
 GPS week: 1134   Day: 2   MJD: 52184                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2682      0     0.19    -0.30     3.99     0.00
 cod |   288     0  24049    435    -0.01    -3.15     0.08    27.02
 emr |    96     0   2680    112   771.03    10.39     0.14    13.89
 esa |   288     8  15775    242148801.27  -324.46  3085.59     0.00
 gfz |   288     0  14301    550     0.03    -0.57     0.11    20.62
 igu |    96     0   2298      6     0.07    -0.12     4.51     0.00
 jpl |   278     0  10596   2309    -1.60     6.90     0.17     7.97
 ngs |    96     0   2682      0     0.18    -0.29     3.76     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24794    249   770.73    11.00     0.07    30.49

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -3718   152     3   214    82 -9696     X -3406     -  -191 |
    2 | -3126   -15   -50******   -84 -7753   476 -2401     -    -3 |
    3 |   121   -25    11  -143   231  3550     X  -716     -  -135 |
    4 |  -188   113    37   -51   275   -69   270  -660     -  -337 |
    5 | -2704    99    52******  -103 -3846     X -2458     -   -27 |
    6 | -5484    -4   -91   139   151 -6784   496 -4399     -  -167 |
    7 |  1234   -29    71   -33    95  6798     X  1907     -   -50 |
    8 | -1452   221     7   168  -636  2788   434 -1845     -   160 |
    9 |  2638   205  -208   322   -17  3009     X  2446     -  -139 |
   10 |  5371    28    48    95   -39 10832   617  4569     -  -109 |
   11 |  6783    52    85   271   -56  3845     X  6657     -   -21 |
   13 |  4558   119   294   175   102  1190     X  4530     -  -220 |
   14 |  4271   162   -28  -154  -152  1773   336  4350     -   -92 |
   15 | -4249    76   155     -  -158 -8406     X -3765     -    16 |
   17 |  -914    54   -40     X   -44     -   540  -875     -   -98 |
   18 |  5276  -109    91  -257  -261  3573   428  5329     -   188 |
   20 |  4955    25    54    18   -42  4765   560  4781     -   -96 |
   21 |  3157     -     X   245  -113 18906     X  2182     -    76 |
   22 | -8367   103  -206******   293 -8356     X -7977     -  -256 |
   23 |  2837   175    92   346  -131     -     X  2751     -   -79 |
   24 | -6224    58   -22   345   181 -4311   395 -5686     -  -237 |
   25 | -6912   174  -281  -187   227 -7376     X -6141     -  -266 |
   26 | -1965    83   -12   301    39  6345   437 -1998     -  -171 |
   27 | -4452   -35  -193   136   396     -   -30 -4117     -  -201 |
   28 | -2053     7   131  -182   -62 -4346     X -1328     -    15 |
   29 |  1562   298  -137    -5   -34  6708     X  1085     -  -220 |
   30 |  2224    99    21   212    22-13957   376  1420     -  -169 |
   31 |  6468   -45    10    18   122     -   287  5430     -   -93 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -213     -  -284     -     -    75     -     -   171 |
 ALGO |     -    54     -  -197  -126     -  -139     -     -    72 |
 AMC2 |     -    11     -     -     -     -  -342     -     -    77 |
 AOML |     -   -31     -     -     -     -     -     -     -    28 |
 AREQ |     -  -114     -   170     -     -     -     -     -   101 |
 AUCK |     -    66     -    32     -     -     -     -     -   -59 |
 BAHR |     -    -9     -   -90  -104     -   122     -     -    48 |
 BILI |     -  -344     -     -   451     -     -     -     -     - |
 BOR1 |     -    13     -     -     -     -     -     -     -   -11 |
 BRMU |     -   192     -528762  -176     -     -     -     -   -48 |
 BRUS |     -   -43     -     -     -     -    51     -     -    26 |
 CAS1 |     -   -37     -   244  -101     -   159     -     -    62 |
 CRO1 |     -  -134     -   311     -     -  -196     -     -   167 |
 DAEJ |     - -1031     -     -     -     -     -     -     -   914 |
 DAV1 |     -    43     -     -  -182     -     -     -     -    85 |
 DRAO |     -   -20     -     -     -     -     -     -     -    18 |
 FAIR |     -     -     -******     -     -   -64     -     -    17 |
 GALA |     -     X     -     -  -117     -     X     -     -    79 |
 GUAM |     -   -17     -   154   -98     -   -94     -     -   105 |
 HOB2 |     -    81     -******   -51     -     -     -     -   -37 |
 HRAO |     -    17     -     -     -     -  -330     -     -    71 |
 IISC |     -    47     -******     -     -     -     -     -   -42 |
 KERG |     -   239     -     -     -     -     X     -     -  -212 |
 KOKB |     -     -     -******   374     -     X     -     -  -253 |
 KSTU |     -   -32     -     -     -     -     -     -     -    28 |
 LPGS |     -   -24     -******     X     -   152     -     -   -16 |
 MAC1 |     -   -82     -    28  -251     -     -     -     -   248 |
 MAS1 |     -   -28     -   230   -86     -     -     -     -    83 |
 MATE |     -   -82     -     -     -     -     X     -     -    72 |
 MAW1 |     -    41     -     -     -     -     -     -     -   -36 |
 MCM4 |     -   215     -******  -282     -     -     -     -     X |
 MEDI |     -  -184     -     -     -     -     -     -     -   163 |
 METS |     -   199     -     -     -     -     -     -     -  -177 |
 NLIB |     -    -4     -     -     -     -     -     -     -     3 |
 NPLD |     -   -90     -     -     -     -     -     -     -    80 |
 NRC2 |     -   -20     -     -     -     -    -3     -     -    19 |
 NTUS |     -   -54     -     -     -     -     -     -     -    48 |
 NYA1 |     -    16     -     -  -151     -    76     -     -    69 |
 OHIG |     -  -134     -549868   -93     -   115     -     -   140 |
 ONSA |     -   -94     -   -59     -     -     -     -     -    84 |
 PERT |     -    78     -    -9     -     -     -     -     -   -69 |
 PIE1 |     -  -250     -673073     -     -     -     -     -   221 |
 POTS |     -   -62     -******     -     -     -     -     -    55 |
 REYK |     -   -38     -     -     -     -     -     -     -    34 |
 RIOG |     -  -108     -******   184     -     -     -     -   -29 |
 SANT |     -     X     -******   294     -     -     -     -  -199 |
 SFER |     -  -356     -     -     -     -     -     -     -   315 |
 STJO |     -   -88     -     -   -53     -     -     -     -   115 |
 THTI |     -     -     -     -     -     -  -128     -     -    33 |
 THU1 |     -   101     -     -     -     -     -     -     -   -89 |
 TLSE |     -  -109     -     -     -     -     -     -     -    97 |
 TRO1 |     -   -25     -     -    33     -     -     -     -     - |
 TSKB |     -    32     -******     -     -     -     -     -   -28 |
 USNO |     -    32     -  -384     -     -   -40     -     -   -18 |
 USUD |     -     3     -******     -     -     -     -     -    -3 |
 VILL |     -   -80     -******     -     -     -     -     -    71 |
 WES2 |     -    28     -     -     -     -     -     -     -   -24 |
 WHIT |     -    69     -     -   -90     -     -     -     -     - |
 WSRT |     -   -55     -     -     -     -   -46     -     -    61 |
 WTZR |     -   -85     -    98     -     -    -4     -     -    76 |
 WUHN |     -    67     -******     X     -    24     -     -   -64 |
 YAR2 |     -     -     -     X     -     -   -50     -     -    13 |
 YELL |     -    82     -******     -     -  -154     -     -   -34 |
 ZWEN |     -     -     -     -   397     -     -     -     -  -269 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3972    80    80673049    88  5461     X  3556     -    52 |  288   2.54
    2 |  5247   232   122******    91  4639   294  4747     -   184 |  277   2.59
    3 |  6336    61   195673012   132  2128     X  5683     -    43 |  288   2.50
    4 |  2559    57   117673037    71   879   233  2592     -    54 |  288   0.99
    5 |  7367    98    77******    68 15545     X  6245     -    62 |  283   2.69
    6 |  5914    65    89673023    47  2289   224  5683     -    41 |  288   6.31
    7 |  7350    86   104673034    52  4207     X  6938     -    71 |  288   2.25
    8 |  3061    74    76673040    69  1540   245  2534     -    47 |  288   2.34
    9 |  4094    46   104673048   108  3775     X  3889     -    53 |  288   2.40
   10 |  5664    96   101673049   113  2855   229  5183     -    53 |  288   2.69
   11 |  1257    95   120673041   196  2302     X  1071     -    81 |  288   0.30
   13 |   677    52    79673021    60  1064     X   606     -    40 |  288   0.20
   14 |   889    59   220673001    88  1013   235   825     -    60 |  288   0.22
   15 |  3245   149   124     -   274  3155     X  3450     -    60 |  288   3.05
   17 |  1705   100   239     X   133     -   201  1438     -    44 |  288   2.63
   18 |  1424   119   124673006   116  2097   244  1197     -    52 |  288   0.32
   20 |  1788    87    95673049    87  2640   222  1616     -    57 |  288   0.27
   21 |  5457     -     X673378   119  6642     X  5286     -    81 |  288   2.67
   22 |  2176   101   244******    72  4286     X  2301     -    84 |  283   1.42
   23 |  5782    90   137673021    62     -     X  5985     -    57 |  288   6.20
   24 |  3267    93   166673035   176  1405   240  3772     -    56 |  288   2.39
   25 |  2901    56   100672991   116  3175     X  2640     -    75 |  288   1.96
   26 |   948    82   183673063   173  2428   241   882     -    71 |  288   0.67
   27 |  3970    60   159673050   193     -   265  4138     -   119 |  288   3.07
   28 |  3726    70    45673027   101  1011     X  3930     -    43 |  288   0.47
   29 |  1558    63   108672983    34  3394     X  1643     -    53 |  288   0.70
   30 |  2628   163    90673059    99  6549   236  2607     -    72 |  288   1.30
   31 |  3435    60   119673036   133     -   227  2363     -    62 |  288   3.14
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    29     -673022     -     -   104     -     -    24 |  288   0.08
 ALGO |     -    44     -673018    75     -   113     -     -    18 |  288   0.05
 AMC2 |     -    25     -     -     -     -   100     -     -    25 |  288   0.08
 AOML |     -    16     -     -     -     -     -     -     -    14 |  283  25.50
 AREQ |     -    30     -673013     -     -     -     -     -    26 |  288  23.72
 AUCK |     -    94     -673022     -     -     -     -     -    83 |  288  17.98
 BAHR |     -    47     -673014    56     -   116     -     -    43 |  288   0.29
 BILI |     -    31     -     -    41     -     -     -     -     - |  285  10.22
 BOR1 |     -    51     -     -     -     -     -     -     -    45 |  286   4.49
 BRMU |     -    47     -155680    63     -     -     -     -    42 |  287  40.67
 BRUS |     -    59     -     -     -     -   110     -     -    52 |  288   0.08
 CAS1 |     -    51     -673017    94     -   119     -     -    28 |  288   8.87
 CRO1 |     -    37     -673015     -     -   128     -     -    26 |  288   0.29
 DAEJ |     -    36     -     -     -     -     -     -     -    32 |  283   2.99
 DAV1 |     -    99     -     -    54     -     -     -     -    69 |  288  20.47
 DRAO |     -    29     -     -     -     -     -     -     -    25 |  288   0.07
 FAIR |     -     -     -******     -     -   103     -     -    27 |  259   0.88
 GALA |     -     X     -     -    92     -     X     -     -    62 |  286  29.31
 GUAM |     -    42     -673038    60     -   132     -     -    53 |  288  27.96
 HOB2 |     -    30     -******    45     -     -     -     -    47 |  287   0.12
 HRAO |     -   152     -     -     -     -   140     -     -   125 |  284  45.63
 IISC |     -    32     -******     -     -     -     -     -    28 |  239  28.07
 KERG |     -    72     -     -     -     -     X     -     -    64 |  285   2.12
 KOKB |     -     -     -******   141     -     X     -     -    95 |  210   0.46
 KSTU |     -    40     -     -     -     -     -     -     -    36 |  286  14.16
 LPGS |     -    72     -******     X     -   172     -     -    67 |  273  30.14
 MAC1 |     -    90     -673031    87     -     -     -     -    84 |  288  15.50
 MAS1 |     -    28     -673024    54     -     -     -     -    31 |  288   1.76
 MATE |     -    42     -     -     -     -     X     -     -    38 |  288   0.18
 MAW1 |     -    57     -     -     -     -     -     -     -    50 |  279  28.53
 MCM4 |     -    86     -******   113     -     -     -     -     X |  249  29.96
 MEDI |     -    33     -     -     -     -     -     -     -    29 |  286   0.10
 METS |     -    23     -     -     -     -     -     -     -    20 |  230   1.09
 NLIB |     -   295     -     -     -     -     -     -     -   262 |  287 923.21
 NPLD |     -    45     -     -     -     -     -     -     -    40 |  285   0.06
 NRC2 |     -    50     -     -     -     -   124     -     -    61 |  286   0.09
 NTUS |     -    61     -     -     -     -     -     -     -    54 |  284   6.79
 NYA1 |     -    50     -     -    58     -   110     -     -    48 |  288   0.61
 OHIG |     -    66     -138102    62     -   106     -     -    42 |  287  15.08
 ONSA |     -    66     -673030     -     -     -     -     -    58 |  288   3.71
 PERT |     -    46     -673026     -     -     -     -     -    41 |  288  13.79
 PIE1 |     -    28     - 63521     -     -     -     -     -    25 |  226  12.92
 POTS |     -    64     -384831     -     -     -     -     -    56 |  286  12.16
 REYK |     -   116     -     -     -     -     -     -     -   103 |  280   8.76
 RIOG |     -    58     -******    64     -     -     -     -    89 |  282  19.09
 SANT |     -     X     -******   173     -     -     -     -   117 |  218  32.89
 SFER |     -    49     -     -     -     -     -     -     -    44 |  285   1.58
 STJO |     -    71     -     -    54     -     -     -     -    55 |  288  23.32
 THTI |     -     -     -     -     -     -    97     -     -    25 |  268   2.75
 THU1 |     -   199     -     -     -     -     -     -     -   176 |  216  29.56
 TLSE |     -    79     -     -     -     -     -     -     -    70 |  223   0.31
 TRO1 |     -    26     -     -    34     -     -     -     -     - |  288  12.49
 TSKB |     -    46     -******     -     -     -     -     -    41 |  283   1.58
 USNO |     -    32     -673019     -     -    99     -     -    33 |  288   0.08
 USUD |     -    41     -384861     -     -     -     -     -    36 |  286   0.27
 VILL |     -    63     -384836     -     -     -     -     -    56 |  286  28.43
 WES2 |     -   105     -     -     -     -     -     -     -    93 |  280   0.08
 WHIT |     -    35     -     -    45     -     -     -     -     - |  288  12.96
 WSRT |     -    44     -     -     -     -   110     -     -    40 |  288   0.07
 WTZR |     -    48     -673018     -     -   113     -     -    37 |  288   0.20
 WUHN |     -    46     -443500     X     -   139     -     -    24 |  287  32.02
 YAR2 |     -     -     -     X     -     -   108     -     -    28 |  267   6.06
 YELL |     -   155     -******     -     -   146     -     -   153 |  275   0.12
 ZWEN |     -     -     -     -    36     -     -     -     -    24 |  186  22.93
 -----+-------------------------------------------------------------+--------------
 TOT  |  3992    83   135******   105  4515   165  3762     -    69 |


 BEST CLOCK FIT: ALGO   288   0.05 (ns) 

