -     -     -     -     -     -    35 |
 WTZR |     -   -15     -  -137     -     -     -     -   124 |
 WUHN |     -   -82     -   249   -82     -     -     -    49 |
 YELL |     -   111    47  -181    17     -     -     -   -32 |
 ZWEN |     -     -     -     -   -31     -     -     -    58 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6046    78   140    68    50  3842  5535     -    63 |  288   4.94
    2 |  7814   152   126    53    47  4947  7229     -   178 |  288   2.14
    3 |  4322   123    72   224    67  2464  4118     -   136 |  288   2.44
    4 |  3358   114    47    34    53  4403  3821     -    70 |  288   1.17
    5 |  5309    92   200   222    64  5803  4367     -    92 |  286   3.06
    6 |  9870   236   217   209   137  4852  9818     -   307 |  288  10.03
    7 |  6491   155    68    41   129  9673  5935     -   103 |  288   0.84
    8 |  3982   106   169   208    68  2890  4209     -   245 |  288   3.79
    9 |  2039    64   170   125    58  1800  2445     -   144 |  288   1.64
   10 |  3741   150   279   350   110  1886  4331     -   332 |  282   2.85
   11 |  1692   206   248    83    43  2357  1799     -   133 |  288   0.36
   13 |  1107   128    52   129    36  4026  1154     -    83 |  288   0.23
   14 |  8170   170    56   264    59 11485  7531     -   107 |  288   0.35
   15 |  4549   154   169     -    57     -  5140     -   138 |  288   2.52
   18 |  2112    86   230   162    52  3055  2163     -   137 |  288   0.35
   20 |  2505   129    58   150    81  2781  2450     -    90 |  288   0.26
   21 |  5080   166   161     X    56     -  5294     -   124 |  277   4.03
   22 |  3466   142    92     X    84  6153  3139     -   117 |  288   1.12
   23 |  5103     -   196     X    74     -  4917     -   167 |  275   5.05
   24 |  9616   140    96    54    33  3871  8125     -   104 |  288   2.21
   25 |  3406    94    88   174   112  4209  3454     -   105 |  288   1.97
   26 |  2081    50     X   133    76  2142  1636     -     X |  288   0.80
   27 |  4514   134   110    63    71  5692  4739     -    91 |  288   4.51
   28 |  1100   106    77    67    36  1603  1180     -    63 |  288   0.88
   29 |  2067   193    74   267    44  3755  2287     -   127 |  288   0.96
   30 |  3496   125   170   372   181  1852  2957     -   137 |  280   2.03
   31 |  4086    72    59    44    77  2607  3802     -   128 |  288   2.34
 -----+-------------------------------------------------------+--------------
 ALBH |     -    46     -     X     -     -     -     -    51 |  286   0.26
 ALGO |     -   112    48    77    35     -     -     -   135 |  288   0.05
 AMC2 |     -    40     -     -     -     -     -     -    45 |  286   0.04
 AOML |     -    34     -     -     -     -     -     -    39 |  286  18.73
 ARTU |     -   104     -     -    63     -     -     -     - |  280  37.75
 BAHR |     -    54    70    35    54     -     -     -   100 |  288   0.31
 BILI |     -    38     -     -    23     -     -     -     - |  119  19.85
 BOR1 |     -    30     -     -     -     -     -     -    34 |  278   1.93
 BRUS |     -   121     -     -     -     -     -     -   136 |  238   0.11
 CAS1 |     -    95     -   189    37     -     -     -   192 |  288   9.24
 CRO1 |     -   112     -    69     -     -     -     -   119 |  288   0.11
 DAEJ |     -    55     -     -     -     -     -     -    62 |  220   1.51
 DAV1 |     -    65     -     -    35     -     -     -    77 |  288  17.81
 DRAO |     -    70    87     -     -     -     -     -    52 |  288   0.03
 FAIR |     -     -   161   271     -     -     -     -   208 |  230   1.04
 GALA |     -    90     -   140    33     -     -     -   103 |  288  25.90
 GRAZ |     -    39     -     -     -     -     -     -    44 |  282    >>>
 GUAM |     -    85     -   108    38     -     -     -   194 |  288  31.62
 HOB2 |     -   107    34     X     -     -     -     -   125 |   96   0.06
 HRAO |     -   180     -     -     -     -     -     -   203 |  287  46.76
 IISC |     -     -     -   249     -     -     -     -   197 |  287  41.99
 KARR |     -    78     -     -    47     -     -     -     - |  287  20.73
 KIRU |     -   124     -   176     -     -     -     -     - |  282   1.77
 KOSG |     -    55     -    59     -     -     -     -    49 |  288  31.52
 KWJ1 |     -     -     -   301   133     -     -     -   276 |  225 152.35
 MAC1 |     -   465     -   259   195     -     -     -     - |  287  15.81
 MAS1 |     -   128    76    98    48     -     -     -    23 |  288   1.63
 MATE |     -    31    49     -     -     -     -     -    39 |  288   0.10
 MAW1 |     -   260     -     -    96     -     -     -   172 |  285  30.63
 MCM4 |     -   207     -   154    85     -     -     -   317 |  269  29.00
 MDO1 |     -    45    76     -     -     -     -     -    42 |  277  19.72
 MEDI |     -    30     -     -     -     -     -     -    33 |  286   0.12
 METS |     -    84     -     -     -     -     -     -    94 |  283   0.13
 MKEA |     -    96    71   146    69     -     -     -    57 |  288  49.93
 NLIB |     -    71     -     -     -     -     -     -    80 |  277   0.13
 NPLD |     -    60     -     -     -     -     -     -    68 |  285   0.05
 NRC2 |     -   153   141    91     -     -     -     -   187 |  288   0.11
 NTUS |     -    55     -     -     -     -     -     -    61 |  288   7.15
 ONSA |     -    36     -    60     -     -     -     -    48 |  288   4.49
 PENC |     -    41     -     -     -     -     -     -    46 |  285   4.25
 PERT |     -    87     -   179     -     -     -     -    88 |  288  18.33
 PIE1 |     -    96     -   193     -     -     -     -   176 |  288   0.08
 PIMO |     -    35     -    50     -     -     -     -     X |  286  36.44
 POTS |     -    37     -    54     -     -     -     -    37 |  288  14.72
 REYK |     -   178     -   153     -     -     -     -   230 |  281   8.70
 RIOG |     -    53     -   157    55     -     -     -    82 |  288  17.55
 SANT |     -     X     -     X   118     -     -     -   219 |  256  22.78
 STJO |     -    49    46     -    32     -     -     -    41 |  288  19.99
 SUTH |     -     -     -   213    91     -     -     -     - |  182  36.88
 THTI |     -     -     -    64     -     -     -     -    50 |  287   3.97
 THU1 |     -   194     -     -     -     -     -     -   218 |  193  43.59
 TRO1 |     -    64     -     -    39     -     -     -     - |  286  11.26
 TROM |     -     -     -   183     -     -     -     -   145 |  275  13.15
 UNSA |     -     -     -     -    54     -     -     -   100 |  254  41.09
 URUM |     -    43     -     -     -     -     -     -    49 |  288 131.26
 USNO |     -    43    50    64     -     -     -     -    35 |  288   0.05
 USUD |     -    89     -    83     -     -     -     -    67 |  288   0.35
 VILL |     -    71    62    95     -     -     -     -    21 |  288  52.63
 WES2 |     -   145     -     -     -     -     -     -   164 |  286   0.09
 WHIT |     -    46     -     -    28     -     -     -     - |  281   2.08
 WSRT |     -    49     -     -     -     -     -     -    55 |  288   0.05
 WTZR |     -    72     -    82     -     -     -     -    26 |  288   0.07
 WUHN |     -    35     -    62    30     -     -     -    70 |  287  42.91
 YELL |     -   116   173   195   109     -     -     -   347 |  288   0.09
 ZWEN |     -     -     -     -    27     -     -     -    50 |  277  15.76
 -----+-------------------------------------------------------+--------------
 TOT  |  4915   121   129   161    77  4704  4694     -   135 |


 BEST CLOCK FIT: DRAO   288   0.03 (ns) 

