
 GPS week: 1132   Day: 6   MJD: 52174                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2685      0     0.04    -0.16     4.79     0.00
 cod |   288     0  24211    345    -0.20    -2.04     0.08    24.96
 emr |    96     0   3807    270   338.81     8.50     0.12    13.80
 esa |   288     0  19012   1107   337.36     6.10     0.13    13.73
 gfz |   288     0  14941    238    -0.10    -0.71     0.10    19.90
 igu |    96     0   2301      0     0.03    -0.13     5.71     0.00
 ngs |    96     0   2685      0     0.05    -0.16     4.68     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25171   1393   701.74     5.58     0.07    27.61

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  6134   106  -100  -182   143 14363  4598     -   -91 |
    2 |  6971    26    22  -268   148 10421  5794     -     - |
    3 |   889   -87   231   130   151  6476   229     -  -133 |
    4 | -8188   154  -201   176   202     - -7166     -  -369 |
    5 |  -117   -46  -100   426   -19 -1737   -90     -  -140 |
    6 |  5212   -30    66   452   104 14380  4372     -  -284 |
    7 | -1124    -7  -192    32    31  3290   121     -     X |
    8 |   683   121     X  -300   123  2936   554     -   -49 |
    9 |  3000   111  -401   211   -14  4411  3227     -  -128 |
   10 |-10796   236  -428   241   -96 -3368-10344     -  -192 |
   11 |  1908   -72   247   -43    18   263  2110     -    32 |
   13 |  4617   242   -43   -71    18  2264  4673     -  -189 |
   14 |  -528    78   107   -14    -6 -1048    28     -   -77 |
   15 |-11881    29    46     -   -47 -4907-11495     -     0 |
   17 |-10759   114   -77   566  -202     - -8820     -  -228 |
   18 |  7043    38  -252   174    17   416  7086     -   -89 |
   20 |  4792     3   194  -207   138   522  4809     -   -31 |
   21 |  3750   184  -214     X    86     -  2372     -  -171 |
   22 |   585   -28   329   173    55 -6337   284     -  -156 |
   23 |  1384   226  -227   -60   109     -  1106     -  -222 |
   24 | -5417    92  -296   455    -2 -1631 -5209     -  -260 |
   25 | -1019    38   144    46   183  3734  -908     -  -214 |
   26 |  2275    62  -435   572   -50  -605  1750     -  -210 |
   27 |  9833    89     X  -125    76 10296  8476     -   -73 |
   28 |  1306    42   -15  -384    81 -9018  1542     -    98 |
   29 |   297   139    60   -27    98 -6411  -261     -  -193 |
   30 | -8500   -38   123   513    65-26515 -7372     -  -283 |
   31 | -2126  -108   240    -2   110-11854 -1281     -   -21 |
 -----+-------------------------------------------------------+
 ALBH |     -  -230     -     X     -     -     -     -   208 |
 ALGO |     -   -82   120     X   -10     -     -     -    61 |
 AMC2 |     -   -63     -     -     -     -     -     -    57 |
 AOML |     -   -69     -     -     -     -     -     -    63 |
 AREQ |     -   -97     -    28     -     -     -     -    73 |
 AUCK |     -    -4     -  -263     -     -     -     -   121 |
 BAHR |     -   127   102   -51    12     -     -     -  -116 |
 BILI |     -    59     -     -   -73     -     -     -     - |
 BOR1 |     -    14     -     -     -     -     -     -   -13 |
 BRMU |     -   379     -  -124  -175     -     -     -     2 |
 CAS1 |     -  -121     -   124   -28     -     -     -    68 |
 COCO |     -   217     -  -363    17     -     -     -   -28 |
 CRO1 |     -  -122     -   222     -     -     -     -     X |
 DAV1 |     -   -13     -     -   -42     -     -     -    42 |
 DRAO |     -  -109   -27     -     -     -     -     -   103 |
 FAIR |     -     -    74   -74     -     -     -     -    25 |
 GALA |     -  -308     -  -319  -464     -     -     -   878 |
 GRAZ |     -   -89     -     -     -     -     -     -    81 |
 GUAM |     -  -135     -    24    -9     -     -     -   114 |
 HRAO |     -  -113     -     -     -     -     -     -   102 |
 IISC |     -    47     -  -151     -     -     -     -    31 |
 KARR |     -  -131     -     -   164     -     -     -     - |
 KERG |     -   129     -     -     -     -     -     -  -117 |
 KIRU |     -    83     -  -150     -     -     -     -     - |
 KOKB |     -     -     -    36   -25     -     -     -     X |
 KOSG |     -   -72     -   -72     -     -     -     -   101 |
 KSTU |     -   -54     -     -     -     -     -     -    49 |
 LPGS |     -   167     -  -878     X     -     -     -   238 |
 MAC1 |     -    31     -   412  -323     -     -     -     X |
 MALI |     -     -     -  -194     -     -     -     -    96 |
 MAS1 |     -   -73   132   133   -88     -     -     -    42 |
 MATE |     -   -44     -     -     -     -     -     -    40 |
 MAW1 |     -    56     -     -     -     -     -     -   -51 |
 MCM4 |     -   -18     -   -13    29     -     -     -     X |
 MDO1 |     -  -381    41     -     -     -     -     -   307 |
 MEDI |     -  -113     -     -     -     -     -     -   103 |
 MKEA |     -     -     3  -134     -     -     -     -    66 |
 NKLG |     -     -     -  -292     -     -     -     -   145 |
 NLIB |     -   -67     -     -     -     -     -     -    60 |
 NPLD |     -  -104     -     -     -     -     -     -    94 |
 NRC2 |     -    63   271  -343     -     -     -     -    69 |
 NTUS |     -    91     -     -     -     -     -     -   -82 |
 NYA1 |     -   -31     -     -  -125     -     -     -   119 |
 OHIG |     -   -79     -    62   -83     -     -     -   100 |
 ONSA |     -  -128   112   164     -     -     -     -    15 |
 PENC |     -   180     -     -     -     -     -     -  -163 |
 PERT |     -   149     -   -92     -     -     -     -   -88 |
 PIE1 |     -   -87     -  -124     -     -     -     -   137 |
 POTS |     -   -60     -    53     -     -     -     -    27 |
 REYK |     -    12     -     -     -     -     -     -   -11 |
 RIOG |     -  -163     -   355  -119     -     -     -    58 |
 SANT |     -     X     -    72    50     -     -     -   -72 |
 STJO |     -  -183   199     -   -63     -     -     -   179 |
 THTI |     -     -     -     -  -285     -     -     -   205 |
 TRO1 |     -  -116     -     -   146     -     -     -     - |
 TROM |     -     -     -   -47     -     -     -     -    23 |
 TSKB |     -     X     X   725     -     -     -     -  -361 |
 URUM |     -  -111     -     -     -     -     -     -   100 |
 USNO |     -    57     -  -509     -     -     -     -   202 |
 USUD |     -    41     -   -34     -     -     -     -   -20 |
 VILL |     -   -38     -    77     -     -     -     -    -4 |
 WHIT |     -    34     -     -   -42     -     -     -     - |
 WSRT |     -    -6     -     -     -     -     -     -     5 |
 WTZR |     -  -102     -   118     -     -     -     -    33 |
 WUHN |     -    76     -  -411   -69     -     -     -   186 |
 YELL |     -    41   139  -267     -     -     -     -    73 |
 ZWEN |     -     -     -   -50    19     -     -     -    12 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  3556    81    90   145    82  8141  3921     -    31 |  288   3.00
    2 |  4589   181    99   260   104  5573  3871     -     - |  279   2.00
    3 |  4195    97   148   118   198  2716  3992     -   126 |  288   2.28
    4 |  3881   137   136   151    85     -  3749     -   185 |  288   0.64
    5 |  3619    54   185    76   129  2754  3504     -    64 |  288   2.82
    6 |  5629    87    47   154    38  8185  6471     -    31 |  288   6.30
    7 |  9121   118   248   142    63  3062  8611     -     X |  288   1.28
    8 |  2521   138     X    82    54  1393  2386     -   154 |  288   2.34
    9 |  3532    45   143   110    90  3722  3741     -    65 |  288   2.92
   10 |  2883    73   249    65   160  5032  3219     -   123 |  288   2.21
   11 |   815    76   127    78   103   711   711     -   108 |  288   0.41
   13 |   807    61   100   129   114  1587   800     -    70 |  288   0.38
   14 |  1759   130   208    53   185   337  1599     -    36 |  288   0.19
   15 |  6081    97   108     -   174  5874  5580     -    73 |  288   3.78
   17 |  5011    64    85   155    87     -  4009     -    32 |  288   3.42
   18 |   749   181    60   236    91   373   841     -    47 |  288   0.39
   20 |  1583    66    48   116    77   486  1422     -    48 |  288   0.21
   21 |  5996   201   261     X    86     -  6551     -   158 |  288   3.53
   22 |  3229    61    64    60    61  4099  2852     -    74 |  288   0.82
   23 |  7626   112    94   244    39     -  7381     -    84 |  288   5.81
   24 |  5047   127   176   113    98  3700  5474     -   187 |  288   4.10
   25 |  4557   102   116    70    95  5886  4646     -    29 |  288   1.89
   26 |  5051    54   143   205    66  2430  5448     -   101 |  288   1.95
   27 |  9917    81     X    76    52 10080  9035     -    58 |  288   5.13
   28 |  4683   148   126   105    61  7217  4415     -   115 |  288   0.90
   29 |  4523    55    80    79    79  3867  4296     -    51 |  288   0.91
   30 |  3567    48   104   152   102 16379  3255     -    81 |  288   1.64
   31 |  5315    73    67   108    45  3863  5452     -   108 |  288   3.05
 -----+-------------------------------------------------------+--------------
 ALBH |     -    24     -     X     -     -     -     -    21 |  286   0.09
 ALGO |     -    31    46     X    37     -     -     -    26 |  288   0.08
 AMC2 |     -    20     -     -     -     -     -     -    18 |  286   0.07
 AOML |     -    60     -     -     -     -     -     -    54 |  285  21.30
 AREQ |     -    52     -    78     -     -     -     -    59 |  288  26.98
 AUCK |     -    57     -   125     -     -     -     -    60 |  287  19.49
 BAHR |     -    80    88    77    22     -     -     -    37 |  288   0.53
 BILI |     -    16     -     -    20     -     -     -     - |  287  14.36
 BOR1 |     -    21     -     -     -     -     -     -    19 |  286   2.74
 BRMU |     -   172     -   120    70     -     -     -    99 |  288  29.12
 CAS1 |     -    38     -   168    42     -     -     -    97 |  288  10.68
 COCO |     -    70     -    95    45     -     -     -    43 |  288  12.99
 CRO1 |     -    32     -    57     -     -     -     -     X |  284   0.20
 DAV1 |     -   114     -     -    59     -     -     -    68 |  288  24.61
 DRAO |     -    24    75     -     -     -     -     -    18 |  288   0.09
 FAIR |     -     -   129   212     -     -     -     -   108 |  281   0.19
 GALA |     -    69     -    82   134     -     -     -    66 |  285  26.24
 GRAZ |     -    94     -     -     -     -     -     -    85 |  281  25.14
 GUAM |     -    68     -    90   201     -     -     -   185 |  288  29.33
 HRAO |     -    86     -     -     -     -     -     -    78 |  277  37.61
 IISC |     -   151     -   271     -     -     -     -    58 |  283  31.74
 KARR |     -    94     -     -   118     -     -     -     - |  226  36.03
 KERG |     -    51     -     -     -     -     -     -    46 |  287   1.48
 KIRU |     -    39     -    70     -     -     -     -     - |  274   3.45
 KOKB |     -     -     -   198   137     -     -     -     X |  271   0.88
 KOSG |     -    21     -    53     -     -     -     -    28 |  288  13.25
 KSTU |     -    90     -     -     -     -     -     -    81 |  274  15.97
 LPGS |     -   113     -   113     X     -     -     -   109 |  250  48.63
 MAC1 |     -    62     -   149    48     -     -     -     X |  288  15.66
 MALI |     -     -     -   143     -     -     -     -    71 |  281  35.30
 MAS1 |     -    53    49   109    35     -     -     -    27 |  288   2.03
 MATE |     -    25     -     -     -     -     -     -    22 |  287   0.16
 MAW1 |     -   116     -     -     -     -     -     -   105 |  286  28.35
 MCM4 |     -   106     -   342   281     -     -     -     X |  221  26.20
 MDO1 |     -    32    79     -     -     -     -     -    39 |  246 288.74
 MEDI |     -    30     -     -     -     -     -     -    27 |  286   0.35
 MKEA |     -     -    68   103     -     -     -     -    45 |  286  49.70
 NKLG |     -     -     -    71     -     -     -     -    35 |  287    >>>
 NLIB |     -    25     -     -     -     -     -     -    22 |  288   0.12
 NPLD |     -    32     -     -     -     -     -     -    28 |  285   0.08
 NRC2 |     -    26    59    67     -     -     -     -    36 |  288   0.10
 NTUS |     -    39     -     -     -     -     -     -    35 |  287   8.50
 NYA1 |     -    23     -     -    27     -     -     -    23 |  285   0.11
 OHIG |     -    69     -    82    36     -     -     -    70 |  288  18.84
 ONSA |     -    27    38    55     -     -     -     -    26 |  288   1.56
 PENC |     -    43     -     -     -     -     -     -    39 |  285   1.74
 PERT |     -    80     -    75     -     -     -     -    55 |  288  16.71
 PIE1 |     -    47     -    71     -     -     -     -    29 |  288   0.09
 POTS |     -    66     -    57     -     -     -     -    67 |  277  13.64
 REYK |     -    28     -     -     -     -     -     -    26 |  286  11.31
 RIOG |     -    53     -   215    79     -     -     -    99 |  276  17.66
 SANT |     -     X     -   170    57     -     -     -    66 |  281  26.82
 STJO |     -    36    43     -    48     -     -     -    28 |  288   2.96
 THTI |     -     -     -     -    62     -     -     -    45 |  231   2.41
 TRO1 |     -    23     -     -    29     -     -     -     - |  288  16.19
 TROM |     -     -     -    57     -     -     -     -    28 |  286  17.76
 TSKB |     -     X     X   119     -     -     -     -    59 |  220   1.19
 URUM |     -    52     -     -     -     -     -     -    47 |  288  27.85
 USNO |     -    35     -    51     -     -     -     -    40 |  288   0.08
 USUD |     -    69     -   102     -     -     -     -    35 |  288   0.38
 VILL |     -    32     -    65     -     -     -     -    30 |  288  25.36
 WHIT |     -    27     -     -    34     -     -     -     - |  288   4.81
 WSRT |     -    27     -     -     -     -     -     -    24 |  288   0.09
 WTZR |     -    52     -    63     -     -     -     -    29 |  288   0.15
 WUHN |     -    25     -    72    58     -     -     -    53 |  287  26.08
 YELL |     -   103   132    93     -     -     -     -    61 |  288   0.07
 ZWEN |     -     -     -    73    20     -     -     -    32 |  288  19.37
 -----+-------------------------------------------------------+--------------
 TOT  |  4790    80   125   128    97  5710  4678     -    73 |


 BEST CLOCK FIT: AMC2   286   0.07 (ns) 

