
 GPS week: 1137   Day: 4   MJD: 52207                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2572     14     0.20    -0.42     4.63     0.00
 cod |   288     0  24962     71    -1.18     2.30     0.11    21.64
 esa |   288     0  17442    501   761.67    12.76     0.19    10.57
 gfz |   288     0  14352    264    -0.03    -0.23     0.11    21.41
 igu |    96     0   2572     14     0.07    -0.72     3.53     0.00
 jpl |   285     0   9976    482    -1.26    -3.38     0.12    20.15
 ngs |    96     0   2572     14     0.19    -0.40     4.53     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24983    711   589.05     5.16     0.09    26.23

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |   722    52    39  -164  9389   271   -66     -   -37 |
    2 | -4634    38    48    -5 -8397    20 -4081     -   -55 |
    3 |  2002   -88   172   128  3857   165  1816     -  -154 |
    4 | -3512   -28    28   217 -6364  -106 -3688     -  -121 |
    5 |  5968     3   140    25  7525    10  4726     -   -81 |
    6 | -1518   -93   425   192  5964   -52 -1516     -  -229 |
    7 | -1679   -10    36    77  -303    81 -1602     -  -103 |
    8 |  1427   189  -112    16  -421   -68  1133     -   -97 |
    9 | -3363    71    86   116 -6474  -122 -2904     -  -148 |
   10 | -6374    71    57    62 -2937    -4 -5909     -  -130 |
   11 |  1131   -48   209   -88 -1905   302  1224     -   -70 |
   13 |  3743    62    77    36  -476    -6  3987     -  -110 |
   14 |  2166     8   321  -179  -569   118  2298     -   -39 |
   15 |    37   -63     -    89  3593   127   460     -   -60 |
   18 |  3791  -135   340    43 -8586    -8  3724     -   -46 |
   20 |  2383   -42    -4   -57 -2333     X  2457     -    82 |
   21 | -1957    14    56   107 -8421   183 -1755     -  -180 |
   22 | 11287    70   -87  -157 18475   419 10581     -   -32 |
   23 |  2439   -49    13    58  2861   -24  2038     -     X |
   24 | -8785    47  -121    88 -3858   -97 -8189     -   -31 |
   25 |  4694    82   132    57   437   173  4620     -  -239 |
   26 | -4989    12   426   176 -4042   -40 -4817     -  -313 |
   27 | -4358   144    97    98-13316   -63 -4443     -  -211 |
   28 |  5633   129   -94  -143  8661   -37  5697     -    55 |
   29 | -2802    39   395   -73  1369   176 -2366     -  -208 |
   30 | -4547   -17   381   140 -4045   -71 -4088     -  -225 |
   31 |  -124   -72   149   129  6572   169  -629     -  -161 |
 -----+-------------------------------------------------------+
 ALBH |     -  -138   193     -     -   -34     -     -    63 |
 ALGO |     -    11     X   -18     -     1     -     -     5 |
 AMC2 |     -   -36     -     -     -  -116     -     -   118 |
 ARTU |     -   134     -  -135     -     -     -     -     - |
 AUCK |     -   152  -396     -     -     -     -     -    36 |
 BAHR |     -    34  -112   -62     -    96     -     -    -5 |
 BILI |     -   -82     -    83     -     -     -     -     - |
 BOR1 |     -    30     -     -     -     -     -     -   -25 |
 BRMU |     -     -  -167    30     -     -     -     -    43 |
 BRUS |     -   -53     -     -     -   -11     -     -    52 |
 CAS1 |     -  -162   -15   -20     -    16     -     -   144 |
 CRO1 |     -   -79     -     -     -   -27     -     -    86 |
 DAEJ |     - -1150     -     -     -     -     -     -   949 |
 DAV1 |     -   -56     -   -52     -     -     -     -    90 |
 DRAO |     -   -40     -     -     -     -     -     -    33 |
 FAIR |     -     -   114     -     -    -1     -     -   -46 |
 GALA |     -   -88    92     6     -    25     -     -     9 |
 GODE |     -   -13    27     -     -     -     -     -     - |
 GRAZ |     -  -116     -     -     -     -     -     -    96 |
 GUAM |     -  -123  -110   -44     -     -     -     -   180 |
 HOB2 |     -   168  -279     -     -     -     -     -   -28 |
 HRAO |     -   142     -     -     -   231     -     -  -378 |
 IISC |     -    -5  -347     -     -     -     -     -   145 |
 KARR |     -   -18     -    18     -     -     -     -     - |
 KERG |     -   353     -     -     - -1048     -     -   478 |
 KIRU |     -   174  -357     -     -     -     -     -     - |
 KOKB |     -     -    64    73     -  -111     -     -     X |
 KOSG |     -  -157   -16     -     -     -     -     -   137 |
 KWJ1 |     -     -   -45   -69     -   -21     -     -    78 |
 LPGS |     -   283  -550     X     -    -1     -     -   -17 |
 MAC1 |     -    39   -92  -237     -     -     -     -   201 |
 MAS1 |     -   105    74   -95     -    33     -     -   -50 |
 MATE |     -     0     -     -     -     X     -     -     0 |
 MAW1 |     -    20     -   -80     -     -     -     -    49 |
 MDO1 |     -  -303     -     -     -     -     -     -   250 |
 MEDI |     -   -55     -     -     -     -     -     -    45 |
 METS |     -   230     -     -     -     -     -     -  -190 |
 MKEA |     -   -42   -54     -     -     -     -     -    57 |
 NKLG |     -   -67  -376     -     -     -     -     -   205 |
 NLIB |     -  -158     -     -     -     -     -     -   131 |
 NPLD |     -  -218     -     -     -     -     -     -   180 |
 NTUS |     -  -126     -     -     -     -     -     -   104 |
 OHIG |     -    58  -331  -111     -    89     -     -   111 |
 ONSA |     -   -69   -70     -     -     -     -     -    85 |
 PENC |     -   297     -     -     -     -     -     -  -245 |
 PERT |     -   153  -232     -     -     -     -     -   -33 |
 PIE1 |     -  -645   413     -     -     -     -     -   300 |
 PIMO |     -  1140   848     -     -  -219     -     - -1003 |
 POTS |     -    45  -191     -     -     -     -     -    39 |
 REYK |     -    -9     -     -     -     -     -     -     7 |
 RIOG |     -   -28   123     3     -     -     -     -   -29 |
 SANT |     -    53    40    24     -     -     -     -   -69 |
 SFER |     -  -374     -     -     -     -     -     -   309 |
 STJO |     -   -32     -  -173     -     -     -     -   169 |
 THTI |     -     -     -     -     -    12     -     -    -9 |
 THU1 |     -  -126     -     -     -     -     -     -   104 |
 TRO1 |     -    -9     -    10     -     -     -     -     - |
 TROM |     -     -   250     -     -     -     -     -  -101 |
 TSKB |     -   143  -294     -     -     -     -     -     - |
 URUM |     -   -11     -     -     -     -     -     -     9 |
 USNO |     -   147  -732     -     -   165     -     -    49 |
 USUD |     -    90   -16     -     -   127     -     -  -206 |
 VILL |     -    16   -64     -     -     -     -     -    12 |
 WES2 |     -    61     -     -     -     -     -     -   -50 |
 WHIT |     -    18     -   -19     -     -     -     -     - |
 WSRT |     -   -65     -     -     -    37     -     -    26 |
 WTZR |     -   -36   -64     -     -    27     -     -    35 |
 WUHN |     -   198  -241   -86     -     -     -     -     3 |
 YELL |     -   121  -185     -     -     -     -     -   -25 |
 ZWEN |     -     -     -   -76     -     -     -     -    62 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6375   130    73    80  2636   133  6628     -    30 |  288   3.80
    2 |  7506   122   238    86  2859   244  7518     -    80 |  288   3.23
    3 |  2703    88   392   114  1426    61  2559     -    49 |  288   1.32
    4 |  3799    75   244    84  3726    82  3863     -    61 |  288   0.97
    5 |  5695   126   397   109  2332   118  4753     -    88 |  282   3.75
    6 |  8111    87    80    51  2688    73  8119     -    60 |  288   8.69
    7 |  3089   119   102    80  1963   134  2994     -   136 |  288   0.83
    8 |  4031    50   219   109  1136    98  3627     -    79 |  288   3.21
    9 |  2635    56   180    97  1569    58  2448     -    39 |  288   1.84
   10 |  2879   108   279    78  2351    72  3101     -   179 |  283   1.41
   11 |   639   167   140    94   608   127   740     -   154 |  288   0.47
   13 |   884    55   110    75   807    75   950     -    98 |  288   0.31
   14 |  1022    78    76    83   616   130  1027     -   102 |  288   0.33
   15 |  6463   115     -   151  4649    81  6301     -    80 |  288   2.94
   18 |  1100   169   309    48  1614   101  1039     -    85 |  288   0.31
   20 |   819   113   235    64  1052     X   794     -    39 |  288   0.24
   21 | 10012   154   381   165  4151    65 10141     -    43 |  286   4.80
   22 |  4998    69   147   118  9498   149  4759     -   184 |  284   1.42
   23 |  5980   240   252   133  4195   253  5759     -     X |  283   6.04
   24 |  3209    87    76    42  4621    65  3201     -    55 |  288   2.06
   25 |  4112    56   360    65  4483    45  4162     -   103 |  288   2.46
   26 |  1124   137   190    60  1737    49   994     -   137 |  288   0.41
   27 |  7263    91    85    74  7986   264  6428     -   104 |  252    >>>
   28 |  1957   131    75    59  4143    72  1890     -    93 |  288   0.49
   29 |  3456   114   136    51  1667    87  3324     -    55 |  288   0.75
   30 |  1682   156   143   111  2046    50  1250     -    52 |  282   1.68
   31 |  5542   232   173   161  3464    86  5495     -    32 |  288   3.44
 -----+-------------------------------------------------------+--------------
 ALBH |     -    49   175     -     -    75     -     -    49 |  288   0.11
 ALGO |     -    53     X    78     -    66     -     -    42 |  288   0.05
 AMC2 |     -    75     -     -     -    40     -     -    55 |  288   0.04
 ARTU |     -    45     -    46     -     -     -     -     - |  280  32.92
 AUCK |     -   110   212     -     -     -     -     -    50 |  276  28.08
 BAHR |     -   253   169   344     -   300     -     -   234 |  285   0.33
 BILI |     -    24     -    24     -     -     -     -     - |  287    >>>
 BOR1 |     -    44     -     -     -     -     -     -    36 |  286   2.79
 BRMU |     -     -    97    55     -     -     -     -    33 |  288  55.76
 BRUS |     -    42     -     -     -    34     -     -    46 |  276   0.08
 CAS1 |     -    80    86    32     -    23     -     -    32 |  288   8.34
 CRO1 |     -    71     -     -     -    62     -     -    57 |  288   0.14
 DAEJ |     -    25     -     -     -     -     -     -    20 |  283   0.92
 DAV1 |     -   115     -   115     -     -     -     -   175 |  287  19.94
 DRAO |     -    53     -     -     -     -     -     -    43 |  288   0.04
 FAIR |     -     -   264     -     -    73     -     -   106 |  286   0.10
 GALA |     -   186   104    82     -   113     -     -    81 |  288  31.86
 GODE |     -   136   279     -     -     -     -     -     - |  106 268.89
 GRAZ |     -    71     -     -     -     -     -     -    58 |  281  45.51
 GUAM |     -    40   192   129     -     -     -     -    45 |  288  34.60
 HOB2 |     -   169   316     -     -     -     -     -    64 |  286   0.09
 HRAO |     -    66     -     -     -   152     -     -    89 |  278    >>>
 IISC |     -    87   141     -     -     -     -     -   103 |  252  45.25
 KARR |     -   203     -   205     -     -     -     -     - |  284  34.90
 KERG |     -    73     -     -     -    43     -     -    40 |  287   1.43
 KIRU |     -    36    74     -     -     -     -     -     - |  280   2.39
 KOKB |     -     -   157    59     -    80     -     -     X |  280   1.59
 KOSG |     -    53    68     -     -     -     -     -    28 |  288  12.63
 KWJ1 |     -     -   250   303     -   124     -     -   266 |  257 132.79
 LPGS |     -   200   252     X     -   147     -     -   184 |  263  29.84
 MAC1 |     -    87   139    38     -     -     -     -    31 |  287  15.08
 MAS1 |     -    54    44    44     -    66     -     -    34 |  288   1.48
 MATE |     -    34     -     -     -     X     -     -    28 |  288   0.06
 MAW1 |     -    55     -    58     -     -     -     -    72 |  270  29.18
 MDO1 |     -    52     -     -     -     -     -     -    43 |  240  17.28
 MEDI |     -    33     -     -     -     -     -     -    27 |  286   0.21
 METS |     -    42     -     -     -     -     -     -    35 |  219   0.64
 MKEA |     -    81   103     -     -     -     -     -    65 |  281  57.11
 NKLG |     -   264   151     -     -     -     -     -   167 |  286    >>>
 NLIB |     -   101     -     -     -     -     -     -    83 |  277 139.26
 NPLD |     -    55     -     -     -     -     -     -    46 |  285   0.07
 NTUS |     -    34     -     -     -     -     -     -    28 |  288   8.78
 OHIG |     -   199   318    56     -    80     -     -    48 |  287  26.77
 ONSA |     -    41    47     -     -     -     -     -    36 |  288   3.31
 PENC |     -    59     -     -     -     -     -     -    49 |  285   3.85
 PERT |     -    86   116     -     -     -     -     -    35 |  288  19.35
 PIE1 |     -    42    68     -     -     -     -     -    34 |  242   0.05
 PIMO |     -   120   267     -     -   263     -     -   148 |  283  30.34
 POTS |     -    34    74     -     -     -     -     -    42 |  288  14.06
 REYK |     -    92     -     -     -     -     -     -    76 |  276   8.94
 RIOG |     -   142   180    42     -     -     -     -    75 |  288  14.54
 SANT |     -   155   185   182     -     -     -     -   181 |  287  25.46
 SFER |     -    39     -     -     -     -     -     -    33 |  285   0.88
 STJO |     -   116     -    65     -     -     -     -    63 |  288   2.30
 THTI |     -     -     -     -     -    23     -     -    18 |  272   4.80
 THU1 |     -   237     -     -     -     -     -     -   196 |  224  44.74
 TRO1 |     -    48     -    48     -     -     -     -     - |  286  13.06
 TROM |     -     -    89     -     -     -     -     -    36 |  279  13.08
 TSKB |     -    68   140     -     -     -     -     -     - |  181   0.84
 URUM |     -    42     -     -     -     -     -     -    34 |  288  26.66
 USNO |     -    66   135     -     -    56     -     -    45 |  288   0.06
 USUD |     -   122   185     -     -    74     -     -   228 |  287   0.32
 VILL |     -    38    37     -     -     -     -     -    35 |  288  34.99
 WES2 |     -    91     -     -     -     -     -     -    75 |  284   0.14
 WHIT |     -    67     -    68     -     -     -     -     - |  288   3.43
 WSRT |     -    66     -     -     -    72     -     -    25 |  288   0.06
 WTZR |     -    47    37     -     -    54     -     -    41 |  288   0.09
 WUHN |     -    44    75    50     -     -     -     -    26 |  287  42.89
 YELL |     -    40   159     -     -     -     -     -    67 |  288   0.04
 ZWEN |     -     -     -    24     -     -     -     -    20 |  288  25.25
 -----+-------------------------------------------------------+--------------
 TOT  |  4632   109   190   109  3526   118  4530     -    91 |


 BEST CLOCK FIT: YELL   288   0.04 (ns) 

