
 GPS week: 1130   Day: 0   MJD: 52154                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2744     45     0.34    -0.68     4.96     0.00
 cod |   288     0  20057    260    -0.51     0.66     0.09    24.50
 esa |   288     0  17259    302 -2758.00    22.27     0.11    20.85
 gfz |   288     0  15292    324    -1.00     0.40     0.11    20.87
 igu |    96     0   2289      0     1.56    -0.89     3.25     0.00
 jpl |   284     0   9823    293     2.01     1.98     0.07    33.78
 ngs |    96     0   2744     56    -0.49     0.98     4.17     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------+
    1 | -5693   156   -10  -103 -7023   -89 -4730     - |
    2 | -2726  -141   106   -21 -1225    94 -2601     - |
    3 |  1839    93  -158    65   107   -20  1622     - |
    4 | -1698  -208  -143   552  2495  -205 -1659     - |
    5 |  1982   -44    19   -77  6867   156  1092     - |
    6 | -6782    20    -8   -44     -    36 -6151     - |
    7 | -5291   -71   104   -21 -4730     1 -4561     - |
    8 |  1273    43   146  -129 -1815   -72   523     - |
    9 |  -598    54   -60   -39 -4736    37   -93     - |
   10 |    48   -25  -144     4  9660   241    -5     - |
   11 |  3621   -97   199  -135  2453    60  4395     - |
   13 |  5190   188    66  -201 -3308  -107  5380     - |
   14 |  7090    49   -18   -48  4274    11  7353     - |
   15 | -2904   -23     -   -22     -    69 -2557     - |
   17 |-13040     -   -89    32     -    56-13144     - |
   18 |  1208   -39   133   -72  1760   -18  1771     - |
   19 | 21393   -31     X   180     -  -175 20280     - |
   20 |  5859    11    47   -51  -497   -12  6175     - |
   21 | -4593    86  -157    -6 -9384    83 -4179     - |
   22 |  4473   108  -156    48 -1025   -24  4196     - |
   23 | -6220    99  -284    30     -   134 -5244     - |
   24 | -2608    34   -34   -21   730    18 -2319     - |
   25 | -6724   -89    13   152 -3730   -74 -6421     - |
   26 | -5249   -27   175  -126  -366   -22 -4544     - |
   27 | -2275    15   142   -52  -241  -147 -1015     - |
   28 |  9861    65   143  -283 -1313    88  9421     - |
   29 | -1175   -78    19    77   317    -6  -855     - |
   30 | 14688    67  -113     4  9729    44  3679     - |
   31 | -3520    70    26   -51   761   -65 -3148     - |
 -----+-------------------------------------------------+
 ALBH |     -  -200  -179     -     -   259     -     - |
 ALGO |     -    40  -159   107     -     3     -     - |
 AMC2 |     -    15     -     -     -   -11     -     - |
 AREQ |     -   -32   123   -85     -     -     -     - |
 AUCK |     -   -91   107     X     -     -     -     - |
 BAHR |     -   103    95    13     -  -147     -     - |
 BILI |     -    45     -   -53     -     -     -     - |
 BRMU |     -  -128    67    83     -     -     -     - |
 BRUS |     -     4     -     -     -    -3     -     - |
 CAS1 |     -  -153   163   -66     -    53     -     - |
 CRO1 |     -    -2    29     -     -   -17     -     - |
 DAV1 |     -    38     -   -45     -     -     -     - |
 GALA |     -   -42    26    20     -     -     -     - |
 GUAM |     -     X   104   102     -  -132     -     - |
 HOB2 |     -  -521   612     -     -     -     -     - |
 HRAO |     -   238     -     -     -  -172     -     - |
 KARR |     -  -224     -   262     -     -     -     - |
 KERG |     -   328     -     -     -  -238     -     - |
 KIRU |     -   177  -207     -     -     -     -     - |
 KOKB |     -     -   -23   -12     -    21     -     - |
 KOSG |     -    35   -41     -     -     -     -     - |
 LHAS |     -    34   -40     -     -     -     -     - |
 MAS1 |     -   163  -171   -20     -     -     -     - |
 MCM4 |     -   -14    19    -2     -     -     -     - |
 MDO1 |     -  -375   441     -     -     -     -     - |
 NRC2 |     -  -161     7     -     -   114     -     - |
 NYA1 |     -    34     -    -6     -   -22     -     - |
 OHIG |     -   -99   241  -208     -    52     -     - |
 ONSA |     -   -57   -20    88     -     -     -     - |
 PERT |     -    29   -34     -     -     -     -     - |
 PIE1 |     -    80   -94     -     -     -     -     - |
 REYK |     -    52   -61     -     -     -     -     - |
 SANT |     -     -    80  -152     -    33     -     - |
 SELE |     -    67   -78     -     -     -     -     - |
 STJO |     -   -16     -    19     -     -     -     - |
 THTI |     -     -     -   156     -   -97     -     - |
 TRO1 |     -  -171     -   200     -     -     -     - |
 TSKB |     -   217  -255     -     -     -     -     - |
 USNO |     -    68  -309     -     -   144     -     - |
 USUD |     -   -75    89     -     -     -     -     - |
 VILL |     -    97  -114     -     -     -     -     - |
 WHIT |     -    11     -   -13     -     -     -     - |
 WSRT |     -   121     -     -     -   -88     -     - |
 WTZR |     -   -29   -24   107     -   -30     -     - |
 WUHN |     -     -  -272   -82     -   225     -     - |
 YELL |     -    70   -82     -     -     X     -     - |
 YSSK |     -    -2     -     3     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  4494    59   145   167  5106    36  4721     - |  288   2.58
    2 |  7720   170   252    69  4029    83  7952     - |  288   3.26
    3 |  3088    66    38    73  1593    42  2927     - |  288   1.37
    4 |  2222    77   159    71  2194    77  2013     - |  282   0.88
    5 |  4897   113   112    85  5801    82  4308     - |  288   2.35
    6 |  5361    90    72    65     -   121  5790     - |  288   5.62
    7 |  2332    75    88    59  2263    57  1884     - |  288   0.67
    8 |  7876   155    65   238  4582    77  6880     - |  282   3.07
    9 |  3452   147   132    71  3125    83  3305     - |  280   2.67
   10 |  4080   102   124   140  4376    83  3687     - |  288   2.01
   11 |  1843    91    66    73   628    78  1462     - |  288   0.31
   13 |  1005    85    31    70  1317    78  1070     - |  288   0.28
   14 |  2565    43    70    96  2003    46  2318     - |  288   0.22
   15 |  2919   133     -   171     -   156  2784     - |  275   2.46
   17 |  4456     -   198   227     -    93  3906     - |  259   2.65
   18 |  1545    69   120    75   786    41  1579     - |  288   0.33
   19 |  7537   134     X   128     -   212  7961     - |  257   4.86
   20 |  1122    90    68    78   679    54   769     - |  288   0.24
   21 |  2922    86    65    88  4295    86  3238     - |  288   2.63
   22 |  4254   126    46   176  2489    74  3646     - |  288   1.60
   23 |  6241   114   258    85     -    74  7074     - |  288   5.56
   24 |  2669    82    49    89  2289    52  2547     - |  283   2.71
   25 |  2570   201   222   101  2814   116  2746     - |  280   2.44
   26 |  2846    79    58    92   617    40  2800     - |  287   0.81
   27 |  8492    88   109   105  5885    65  6845     - |  282   4.20
   28 |  4471   141   101   129  1333    35  3708     - |  288   0.94
   29 |  1489    52    65    63   459    38  1152     - |  288   0.36
   30 | 18198   138    86   166  4454    88  3965     - |  288   0.54
   31 |  3898    84   187    74  4032    74  4073     - |  288   4.11
 -----+-------------------------------------------------+--------------
 ALBH |     -    59   201     -     -    93     -     - |  287   0.07
 ALGO |     -    30    44    34     -    22     -     - |  288   0.04
 AMC2 |     -    20     -     -     -    14     -     - |  283   0.04
 AREQ |     -    90    71    48     -     -     -     - |  288  35.95
 AUCK |     -    45    53     X     -     -     -     - |  286  17.20
 BAHR |     -    38    92    80     -    87     -     - |  288   0.42
 BILI |     -    28     -    33     -     -     -     - |  287  12.97
 BRMU |     -    43    81    38     -     -     -     - |  288  25.67
 BRUS |     -    50     -     -     -    36     -     - |  283   0.05
 CAS1 |     -    54    41    32     -    55     -     - |  288  10.14
 CRO1 |     -    66    49     -     -    28     -     - |  288   0.15
 DAV1 |     -    23     -    27     -     -     -     - |  288  21.55
 GALA |     -    98    71    45     -     -     -     - |  288  19.39
 GUAM |     -     X    47    62     -    59     -     - |  288  23.59
 HOB2 |     -    21    25     -     -     -     -     - |  288   0.06
 HRAO |     -   123     -     -     -    89     -     - |  270  28.33
 KARR |     -   338     -   397     -     -     -     - |  255  22.36
 KERG |     -    60     -     -     -    44     -     - |  275   1.64
 KIRU |     -    24    29     -     -     -     -     - |  288   3.67
 KOKB |     -     -   152    84     -    98     -     - |  286   0.67
 KOSG |     -    34    41     -     -     -     -     - |  288  24.06
 LHAS |     -    38    45     -     -     -     -     - |  288  12.45
 MAS1 |     -    74    41    65     -     -     -     - |  288   2.26
 MCM4 |     -   128   291   146     -     -     -     - |  288  10.07
 MDO1 |     -    29    35     -     -     -     -     - |  252 405.63
 NRC2 |     -    31    27     -     -    25     -     - |  288   0.07
 NYA1 |     -    59     -    26     -    36     -     - |  288   0.10
 OHIG |     -   114    59    93     -    25     -     - |  288  12.27
 ONSA |     -    23    35    29     -     -     -     - |  276   0.61
 PERT |     -    31    37     -     -     -     -     - |  288  19.13
 PIE1 |     -    37    43     -     -     -     -     - |  288   0.07
 REYK |     -    20    24     -     -     -     -     - |  288   8.20
 SANT |     -     -    95    96     -    59     -     - |  287  24.20
 SELE |     -    37    44     -     -     -     -     - |  287  35.40
 STJO |     -    31     -    36     -     -     -     - |  284   1.95
 THTI |     -     -     -    43     -    26     -     - |  271   2.64
 TRO1 |     -    48     -    57     -     -     -     - |  288  14.71
 TSKB |     -    19    22     -     -     -     -     - |  285   1.49
 USNO |     -    97   242     -     -    83     -     - |  288   0.08
 USUD |     -    38    45     -     -     -     -     - |  288   0.15
 VILL |     -    55    64     -     -     -     -     - |  288  17.77
 WHIT |     -    26     -    30     -     -     -     - |  288  12.75
 WSRT |     -    52     -     -     -    38     -     - |  280   0.06
 WTZR |     -    71    37    40     -    38     -     - |  288   0.09
 WUHN |     -     -    41    44     -    28     -     - |  286  28.49
 YELL |     -    27    32     -     -     X     -     - |  288   0.06
 YSSK |     -    18     -    21     -     -     -     - |  287  13.33
 -----+-------------------------------------------------+--------------
 TOT  |  4964    90   108   108  3248    69  4167     - |


 BEST CLOCK FIT: AMC2   283   0.04 (ns) 

