
 GPS week: 1135   Day: 5   MJD: 52194                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2578      2     0.01    -0.03     5.15     0.00
 cod |   288     0  23310      8     0.25    -2.19     0.09    26.98
 emr |    96     0   2576     97   -69.59    -0.39     0.12    18.67
 gfz |   288     0  13835    859    -0.22     0.89     0.10    23.05
 igu |    96     0   2482     18    -0.45     1.26     3.37     0.00
 ngs |    96     0   2578      0     0.03    -0.14     4.93     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  22803    112   847.80     6.26     0.08    31.30

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 | -4899   151    12   -34 -8280 -4529     -  -107 |
    2 |-11393    66     X  -153-23910 -9336     -    46 |
    3 | -9753    30   -17   390  -512 -9487     -  -310 |
    4 | -1620    90    44   -22 -2818 -1527     -   -70 |
    5 | -3452   -25    45    43 -4721 -2697     -   -19 |
    6 | -1780    48   -32   211  1955 -1957     -  -191 |
    7 | -2703    70    48   -68 -7888 -2661     -   -20 |
    8 |  1761   176   -11  -128 -1313  1725     -   -55 |
    9 | -3398    65   -47   155   885 -2911     -  -160 |
   10 |  -533   178    14  -167  7941  -397     -   -34 |
   11 |  7133    48   179    30  1258  6763     -   -99 |
   13 |  4785    92   310  -141   185  4842     -   -37 |
   14 |  4880    21    30   -92  1953  4552     -    44 |
   15 |  -921    49    55    81   574  -514     -  -114 |
   17 |  9766   179  -140   224  4618  8969     -  -279 |
   18 |  6654  -169     5   204  2211  6682     -    -5 |
   20 |  6344    79    83  -188   683  6304     -    54 |
   21 | -1965    18  -138    41     - -1936     -   -19 |
   22 |  8306   192   -76    15 -2273  7897     -  -162 |
   23 | -3081   181  -112   -83 -4383 -2787     -   -74 |
   24 |  4230   152   -33     X  8271  3139     -  -125 |
   25 |  -936   131   -57   137  1095  -967     -  -203 |
   26 |   395   189   -48    29  1651   398     -  -175 |
   27 | -3451   141   -80  -209  1596 -4103     -    48 |
   29 | -4432    97   -45    39   691 -4019     -  -103 |
   30 |  -947    27   -50   143 27383 -1350     -  -118 |
   31 |   737   -17    43   271 -6663   -94     -  -194 |
 -----+-------------------------------------------------+
 ALBH |     -  -106     -     -     -     -     -    91 |
 ALGO |     -    26     -   -58     -     -     -    20 |
 AMC2 |     -   -40     -     -     -     -     -    35 |
 AOML |     -    65     -     -     -     -     -   -56 |
 AREQ |     -  -118     -     -     -     -     -   102 |
 AUCK |     -   -86     -     X     -     -     -    74 |
 BAHR |     -    22     -   -57     -     -     -    23 |
 BILI |     -    26     -   -31     -     -     -     - |
 BOR1 |     -   -59     -     -     -     -     -    50 |
 BRUS |     -   -82     -     -     -     -     -    71 |
 CAS1 |     -  -128     -   -32     -     -     -   134 |
 CRO1 |     -   -96     -     -     -     -     -    83 |
 DAV1 |     -    12     -   -82     -     -     -    50 |
 DRAO |     -   -38     -  -167     -     -     -   156 |
 FAIR |     -    38     -   -30     -     -     -    -7 |
 HOB2 |     -   -33     -     -     -     -     -    29 |
 HRAO |     -  -215     -     -     -     -     -   186 |
 KARR |     -   -38     -    44     -     -     -     - |
 KERG |     -   150     -     -     -     -     -  -129 |
 KOKB |     -     -     -   739     -     -     -  -544 |
 KOSG |     -  -150     -     -     -     -     -   129 |
 KOUR |     -    29     -     -     -     -     -   -25 |
 KWJ1 |     -     -     -   -36     -     -     -    27 |
 LPGS |     -    27     -     X     -     -     -   -23 |
 MAS1 |     -    46     -   -72     -     -     -    14 |
 MATE |     -  -151     -     -     -     -     -   130 |
 MAW1 |     -  -337     -     -     -     -     -   290 |
 MCM4 |     -   198     -    64     -     -     -  -258 |
 MDO1 |     -  -172     -     -     -     -     -   148 |
 MEDI |     -  -138     -     -     -     -     -   119 |
 METS |     -  -118     -     -     -     -     -   101 |
 MKEA |     -   180     -  -334     -     -     -    90 |
 NKLG |     -     -     -   -95     -     -     -    70 |
 NLIB |     -  -105     -     -     -     -     -    90 |
 NPLD |     -  -154     -     -     -     -     -   132 |
 NRC2 |     -  -104     -     -     -     -     -    90 |
 NYA1 |     -   116     -   -39     -     -     -   -72 |
 OHIG |     -    48     -  -162     -     -     -    79 |
 ONSA |     -   -92     -     -     -     -     -    79 |
 PENC |     -   193     -     -     -     -     -  -166 |
 PERT |     -   101     -     -     -     -     -   -87 |
 PIE1 |     -  -221     -     -     -     -     -   190 |
 POTS |     -  -106     -     -     -     -     -    91 |
 REYK |     -   -77     -     -     -     -     -    66 |
 RIOG |     -   100     -   -14     -     -     -   -76 |
 SANT |     -    51     -   306     -     -     -  -296 |
 SFER |     -  -155     -     -     -     -     -   133 |
 STJO |     -   -77     -  -102     -     -     -   143 |
 SUTH |     -   -87     -     -     -     -     -    75 |
 THU1 |     -   -11     -     -     -     -     -    10 |
 TLSE |     -  -271     -     -     -     -     -   233 |
 TRO1 |     -   -94     -   110     -     -     -     - |
 USNO |     -   -33     -     -     -     -     -    29 |
 USUD |     -  -150     -     -     -     -     -   130 |
 VILL |     -    73     -     -     -     -     -   -63 |
 WES2 |     -   -23     -     -     -     -     -    19 |
 WSRT |     -   -35     -     -     -     -     -    30 |
 WTZR |     -  -111     -     -     -     -     -    95 |
 YSSK |     -    64     -   -75     -     -     -     - |
 ZWEN |     -     -     -  -356     -     -     -   262 |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  3572   116   108   110  2386  4189     -    63 |  288   2.71
    2 |  8809   140     X   117  4708  7323     -   165 |  280   4.66
    3 | 10293   106   160    55  5077 11175     -    76 |  288   8.29
    4 |  1637   106   135    83  1102  1500     -    59 |  288   0.71
    5 |  4746   129   173    88  2833  4097     -   133 |  276   3.14
    6 |  9796    63   118   204  4099  9502     -   101 |  288   9.37
    7 |  1329    81    88   122  2812  1480     -    44 |  288   1.07
    8 |  2559    81    45    52   953  2632     -    64 |  288   2.45
    9 |  3208   104    98    57  1859  3269     -    52 |  288   1.67
   10 |  3245   160    72    93  6069  3311     -    78 |  288   1.95
   11 |  1377    69    54    95  1174  1296     -    69 |  288   0.43
   13 |   855   114    81    41   572   928     -    71 |  288   0.18
   14 |  1260    39   128    69  1619  1188     -    61 |  288   0.29
   15 |  8524    67    93    75  4172  7891     -    34 |  288   4.09
   17 |  5705   323   145   305  1920  5157     -    99 |  287   2.47
   18 |   446    90   123    58  1089   557     -    48 |  288   0.34
   20 |   917    77   139    45   959   938     -    70 |  288   0.28
   21 |  6251   121    86    99     -  6443     -    53 |  288   4.10
   22 |  4892   124   117   211  3048  4963     -    93 |  277   0.43
   23 |  5903   136   275   106  3057  5845     -    46 |  288   5.53
   24 |  6470   135    70     X  3049  4918     -   119 |  288   2.95
   25 |  2831    52    67    79  4353  2846     -    57 |  288   2.67
   26 |   727    88    69    40   800   782     -    72 |  288   0.23
   27 |  9332    62    90    41  5859  8474     -    55 |  288   3.44
   29 |  1708   103    70   145   950  1852     -    40 |  288   0.77
   30 |  3929   184   160    75  7001  3806     -   109 |  276   1.74
   31 |  3930   122    76    49  3931  3108     -    71 |  288   2.74
 -----+-------------------------------------------------+--------------
 ALBH |     -    67     -     -     -     -     -    58 |  286   0.09
 ALGO |     -    65     -    29     -     -     -    48 |  288   0.06
 AMC2 |     -    90     -     -     -     -     -    78 |  286   0.02
 AOML |     -    77     -     -     -     -     -    66 |  286  20.35
 AREQ |     -    49     -     -     -     -     -    43 |  288  36.07
 AUCK |     -    88     -     X     -     -     -    75 |  288  16.55
 BAHR |     -    26     -    54     -     -     -    46 |  288   0.44
 BILI |     -    63     -    74     -     -     -     - |  287  14.24
 BOR1 |     -    25     -     -     -     -     -    21 |  286   2.58
 BRUS |     -    71     -     -     -     -     -    61 |  286   0.07
 CAS1 |     -    27     -    58     -     -     -    39 |  286  16.12
 CRO1 |     -    63     -     -     -     -     -    54 |  285   0.14
 DAV1 |     -    84     -    45     -     -     -    97 |  288  22.16
 DRAO |     -    49     -    38     -     -     -    56 |  288   0.06
 FAIR |     -   204     -   158     -     -     -   183 |  195   0.18
 HOB2 |     -    79     -     -     -     -     -    68 |  288   0.09
 HRAO |     -    71     -     -     -     -     -    61 |  268   3.36
 KARR |     -    42     -    49     -     -     -     - |  278  24.40
 KERG |     -    48     -     -     -     -     -    41 |  287   0.96
 KOKB |     -     -     -   224     -     -     -   165 |  106   0.74
 KOSG |     -    35     -     -     -     -     -    30 |  284  43.54
 KOUR |     -    42     -     -     -     -     -    36 |  287  35.19
 KWJ1 |     -     -     -   199     -     -     -   146 |  160  96.38
 LPGS |     -   183     -     X     -     -     -   158 |  265  35.76
 MAS1 |     -    44     -    35     -     -     -    24 |  288   2.70
 MATE |     -    19     -     -     -     -     -    16 |  288   0.12
 MAW1 |     -    52     -     -     -     -     -    45 |  183  32.48
 MCM4 |     -   151     -   246     -     -     -   310 |  286   8.16
 MDO1 |     -    66     -     -     -     -     -    57 |  265  25.20
 MEDI |     -    13     -     -     -     -     -    11 |  286   0.40
 METS |     -    20     -     -     -     -     -    17 |  285   0.19
 MKEA |     -    80     -    33     -     -     -    68 |  288  52.11
 NKLG |     -     -     -    33     -     -     -    24 |  222 210.40
 NLIB |     -    47     -     -     -     -     -    41 |  288   0.04
 NPLD |     -    25     -     -     -     -     -    21 |  285   0.06
 NRC2 |     -    72     -     -     -     -     -    62 |  286   0.09
 NYA1 |     -    77     -    41     -     -     -    43 |  288   0.13
 OHIG |     -    67     -    42     -     -     -    65 |  288  15.34
 ONSA |     -    28     -     -     -     -     -    24 |  288   4.51
 PENC |     -    34     -     -     -     -     -    29 |  285   3.29
 PERT |     -    30     -     -     -     -     -    26 |  288  16.29
 PIE1 |     -    61     -     -     -     -     -    53 |  288   0.04
 POTS |     -    53     -     -     -     -     -    46 |  275  13.20
 REYK |     -    69     -     -     -     -     -    59 |  283   9.05
 RIOG |     -    71     -    50     -     -     -    79 |  288  21.76
 SANT |     -   222     -   152     -     -     -   202 |  228  23.11
 SFER |     -   181     -     -     -     -     -   156 |  285  52.42
 STJO |     -    28     -    37     -     -     -    36 |  288  16.07
 SUTH |     -    47     -     -     -     -     -    41 |  283  12.80
 THU1 |     -    31     -     -     -     -     -    27 |  283  33.08
 TLSE |     -    79     -     -     -     -     -    68 |  221   0.37
 TRO1 |     -    41     -    47     -     -     -     - |  288  13.41
 USNO |     -    49     -     -     -     -     -    42 |  288   0.07
 USUD |     -    56     -     -     -     -     -    48 |  288   0.27
 VILL |     -    24     -     -     -     -     -    21 |  288  35.74
 WES2 |     -    57     -     -     -     -     -    49 |  284   0.15
 WSRT |     -    42     -     -     -     -     -    36 |  288   0.07
 WTZR |     -    24     -     -     -     -     -    21 |  288   0.18
 YSSK |     -    36     -    43     -     -     -     - |  287  27.34
 ZWEN |     -     -     -    76     -     -     -    56 |   92    >>>
 -----+-------------------------------------------------+--------------
 TOT  |  5152    93   118   105  3375  4929     -    78 |


 BEST CLOCK FIT: AMC2   286   0.02 (ns) 

