
 GPS week: 1137   Day: 5   MJD: 52208                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2660      0    -0.05    -0.10     4.74     0.00
 cod |   288     0  23585    538    -0.17    -1.04     0.11    13.31
 emr |    96     0   3737    375   772.10    16.56     0.12    10.91
 esa |   288     1  17685   1209  2282.08    13.02     0.12    11.61
 gfz |   288     0  14113    532    -0.45     0.11     0.08    17.69
 igu |    96     0   2279      0    -0.03    -0.21     4.44     0.00
 jpl |   284     0   9385    577    -1.87    -0.34     0.06    28.16
 ngs |    96     0   2660      0     0.03    -0.20     4.67     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23051    503   594.83     8.78     0.08    18.31

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -7646    77  -204    20   -33-11151   116 -6261     -   -58 |
    2 | -1876   -32    80     X     0  5871   -39 -2723     -    43 |
    3 | -4812   -55   -44     5     9  1353   102 -4834     -   -60 |
    4 | -1460   -62   235   274   138  4531  -125 -1647     -  -190 |
    5 |  1973    -2   137    93  -105  -573     9  1485     -    15 |
    6 |  -162    14   -23    68   268 -5324   -40   541     -  -286 |
    7 | -1768    50   139   131   -45 -6422    19 -1999     -  -121 |
    8 | -1165   112     X   -12  -176 -7297    89 -1376     -    49 |
    9 |  7721    82   -46    78   -31 10604    27  6811     -   -95 |
   10 | -2885    26  -133     X   -24  7787   -62 -2766     -    91 |
   11 |  3830    -2   112   134  -107  2266   260  4217     -  -139 |
   13 |  5277     8   -36    99    48  2273    12  5503     -  -115 |
   14 |  3254   121   181   -44   -31  4343    73  3373     -  -105 |
   15 | -9425     -  -189     -    19 -7479    30 -8979     -     X |
   17 | -2413    62     X   -33    28     -    31 -2300     -   -81 |
   18 |  5733   -96   174    67     8  4708    43  5711     -   -55 |
   20 |  4829   -51  -183  -112    59  3081   215  4981     -  -115 |
   21 |  8774   -14    32   106    24     -    22  7565     -   -93 |
   22 | -2835   128  -334    67  -122-20921    76 -2464     -   -23 |
   23 |  8181   244   -90  -352   -88     -   132  7763     -    -9 |
   24 | -6187     4   162    73   196  5738   -82 -5442     -  -193 |
   25 | -5320    43  -286   -38   219  -124   -49 -5213     -  -131 |
   26 | -4245   -19     X   141    24  2064   -65 -3890     -   -64 |
   27 | -4872   120  -253   164    22     -   -78 -5262     -  -108 |
   28 |  9228    41   233    54  -213  6789    23  8176     -    75 |
   29 |  2386    30     2   206    30  -541    31  1964     -  -196 |
   30 | -2445    37   -31   220   269  4018   -52 -1886     -  -389 |
   31 | -2814  -131  -196    94   127 -5935   145 -2152     -  -184 |
 -----+-------------------------------------------------------------+
 ALBH |     -   102     -  -149     -     -   -78     -     -   138 |
 ALGO |     -    98    97   -34   -62     -   -26     -     -    30 |
 AOML |     -    35     -     -     -     -     -     -     -   -26 |
 ARTU |     -    43     -     -  -293     -   163     -     -     - |
 BAHR |     -     -   112   -35     X     -   -21     -     -    31 |
 BILI |     -  -127     -     -    95     -     -     -     -     - |
 BOR1 |     -    15     -     -     -     -     -     -     -   -11 |
 BRMU |     -   117     -   -38   -58     -     -     -     -    -5 |
 BRUS |     -  -119     -     -     -     -    12     -     -    70 |
 CAS1 |     -   -85     -   -46   -46     -   -45     -     -   203 |
 CRO1 |     -   -13     -  -141     -     -    -1     -     -   100 |
 DAEJ |     -  -237     -     -     -     -     -     -     -   172 |
 DAV1 |     -  -105     -     -   -91     -     -     -     -   167 |
 DRAO |     -    95   -53     -     -     -     -     -     -   -58 |
 FAIR |     -     -     X     X     -     -   133     -     -  -205 |
 FORT |     -    43     -   -50     -     -     -     -     -     - |
 GALA |     -   151     -  -132  -145     -     3     -     -   112 |
 GODE |     -     7     -    -2     -     -     -     -     -    -4 |
 GRAZ |     -  -177     -     -     -     -     -     -     -   129 |
 GUAM |     -    34     -   191    53     -  -263     -     -   196 |
 HOB2 |     -    80   218     X     -     -     -     -     -  -101 |
 HRAO |     -   -56     -     -     -     -   -88     -     -   172 |
 IISC |     -     X     -  -112     -     -     -     -     -    71 |
 KARR |     -   -11     -     -     8     -     -     -     -     - |
 KIRU |     -    68     -   -78     -     -     -     -     -     - |
 KOKB |     -     -     -   -21    13     -     X     -     -     X |
 KOSG |     -  -195     -    -4     -     -     -     -     -   146 |
 KOUR |     -    95     -    59     -     -     -     -     -  -107 |
 KWJ1 |     -     -     -   -55    29     -     -     -     -     7 |
 LPGS |     -   229     -  -395     X     -     -     -     -    56 |
 MATE |     -    98    35     -     -     -     X     -     -   -83 |
 MAW1 |     -   -21     -     -  -140     -     -     -     -   152 |
 MDO1 |     -  -319   -52     -     -     -     -     -     -   225 |
 MEDI |     -  -145     -     -     -     -     -     -     -   105 |
 METS |     -  -180     -     -     -     -     -     -     -   131 |
 MKEA |     -   -48     -   -84     -     -     -     -     -    89 |
 NKLG |     -     -     -  -127     -     -     -     -     -    80 |
 NLIB |     -    43  -173     -     -     -     -     -     -     7 |
 NPLD |     -  -323     -     -     -     -     -     -     -   235 |
 NRC2 |     -    65   125     -     -     -     X     -     -  -122 |
 NTUS |     -  -108     -     -     -     -     -     -     -    78 |
 ONSA |     -  -183     -    81     -     -     -     -     -    82 |
 PENC |     -   170     -     -     -     -     -     -     -  -124 |
 PERT |     -   108     -   -69     -     -     -     -     -   -35 |
 PIE1 |     -     6     -    -7     -     -     -     -     -     - |
 POTS |     -    18     -   -82   -49     -     -     -     -    86 |
 REYK |     -  -108     -    98     -     -     -     -     -    17 |
 RIOG |     -    99     -   138    -5     -   -62     -     -   -62 |
 SANT |     -     X     -   -10    66     -     -     -     -   -63 |
 SELE |     -   356     -  -408     -     -     -     -     -     - |
 SFER |     -  -312     -     -     -     -     -     -     -   227 |
 STJO |     -    93    76     -  -173     -     -     -     -    85 |
 SUTH |     -     -     -  -181   118     -     -     -     -     - |
 THTI |     -     -     -   -36     -     -     -     -     -    23 |
 TIXI |     -   -91     -     -     -     -    43     -     -     - |
 TRO1 |     -   -61     -     -    46     -     -     -     -     - |
 TROM |     -     -     -    16     -     -     -     -     -   -10 |
 TSKB |     -     9   131   -50     -     -     -     -     -     - |
 USNO |     -    83     -  -396     -     -    60     -     -    99 |
 USUD |     -    24     -    10     -     -     -     -     -   -24 |
 VILL |     -   -74     -    83     -     -     -     -     -     2 |
 WES2 |     -    58     -     -     -     -     -     -     -   -42 |
 WHIT |     -   142     -     -  -107     -     -     -     -     - |
 WSRT |     -   -56     -     -     -     -   -40     -     -   101 |
 WTZR |     -   -88     -  -120     -     -    21     -     -   107 |
 WUHN |     -    32     -    40   336     -  -225     -     -   -37 |
 YELL |     -   176    23     6     -     -     -     -     -  -135 |
 YSSK |     -   -17     -     -     -     -     8     -     -     - |
 ZWEN |     -     -     -     -   -51     -     -     -     -    49 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6862    87    98    57    58  6106    62  6490     -    45 |  288   4.03
    2 |  6740   202   145     X    75  3946    39  6024     -   101 |  279   3.63
    3 |  3579   110    47    95    70  1923    51  3444     -    96 |  288   1.71
    4 |  2017   116   141    63    87  2564    34  2081     -    59 |  288   0.99
    5 |  5110   173    73   220    83  4729    75  4475     -    59 |  282   4.20
    6 |  9706    79   141   130    75  2725    59 10188     -    59 |  288   9.12
    7 |  2619    91   129    65    42  3150    25  2310     -    33 |  288   0.83
    8 |  5049    89     X   103   111  5725   131  4567     -   145 |  288   2.97
    9 |  4370   102    63    66    45  6291    18  3472     -    72 |  288   1.84
   10 |  3691   213   157     X    69  4390    75  4115     -    87 |  276   2.82
   11 |  1854   167    64   154    54  1068    90  1871     -    36 |  288   0.42
   13 |  2077   152    56    74    64  1856    25  1899     -    35 |  288   0.20
   14 |   846    68    86   132    94  2527    41   855     -   170 |  288   0.25
   15 |  9484     -   221     -   119  6885    70  9241     -     X |  151   3.22
   17 |   851   105     X   179   112     -    51   834     -   100 |  288   2.98
   18 |  1266   126   176    98   100  2027    95  1244     -    88 |  288   0.43
   20 |  1510    97    73   141    27  1902    44  1563     -    51 |  288   0.27
   21 |  5415   184   215   354   116     -    87  4958     -    61 |  286   3.11
   22 |  2291   177   160   124    76 12190    81  2033     -   112 |  287   1.42
   23 |  6320   259   165   203   115     -    90  6362     -   221 |  278   6.99
   24 |  6018    97   181    88    75  5809    50  6889     -    76 |  288   1.90
   25 |  3118   103   122    63    40  3209    57  3129     -    62 |  288   2.06
   26 |  2130   187     X   130    65  1756    43  2070     -   101 |  288   0.48
   27 |  8036   232   227   135    80     -    50  8138     -   116 |  288   4.04
   28 |  3342    49    47    88    40  3032    21  3258     -    52 |  288   1.36
   29 |  2787   158    90    97    67   924    48  2947     -    72 |  288   0.70
   30 |  2710   126    69   191   127  3268    67  2877     -    59 |  282   0.64
   31 |  5748   153   102    67   135  2354    68  5431     -    37 |  288   2.94
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    58     -    94     -     -    33     -     -    35 |  288   0.06
 ALGO |     -    30    37    62    37     -    14     -     -    60 |  288   0.04
 AOML |     -    34     -     -     -     -     -     -     -    25 |  288  33.47
 ARTU |     -    48     -     -    88     -    36     -     -     - |  286  37.24
 BAHR |     -     -    54    56     X     -    41     -     -    30 |  288   0.46
 BILI |     -    71     -     -    54     -     -     -     -     - |  287  23.65
 BOR1 |     -    21     -     -     -     -     -     -     -    15 |  286   2.24
 BRMU |     -    57     -    78    35     -     -     -     -    85 |  288  39.74
 BRUS |     -    52     -     -     -     -    22     -     -    19 |  288   0.04
 CAS1 |     -   112     -    49    25     -    33     -     -    54 |  288   9.50
 CRO1 |     -    74     -    38     -     -    67     -     -   129 |  288   0.24
 DAEJ |     -    28     -     -     -     -     -     -     -    20 |  140   1.22
 DAV1 |     -   159     -     -    41     -     -     -     -    82 |  288  19.08
 DRAO |     -    49    54     -     -     -     -     -     -    33 |  287   0.06
 FAIR |     -     -     X     X     -     -   171     -     -   262 |  224  61.49
 FORT |     -   119     -   136     -     -     -     -     -     - |  132   0.11
 GALA |     -    86     -    68    27     -    34     -     -   117 |  288  33.05
 GODE |     -    85     -   180     -     -     -     -     -    86 |  219 350.94
 GRAZ |     -    19     -     -     -     -     -     -     -    14 |  284  12.88
 GUAM |     -    52     -    99    55     -    58     -     -    43 |  288  35.61
 HOB2 |     -    33    71     X     -     -     -     -     -    20 |  288   0.04
 HRAO |     -    84     -     -     -     -    29     -     -    56 |  288  37.97
 IISC |     -     X     -   251     -     -     -     -     -   159 |  193  39.43
 KARR |     -   290     -     -   218     -     -     -     -     - |  283  28.33
 KIRU |     -    17     -    20     -     -     -     -     -     - |  287   2.53
 KOKB |     -     -     -   171   112     -     X     -     -     X |  237   1.28
 KOSG |     -    34     -    37     -     -     -     -     -    18 |  288  66.06
 KOUR |     -    40     -    68     -     -     -     -     -    39 |  288  37.82
 KWJ1 |     -     -     -   194   180     -     -     -     -   210 |  244    >>>
 LPGS |     -   172     -   242     X     -     -     -     -   102 |  244  33.66
 MATE |     -    26    33     -     -     -     X     -     -    23 |  265   0.11
 MAW1 |     -   132     -     -    34     -     -     -     -    69 |  288  31.76
 MDO1 |     -    48    69     -     -     -     -     -     -    40 |  246  13.14
 MEDI |     -    34     -     -     -     -     -     -     -    24 |  286   0.14
 METS |     -    36     -     -     -     -     -     -     -    26 |  285   0.40
 MKEA |     -    76     -    65     -     -     -     -     -    20 |  288  52.64
 NKLG |     -     -     -    35     -     -     -     -     -    22 |  287    >>>
 NLIB |     -   177   160     -     -     -     -     -     -   145 |  271 931.26
 NPLD |     -    49     -     -     -     -     -     -     -    36 |  285   0.06
 NRC2 |     -    22    49     -     -     -     X     -     -    28 |   96   0.02
 NTUS |     -    42     -     -     -     -     -     -     -    31 |  288   9.33
 ONSA |     -    57     -    40     -     -     -     -     -    32 |  288   3.79
 PENC |     -    23     -     -     -     -     -     -     -    17 |  285   7.33
 PERT |     -    50     -    45     -     -     -     -     -    33 |  288  17.08
 PIE1 |     -    58     -    67     -     -     -     -     -     - |  210   0.03
 POTS |     -    29     -    31    21     -     -     -     -    20 |  288  13.86
 REYK |     -    24     -    36     -     -     -     -     -    26 |  288   8.38
 RIOG |     -    72     -    99    47     -    45     -     -    58 |  276  20.86
 SANT |     -     X     -   121   119     -     -     -     -   180 |  285  24.92
 SELE |     -    27     -    31     -     -     -     -     -     - |   77  58.11
 SFER |     -    28     -     -     -     -     -     -     -    20 |  287   1.31
 STJO |     -    60    38     -    55     -     -     -     -    54 |  288   3.00
 SUTH |     -     -     -   112    74     -     -     -     -     - |  183  37.27
 THTI |     -     -     -    32     -     -     -     -     -    20 |  287   3.72
 TIXI |     -    52     -     -     -     -    24     -     -     - |  280  16.33
 TRO1 |     -    31     -     -    24     -     -     -     -     - |  288  10.71
 TROM |     -     -     -    63     -     -     -     -     -    40 |  284  13.31
 TSKB |     -    62    44    67     -     -     -     -     -     - |  186   1.29
 USNO |     -    33     -    63     -     -    16     -     -    52 |  288   0.03
 USUD |     -   170     -    86     -     -     -     -     -    91 |  270   0.34
 VILL |     -    42     -    39     -     -     -     -     -    28 |  288  37.84
 WES2 |     -    66     -     -     -     -     -     -     -    48 |  271   0.39
 WHIT |     -    65     -     -    49     -     -     -     -     - |  288  23.64
 WSRT |     -    43     -     -     -     -    24     -     -    17 |  288   0.03
 WTZR |     -    64     -   169     -     -    59     -     -    68 |  288   0.40
 WUHN |     -   108     -    50    33     -    30     -     -    20 |  287  45.87
 YELL |     -    93   162   193     -     -     -     -     -    41 |  288   0.48
 YSSK |     -    32     -     -     -     -    15     -     -     - |  279  26.75
 ZWEN |     -     -     -     -    27     -     -     -     -    26 |  266  22.37
 -----+-------------------------------------------------------------+--------------
 TOT  |  4743   106   119   118    82  4445    56  4666     -    79 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

