
 GPS week: 1134   Day: 0   MJD: 52182                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2685      0     0.04    -0.09     4.78     0.00
 cod |   288     0  20577     73    -3.24     0.83     0.09    24.78
 emr |    96     0   3690    303   428.18    13.88     0.14    14.69
 esa |   288     0  17451    667   424.58    13.91     0.12    17.24
 gfz |   288     0  14767      0    -0.70     0.84     0.07    30.47
 igu |    96     0   2493      0     0.05    -0.12     4.09     0.00
 ngs |    96     0   2685      0     0.04    -0.10     4.75     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  17446   1826   756.75     8.08     0.16    12.82

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  3268   -25   -73    17    21 10083  2033     -     X |
    2 | -1760    -5   -40   156  -110 -8568 -1161     -    79 |
    3 | -3273   -98  -117   192    71 -1459 -3772     -  -193 |
    4 | -3331    59  -288   -37   147 -4052 -3193     -  -313 |
    5 |  1785   -17     X    62    75 -1500  1952     -  -285 |
    6 | -5759    40  -124   -27   101 -3193 -4899     -  -235 |
    7 | -1724   151   -41  -128   -71 -3537 -1963     -    66 |
    8 |  1352   124  -115   -13   -96  1249  1816     -    56 |
    9 | -3103   129   -92   143   -78 -1433 -2395     -  -226 |
   10 |  3958   199   -93    17  -153  3451  3544     -     X |
   11 |  2033   -68   151   111   -70  -370  2178     -    90 |
   13 |  3020    40    38   -65    16   -87  3350     -   -42 |
   14 |  4274    34     X   -16   -18   768  4153     -     X |
   15 |  2632   130    -3     -  -107  4075  2498     -     5 |
   17 | -3974   183   -78     X   -66 -2710 -3857     -  -164 |
   18 |  2028   172   130  -245   -65   833  2119     -    99 |
   20 |  4966  -191    53    16    91   764  4820     -   112 |
   21 |  1428   104    -9     X   -68     -  1255     -   -31 |
   22 |-10960   -17   -43   172   -59-11227-10306     -   -43 |
   23 |  2412   110   -64   364  -285     -  1707     -     X |
   24 | -4947    43     X    12   -40   879 -4795     -     X |
   25 |  -948  -230  -104   158   158 -2127  -983     -  -129 |
   26 | -3966   -13  -178   421   -77 -2521 -3706     -  -289 |
   27 |  6566   -58  -192    82    35 11388  6336     -    -9 |
   28 |  7940    91   127   -68  -133  2192  7565     -   183 |
   29 |  -792    22  -194   149   -40 10980  -679     -   -72 |
   30 |  2463   -83    33    17   163 -5074  1762     -  -261 |
   31 | -5768  -122   -80    80   161  1212 -5563     -  -237 |
 -----+-------------------------------------------------------+
 ALBH |     -   129     -  -185     -     -     -     -     - |
 ALGO |     -    38   140     X   -83     -     -     -    70 |
 AMC2 |     -   -53     -     -     -     -     -     -   103 |
 ANKR |     -   -91     -   131     -     -     -     -     - |
 AOML |     -    32     -     -     -     -     -     -   -61 |
 AREQ |     -   -80     -   -28   -11     -     -     -   219 |
 AUCK |     -  -369     -  -180   437     -     -     -  -150 |
 BILI |     -    89     -     -   -72     -     -     -     - |
 BRMU |     -    64     -   -39   -16     -     -     -   -32 |
 BRUS |     -    -3     -     -     -     -     -     -     5 |
 CRO1 |     -  -111     -   159     -     -     -     -     - |
 DRAO |     -  -111    16     -     -     -     -     -   209 |
 FAIR |     -     -     7  -112     -     -     -     -   148 |
 GALA |     -   273     -  -229   -44     -     -     -     - |
 GRAZ |     -   -24     -     -     -     -     -     -    46 |
 GUAM |     -  -225     -   174   -48     -     -     -   297 |
 HRAO |     -  -134     -     -     -     -     -     -   259 |
 IISC |     -   -75     -     7     -     -     -     -    76 |
 KIRU |     -   246     -  -353     -     -     -     -     - |
 KOKB |     -     -     -   -54    31     -     -     -     X |
 KOSG |     -   -91     -    36     -     -     -     -   127 |
 KOUR |     -    90     -  -139     -     -     -     -    13 |
 LPGS |     -   241     -  -346     -     -     -     -     - |
 MALI |     -  -184     -  -130   172     -     -     -    93 |
 MAS1 |     -    73   111    29   -91     -     -     -    -7 |
 MCM4 |     -    16     -   -61    64     -     -     -  -107 |
 MKEA |     -     -   402   -44   -40     -     -     -     - |
 NRC2 |     -   175   299  -336     -     -     -     -     - |
 NTUS |     -  -112     -     -     -     -     -     -   216 |
 NYA1 |     -    38     -     -   -31     -     -     -     - |
 NYAL |     -     -    27     -     -     -     -     -   -31 |
 OHIG |     -  -109     -   -66    78     -     -     -   110 |
 PENC |     -    78     -     -     -     -     -     -  -151 |
 PERT |     -    22     -    10   -22     -     -     -     - |
 PIE1 |     -    13     -   -18     -     -     -     -     - |
 POTS |     -   -64     -    16     -     -     -     -   102 |
 RIOG |     -   -99     -    25    66     -     -     -     - |
 SANT |     -     -     -    -1    78     -     -     -  -225 |
 SELE |     -   107     -  -154     -     -     -     -     - |
 STJO |     -    -3   166     -   -24     -     -     -     - |
 TIXI |     -  -589     -     -   479     -     -     -     - |
 TLSE |     -   -63     -     -     -     -     -     -   122 |
 TRO1 |     -   376     -     -  -306     -     -     -     - |
 TROM |     -     -     -    87     -     -     -     -  -117 |
 TSKB |     -   231   -33   -78  -110     -     -     -     - |
 USUD |     -  -215     -   112     -     -     -     -   265 |
 VILL |     -   -18    17    21     -     -     -     -     - |
 WES2 |     -    61     -     -     -     -     -     -  -117 |
 WHIT |     -   -23     -     -    19     -     -     -     - |
 WTZR |     -   -49     -    -4     -     -     -     -   100 |
 WUHN |     -   108     -    49  -170     -     -     -   130 |
 YAR2 |     -   -72     -   188     -     -     -     -  -123 |
 YELL |     -    35   217  -236     -     -     -     -   177 |
 ZWEN |     -     -     -     -    25     -     -     -   -60 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  2976    97   123   125   121  5141  2252     -     X |  288   2.41
    2 |  5347    97    88   128    68  2880  4881     -   204 |  288   3.30
    3 |  4567   108   134    99    43  2472  4338     -    98 |  288   2.03
    4 |  1373    73   330   147    58  2941  1546     -    54 |  288   1.14
    5 |  2166   112     X    71    71  2878  2368     -   253 |  288   2.23
    6 |  7911    56    51   128    70  4763  8321     -    55 |  288   7.02
    7 |  2640   146   168   279    78  2237  2537     -   279 |  288   0.67
    8 |  5514    77    97    89    89  2901  5327     -   254 |  288   2.82
    9 |  7375   117   105    82    69  3654  7336     -   220 |  288   2.37
   10 |  2091    88   316   193   141  2113  2126     -     X |  288   1.51
   11 |   811    86   153   151    69   634   825     -   248 |  288   0.48
   13 |   946   131   109   113    39   511  1023     -   332 |  288   0.17
   14 |   856    57     X    61    42   749   768     -     X |  288   0.23
   15 |  6641    92    63     -    58  6844  6510     -    79 |  288   2.13
   17 |  5709   110   212     X    64  1076  5487     -    98 |  288   2.79
   18 |   725   115   206   156   107   733   666     -   179 |  288   0.36
   20 |   847   135    73    92   114   704   719     -   117 |  288   0.34
   21 |  5038   140    99     X    77     -  4183     -    79 |  288   2.83
   22 |  4125   175   120    58   146  6818  4369     -    84 |  288   1.27
   23 |  8310   135   243   173    54     -  7845     -     X |  288   4.60
   24 |  2734    86     X    45    62  2653  2695     -     X |  285   1.82
   25 |  3972    62   112   136   111  3219  3982     -   106 |  288   3.19
   26 |   865    87    70    62    83  2085   752     -   253 |  288   0.68
   27 | 10362   102   162   108   112  9129 10998     -   243 |  288   7.13
   28 |  2326    95   120   116    43   593  2544     -   205 |  288   0.23
   29 |  3819    79    83   139   116  6197  3761     -   168 |  288   1.40
   30 |  4210    65   185    74    68  4202  3875     -   195 |  288   1.46
   31 |  7860   171   225   226    36  8278  8103     -    79 |  288   3.43
 -----+-------------------------------------------------------+--------------
 ALBH |     -   183     -   263     -     -     -     -     - |  229   0.12
 ALGO |     -    77    41     X    41     -     -     -    70 |  288   0.02
 AMC2 |     -    41     -     -     -     -     -     -    78 |  286   0.07
 ANKR |     -    73     -   105     -     -     -     -     - |  288  26.27
 AOML |     -    42     -     -     -     -     -     -    82 |  288  23.79
 AREQ |     -    53     -    58    38     -     -     -    87 |  288  25.29
 AUCK |     -    72     -   122    76     -     -     -    66 |  288  18.48
 BILI |     -    71     -     -    58     -     -     -     - |  287  12.40
 BRMU |     -    45     -   119    29     -     -     -    76 |  288  31.03
 BRUS |     -    25     -     -     -     -     -     -    48 |  286   0.07
 CRO1 |     -    25     -    35     -     -     -     -     - |  287   0.13
 DRAO |     -    43    82     -     -     -     -     -    59 |  288   0.11
 FAIR |     -     -   188   182     -     -     -     -   227 |  286   0.35
 GALA |     -    76     -   133    90     -     -     -     - |  288  34.04
 GRAZ |     -    22     -     -     -     -     -     -    42 |  283  16.47
 GUAM |     -    44     -   106    40     -     -     -    73 |  288  24.15
 HRAO |     -   111     -     -     -     -     -     -   214 |  276  38.66
 IISC |     -   114     -   249     -     -     -     -   376 |  288  35.47
 KIRU |     -   160     -   230     -     -     -     -     - |  287   5.75
 KOKB |     -     -     -   126    71     -     -     -     X |  271   2.79
 KOSG |     -    56     -    54     -     -     -     -    60 |  288  35.19
 KOUR |     -    51     -    80     -     -     -     -    48 |  288  40.41
 LPGS |     -   153     -   220     -     -     -     -     - |  150  19.21
 MALI |     -   125     -    99    56     -     -     -   132 |  288  17.63
 MAS1 |     -    31    46    83    35     -     -     -    36 |  288   2.77
 MCM4 |     -   127     -   133   113     -     -     -   322 |  288  59.97
 MKEA |     -     -   103    67    33     -     -     -     - |  288  52.94
 NRC2 |     -    36    59    52     -     -     -     -     - |  288   0.08
 NTUS |     -    66     -     -     -     -     -     -   127 |  286   6.69
 NYA1 |     -    84     -     -    69     -     -     -     - |  288   0.15
 NYAL |     -     -    14     -     -     -     -     -    16 |   89   0.17
 OHIG |     -    69     -    92    72     -     -     -    77 |  288  17.85
 PENC |     -    22     -     -     -     -     -     -    42 |  285   3.96
 PERT |     -    34     -    68    33     -     -     -     - |  288  19.14
 PIE1 |     -    26     -    37     -     -     -     -     - |  209   0.03
 POTS |     -    82     -    87     -     -     -     -    58 |  288  12.56
 RIOG |     -    68     -    69    55     -     -     -     - |  288  17.34
 SANT |     -     -     -   155   104     -     -     -   265 |  282  31.61
 SELE |     -    19     -    27     -     -     -     -     - |  287  40.70
 STJO |     -    80    44     -    62     -     -     -     - |  288  23.25
 TIXI |     -    22     -     -    18     -     -     -     - |  287   9.60
 TLSE |     -    15     -     -     -     -     -     -    28 |  234   0.43
 TRO1 |     -    32     -     -    26     -     -     -     - |  204  12.49
 TROM |     -     -     -    81     -     -     -     -   108 |  287  14.51
 TSKB |     -    77    98   102    53     -     -     -     - |  223   1.42
 USUD |     -    75     -    58     -     -     -     -   123 |  288   0.30
 VILL |     -    38    84    60     -     -     -     -     - |  288  23.63
 WES2 |     -    24     -     -     -     -     -     -    45 |  285   0.04
 WHIT |     -    45     -     -    36     -     -     -     - |  288   1.94
 WTZR |     -    38     -    55     -     -     -     -    31 |  288   0.06
 WUHN |     -    35     -    44    44     -     -     -    74 |  287  27.97
 YAR2 |     -   136     -   128     -     -     -     -   219 |  197 198.03
 YELL |     -    32    81    70     -     -     -     -    59 |  288   0.06
 ZWEN |     -     -     -     -    11     -     -     -    27 |  288  17.88
 -----+-------------------------------------------------------+--------------
 TOT  |  4781    88   143   124    74  4087  4750     -   158 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

