
 GPS week: 1131   Day: 3   MJD: 52164                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2687      0     0.13    -0.27     4.47     0.00
 cod |   288     0  26082    232    -0.64    -1.93     0.06    19.31
 emr |    96     0   3640    316   226.00    12.95     0.10     9.89
 esa |   288     0  18111   1617   196.68     5.00     0.11     9.64
 gfz |   288     0  15244    269     0.16    -0.28     0.09    12.19
 igu |    96     0   2400      0     0.13    -0.22     4.20     0.00
 jpl |   282     0  10522    550    -0.37     0.91     0.05    29.48
 ngs |    96     0   2687      0     0.12    -0.25     4.39     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25740   1094   623.59     9.90     0.06    19.49

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  2162    68   -14  -132   142  -591    11  2085     -  -100 |
    2 | -1116    -4   -91     X   -63     -   155 -1488     -     - |
    3 | -8672    -6    35    57   193  -762   -69 -8557     -  -120 |
    4 |  1716    85     X   150   106 -2232   -75  1001     -  -196 |
    5 | -3932   -21  -137   119  -217 -5670   246 -3166     -  -143 |
    6 | -2927   177  -221   293    80  6303   -82 -2504     -  -244 |
    7 |   211    29   -37   -23   -32 -5485    35   424     -   -29 |
    8 |  6429    24   -78    -8   108 21995    75  5592     -  -102 |
    9 | -3222   116  -277    55    54  -147   146 -2760     -  -184 |
   10 |  2033   -14     X   352  -270  9283   185  1744     -  -191 |
   11 |  4036   -94    63   233   -65  1145    -8  3581     -    16 |
   13 |  6455   179   263   -21    48   807   -34  6167     -  -202 |
   14 |  3435   156   -17    68  -124   499   -49  3337     -   -89 |
   15 |  1833   119   -98     -    35     -   120  1173     -  -169 |
   17 |  5789   259   -91  -244    -6     -    86  4696     -  -223 |
   18 |  6553   109    24   -39   -80  4697    -7  6302     -   -40 |
   20 |  6965   -10   240    74    -8  1645    16  6691     -   -68 |
   21 | -1750   229  -274     X  -112  -874   167 -1568     -  -283 |
   22 | -7775    38   119   132    99-17116   163 -7545     -  -248 |
   23 |  2152   113  -329   794  -193    59   109  2232     -  -358 |
   24 | -5280    93     -   477  -105   635   -75 -4789     -  -182 |
   25 | -1309    38     X   135   362  8065    17 -1384     -  -383 |
   26 |  -206   119  -184   408  -115 -2069   169  -399     -  -281 |
   27 |  -754     7   -66  -184   337  6839  -103  -283     -   -98 |
   28 |  4137   -88    57  -207  -126 -9464    82  4297     -   169 |
   29 | -2438   193  -121   132    15 -2343    29 -2341     -  -256 |
   30 | -7215    76   -82   251   121-13386  -150 -6300     -  -203 |
   31 | -7247  -110    67  -149   283 -1835    20 -6185     -   -27 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -79     -     X     -     -     X     -     -    78 |
 ALGO |     -    -5   213   -11   -13     -   -48     -     -    54 |
 AMC2 |     -    44     -     -     -     -  -172     -     -   213 |
 ANKR |     -    43     -   -86     -     -     -     -     -     - |
 AOML |     -  -141     -     -     -     -     -     -     -   140 |
 AUCK |     -    78     -   -85     -     -     -     -     -   -35 |
 BAHR |     -     -     -  -109    64     -    -6     -     -    22 |
 BILI |     -    11     -     -   -18     -     -     -     -     - |
 BOR1 |     -    62     -     -     -     -     -     -     -   -61 |
 BRMU |     -   -82     -    40    93     -     -     -     -     3 |
 BRUS |     -     8     -     -     -     -    22     -     -   -41 |
 CAS1 |     -  -102     -     -   -59     -   104     -     -   -14 |
 CRO1 |     -  -248     -   -19     -     -    61     -     -   167 |
 DAV1 |     -    -7     -     -    47     -     -     -     -   -23 |
 DRAO |     -   -66   102     -     -     -     -     -     -    48 |
 GALA |     -    46     -    72  -141     -    23     -     -   -21 |
 GUAM |     -     3     -  -106    76     -   -99     -     -   147 |
 HOB2 |     -   -48     -  -208     -     -     -     -     -    90 |
 HRAO |     -   -10     -     -     -     -  -141     -     -   217 |
 IISC |     -   -36     -   -67     -     -     -     -     -    69 |
 KARR |     -  -128     -     -   203     -     -     -     -     - |
 KERG |     -    -4     -     -     -     -     X     -     -     4 |
 KIRU |     -   186     -  -374     -     -     -     -     -     - |
 KOKB |     -     -     -    14    11     -    -9     -     -     X |
 KOSG |     -  -115     -     2     -     -     -     -     -   113 |
 KOUR |     -    12     -   -36     -     -     -     -     -     5 |
 LPGS |     -  -105     -     X     X     -    69     -     -     X |
 MAC1 |     -   -68     -    39   -64     -     -     -     -   107 |
 MALI |     -  -170     -    72    77     -     -     -     -    82 |
 MAS1 |     -    37   130   -92   -78     -     -     -     -    36 |
 MATE |     -   363     -     -     -     -  -634     -     -   573 |
 MAW1 |     -    -3     -     -     -     -     -     -     -     3 |
 MCM4 |     -   159     -  -112  -170     -     -     -     -     X |
 MDO1 |     -  -111     -     -     -     -     -     -     -   110 |
 MEDI |     -   -88     -     -     -     -     -     -     -    87 |
 METS |     -   -55     -     -     -     -     -     -     -    55 |
 MKEA |     -   -70   252  -157     -     -     -     -     -   105 |
 MSKU |     -   -31     -     -    49     -     -     -     -     - |
 NKLG |     -     -     -  -309     -     -     -     -     -   153 |
 NLIB |     -  -171     -     -     -     -     -     -     -   170 |
 NPLD |     -  -196     -     -     -     -     -     -     -   194 |
 NRC2 |     -   -73   269     -     -     -    10     -     -    12 |
 NTUS |     -    16     -     -     -     -     -     -     -   -16 |
 NYAL |     -     -   -46     -     -     -     -     -     -    23 |
 OHIG |     -   -53     -    62   -80     -    20     -     -    35 |
 ONSA |     -   -39     5    38     -     -     -     -     -    20 |
 PERT |     -   -44     -   -21     -     -     -     -     -    54 |
 PIE1 |     -   -82     -     X     -     -     -     -     -    81 |
 POTS |     -   -11     -   -45   -25     -     -     -     -    49 |
 REYK |     -   -22     -     -     -     -     -     -     -    22 |
 RIOG |     -    -7     -   190   -46     -     -     -     -   -54 |
 SANT |     -     -     -   117     1     -     -     -     -   -58 |
 SFER |     -  -203     -     -     -     -     -     -     -   201 |
 STJO |     -   -39   207     -  -116     -     -     -     -    76 |
 THTI |     -     -     -     -  -224     -    -9     -     -   152 |
 TLSE |     -  -214     -     -     -     -     -     -     -   212 |
 TRO1 |     -  -115     -     -   183     -     -     -     -     - |
 TROM |     -     -     -   -42     -     -     -     -     -    21 |
 TSKB |     -    85  -118  -237     -     -     -     -     -    59 |
 URUM |     -    42     -     -     -     -     -     -     -   -41 |
 USNO |     -    39     -  -648     -     -   102     -     -   131 |
 USUD |     -   -21     -    83     -     -     -     -     -   -20 |
 VILL |     -   -58    28    -9     -     -     -     -     -    58 |
 WES2 |     -   -10     -     -     -     -     -     -     -    10 |
 WHIT |     -    33     -     -   -52     -     -     -     -     - |
 WSRT |     -    12     -     -     -     -   -60     -     -    78 |
 WTZR |     -    24     -  -102     -     -     0     -     -    27 |
 WUHN |     -  -190     -  -221  -114     -   164     -     -   127 |
 YAR2 |     -     X     -  -153     -     -    50     -     -     X |
 YELL |     -    59   210  -191     -     -   -66     -     -   103 |
 YSSK |     -    37     -     -     -     -   -24     -     -     - |
 ZWEN |     -     -     -     -   -53     -     -     -     -    33 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3577    99   118   111   148  2483    47  3710     -    28 |  288   3.32
    2 |  4986    42    94     X    64     -    66  5031     -     - |  288   2.83
    3 |  3652   106   121   204    35  2122    36  3774     -    34 |  288   2.50
    4 |  3726    52     X    77    82  2686    29  3700     -    61 |  288   0.92
    5 |  6231    62    47   176    90  4613    59  5934     -    58 |  288   4.33
    6 |  7716    40    57   165   192  5679    36  8306     -    44 |  288   7.90
    7 |  5088    64   194   204    59  1077    52  4952     -   109 |  288   0.69
    8 |  7128   103    74   101    69  8399    46  5193     -    34 |  285   2.22
    9 |  4273    79   139    92    76  2156    43  4237     -    63 |  288   2.24
   10 |  4307    46     X    75   129  5054    30  4670     -    53 |  288   3.62
   11 |  2405    90    88    43    52   767    82  2062     -    95 |  288   0.48
   13 |   845    88   143    89    39   756    51   806     -    71 |  288   0.23
   14 |   720    43   170    37   112   442    32   699     -    96 |  288   0.21
   15 |  4787    80   112     -    88     -    32  5298     -    99 |  288   3.03
   17 |  5573   104   130   243    79     -    70  5305     -    59 |  285   2.86
   18 |   664    66   160   112    64  2028    29   482     -    43 |  288   0.42
   20 |  1088    63    65    85    93   947    37   926     -    68 |  288   0.27
   21 |  4094    98    78     X   215  4126    79  3854     -   137 |  288   3.58
   22 |  1526   110    75   224    82  9487    48  1744     -    53 |  288   0.90
   23 |  6479    98   156   233    65  3635    55  6315     -   122 |  288   6.12
   24 |  4512    79     -    93    86  1779    52  4485     -    85 |  288   1.46
   25 |  1559    76     X   136   159  4351    49  1507     -   190 |  288   1.45
   26 |   897    97    76   118    30  1451    43   819     -    29 |  288   0.63
   27 |  9469    98   157   127   102  5271    48  9460     -   121 |  288   5.92
   28 |  2701    50   133    88    57  5216    44  2338     -    65 |  288   0.46
   29 |   799    35    57    97   122  2067    23   956     -    57 |  288   0.68
   30 |  3562    85    36    73   218  7120    51  3054     -    30 |  288   0.72
   31 |  5691    88   146    90    72  3335    51  5794     -    53 |  288   3.57
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    17     -     X     -     -     X     -     -    17 |  286   0.06
 ALGO |     -    34    57    43    49     -    43     -     -    23 |  288   0.04
 AMC2 |     -    35     -     -     -     -    20     -     -    33 |  288   0.04
 ANKR |     -    28     -    57     -     -     -     -     -     - |  288  46.98
 AOML |     -    42     -     -     -     -     -     -     -    42 |  285  25.48
 AUCK |     -    35     -    72     -     -     -     -     -    46 |  288  20.98
 BAHR |     -     -     -    79    58     -    16     -     -    39 |  288   0.50
 BILI |     -    33     -     -    52     -     -     -     -     - |  284  12.61
 BOR1 |     -    36     -     -     -     -     -     -     -    36 |  286   2.54
 BRMU |     -    26     -    63    23     -     -     -     -    34 |  288  29.00
 BRUS |     -   106     -     -     -     -    51     -     -    41 |  276   0.06
 CAS1 |     -   102     -     -    91     -    34     -     -   150 |  288   9.65
 CRO1 |     -    86     -    90     -     -    50     -     -    33 |  288   0.48
 DAV1 |     -    36     -     -    48     -     -     -     -    58 |  288  22.26
 DRAO |     -    36    80     -     -     -     -     -     -    32 |  288   0.10
 GALA |     -    55     -    72    31     -    48     -     -    52 |  288  22.22
 GUAM |     -    56     -    68    74     -    52     -     -    39 |  288  20.28
 HOB2 |     -    38     -    52     -     -     -     -     -    30 |  288   0.08
 HRAO |     -   133     -     -     -     -    39     -     -    86 |  288  39.45
 IISC |     -    46     -    56     -     -     -     -     -    32 |  288  31.30
 KARR |     -    86     -     -   137     -     -     -     -     - |  212  14.70
 KERG |     -    59     -     -     -     -     X     -     -    59 |  287   1.82
 KIRU |     -    38     -    76     -     -     -     -     -     - |  288   3.06
 KOKB |     -     -     -   168   114     -    61     -     -     X |  285   0.89
 KOSG |     -    35     -    44     -     -     -     -     -    37 |  287    >>>
 KOUR |     -    80     -    81     -     -     -     -     -    48 |  288  33.75
 LPGS |     -    87     -     X     X     -    57     -     -     X |  262  23.23
 MAC1 |     -    36     -    93    45     -     -     -     -    52 |  288  14.68
 MALI |     -    39     -   141    72     -     -     -     -    49 |  288  27.68
 MAS1 |     -    20    38    52    22     -     -     -     -    26 |  288   1.92
 MATE |     -    46     -     -     -     -    28     -     -    31 |  287   0.13
 MAW1 |     -    42     -     -     -     -     -     -     -    42 |  285  27.82
 MCM4 |     -    45     -   104    26     -     -     -     -     X |  284    >>>
 MDO1 |     -    25     -     -     -     -     -     -     -    25 |  278  11.90
 MEDI |     -    23     -     -     -     -     -     -     -    23 |  286   0.61
 METS |     -    30     -     -     -     -     -     -     -    29 |  285   0.44
 MKEA |     -    42    69    99     -     -     -     -     -    57 |  288  36.67
 MSKU |     -    45     -     -    72     -     -     -     -     - |  273  38.28
 NKLG |     -     -     -    86     -     -     -     -     -    42 |  287    >>>
 NLIB |     -   119     -     -     -     -     -     -     -   118 |  287 782.44
 NPLD |     -    43     -     -     -     -     -     -     -    42 |  285   0.08
 NRC2 |     -    55    51     -     -     -    31     -     -    23 |  288   0.09
 NTUS |     -    28     -     -     -     -     -     -     -    27 |  288   6.52
 NYAL |     -     -    21     -     -     -     -     -     -    10 |   96   0.21
 OHIG |     -   193     -   195   147     -    66     -     -   199 |  287  21.96
 ONSA |     -    31    31    53     -     -     -     -     -    40 |  288   1.26
 PERT |     -    27     -    61     -     -     -     -     -    38 |  288  17.76
 PIE1 |     -    34     -     X     -     -     -     -     -    33 |  282   0.06
 POTS |     -    29     -    63    30     -     -     -     -    34 |  288  13.69
 REYK |     -    27     -     -     -     -     -     -     -    27 |  285   8.53
 RIOG |     -    80     -   123    72     -     -     -     -    27 |  264  13.88
 SANT |     -     -     -    84    83     -     -     -     -    46 |  285  25.84
 SFER |     -    33     -     -     -     -     -     -     -    33 |  285   1.09
 STJO |     -    36    99     -   117     -     -     -     -    77 |  286   3.80
 THTI |     -     -     -     -    53     -    21     -     -    34 |  287   1.83
 TLSE |     -    29     -     -     -     -     -     -     -    29 |  285   0.41
 TRO1 |     -    20     -     -    31     -     -     -     -     - |  288  14.39
 TROM |     -     -     -    49     -     -     -     -     -    24 |  286  15.49
 TSKB |     -    65   133    94     -     -     -     -     -    37 |  278   1.02
 URUM |     -    52     -     -     -     -     -     -     -    52 |  288  19.39
 USNO |     -    52     -    45     -     -    39     -     -    25 |  288   0.03
 USUD |     -    59     -    97     -     -     -     -     -    41 |  288   0.33
 VILL |     -    25    37    51     -     -     -     -     -    24 |  288  17.24
 WES2 |     -    21     -     -     -     -     -     -     -    21 |  286   0.15
 WHIT |     -    25     -     -    40     -     -     -     -     - |  286   3.32
 WSRT |     -    29     -     -     -     -    18     -     -    32 |  288   0.04
 WTZR |     -    39     -    54     -     -    19     -     -    34 |  288   0.05
 WUHN |     -    50     -    71    63     -    60     -     -    46 |  287  24.68
 YAR2 |     -     X     -    92     -     -    30     -     -     X |  268   7.15
 YELL |     -    59   109    65     -     -    36     -     -    49 |  288   0.05
 YSSK |     -    33     -     -     -     -    22     -     -     - |  281  10.40
 ZWEN |     -     -     -     -    47     -     -     -     -    29 |  268  13.49
 -----+-------------------------------------------------------------+--------------
 TOT  |  4475    65   105   109    92  4198    46  4387     -    63 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

