
 GPS week: 1136   Day: 3   MJD: 52199                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2658      0    -0.04     0.40     4.65     0.00
 cod |   288     0  25296    349    -2.05     2.36     0.09    21.84
 emr |    96     0   3965     13   656.39     9.74     0.12    17.93
 esa |   288     0  16890    357   658.09    10.38     0.19     9.05
 gfz |   288     0  14586    279    -0.07     0.38     0.10    21.72
 igu |    96     0   2278      0    -0.06     0.40     3.77     0.00
 jpl |   280     0  10146   1025     2.91     1.46     0.14    11.71
 ngs |    96     0   2658      0    -0.04     0.41     4.25     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25873    136   539.82     3.82     0.11    17.75

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -1217    -5  -141    54   103 -4902   252 -1396     -  -152 |
    2 |  1376    69     6   145  -235     -   590  1793     -     2 |
    3 |  1329   -60  -112    38   283  5198  -109  1079     -  -205 |
    4 | -1950    14   -87   266   104  1830    43 -2131     -  -261 |
    5 | -7903    73    64    97    16     -    86 -6770     -  -195 |
    6 | -8291   -56  -205   377   169-12836  -111 -8156     -  -238 |
    7 | -1096    75   -57   210   -44 -2468   127 -1398     -  -181 |
    8 |  -157   207   -67    14  -102   387   207  -299     -  -157 |
    9 | -6719   191   -53   110   -75-11695    10 -6258     -  -186 |
   10 |-10624   154    11   -57   -29-12752    36 -9836     -  -148 |
   11 |  3857    77   118   217  -186  2607   419  3435     -  -105 |
   13 |  3621    68   162   202    87  2265  -362  3719     -  -195 |
   14 |  5127    20    41   103  -105  1835  -112  4729     -    85 |
   15 |  6534    72   -25     -   -45 18305   398  5662     -  -109 |
   17 |  7282     -   -52     X     -  5474   336  7221     -   -87 |
   18 |  4454   -44   102    73   -83  1910   227  4290     -    37 |
   20 |  3792   -22   -37   118     7  2113     X  3308     -   -29 |
   21 |  3386    57   -75    35   -69     -   141  3392     -   -41 |
   22 |  1419   157  -288  -106    45  4902   251  1746     -  -154 |
   23 |   176   202   -66    46  -110 11178    57   435     -  -138 |
   24 | -5932   162   -49    68    58 -1396   -62 -5714     -  -263 |
   25 |  1174   -25  -293    31   262  3695  -220  1158     -  -161 |
   26 |  -497   117   -30   365   -14  1270   -55  -819     -  -277 |
   27 |  -385   126  -142    68   135     -  -355   -79     -  -157 |
   28 |  7906   -22   164   198  -150  2753   314  6973     -   -18 |
   29 |  2451   109  -181    37   158   353  -197  1701     -  -203 |
   30 |  -720    29   -95   171   133 -7248  -202 -1068     -  -204 |
   31 | -7623   -34   -52    40   175-12428    30 -5896     -  -188 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -137     -   -14     -     -    39     -     -   151 |
 ALGO |     -   162   269 -1555    85     -    32     -     -   199 |
 AMC2 |     -    50     -     -     -     -  -249     -     -    99 |
 AOML |     -   -57     -     -     -     -     -     -     -    70 |
 AUCK |     -     6     -   261     -     -     -     -     -  -139 |
 BAHR |     -    10    64   -37   -92     -   106     -     -    30 |
 BILI |     -   108     -     -  -108     -     -     -     -     - |
 BOR1 |     -   -34     -     -     -     -     -     -     -    42 |
 BRMU |     -    30     -  -128    12     -     -     -     -    13 |
 BRUS |     -   -87     -     -     -     -   -13     -     -   116 |
 CAS1 |     -  -134     -     -  -104     -    78     -     -   242 |
 CRO1 |     -   -85     -     -     -     -   -35     -     -   128 |
 DAV1 |     -   -11     -     -   -98     -     -     -     -   134 |
 DRAO |     -   -60   -10     -     -     -     -     -     -    78 |
 FAIR |     -     -    29    72     -     -     X     -     -   -46 |
 GALA |     -   -56     -     -     2     -    -3     -     -    68 |
 GRAZ |     -  -104     -     -     -     -     -     -     -   128 |
 GUAM |     -  -567     -   556   453     -     -     -     -  -384 |
 HOB2 |     -   195   179  -218  -115     -     -     -     -   -49 |
 HRAO |     -   113     -     -     -     -  -381     -     -    99 |
 IISC |     -   -42     -  -370     -     -     -     -     -   231 |
 KIRU |     -    83     -  -199     -     -     -     -     -     - |
 KOKB |     -     -     -   306    34     -     X     -     -  -189 |
 KOSG |     -  -108     -   -81     -     -     -     -     -   176 |
 KOUR |     -    66     -  -348     -     -     -     -     -    96 |
 KWJ1 |     -    59     -   -93   -96     -    59     -     -    55 |
 LPGS |     -     -     -  -256     X     -   147     -     -    28 |
 MAC1 |     -    84     -     -  -290     -     -     -     -   255 |
 MAS1 |     -  -208   136   247     2     -     -     -     -    80 |
 MATE |     -  -103    16     -     -     -     X     -     -   120 |
 MAW1 |     -   -28     -     -     -     -     -     -     -    34 |
 MCM4 |     -   277     -  -237   -94     -     -     -     -  -118 |
 MDO1 |     -    13   -61     -     -     -     -     -     -     6 |
 MEDI |     -  -108     -     -     -     -     -     -     -   133 |
 METS |     -   -75     -     -     -     -     -     -     -    93 |
 MKEA |     -     -     -    46     -     -     -     -     -   -23 |
 NLIB |     -    29     -     -     -     -     -     -     -   -36 |
 NPLD |     -  -149     -     -     -     -     -     -     -   183 |
 NRC2 |     -   -62   145     -     -     -    24     -     -    13 |
 NTUS |     -  -140     -     -     -     -     -     -     -   172 |
 NYA1 |     -     6     -     -   -63     -    54     -     -    36 |
 OHIG |     -     2     -  -563   -30     -   180     -     -   209 |
 ONSA |     -  -132     -    -8     -     -     -     -     -   166 |
 PENC |     -   128     -     -     -     -     -     -     -  -158 |
 PERT |     -   160     -  -113     -     -     -     -     -  -139 |
 PIE1 |     -  -116     -   106     -     -     -     -     -    82 |
 POTS |     -   -96     -   -13     -     -     -     -     -   126 |
 REYK |     -   -92     -     -     -     -     -     -     -   114 |
 RIOG |     -  -155     -   313    11     -     -     -     -    18 |
 SANT |     -    27     -   216    51     -     -     -     -  -223 |
 SFER |     -  -222     -     -     -     -     -     -     -   273 |
 STJO |     -   -88   229     -   -59     -     -     -     -   105 |
 SUTH |     -     -     -  -135    56     -     -     -     -     - |
 THU1 |     -   -14     -     -     -     -     -     -     -    17 |
 TIDB |     -     X     -     -     -     -   -47     -     -    31 |
 TLSE |     -  -186     -     -     -     -     -     -     -   229 |
 TRO1 |     -  -169     -     -   170     -     -     -     -     - |
 TROM |     -     -     -   112     -     -     -     -     -   -57 |
 TSKB |     -   160   -28  -399     -     -     -     -     -     - |
 URUM |     -   -79     -     -     -     -     -     -     -    98 |
 USNO |     -    95   254  -557     -     -    56     -     -    45 |
 USUD |     -    24     -   -57     -     -    16     -     -   -11 |
 VILL |     -   -71    75   -24     -     -     -     -     -    75 |
 WES2 |     -    -8     -     -     -     -     -     -     -    10 |
 WHIT |     -    45     -     -   -45     -     -     -     -     - |
 WSRT |     -   -79     -     -     -     -   -37     -     -   121 |
 WTZR |     -  -184     -   131     -     -    25     -     -   144 |
 WUHN |     -    60     -  -248  -139     -     -     -     -   223 |
 YELL |     -    85   116   -80     -     -  -159     -     -    -2 |
 ZWEN |     -     -     -     -    34     -     -     -     -   -42 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5369    82   182   106    50  2935   262  4160     -    42 |  288   2.84
    2 |  6451   184   244   201   150     -   342  5751     -   224 |  280   4.06
    3 |  2343    35    56   323    54  2312   173  2414     -   157 |  288   2.19
    4 |  1542   208    97    98   220  1196   158  1574     -    55 |  288   0.80
    5 |  4582   194   273   214   207     -   202  4510     -   233 |  281   2.52
    6 |  8752   135    90   136    45  5726   163  8905     -    46 |  288   7.77
    7 |  2778    70    71   118    51  1929   118  2736     -    38 |  288   0.80
    8 |  2941   105    85   210    70  1461   216  3046     -   109 |  288   2.45
    9 |  4403    95   130    49    88  4988   107  3877     -    59 |  288   2.33
   10 |  3466   101    57   342    77  3886   106  3072     -   230 |  280   2.00
   11 |  1778   176    60   210   146   518   180  1651     -   120 |  288   0.35
   13 |   974    60    81   123    93   676   133   921     -   117 |  288   0.19
   14 |  1335    31   103   104    46   449   110  1433     -    38 |  288   0.22
   15 |  7285   110    62     -   117 11438   112  6713     -    98 |  288   2.84
   17 |  1283     -   244     X     -  1367   379  1401     -   259 |  124   1.87
   18 |  1470   103   163   192   106   538   130  1474     -    96 |  288   0.41
   20 |  2325   141    78   220    99   631     X  2065     -   200 |  288   0.39
   21 |  7765   185    83   253    59     -   155  5898     -    42 |  287   4.17
   22 |  5941   176   169   124   179  5174   139  6064     -    61 |  281   1.20
   23 |  6053    88   213   313    83  4922   116  5918     -   106 |  288   5.77
   24 |  4374   119   120   122    72  3723   156  4034     -   172 |  288   2.81
   25 |  1798   165    83   299    62  1554   174  1879     -    48 |  288   1.40
   26 |  1372    85   135   257    70   448   117  1281     -   139 |  288   0.57
   27 |  6048    81   120   114    59     -   173  4398     -    72 |  288   4.26
   28 |  6396    68    87   232    46  2010   223  6206     -    45 |  288   1.41
   29 |  3019   136   162    79    92   751   109  2932     -   303 |  288   0.74
   30 |  4249   334   123   443   219  5452   173  4096     -   103 |  279   1.99
   31 |  7429    81   105   145    84  3718   203  6206     -    69 |  288   2.77
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    71     -   260     -     -    65     -     -    86 |  288   0.13
 ALGO |     -    49    66   180    46     -    81     -     -    46 |  288   0.06
 AMC2 |     -    27     -     -     -     -    89     -     -    49 |  288   0.07
 AOML |     -    33     -     -     -     -     -     -     -    41 |  286  21.18
 AUCK |     -    76     -   289     -     -     -     -     -    71 |  287  18.86
 BAHR |     -    71    70   112    52     -   144     -     -   130 |  288   0.31
 BILI |     -    45     -     -    45     -     -     -     -     - |  287  22.91
 BOR1 |     -   171     -     -     -     -     -     -     -   211 |  286   2.05
 BRMU |     -    42     -    81    40     -     -     -     -    29 |  288  29.57
 BRUS |     -    65     -     -     -     -   169     -     -    36 |  285   0.10
 CAS1 |     -    49     -     -    57     -   123     -     -    69 |  288   7.26
 CRO1 |     -    41     -     -     -     -    79     -     -    55 |  288   0.16
 DAV1 |     -    43     -     -    67     -     -     -     -    51 |  288  21.75
 DRAO |     -    50    38     -     -     -     -     -     -    52 |  288   0.16
 FAIR |     -     -    86   214     -     -     X     -     -    88 |  285   0.10
 GALA |     -   101     -     -   109     -   251     -     -   274 |  288  31.98
 GRAZ |     -    21     -     -     -     -     -     -     -    25 |  283  34.99
 GUAM |     -    94     -   179   124     -     -     -     -    93 |  224  29.39
 HOB2 |     -    31    87    63    45     -     -     -     -    37 |  288   0.10
 HRAO |     -    48     -     -     -     -   108     -     -    54 |  288   2.52
 IISC |     -    87     -   135     -     -     -     -     -   111 |  261  41.95
 KIRU |     -    45     -   109     -     -     -     -     -     - |  288   2.55
 KOKB |     -     -     -   301   252     -     X     -     -   370 |  286   0.66
 KOSG |     -    28     -    76     -     -     -     -     -    32 |  288  54.01
 KOUR |     -    36     -   104     -     -     -     -     -    65 |  288  37.19
 KWJ1 |     -    65     -   171    51     -   127     -     -   142 |  287  13.99
 LPGS |     -     -     -   361     X     -   170     -     -   202 |  266 206.44
 MAC1 |     -    34     -     -    48     -     -     -     -    45 |  288  17.99
 MAS1 |     -    44    72    95   103     -     -     -     -    70 |  275   3.05
 MATE |     -    34    65     -     -     -     X     -     -    32 |  288   0.09
 MAW1 |     -    43     -     -     -     -     -     -     -    53 |  286  28.83
 MCM4 |     -   175     -   204    61     -     -     -     -   123 |  259  24.50
 MDO1 |     -    24    28     -     -     -     -     -     -    26 |  278  12.80
 MEDI |     -    19     -     -     -     -     -     -     -    23 |  286   0.15
 METS |     -    10     -     -     -     -     -     -     -    12 |  285   0.34
 MKEA |     -     -     -   142     -     -     -     -     -    72 |  283  52.15
 NLIB |     -    26     -     -     -     -     -     -     -    32 |  288   0.07
 NPLD |     -    38     -     -     -     -     -     -     -    47 |  285   0.08
 NRC2 |     -    47    46     -     -     -    77     -     -    29 |  288   0.08
 NTUS |     -    28     -     -     -     -     -     -     -    35 |  288   7.43
 NYA1 |     -    56     -     -    30     -    93     -     -    71 |  288   0.10
 OHIG |     -   193     -   286   108     -   147     -     -    68 |  288  13.87
 ONSA |     -    44     -    86     -     -     -     -     -    33 |  288   3.33
 PENC |     -    26     -     -     -     -     -     -     -    32 |  285   3.91
 PERT |     -    28     -    76     -     -     -     -     -    37 |  288  16.20
 PIE1 |     -    40     -   156     -     -     -     -     -    68 |  288   0.14
 POTS |     -    21     -    74     -     -     -     -     -    22 |  288  13.32
 REYK |     -    34     -     -     -     -     -     -     -    41 |  286   7.45
 RIOG |     -   127     -   340    55     -     -     -     -    88 |  288  14.74
 SANT |     -   140     -   226   190     -     -     -     -   261 |  284  26.06
 SFER |     -    36     -     -     -     -     -     -     -    44 |  285   1.82
 STJO |     -    41    53     -    55     -     -     -     -    35 |  288  11.87
 SUTH |     -     -     -   271   113     -     -     -     -     - |  218  58.16
 THU1 |     -    95     -     -     -     -     -     -     -   116 |  276  29.87
 TIDB |     -     X     -     -     -     -    75     -     -    50 |  276   0.09
 TLSE |     -   156     -     -     -     -     -     -     -   192 |  204 171.29
 TRO1 |     -    20     -     -    21     -     -     -     -     - |  288  12.19
 TROM |     -     -     -    72     -     -     -     -     -    37 |  285  14.28
 TSKB |     -    65   137    98     -     -     -     -     -     - |  191   1.31
 URUM |     -    64     -     -     -     -     -     -     -    78 |  288  29.40
 USNO |     -    46    61   119     -     -    85     -     -    29 |  288   0.07
 USUD |     -    24     -   104     -     -   110     -     -    31 |  288   0.32
 VILL |     -    32    65    80     -     -     -     -     -    37 |  288  34.99
 WES2 |     -    37     -     -     -     -     -     -     -    45 |  284   0.10
 WHIT |     -    29     -     -    30     -     -     -     -     - |  288  26.81
 WSRT |     -    46     -     -     -     -    91     -     -    34 |  288   0.06
 WTZR |     -    50     -    99     -     -    86     -     -    39 |  288   0.13
 WUHN |     -    29     -    46    36     -     -     -     -    49 |  287  35.87
 YELL |     -    61    98   111     -     -    79     -     -    57 |  288   0.07
 ZWEN |     -     -     -     -    85     -     -     -     -   104 |  276  17.87
 -----+-------------------------------------------------------------+--------------
 TOT  |  4647    95   118   193   102  3771   140  4248     -   110 |


 BEST CLOCK FIT: ALGO   288   0.06 (ns) 

