
 GPS week: 1134   Day: 3   MJD: 52185                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2590      0    -0.15     0.31     4.59     0.00
 cod |   288     0  19972     40    -1.09     2.07     0.08    27.31
 emr |    96     0   3748      9   780.26     9.52     0.12    18.71
 esa |   288     0  17257    137   472.20    15.59     0.12    18.52
 gfz |   288     0  14132     34    -0.67     0.99     0.10    21.71
 igu |    96     0   2302      0    -0.15     0.33     4.52     0.00
 jpl |   277     0   9931    281    -0.04     4.70     0.14    13.74
 ngs |    96     0   2590      0    -0.15     0.31     4.30     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 |  3456    99   -43   -26   -41 12515  -311  3098     - |
    2 | -5343    60  -176   169  -194 -2443    36 -5004     - |
    3 | -4139  -173  -117   -75   372 -2443  -333 -3713     - |
    4 | -5084    11  -171   -26    92 -2395   -78 -4832     - |
    5 | -4013   -62   -23    76  -116 -1704   310 -3650     - |
    7 |  2359   141    76   -56   -91 -8867  -357  2224     - |
    8 | -2618    86  -165     6   -52  2920   -29 -2612     - |
    9 | -1682    16  -165   117    -9 -3557  -397 -1390     - |
   10 |  -710   153     7   -82  -242 -3199   264  -825     - |
   11 |  5963   -48     1     7   -48  -208   231  5445     - |
   13 |  4125   -15    69   -99   183  2154  -616  4259     - |
   14 |  2897    57    36   -25    -8  1701  -327  2877     - |
   15 | -3828   -73    -7     -   118 -2356  -151 -2983     - |
   17 |  4236  -148   -97     X   170     -    97  4352     - |
   18 | -2414  -122    94   -50    79 -7133   205 -2356     - |
   20 |  4053   -33    14  -121   -18 -1112   360  4072     - |
   21 |  7787   -34     4   -20   -51     -   247  5933     - |
   22 |  2489  -106  -120    79   107 14446    -3  2608     - |
   23 |   336    10    84   122  -103     -  -245   913     - |
   24 |  1174   100   -59     0   -45  9241  -408   584     - |
   25 | -4809   -91  -221   -47   179 -2097    89 -4658     - |
   26 | -4384    -6  -208   227   -59 -1408  -418 -4130     - |
   27 |  -461    11   -60    33    84  9181  -244   429     - |
   28 |  5568   130    28   -43  -104  7135  -189  5246     - |
   29 |  1340   -72  -345    76   194  5007  -431   972     - |
   30 | -2183  -167   -54    83   193-18407   -80 -2179     - |
   31 | -4251  -110    -3    40    67 -7038    87 -4797     - |
 -----+-------------------------------------------------------+
 ALBH |     -  -340     -   416     -     -   119     -     - |
 ALGO |     -   345   379 -1088   255     -   214     -     - |
 AMC2 |     -    76     -     -     -     -  -151     -     - |
 ANKR |     -    -8     -    12     -     -     -     -     - |
 AREQ |     -   -16     -    23     -     -     -     -     - |
 BAHR |     -    10    82    30   -25     -   -61     -     - |
 BRMU |     -   124     -  -183     2     -     -     -     - |
 BRUS |     -    18     -     -     -     -   -35     -     - |
 CAS1 |     -  -263     -   447  -128     -    68     -     - |
 CRO1 |     -   -18     -    45     -     -   -27     -     - |
 DAV1 |     -    19     -     -   -24     -     -     -     - |
 DRAO |     -   -61    89     -     -     -     -     -     - |
 FAIR |     -     -    39   -25     -     -    22     -     - |
 GALA |     -   -79     -     -    35     -   106     -     - |
 GUAM |     -  -195     -   325    57     -  -170     -     - |
 HOB2 |     -   124     -  -182     -     -     -     -     - |
 HRAO |     -    82     -     -     -     -  -163     -     - |
 KIRU |     -    47     -   -69     -     -     -     -     - |
 KOKB |     -     -     -     7    -6     -     X     -     - |
 KOSG |     -   -48     -    71     -     -     -     -     - |
 KSTU |     -    11     -     -     -     -   -22     -     - |
 LPGS |     -   532     -   -72 -1075     -   566     -     - |
 MAC1 |     -    57     -     9   -79     -     -     -     - |
 MALI |     -   -60     -  -199   244     -     -     -     - |
 MAS1 |     -    -1    67   -39    16     -     -     -     - |
 MCM4 |     -    29     -   -44     2     -     -     -     - |
 MDO1 |     -   -39    57     -     -     -     -     -     - |
 MKEA |     -    22   175   -92     -     -     -     -     - |
 NKLG |     -     -     -    20   -17     -     -     -     - |
 NRC2 |     -   -23    95     -     -     -     3     -     - |
 NYA1 |     -    37     -     -   -27     -   -33     -     - |
 OHIG |     -   -92     -    72   -29     -   136     -     - |
 ONSA |     -   -38     -    57     -     -     -     -     - |
 PERT |     -    -1     -     2     -     -     -     -     - |
 PIE1 |     -  -142     -   209     -     -     -     -     - |
 POTS |     -     0     -   -52    45     -     -     -     - |
 RIOG |     -   -85     -    75    43     -     -     -     - |
 SANT |     -  -101     -   -95   144     -     -     -     - |
 STJO |     -   -45   149     -    14     -     -     -     - |
 TSKB |     -   142   108  -245     -     -     -     -     - |
 USNO |     -   113   217  -312     -     -   101     -     - |
 USUD |     -   -46     -    68     -     -     -     -     - |
 VILL |     -    45    40   -79     -     -     -     -     - |
 WHIT |     -     0     -     -     0     -     -     -     - |
 WSRT |     -    19     -     -     -     -   -37     -     - |
 WTZR |     -   -25     -    26     -     -    17     -     - |
 WUHN |     -     -     -   121    63     -  -279     -     - |
 YELL |     -    64   106   -67     -     -   -73     -     - |
 YSSK |     -    26     -     -     -     -   -52     -     - |
 ZWEN |     -     -     -   462  -395     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5281    61    70   186   150  7353   259  4766     - |  288   3.59
    2 |  9229    73   128    98   133  6920   154  7566     - |  271   3.07
    3 |  3106    74    78    66   132  1696   244  3260     - |  288   1.65
    4 |  1260    47    81   126    95  1491   145  1247     - |  288   0.99
    5 |  2848   114    77   253    68  3094   119  2773     - |  284   3.22
    7 |  3161    61   103   118    56  2598   258  3230     - |  288   1.24
    8 |  2930    85    66    64    93  1038   143  2919     - |  288   2.63
    9 |  2149    55    84    94   100  2911   247  2137     - |  288   1.18
   10 |  2364    95   176    91   113  2298   141  2445     - |  288   2.12
   11 |  2295    90   140   112   145   523   198  2171     - |  288   0.35
   13 |   877    77   177   146    79   944   224   846     - |  288   0.27
   14 |  1083    74   113    57    99   722   248  1155     - |  288   0.20
   15 |  7517    76    85     -    80  4924   257  6996     - |  288   5.39
   17 |  1708   111    98     X   114     -   152  1611     - |  288   3.21
   18 |  6514    92   121    95    84  6840   125  6653     - |  288   1.20
   20 |  1579   128    68    75   302  1049   226  1442     - |  288   0.24
   21 |  8528   179   358    75   109     -   121  8128     - |  288   3.34
   22 |  3525    73    99   153   107  8291   294  3397     - |  283   1.38
   23 |  5131    81   122   215   105     -   321  4363     - |  288   5.09
   24 |  4922    77   331    82    69  2496   242  5355     - |  288   2.19
   25 |  2862    47   120    66    63  2014   166  2772     - |  288   2.73
   26 |  1156    53    94   214   185  1427   245   924     - |  288   0.65
   27 | 10882    60    73    68   116 10449   141 10190     - |  288   2.28
   28 |  1640   102    56   135    75  3336   271  1528     - |  288   0.40
   29 |  3101    71    86    57    77  2249   244  2865     - |  288   1.33
   30 |   855    85    77    58    80  7968   135   842     - |  288   1.33
   31 |  5072    56    89    61    88  3730   127  4657     - |  288   2.11
 -----+-------------------------------------------------------+--------------
 ALBH |     -   157     -   350     -     -   184     -     - |  287   0.21
 ALGO |     -    34    54    61    65     -    76     -     - |  288   0.07
 AMC2 |     -    24     -     -     -     -    47     -     - |  277   0.16
 ANKR |     -    13     -    19     -     -     -     -     - |  288  32.42
 AREQ |     -    35     -    51     -     -     -     -     - |  286  27.35
 BAHR |     -    71    44    56    97     -    98     -     - |  288   0.60
 BRMU |     -    39     -    55    71     -     -     -     - |  288  40.46
 BRUS |     -    46     -     -     -     -    91     -     - |  275   0.11
 CAS1 |     -    85     -   147   135     -   155     -     - |  284  11.24
 CRO1 |     -    42     -    30     -     -    71     -     - |  288   0.23
 DAV1 |     -    37     -     -    47     -     -     -     - |  288  19.87
 DRAO |     -    30    43     -     -     -     -     -     - |   96   0.11
 FAIR |     -     -   133    85     -     -   119     -     - |  248   0.64
 GALA |     -    33     -     -    46     -   116     -     - |  288  34.51
 GUAM |     -    42     -   103    72     -   101     -     - |  288  25.44
 HOB2 |     -    42     -    63     -     -     -     -     - |  288   0.08
 HRAO |     -    61     -     -     -     -   121     -     - |  275  44.71
 KIRU |     -    82     -   121     -     -     -     -     - |  278   3.77
 KOKB |     -     -     -    76    65     -     X     -     - |  267   0.70
 KOSG |     -    30     -    44     -     -     -     -     - |  288  20.62
 KSTU |     -    32     -     -     -     -    64     -     - |  258  16.04
 LPGS |     -   138     -   142   122     -   137     -     - |  272  29.42
 MAC1 |     -   116     -   176    51     -     -     -     - |  288  15.48
 MALI |     -    63     -    55    54     -     -     -     - |  288  66.21
 MAS1 |     -    41    45    44    41     -     -     -     - |  288   1.97
 MCM4 |     -   226     -   363   109     -     -     -     - |  281    >>>
 MDO1 |     -    37    54     -     -     -     -     -     - |   95  11.79
 MKEA |     -    72    50    98     -     -     -     -     - |  282  66.39
 NKLG |     -     -     -    33    28     -     -     -     - |  178 570.27
 NRC2 |     -    35    57     -     -     -    64     -     - |  287   0.13
 NYA1 |     -    46     -     -    63     -    87     -     - |  288   0.46
 OHIG |     -    41     -    83    32     -    94     -     - |  288  14.66
 ONSA |     -    40     -    59     -     -     -     -     - |  288   2.18
 PERT |     -    27     -    40     -     -     -     -     - |  288  17.33
 PIE1 |     -    29     -    43     -     -     -     -     - |  288   1.14
 POTS |     -    83     -    68    91     -     -     -     - |  277  12.75
 RIOG |     -    43     -    76    32     -     -     -     - |  288  14.51
 SANT |     -   308     -   143   194     -     -     -     - |  278  30.22
 STJO |     -    60    44     -    69     -     -     -     - |  288  18.86
 TSKB |     -    96    34   140     -     -     -     -     - |  285   1.50
 USNO |     -    25    49    28     -     -    67     -     - |  288   0.10
 USUD |     -    73     -   108     -     -     -     -     - |  288   0.26
 VILL |     -    34    28    45     -     -     -     -     - |  288  29.47
 WHIT |     -    19     -     -    24     -     -     -     - |  285  12.74
 WSRT |     -    43     -     -     -     -    86     -     - |  275   0.10
 WTZR |     -    54     -    57     -     -    89     -     - |  288   0.15
 WUHN |     -     -     -    71    86     -   140     -     - |  269    >>>
 YELL |     -   139   129   141     -     -   153     -     - |  286   0.07
 YSSK |     -    26     -     -     -     -    52     -     - |  275  13.88
 ZWEN |     -     -     -    45    38     -     -     -     - |  288  24.15
 -----+-------------------------------------------------------+--------------
 TOT  |  4586    81   117   121   103  4519   141  4297     - |


 BEST CLOCK FIT: ALGO   288   0.07 (ns) 

