
 GPS week: 1134   Day: 5   MJD: 52187                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2671      0     0.10    -0.31     4.67     0.00
 cod |   288     0  22180      0     1.02    -2.72     0.09    38.42
 esa |   288     0  17414   1085   500.20    13.64     0.13    27.05
 igu |    96     0   2479      0     0.06    -0.25     3.78     0.00
 ngs |    96     0   2671      0     0.12    -0.32     4.49     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23618    314   802.31     8.29     0.10    34.54

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   igu   ngs   sio   usn |
 -----+-------------------------------------------+
    1 | -6873   110   -71-11239 -6930     -   -67 |
    2 | -4080  -106   161  9304 -3920     -    -1 |
    3 | -6004    12    77 -3796 -5694     -   -74 |
    4 | -3585     6   215  -730 -3390     -  -175 |
    5 | -5475   -69   262-14194 -3837     -  -119 |
    6 |  4478    53   160 10211  4176     -  -184 |
    7 |  1434   -55    57   744  1058     -    17 |
    8 |  -130    -3     4 -3729   -55     -     X |
    9 |  5060    57   126 12433  5006     -  -161 |
   10 |  4183   -65   140  7169  3686     -   -38 |
   11 |  6145    32   -84  3507  5946     -    31 |
   13 |  3328     3   131   343  3249     -  -106 |
   14 |  4733   167  -140  1028  4636     -   -74 |
   15 | -3138    54     - -2861 -3098     -   -60 |
   17 |  -371   208     X -2046  -335     -  -231 |
   18 |  3957   123  -329  4732  3888     -   122 |
   20 |  5427   -29    39  1093  5499     -     2 |
   21 |  3635   184   -79     -  2514     -  -139 |
   22 | -1278    57    85  1587  -970     -  -129 |
   23 |  2633   156    27     -  2116     -  -195 |
   24 |  3920   -53   276  5277  3848     -  -158 |
   25 | -5034   115   255 -2775 -4951     -  -328 |
   26 | -4758    31   307  2076 -4358     -  -275 |
   27 | -7767   -24    88-14701 -7343     -   -43 |
   28 |   253   -60   -59 -2432   404     -   114 |
   29 | -4636   191     1 -3311 -4574     -  -214 |
   30 |    15    47   159   106  -320     -  -174 |
   31 |  3599   -25   -71  2175  3463     -    84 |
 -----+-------------------------------------------+
 ALBH |     -  -229     X     -     -     -   255 |
 ALGO |     -    -2     X     -     -     -     2 |
 AMC2 |     -  -196     -     -     -     -   218 |
 ANKR |     -     0     0     -     -     -     - |
 AREQ |     -   -81    37     -     -     -    60 |
 AUCK |     -   -61   211     -     -     -   -98 |
 BAHR |     -    19    20     -     -     -   -35 |
 BOR1 |     -    18     -     -     -     -   -20 |
 BRMU |     -   110  -179     -     -     -    18 |
 BRUS |     -    15     -     -     -     -   -17 |
 CAS1 |     -  -217    70     -     -     -   187 |
 CRO1 |     -     -    44     -     -     -   -34 |
 DAV1 |     -   -99     -     -     -     -   110 |
 DRAO |     -  -153     -     -     -     -   170 |
 FAIR |     -     -  -159     -     -     -   125 |
 GALA |     -     -  -144     -     -     -   113 |
 GRAZ |     -   -47     -     -     -     -    52 |
 GUAM |     -     -  -797     -     -     -   624 |
 HOB2 |     -    53    46     -     -     -   -95 |
 HRAO |     -  -117     -     -     -     -   131 |
 IISC |     -     -  -164     -     -     -   128 |
 KERG |     -    55     -     -     -     -   -61 |
 KIRU |     -   149  -211     -     -     -     - |
 KOKB |     -  -317  -383     -     -     -   466 |
 KSTU |     -    -9     -     -     -     -    11 |
 LPGS |     -   106     X     -     -     -  -118 |
 MAC1 |     -   -93   -94     -     -     -   178 |
 MAS1 |     -    49   -76     -     -     -     5 |
 MATE |     -   -72     -     -     -     -    80 |
 MAW1 |     -    14     -     -     -     -   -16 |
 MCM4 |     -   -52    73     -     -     -     - |
 MDO1 |     -  -331     -     -     -     -   368 |
 MEDI |     -   -18     -     -     -     -    20 |
 METS |     -    -9     -     -     -     -    10 |
 NKLG |     -     -    84     -     -     -   -65 |
 NPLD |     -    -1     -     -     -     -     1 |
 NRC2 |     -  -131     -     -     -     -   146 |
 NTUS |     -   -54     -     -     -     -    60 |
 NYA1 |     -     6     -     -     -     -    -7 |
 NYAL |     -     -   -16     -     -     -    13 |
 OHIG |     -   -13  -203     -     -     -   174 |
 ONSA |     -   -34    -9     -     -     -    45 |
 PENC |     -   310     -     -     -     -  -345 |
 PERT |     -   -54    39     -     -     -    30 |
 PIE1 |     -  -102  -164     -     -     -   247 |
 POTS |     -    11   -21     -     -     -     4 |
 REYK |     -    10     -     -     -     -   -11 |
 RIOG |     -   -29   117     -     -     -   -60 |
 SANT |     -     -   179     -     -     -  -140 |
 STJO |     -   -96     -     -     -     -   106 |
 SUTH |     -  -337   479     -     -     -     - |
 TLSE |     -   333     -     -     -     -  -371 |
 USNO |     -   218  -607     -     -     -   232 |
 USUD |     -     -     6     -     -     -    -5 |
 VILL |     -    51   -78     -     -     -     5 |
 WES2 |     -    25     -     -     -     -   -28 |
 WSRT |     -   -41     -     -     -     -    46 |
 WTZR |     -   -55    -7     -     -     -    67 |
 WUHN |     -   -94    42     -     -     -    72 |
 YAR2 |     -   200     X     -     -     -  -223 |
 YELL |     -    45  -257     -     -     -   154 |
 ZWEN |     -     -   -13     -     -     -    10 |
 -----+-------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------+--------------
    1 |  7181   105   121  5734  5986     -   184 |  288   3.55
    2 |  7533   221   335  3710  7005     -   187 |  279   3.92
    3 |  6104    98    69  3491  5559     -   141 |  288   1.90
    4 |  1370    72    49   402  1232     -    79 |  288   0.51
    5 |  6382    69   117  5202  7430     -    58 |  283   3.86
    6 |  7510   107    57  5740  7069     -   121 |  288   7.47
    7 |  3422    95    62  3456  2889     -   128 |  288   2.54
    8 |  3500    81   115  1781  3618     -     X |  288   3.33
    9 |  4637   110    68  7521  4505     -   156 |  288   1.92
   10 |  3268    88   217  3266  3267     -   142 |  288   1.84
   11 |   904   100    75  1334   628     -   114 |  288   0.38
   13 |  1528   154   115   423  1509     -   123 |  288   0.30
   14 |   684    55    91   897   701     -   105 |  288   0.28
   15 |  6884    89     -  6469  6927     -    99 |  287   2.31
   17 |  1615    64     X  1479  1477     -    72 |  275   2.69
   18 |   518    49    62  2139   548     -    59 |  288   0.38
   20 |   916   114    68   706   959     -   120 |  287   0.26
   21 |  3426    87   110     -  3598     -    46 |  288   2.94
   22 |  2294   143   162  1267  1989     -    65 |  282   2.18
   23 |  6742    87   289     -  7171     -   202 |  288   5.59
   24 |  4764    72   136  5564  4691     -   160 |  288   3.03
   25 |  3098    29    76  1917  3122     -    46 |  288   1.94
   26 |  1959    91   148  1517  1961     -   117 |  288   0.56
   27 |  3678   135    70  4739  4163     -   153 |  288   3.24
   28 |  1476   146   145  1111  1454     -   150 |  288   0.41
   29 |  1667    62    54  2089  1819     -    61 |  288   0.94
   30 |  1874   116   220   491  1690     -    84 |  282   1.37
   31 | 11933    77   217  7360 10545     -   213 |  288   6.39
 -----+-------------------------------------------+--------------
 ALBH |     -    63     X     -     -     -    70 |  286   0.06
 ALGO |     -    25     X     -     -     -    28 |  288   0.06
 AMC2 |     -    84     -     -     -     -    94 |  286   0.06
 ANKR |     -    69    98     -     -     -     - |  286  37.73
 AREQ |     -    45    50     -     -     -    62 |  288  13.07
 AUCK |     -    65    56     -     -     -    72 |  288  17.59
 BAHR |     -    25    30     -     -     -    27 |  288   0.62
 BOR1 |     -    31     -     -     -     -    35 |  286   2.93
 BRMU |     -    42    29     -     -     -    35 |  288  38.01
 BRUS |     -    38     -     -     -     -    42 |  286   0.05
 CAS1 |     -    98    75     -     -     -    57 |  288   8.46
 CRO1 |     -     -   142     -     -     -   111 |  226   0.17
 DAV1 |     -    60     -     -     -     -    67 |  285  20.81
 DRAO |     -    25     -     -     -     -    28 |  288   0.05
 FAIR |     -     -   173     -     -     -   136 |  236   0.45
 GALA |     -     -   267     -     -     -   209 |  255  27.95
 GRAZ |     -    35     -     -     -     -    39 |  285  32.76
 GUAM |     -     -   282     -     -     -   220 |  166  22.43
 HOB2 |     -    45    63     -     -     -    30 |  288   0.08
 HRAO |     -   102     -     -     -     -   113 |  258  39.00
 IISC |     -     -   219     -     -     -   172 |  171  37.24
 KERG |     -    70     -     -     -     -    78 |  287   1.21
 KIRU |     -    36    51     -     -     -     - |  288   6.19
 KOKB |     -   311   157     -     -     -   165 |  156   0.77
 KSTU |     -    60     -     -     -     -    67 |  268  13.55
 LPGS |     -   178     X     -     -     -   198 |  195  44.84
 MAC1 |     -    50    65     -     -     -    38 |  288  15.63
 MAS1 |     -    31    56     -     -     -    39 |  288   2.51
 MATE |     -    45     -     -     -     -    50 |  288   0.11
 MAW1 |     -    44     -     -     -     -    49 |  275  29.20
 MCM4 |     -   107   153     -     -     -     - |  251  12.60
 MDO1 |     -    36     -     -     -     -    40 |  254  10.01
 MEDI |     -   219     -     -     -     -   243 |  286   0.16
 METS |     -    44     -     -     -     -    49 |  285   0.26
 NKLG |     -     -    86     -     -     -    67 |  252    >>>
 NPLD |     -   104     -     -     -     -   116 |  285   0.09
 NRC2 |     -    35     -     -     -     -    39 |  286   0.04
 NTUS |     -    36     -     -     -     -    40 |  283   6.65
 NYA1 |     -    23     -     -     -     -    26 |  286   0.06
 NYAL |     -     -    52     -     -     -    41 |  288   0.05
 OHIG |     -    68   105     -     -     -    71 |  288  23.33
 ONSA |     -    37    61     -     -     -    36 |  288   2.29
 PENC |     -    54     -     -     -     -    60 |  285   2.84
 PERT |     -    57    62     -     -     -    29 |  288  16.07
 PIE1 |     -    32    63     -     -     -    41 |  276   0.27
 POTS |     -    37    57     -     -     -    26 |  288  14.24
 REYK |     -    29     -     -     -     -    33 |  286   8.78
 RIOG |     -    33    74     -     -     -    59 |  288  17.52
 SANT |     -     -   243     -     -     -   191 |  214  33.16
 STJO |     -    20     -     -     -     -    22 |  286  35.43
 SUTH |     -   218   309     -     -     -     - |  175  46.28
 TLSE |     -    22     -     -     -     -    24 |  168   0.36
 USNO |     -    40    29     -     -     -    30 |  288   0.05
 USUD |     -     -    65     -     -     -    51 |  239   0.28
 VILL |     -    38   140     -     -     -    93 |  288  32.00
 WES2 |     -    30     -     -     -     -    33 |  284   0.12
 WSRT |     -    35     -     -     -     -    39 |  288   0.05
 WTZR |     -    58    80     -     -     -    37 |  288   0.08
 WUHN |     -    62   118     -     -     -    44 |  287  31.46
 YAR2 |     -   165     X     -     -     -   184 |  274 709.37
 YELL |     -   302   196     -     -     -   206 |  288   0.11
 ZWEN |     -     -    57     -     -     -    45 |  277  20.93
 -----+-------------------------------------------+--------------
 TOT  |  4674    93   133  3778  4487     -   104 |


 BEST CLOCK FIT: NRC2   286   0.04 (ns) 

