
 GPS week: 1137   Day: 0   MJD: 52203                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2675      0    -0.03     0.01     4.78     0.00
 cod |   288     0  23265    198   -12.21   -18.61     0.10    19.24
 emr |    96     0   3182      6   567.61     2.20     0.10    19.98
 esa |   288     0  17176    732   688.93     9.24     0.11    15.99
 gfz |   288     0  14638    395     0.18    -0.13     0.07    26.27
 igu |    96     0   2483      0    -0.08     0.21     4.04     0.00
 jpl |   283     0  10129    341     6.53    -9.59     0.11     0.00
 ngs |    96     0   2675      0    -0.03     0.00     4.46     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23619   1213   567.49     2.23     0.10    18.52

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -2160    32   -91    26   -28 -4123   128 -3128     -    17 |
    2 | -2866   -16  -253   339   -23 13592  -157 -3322     -   -70 |
    3 | 10923  -115    46    67    28  8603    72 10488     -     5 |
    4 | -2902   -77  -181    32   248 -4741     3 -3089     -  -235 |
    5 |  4336    22   -14   150   -49  7243    82  4537     -   -72 |
    6 | -6231   -49    -8   146   128     -    40 -4771     -  -253 |
    7 |   894     1  -136   144    40 -4167    14   537     -  -149 |
    8 |  1065    53  -126  -106    58 -1960   -45   953     -     X |
    9 | -2526    95   -96   218    12 -1520    20 -2582     -  -270 |
   10 | -5226   149   -12  -192   100 -9672   377 -4717     -  -138 |
   11 |  3389   -63    11   234   -42 -2501   223  3157     -   -81 |
   13 |  2933     7   221    85   -19 -3144   -72  2956     -  -133 |
   14 |  2697    12    63   131  -114 -1735   107  2739     -    13 |
   15 | -1923    58   229     -   -25 15664   326 -1769     -  -107 |
   17 |  3356   163   246    82   -65     -    90  3132     -  -235 |
   18 |  3726   -75   324    51   -69  -995   100  3483     -    12 |
   20 |  4106  -115   -61   107   -17 -1598   187  3888     -    71 |
   21 | -1194   107    41     X   -65  2841   144 -1297     -   -39 |
   22 |-10259   108     6   -14   -91-19734   319 -9460     -    24 |
   23 | -3116   166    98   119   -24  3926   173 -2581     -  -277 |
   24 |  -966    17  -130   166   133  4781    83 -1323     -  -305 |
   25 |   119   -45  -144   102    82 -3120  -134   730     -  -106 |
   26 | -3049   133  -111   133   119 -3652    33 -3063     -  -381 |
   27 |  -436  -100  -204   -45   254-12850  -308   -49     -  -144 |
   28 |  4985   110   184  -226   -99  2724    92  4817     -   146 |
   29 | -1042   -50  -217   255    16  1238    -1 -1091     -  -113 |
   30 |  -547   104    20    38   110  -214  -108  -720     -  -304 |
   31 |  1536     2   -47   -20    93 14795    46  1234     -  -100 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -123     -  -197     -     -   106     -     -   292 |
 ALGO |     -     7    10     X     X     -  -124     -     -   -17 |
 AMC2 |     -   -64     -     -     -     -  -345     -     -    66 |
 AOML |     -   -56     -     -     -     -     -     -     -    58 |
 AREQ |     -   -99     -    -8     -     -     -     -     -   111 |
 AUCK |     -   157     -  -233     -     -     -     -     -    38 |
 BAHR |     -     9     -    81   -72     -    14     -     -    24 |
 BILI |     -   -41     -     -    30     -     -     -     -     - |
 BOR1 |     -    64     -     -     -     -     -     -     -   -67 |
 BRMU |     -  -100     -    43    13     -     -     -     -    49 |
 BRUS |     -   -19     -     -     -     -    25     -     -    20 |
 CAS1 |     -  -208     -   367  -120     -   -73     -     -    69 |
 CRO1 |     -  -107     -     -     -     -   -40     -     -   111 |
 DAV1 |     -   -23     -     -   -42     -     -     -     -    85 |
 DRAO |     -   -19   -51     -     -     -     -     -     -    38 |
 FAIR |     -     -    49  -150     -     -   122     -     -   113 |
 GALA |     -  -104     -     -    20     -   160     -     -    80 |
 GRAZ |     -   -62     -     -     -     -     -     -     -    65 |
 GUAM |     -  -114     -    20   -24     -     -     -     -   135 |
 HOB2 |     -   140     -   -96   -35     -     -     -     -   -13 |
 HRAO |     -  -181     -     -     -     -  -200     -     -   188 |
 IISC |     -  -217     -    47     -     -     -     -     -   176 |
 KERG |     -   142     -     -     -     - -1932     -     -  -148 |
 KIRU |     -   313     -  -376     -     -     -     -     -     - |
 KOKB |     -     -     -    88   103     -   -69     -     -  -260 |
 KOSG |     -  -127     -   104     -     -     -     -     -    43 |
 KWJ1 |     -     -     -  -206   114     -     1     -     -    32 |
 LPGS |     -   -16     -     X     X     -   299     -     -    16 |
 MAC1 |     -   117     -   -35  -194     -     -     -     -   199 |
 MALI |     -     -     -  -135   123     -     -     -     -   -58 |
 MAS1 |     -    29    27    28   -19     -   -32     -     -   -37 |
 MAW1 |     -   -48     -     -     -     -     -     -     -    50 |
 MCM4 |     -   213     -  -127   -78     -     -     -     -     X |
 METS |     -  -129     -     -     -     -     -     -     -   134 |
 MKEA |     -   169     -  -398     -     -     -     -     -   169 |
 NPLD |     -  -199     -     -     -     -     -     -     -   207 |
 NRC2 |     -   -72     -     -     -     -    -9     -     -    74 |
 NTUS |     -  -106     -     -     -     -     -     -     -   110 |
 NYA1 |     -    59     -     -   -71     -    97     -     -    45 |
 OHIG |     -     -     -  -119    -3     -     X     -     -   107 |
 PENC |     -   179     -     -     -     -     -     -     -  -186 |
 PERT |     -    15     -    36     -     -     -     -     -   -47 |
 PIE1 |     -    32     -   -39     -     -     -     -     -     - |
 PIMO |     -    38     -   -46     -     -   162     -     -     X |
 POTS |     -     -     -  -112     -     -     -     -     -    97 |
 REYK |     -    32     -     -     -     -     -     -     -   -33 |
 RIOG |     -   -67     -   170   -53     -     -     -     -     - |
 SANT |     -     X     -   -25    15     -     -     -     -     X |
 STJO |     -    57   191     -  -207     -     -     -     -   166 |
 THU1 |     -    69     -     -     -     -     -     -     -   -72 |
 TRO1 |     -   -42     -     -    31     -     -     -     -     - |
 TROM |     -     -     -   128     -     -     -     -     -  -111 |
 TSKB |     -    49     -   -59     -     -     -     -     -     - |
 URUM |     -   -44     -     -     -     -   -68     -     -    46 |
 USNO |     -   114     -  -424     -     -   200     -     -   247 |
 USUD |     -   -95     -   -26     -     -   -31     -     -   121 |
 VILL |     -    -7     -   -26     -     -     -     -     -    30 |
 WES2 |     -     7     -     -     -     -     -     -     -    -7 |
 WHIT |     -    98     -     -   -72     -     -     -     -     - |
 WSRT |     -   -80     -     -     -     -  -135     -     -    83 |
 WTZR |     -  -104     -     0     -     -   -60     -     -   108 |
 WUHN |     -     7     -  -104  -119     -     -     -     -   249 |
 YELL |     -    71   128  -170     -     -     -     -     -    47 |
 ZWEN |     -     -     -     -   -52     -     -     -     -    74 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4445   121    53    61    82  2553    94  3931     -    66 |  288   2.34
    2 | 10600    81   133   171    92  3956   135  9964     -   176 |  284   4.07
    3 |  3743   132    82   157    31  5796    63  3751     -    66 |  288   1.59
    4 |  1630    83    61    33    50  1828   159  1758     -    49 |  288   0.94
    5 |  8080    98   113   222    75  5282   140  6774     -    97 |  281   2.40
    6 | 11083    70    51    89    62     -   112  9885     -    83 |  288   9.18
    7 |  2003    86   210    99   116  1813   154  2058     -   160 |  288   0.94
    8 |  2893   117    64   100   140  1345    61  2992     -     X |  288   2.78
    9 |  2601    94   102    73    49  3528    67  2625     -    70 |  288   2.17
   10 |  6098   115    96   102    65  3019   203  5814     -   133 |  284   2.72
   11 |  1284   113   114    66    74  1002    77  1432     -   119 |  288   0.41
   13 |  1525   112    65   159    69  1688    79  1556     -   102 |  288   0.20
   14 |  1319    98   106   137    37   756    55  1245     -    65 |  288   0.27
   15 |  5898   107    93     -    58  9005   124  5312     -    58 |  288   3.61
   17 |  1132    85   131   110    29     -    57  1084     -    70 |  288   2.67
   18 |  1437    95   115    65    48   943   142  1464     -    45 |  288   0.35
   20 |   929    72    90    87    36   640    47   972     -    63 |  288   0.24
   21 |  4244   207    63     X   106  2080   142  4267     -   141 |  278   1.61
   22 |  5084   156   114   135   167 10352   172  4894     -    83 |  280   1.22
   23 |  8135   118   151   204    63  3466   161  7722     -   238 |  281   5.54
   24 |  2705    89    41   107    68  5339    63  2578     -    84 |  288   1.83
   25 |  6281    79   146    56    66  2360    53  6129     -    60 |  288   1.48
   26 |   952   148    78   229    62  2100    82   920     -    33 |  288   0.61
   27 |  5407    48    62    79    62  4385    41  5257     -    85 |  288   3.06
   28 |   917   127    75    71   193  1656   169   886     -   102 |  288   0.40
   29 |   880   102   152   102    75   985    78   793     -    69 |  288   1.12
   30 |  1250   128    96   259    79  1100   102  1166     -   111 |  281   2.04
   31 |  4572    57    56    60    35  6662    67  4421     -    35 |  288   4.10
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    53     -    95     -     -    47     -     -    43 |  288   0.07
 ALGO |     -    45    27     X     X     -   134     -     -    28 |   95   0.08
 AMC2 |     -    27     -     -     -     -    44     -     -    28 |  286   0.04
 AOML |     -    36     -     -     -     -     -     -     -    37 |  288  21.76
 AREQ |     -    47     -    69     -     -     -     -     -    41 |  288  39.78
 AUCK |     -    83     -    44     -     -     -     -     -    59 |  288  20.21
 BAHR |     -    65     -    76    41     -    63     -     -    34 |  288   0.30
 BILI |     -    45     -     -    33     -     -     -     -     - |  284  15.27
 BOR1 |     -    40     -     -     -     -     -     -     -    41 |  286   2.09
 BRMU |     -    61     -    56    27     -     -     -     -    57 |  288  40.83
 BRUS |     -    34     -     -     -     -    44     -     -    35 |  286   0.03
 CAS1 |     -    88     -    88    37     -    70     -     -    54 |  288   8.44
 CRO1 |     -    55     -     -     -     -    61     -     -    57 |  286   0.11
 DAV1 |     -   175     -     -    35     -     -     -     -   210 |  288  21.45
 DRAO |     -    21    20     -     -     -     -     -     -    20 |  288   0.07
 FAIR |     -     -    55   178     -     -    52     -     -   154 |  266   0.16
 GALA |     -    35     -     -    23     -    73     -     -    31 |  288  34.05
 GRAZ |     -    42     -     -     -     -     -     -     -    44 |  282    >>>
 GUAM |     -    45     -    91    48     -     -     -     -    45 |  288  33.60
 HOB2 |     -    94     -    89    32     -     -     -     -    47 |  288   0.12
 HRAO |     -    72     -     -     -     -    82     -     -    75 |  286    >>>
 IISC |     -   271     -   151     -     -     -     -     -   157 |  288  41.71
 KERG |     -    96     -     -     -     -    64     -     -   100 |  239   1.66
 KIRU |     -   100     -   121     -     -     -     -     -     - |  253   6.43
 KOKB |     -     -     -   146   161     -   327     -     -   176 |  278   0.58
 KOSG |     -    39     -    61     -     -     -     -     -    22 |  288  34.96
 KWJ1 |     -     -     -   194   162     -   182     -     -   232 |  237 185.24
 LPGS |     -    45     -     X     X     -   132     -     -    47 |  279  32.79
 MAC1 |     -    68     -   147    61     -     -     -     -   199 |  288  22.75
 MALI |     -     -     -    86    35     -     -     -     -    89 |  288  12.28
 MAS1 |     -    53    32    79    23     -    37     -     -    36 |  288   3.58
 MAW1 |     -   172     -     -     -     -     -     -     -   179 |  278  29.62
 MCM4 |     -   145     -   124    56     -     -     -     -     X |  275   7.51
 METS |     -   108     -     -     -     -     -     -     -   112 |  281   0.36
 MKEA |     -    56     -    86     -     -     -     -     -    72 |  288  60.01
 NPLD |     -    43     -     -     -     -     -     -     -    44 |  285   0.04
 NRC2 |     -    40     -     -     -     -   166     -     -    42 |  283   0.06
 NTUS |     -    31     -     -     -     -     -     -     -    32 |  288   7.28
 NYA1 |     -    96     -     -    44     -    98     -     -   162 |  288   0.10
 OHIG |     -     -     -   131    48     -     X     -     -    55 |  286  17.73
 PENC |     -    25     -     -     -     -     -     -     -    26 |  285   6.42
 PERT |     -    87     -    82     -     -     -     -     -    30 |  288  17.76
 PIE1 |     -    18     -    21     -     -     -     -     -     - |  204   0.03
 PIMO |     -    19     -    23     -     -    55     -     -     X |  288  32.43
 POTS |     -     -     -    34     -     -     -     -     -    29 |  203  13.97
 REYK |     -   186     -     -     -     -     -     -     -   194 |  267   7.18
 RIOG |     -    90     -   132   112     -     -     -     -     - |  180  18.00
 SANT |     -     X     -    99    60     -     -     -     -     X |  267  29.56
 STJO |     -    41    46     -    28     -     -     -     -    44 |  288   9.32
 THU1 |     -   257     -     -     -     -     -     -     -   267 |  215  23.20
 TRO1 |     -    26     -     -    19     -     -     -     -     - |  288   9.84
 TROM |     -     -     -    68     -     -     -     -     -    59 |  270  12.85
 TSKB |     -    50     -    60     -     -     -     -     -     - |  170   0.99
 URUM |     -    52     -     -     -     -    57     -     -    54 |  288  22.61
 USNO |     -    56     -    39     -     -    56     -     -    67 |  288   0.04
 USUD |     -    66     -    78     -     -    50     -     -    31 |  288   0.33
 VILL |     -    60     -    78     -     -     -     -     -    21 |  288  39.81
 WES2 |     -   142     -     -     -     -     -     -     -   148 |  285   0.13
 WHIT |     -    43     -     -    31     -     -     -     -     - |  288   4.13
 WSRT |     -    37     -     -     -     -    56     -     -    39 |  288   0.04
 WTZR |     -    43     -    62     -     -    39     -     -    30 |  288   0.07
 WUHN |     -    41     -    33    40     -     -     -     -    23 |  287  38.80
 YELL |     -   149    87   180     -     -     -     -     -   283 |  286   0.15
 ZWEN |     -     -     -     -    29     -     -     -     -    41 |  269  25.08
 -----+-------------------------------------------------------------+--------------
 TOT  |  4783    97    96   114    74  4044   107  4462     -   101 |


 BEST CLOCK FIT: BRUS   286   0.03 (ns) 

